arXiv:1901.11265v2 [physics.ins-det] 22 Feb 2019

Identification of particles with Lorentz factor up to 10^4 with Transition Radiation Detectors based on micro-strip silicon detectors

J. Alozy^a, N. Belyaev^b, M. Campbell^a, M. Cherry^c, F. Dachs^{a,d}, S. Doronin^b, K. Filippov^b, P. Fusco^{e,f}, F. Gargano^f, E. Heijne^a, S. Konovalov^g, D. Krasnopevtsev^b, X. Llopart^a, F.Loparco^{e,f,∗}, V. Mascagna^{h,i}, M. N. Mazziotta^{f,∗}, H. Pernegger^a, D. Ponomarenko^b, M. Prest^{h,i}, D. Pyatiizbyantseva^b, R. Radomskii^b, C. Rembser^a, A. Romaniouk^{b,∗}, A. A. Savchenko^{b,j}, D. Schaefer^k, E. J. Schioppa^a, D. Shchukin^g, D. Yu Sergeeva^{b,j}, E. Shulga^b, S. Smirnov^b, Y. Smirnov^b, M. Soldani^{h,i}, P. Spinelli^{e,f}, M. Strikhanov^b, P. Teterin^b, V. Tikhomirov^g, A. A. Tishchenko^{b,j}, E. Vallazza^l, M. van Beuzekom^m, B. van der Heijden^m, K. Vorobev^b, K. Zhukov^g

aCERN, the European Organization for Nuclear Research, Esplanade des Particules 1, 1211 Geneva, Switzerland bNational Research Nuclear University MEPhI (Moscow Engineering Physics Institute), Kashirskoe highway 31, Moscow, 115409, Russia cDept. of Physics & Astronomy, Louisiana State University, Baton Rouge, LA 70803 USA dTechnical University of Vienna, Karlsplatz 13, 1040 Vienna, Austria e Dipartimento di Fisica “M. Merlin” dell’Università e del Politecnico di Bari, Via G. Amendola 173, 70126 Bari, Italy f Istituto Nazionale di Fisica Nucleare, Sezione di Bari, Via E. Orabona 4, 70126 Bari, Italy gP. N. Lebedev Physical Institute of the Russian Academy of Sciences, Leninsky prospect 53, Moscow, 119991, Russia hINFN Milano Bicocca, Piazza della Scienza 3, 20126 Milano iUniversitá degli Studi dell’Insubria, Via Valleggio 11, 22100, Como jNational Research Center “Kurchatov Institute”, Akademika Kurchatova pl. 1, Moscow, Russia kUniversity of Chicago, 5801 S Ellis Ave, Chicago IL 60637, USA lINFN Trieste, Padriciano 99, 34149 Trieste, Italy mNikhef, Science Park 105, 1098 XG Amsterdam, The Netherlands

Abstract

This work is dedicated to the study of a technique for hadron identification

in the TeV momentum range, based on the simultaneous measurement of the

energies and of the emission angles of the Transition Radiation (TR) X-rays with

∗Corresponding authors Email addresses: francesco.loparco@ba.infn.it (F.Loparco),

marionicola.mazziotta@ba.infn.it (M. N. Mazziotta), anatoli.romaniouk@cern.ch

(A. Romaniouk)

Preprint submitted to Nuclear Instruments & Methods A March 11, 2019

respect to the radiating particles. A detector setup has been built and tested with particles in a wide range of Lorentz factors (from about 10^3 to about 4×10^4 crossing different types of radiators. The measured double-differential (in energy and angle) spectra of the TR photons are in a reasonably good agreement with TR simulation predictions.

Keywords: Transition Radiation Detectors, Particle identification

1. Introduction

Particle identification (PID) is a crucial aspect in all high-energy physics experiments. There exist only 3 techniques which can identify particles without a significant effect of interaction with the detector material: Time-of-flight (TOF), Cherenkov radiation and Transition Radiation (TR). Transition radiation detectors (TRDs) are used for PID for many decades and can be the only option for PID in certain ranges of the Lorentz gamma factor.

Predicted by Ginzburg and Frank [1], TR is emitted whenever a charged particle crosses the interface between two media with different dielectric constants. In an ultrarelativistic case, the TR appears in a X-ray energy range and has a sort of threshold effect as a function of the gamma factor [2, 3]. Since the average number of TR photons per interface is small (usually one per 30 foils) radiators consisting of multiple foils (typical thickness of a few tens of μm) are used. Regularly spaced foils (the spacing from fraction to a few mm) allow to obtain a coherent sum of amplitudes from different foils and enhance the TR yield (see for instance [4]). In conventional detectors the TR emission usually starts from a threshold Lorentz factor γ_{th} of about 5 · 10^2 (this value depends on the radiator material and foil thickness) and saturates at a Lorentz factor of about 10 times larger than the threshold (defined by the ratio between the spacing and the foil thickness). TRDs are widely used for electron-hadron separation in both accelerator [5, 6] and cosmic-ray experiments [7] (see also the review in Ref. [8]). Such detectors efficiently separate electrons (positrons) from pions with momenta up to more than 100 GeV/c and from antiprotons (protons) in a momentum range extending up to about 1 TeV/c. The major factor which defines the performance of any TRD is its overall length. A typical TRD consists of a radiator followed by a X-ray detector (gaseous detectors are usually chosen); configurations with multiple TRD modules are often implemented to reach required particle separation. In order to achieve a hadron contamination at the level of 0.1% while keeping a 90% electron identification efficiency, a TRD length of at least 1 m is needed (see fig. 34.16 in ref. [8]). Alternative configurations have been also proposed, in which silicon strip detectors are used in conjunction with a magnetic field to separate the radiating particles from the TR photons in relatively modest distances [9–11].

Hadron identification with TRDs is usually more challenging, since the relative differences between the masses of the particles involved in the selection are smaller. In the past, several authors reported the performances of various TRD prototypes equipped with gaseous detectors, used to separate pions from protons and kaons at momenta up to 200 GeV/c [12–16]. They showed that pion contamination values of a few percent can be achieved while keeping a kaon selection efficiency of 90% at 140 GeV/c momentum with 15 sets of TRD modules. The results also show that, in order to achieve similar performance as in the electron-hadron case, longer TRDs are required.

With growing energies of particles at modern or planned accelerator experiments as well as in various cosmic-ray experiments there is a need to identify particles including hadrons with gamma factors up to ∼ 10^5. An example of such an experiment can be the measurement of the inclusive cross sections in the forward region for the production of charged particles in proton-proton, proton-nucleus and nucleus-nucleus interactions at center-of-mass energies of 14 TeV [17]. In these collisions, secondary hadrons (mainly pions, kaons, protons) are produced with momenta in the TeV range. Hadron identification in this range is highly challenging, since all particles have 1 − β < 10^{−5}, and Cherenkov detectors become ineffective. The only detector which can perform hadron identification in the TeV region is therefore the TRD.

In conventional TRDs, PID is performed exploiting the information about the energy loss in the detectors, which includes ionization losses and the energies of absorbed TR photons. Particles are separated by measuring the total energy deposited in the detector or by counting candidate TR photons. This approach is proven to be very effective for separation of particles which produce TR from those which do not produce it. Various species of hadrons with momenta in the TeV region have close masses and emit some amount of TR. In this case a setup which includes sets of detectors having different TR production thresholds must be used (see for instance [18]). This unavoidably ends up with a quite large material budget (in terms of radiation lengths and nuclear interaction lengths).

In order to enhance the PID performance of TRDs it is important to use all available information about TR production, e.g. to measure simultaneously the number of X-rays, their energies and the angles at which they are produced. This kind of measurement requires a high-granularity detector with high X-ray detection efficiency at a distance of about 1 m from the radiator in order to ensure particle-photon separations at the level of a hundred μm. Real detector performance strongly depends on the radiator parameters and particle gamma factors. Parameters of the detector can be optimized with simulations; however this study requires basic measurements and detailed comparisons with simulations. In the past, a few measurements of the TR angular distribution were made [15, 19]. In this paper for the first time the results of a high-precision measurement of the TR photon energies and production angles are presented.

The measurements were performed using a 300 μm thick double-face silicon strip detector (DSSD) with a readout strip pitch of 50 μm. They were carried out at the CERN SPS facility with 20 GeV/c electrons and with muons from 120 to 290 GeV/c crossing different types of radiators. Data are compared with the predictions of a dedicated simulation. Similar measurements were also performed using a silicon pixel detector. Preliminary results are published in [20] and detailed results will be published elsewhere.

Detector manufacturer CSEM [22] ASIC VA2 Sensitive area ( cm^2) 1.92 × 1.92 Si sensor thickness ( μm) 300 Number of readout channels 768 Leakage current ( nA/strip) 1.5 Full depletion bias voltage ( V) 50 p-side (junction) Strip pitch ( μm) 25 Readout pitch ( μm) 50 Floating scheme yes n-side (ohmic side) Strip pitch ( μm) 50 Readout pitch ( μm) 50 Floating scheme no

Table 1: General features of the silicon micro-strip detector installed at the test beam line.

2. Detector description and test beam setup

2.1. The silicon detector and the readout ASICs

A double-side high-resistivity 300 μm thick silicon micro-strip detector with a sensitive area of 1.92×1.92 cm^2 developed by the INSULAB group [21] was used in the test beam studies. The main features of the detector are summarized in Table 1. On the p-side (“junction side”) a readout scheme with one floating strip is implemented; it has 768 strips, with a pitch of 25 μm and with a readout pitch of 50 μm. The n-side (“ohmic side”) is equipped with 384 strips, orthogonal to those on the junction side, with a pitch of 50 μm. All the strips on the ohmic side are readout. Hence the detector has 384 readout strips with a 50 μm pitch on both sides. The detector is fully depleted with a bias voltage of 50 V. The average leakage current is of the order of 1.5 nA per strip.

Number of channels 128 ENC at 1 μs of peaking time ( e^−RMS) 80 + 15C_d( pF) Power consumption ( mW) 170 Shaper peaking time ( μs) 1 − 3 Dynamic range ( MIPs) ±4 Current gain ( μA/fC) 25

Table 2: Main technical parameters of the VA2 readout ASICs.

Each detector side is read-out by three 128 channels VA2 ASICs [23–25], with main parameters shown in table 2. The strips are capacitively coupled to the input of the ASICs using custom 128 channel capacitor chips built on a quartz substrate. Each ASIC channel consists of a low-noise charge sensitive amplifier, a CR-RC shaper and a sample-and-hold (S&H) circuit. The signal from each strip is amplified and shaped, and its peak amplitude is sampled by a hold signal, which is generated by the readout electronics after it receives a beam trigger signal. The 128 S&H outputs from each ASIC are then multiplexed into one output line. The peaking times of the ASICs connected to the junction and to the ohmic sides are set respectively to 1.5 μs and 2 μs, while the gains are adjusted to properly match the dynamic range of ADCs used for the digitization of the signals. A view of the detector installed in the test beam set-up is shown in Figure 1. The red circle indicates a 70 μm thick kapton foil, which is placed in front of the silicon detector to protect it from the light and to minimize the amount of passive materials along the beam.

The data acquisition system (DAQ) is controlled by a VME SBS Bit3 620 board [26] optically linked to a PC running Linux and includes a custom ADC board, a dedicated VME readout/memory board and a custom trigger board [27]. The ADC board is equipped with a 12-bit AD9220 ADC [28] for the signal digitization.

The pedestals of each strip are defined in dedicated pedestal runs. Noise level is defined on the basis of rms of the pedestal distributions and it is about

Figure 1: The silicon micro-strip detector installed on the beam line. The red circle indicates the kapton foil placed in front of the silicon detector.

1.39 keV for the strips on the junction side and of about 1.78 keV for those on the ohmic side. Here the noise level is expressed in energy scale using a calibration procedure described in Section 3.1. Noisy strips are also identified in pedestal runs and are masked in the data analysis. A total of 18 noisy strips (5 on the junction side and 13 on the ohmic side) have been masked. Nearly all masked strips are located at the edges of the detector.

2.2. Beam test setup

Measurements were performed at the CERN-SPS H8 facility, using a mixed electron-pion beam with a momentum of 20 GeV/c and muon beams with momenta of 290 GeV/c, 180 GeV/c and 120 GeV/c. Figure 2 shows a schematic view of the experimental setup. In order to separate the TR X-rays from the beam particles, the silicon detector was installed 220 cm downstream the radiator, with the junction side facing to the radiator. A 200 cm long pipe filled with helium was placed between the radiator and the detector to minimize the absorption of the X-rays along the path. A trigger system, which separates particles of different types, included scintillator counters, an upstream Cherenkov counter, a preshower detector and a lead-glass calorimeter. A multiplicity counter was used as veto to remove upstream showers and multi-particle events.

Periodic and irregular radiators made of different materials and with different

Figure 2: Schematic view of the experimental setup.

properties were used in the tests. The main properties of the radiators are summarized in Table 3. Radiators were made as sets. Each set of radiator was assembled inside its own support frame. The radiators consisting of multiple sets are stacked in such a way that the distance between foils of adjacent sets is the same as within one set.

3. Data analysis and results

3.1. Selection of particle clusters and energy calibration

A charged particle crossing a silicon micro-strip detector induces electrical signals on several adjacent strips. The ADC charge associated to a cluster is the sum of the charges of individual strips in the cluster. A particle cluster is defined starting from a “seed”, i.e. a strip with Signal-to-Noise level S/N > 20, and associating to it all the adjacent strips with S/N > 3. In addition, S/N > 30

Radiator Foil/gap material d_1 d_2 N_f Mylar (1 set) mylar/air 50 μm 2.97 mm 30 Mylar (3 sets) mylar/air 50 μm 2.97 mm 90 Polyethylene (1 set) polyethylene/air 270 μm 3.3 mm 30 Polyethylene (3 sets) polyethylene/air 270 μm 3.3 mm 90 Polypropylene (10 sets) polypropylene/air 15 μm 210 μm 360 Fibers (1 set) polypropylene/air 12 μm 180 μm 520

Table 3: Parameters of radiators used in the beam test: d_1 and d_2 are the thickness of the foils and of the gaps respectively; N_f is the number of foils. For the fiber radiator average values calculated from the density and from individual fiber parameters are presented.

is required for the whole cluster. The cut on the seed allows to efficiently select the strips hit by the beam particles without contaminations from noisy strips.

In our analysis we selected samples of events with only one particle cluster on both sides of the detector. This choice allows the selection of events with only one particle crossing the detector. It makes also possible to unambiguously determine the position of the particle on each side of the detector, as the center of gravity of the corresponding particle cluster. To perform the energy calibration, the ADC count distributions of particle clusters are fitted with a Landau distribution folded with a Gaussian function. These distributions are compared with those obtained using the simulation code described in Ref. [29], following the prescriptions of Ref. [30]. The calculated most probable value of the ionization energy loss is 83.5 keV for 290 GeV/c muons in 300 μm silicon. The values of the ionization energy losses calculated for the other configurations (i.e. with 20 GeV/c electrons and with 180 GeV/c and 120 GeV/c muons) are not significantly different.

In the left panel of Figure 3, the energy distribution of particle clusters on the junction side is shown for 180 GeV/c muons without radiators. It is well fitted by a Landau distribution folded with a Gaussian function, with a most probable value of about 83.5 keV. The scatter plot on the right panel shows

Figure 3: Energy depositions associated to particle clusters in a run with 180 GeV/c muons without radiators. The left plot shows the energy distribution associated to particle clusters on the junction side. The distribution is fitted by a Landau distribution folded with a Gaussian function. The right plot shows the energy of the particle clusters on the ohmic side versus the energy of those on the junction side. The dashed black line indicates the points in which the two energies are equal.

that the energies associated to the particle clusters on the ohmic side and on the junction side are clearly correlated. Since the noise level of the strips on the junction side is less than for those on the ohmic one (1.39 keV against 1.78 keV), the particle energy deposition associated to the cluster on the junction side will be considered in the analysis.

3.2. Selection of X-ray clusters

An X-ray cluster is defined in a way similar to a particle cluster. As TR energy is less than the ionization loss of particle, the search for an X-ray cluster starts from a seed strip with S/N > 4. Adjacent strips with S/N > 1 are associated to the seed strip. This approach allows to obtain average energy thresholds for X-ray clusters of 5.6 keV on the junction side and of 7.1 keV on the ohmic side. For each X-ray cluster on the two sides, a separation of at least one strip from the particle cluster and from other X-ray clusters is also required. To study the TR properties, events with only one X-ray cluster on each of the detector sides were selected. As in the case of the particle clusters, this selection allows an unambiguous matching of the X-ray clusters on the two sides of the

Figure 4: Relative positions of the X-ray clusters with respect to the particle clusters for 290 GeV/c muons crossing the 360 foil regular polypropylene radiator (see Table 3). The y and z coordinates refer respectively to strip positions on the junction side and on the ohmic side of the detector.

detector. The horizontal and vertical coordinates of each X-ray are defined as the centers of gravity of the strips in the X-ray clusters on the two detector sides, while the energy is taken from the junction side.

Figure 4 shows the relative positions of X-rays with respect to the radiating particles in a run with 20 GeV/c electrons crossing the polypropylene radiator. As expected, the figure shows that the TR X-rays are distributed in rings centered on the radiating particle. Due to the event selection implemented in the present analysis, the regions |Δy| < 50 μm and |Δz| < 50 μm in the plot are not populated (here y and z are the coordinates in the junction side and in the ohmic side respectively).

3.3. Results

As discussed in Section 2, the measurements were performed using beams of 20 GeV/c electrons and of muons with momenta of 120, 180 and 290 GeV/c. These beams cover a wide Lorentz factor range, from γ ≈ 1.1 × 10^3 to γ ≈ 3.9 × 10^4.

Two-dimensional distributions of energy (Y-axis) vs angle (X-axis) of the TR X-rays produced by 20 GeV/c electrons (left column) and 180 GeV/c muons (right column) crossing mylar, polyethylene, polypropylene and fiber radiators (from top to bottom) are shown in Figure 5. Here and later, the distributions are normalized to the total number of incident particles, i.e. to the number of events with only one particle cluster on both detector sides. The TR emission angle is evaluated from the distance of the absorbed X-ray from the particle and from the known distance between the center of radiator and the detector plane.

These distributions clearly show the main features of the TR production. First of all, comparing the TR spectra from the mylar radiator for 20 GeV electrons with those for 180 GeV muons (top row, left and right plots) one can distinguish two TR energy ranges with different angular and Lorentz factor dependencies. TR photons with energies ω < 15 keV exhibit wide angular distributions, which do not follow the commonly quoted law θ ≈ 1/γ. The width of these distributions is practically the same for electrons with γ ≈ 3.9 × 10^4 and for muons with γ ≈ 1.7 × 10^3. On the other hand, high-energy TR photons (ω > 15 keV) exhibit a much narrower angular distribution for electrons, while their yield is almost suppressed in the case of muons. Basic equations for TR generation (see for instance [4, 31, 32]) predict significant interference effects between the photons emitted at the various detector interfaces. The global structure of distributions shown in these plots is defined by the properties of the single foil. Multi-foil interference does not change the energy distribution of the TR photons, but may significantly change their angular distribution. This is clearly seen from the distributions of TR from the polypropylene radiator, which has 15 μm foils spaced by 210 μm gaps (third row from the top). Instead of an expected concentration of TR at angles < 0.1 mrad for electrons, the most

Figure 5: Measured two-dimensional distributions of energy (Y-axis) vs angle (X-axis) of the TR X-rays produced by 20 GeV/c electrons (left column) and 180 GeV/c muons (right column) crossing four different radiators.

intensive TR peak is found at an angle of ∼ 0.8 mrad. Contrary to simple considerations, this peak moves to smaller angles ∼ 0.6 mrad for muons with a lower gamma factor. For irregular radiators, such as the fiber radiator, which has no periodic structure, these patterns are smeared out due to the fluctuations of the material and gap thicknesses (see for instance ref. [33]).

Projections of two-dimensional distributions on the energy axis (Y) and on the angle axis (X) are shown respectively in the left and in the right column of Figure 6. The spectra for different beam configurations are overlapped on the same plots. Results for different radiators are presented in the same order as in Figure 5. Data for the mylar as well as for the polyethylene radiators clearly show that high-energy photons irradiated at small angles have a much higher TR production threshold than those of lower energies (< 15 keV). The angular distribution of low-energy photons is practically the same for particles with Lorentz factors from γ ≈ 1.1 × 10^3 to γ ≈ 3.9 × 10^4.

3.4. Background evaluation

In order to make accurate comparison of the experimental results with simulations, one has to exclude possible background effects caused by non-TR X-rays or delta-rays produced by the beam particles interacting with the materials upstream the detector or in the radiator itself. Special runs were taken with a “dummy” radiator, e.g. a radiator consisting of a polyethylene slab with the same thickness (in radiation length units) as the 3-sets mylar radiator. Figure 7 shows the X-ray spectra obtained in a run with 20 GeV/c electrons and in a run with 180 GeV/c muons crossing the dummy radiator. In the electron run the average number of hits which can be associated to photons is about 0.02 per particle, while in the muon runs it is less than 0.005. This difference is expected, since the probability to produce bremsstrahlung X-rays is higher for electrons than for muons.

The statistics of X-rays obtained in the data samples with dummy radiator is quite poor with respect to the statistics in the runs with radiators. This makes impossible a direct bin-by-bin subtraction of the background. In order to

Figure 6: Measured differential energy (left column) and angular (right column) spectra of the TR X-rays produced by 20 GeV/c electrons and 290, 180 and 120 GeV/c muons crossing four different radiators (mylar, polyethylene, polypropylene and fibers).

subtract properly the background from data, the X-ray spectra measured with

Figure 7: Measured spectra of the X-rays produced by 20 GeV/c electrons (left column) and 180 GeV/c muons (right column) crossing the dummy radiator. The plots in the top panels show the two-dimentional distributions (energy vs angle); the plots in the middle panels show the differential energy spectra; the plots in the bottom panel show the differential angular spectra. The blue curves superimposed to the data points are the results of the fit with the template model.

dummy radiator were fitted with a phenomenological template model: d^2N_{bkg} dθdω = kθ^{−α}ω^{−β} exp − θ_0 θ − ω_0 ω (1)

where α, β, θ_0 and ω_0 are free parameters and the constant factor k is fixed by the overall normalization (i.e. the average number of photons per particle). In the plots in the middle and in the bottom panels of Figure 7 the fitted functions

(integrated either on the angles or on the energies) are superimposed to the measured energy and angular spectra. In both cases the template model fit reproduces reasonably the measured spectra.

4. Monte Carlo simulations and discussion

4.1. Monte Carlo simulation model

The Monte Carlo model used for an interpretation of the experimental data includes a full simulation of the physics processes and of the detector response. The spectrum of the TR X-rays absorbed in the detector is described as: d^2N_{det} dθdω = d^2N_{prod} dθdω × e^{− ∑i xi/λi} × ( 1 − e^{−xdet/λdet} ) . (2)

Where ω is the X-ray energy and θ is the emission angle of X-rays with respect to the radiating particle. The first term on the right-hand side of the equation is the TR production spectrum, the second one takes into account the absorption of X-rays along their path from the radiator to the detector and the last term takes into account X-ray absorption in the detector itself. Here x_i and λ_i are the thicknesses and the absorption lengths of the various materials between the radiator and the detector (the helium in the pipe, the polyethylene windows of the pipe, the air gaps and a kapton window before the detector), while x_{det} and λ_{det} are the detector thickness (300 μm) and the silicon absorption length. The values of the absorption lengths have been taken from the NIST reference database [34].

For the production spectra the approach described in Refs. [31] and [35] was used. It also includes X-ray attenuation in the radiator material and in the air gaps between the foils. According to this approach, the TR production spectrum in a periodic radiator consisting of N foils is given by: d^2N_{prod} dθdω = d^2N_0 dθdω × ( 1 + e^{−σ1} − 2e^{−σ1/2} cos φ_1 ) × I_N (θ, φ). (3) The first term on the right-hand side of Eq. 3 represents the single interface spectrum, the second factor takes into account the single foil interference term, and the third term describes the N-foils interference. The single interface spectrum is given by:

d^2N_0 dθdω = 2αℏθ^3 πω 1 θ^2 + γ^{−2} + ω^2_{p1}/ω^2 − 1 θ^2 + γ^{−2} + ω^2_{p2}/ω^2 2 (4)

where γ is the Lorentz factor of the radiating particle, α is the fine structure constant and ω_{p1} and ω_{p2} are the plasma frequencies of the foil and of the gap (air) materials respectively. The N-foil interference term which takes into account absorption within radiator is given by:

I_N (θ, φ) = 1 + e^{−Nσ} − 2e^{−Nσ/2}cosNφ 1 + e^{−σ} − 2e^{−σ/2}cosφ (5) with σ = σ_1 + σ_2 and φ = φ_1 + φ_2, where φ_i and σ_i (i = 1, 2) are the phase shifts and the attenuations in the foils and in the air gaps defined as:

φ_i = ωd_i 2 ( θ^2 + γ^{−2} + ω^2_{pi}/ω^2 ) (6)

σ_i = d_i/λ_i (7) In this expressions d_i and λ_i are the foil (gap) thicknesses and absorption lengths.

For simulations of irregular radiators, the Garibian formulas were used [33]. In this approach it is assumed that the foil and gap thicknesses d_1 and d_2 follow gamma distributions. Calculations show that fluctuations of d_1 and d_2 do not change the total X-ray yield, but result in a smearing of the TR spectra.

Multiple scattering of particles passing different materials was taken into account as described in [8]. For each particle, two angles θ_{xy} and θ_{xz} are extracted from a Gaussian distribution with null mean and with sigma given by:

θ_0 =

13.6 MeV βcp x X_0

1 + 0.038 ln x X_0 (8) where x/X_0 is the thickness of the radiator and of the absorbers in radiation length units. The impact position of the particle on the detector is then obtained using the distance L between the radiator and the detector.^1

The energy deposition of the particle in the detector is extracted from a Landau distribution folded with a Gaussian function with a most probable value of 83.5 keV and with σ = 7.7 keV, as the one shown in Figure 3. The number n_i of hit strips on two detector sides are extracted from the strip multiplicity distributions of particle clusters in real data. The energy deposited by the particle is then shared among the n_i strips nearest to the particle impact point according to a Gaussian profile: the strips closer to the impact point have larger fractions of energy than the farther ones.

The number of TR X-rays associated to each particle is extracted from a Poisson distribution with an average value corresponding to the integral of the simulated TR spectrum absorbed in the detector. The energy and the polar angle θ of each photon with respect to the direction of the radiating particle are randomly extracted from the distribution in Eq. 2, while the azimuth angle ϕ is extracted from a uniform distribution in [0, 2π]. The generation point of each TR photon is randomly chosen along the particle track within the radiator, and the photon is then propagated to the detector.

Since the X-ray energy is usually significantly smaller than the particle energy loss and since the photoelectric absorption is a point-like event, the photon energy is shared between two strips on each detector side which are closest to the X-ray absorption point. This corresponds to the hit multiplicity observed in data. The detector noise is taken into account in the simulations according to experimentally defined values. Finally, the charge associated to each strip corresponds to the sum of the noise and of the energies released by the particle and by the TR photons. The simulated data are then analyzed applying the

1The multiple scattering angles are usually small for muons, but can be not negligible for electrons. In fact, for 20 GeV/c electrons crossing the 90 foils of polyethylene radiator (total thickness x/X_0 ∼ 0.03) the scattering angle is θ_0 ∼ 0.14 mrad.

Figure 8: Two-dimensional distribution of the TR X-rays produced by 20 GeV/c electrons crossing the 1-set mylar radiator. The measured spectrum (left panel) is compared with the one predicted by the simulation (right panel). The measured spectrum has been corrected by subtracting the background evaluated in a run with the dummy radiator (see Section 3.4).

same event selection algorithm as in real data.

4.2. Mylar and polyethylene radiators

In Figure 8 a background subtracted two dimensional distribution of the TR X-rays obtained in the test with 20 GeV/c electrons crossing 1-set of the mylar radiator is compared with the one obtained from the simulation. A qualitative comparison of the two plots shows that the simulation reproduces the experimental data fairly well. The Monte Carlo simulations confirm that the highest energy photons (ω > 15 keV) are mostly emitted at small angles with respect to the radiating particle, whereas the lower energy photons are spread over angles significantly larger than 1/γ.

Figure 9 shows the comparison between the measured energy (left) and angular (right) differential spectra of the TR X-rays and the simulation predictions for the 1-set mylar radiator and for all types of beam particles. The figure shows that, in general, simulations well reproduce the experimental data for all types of particles, but some discrepancies are observed. A comparison of the measured and simulated energy spectra for 20 GeV/c electrons shows that the simulation predicts a slightly larger number of photons with energies > 15 keV. This is also seen in the angular spectrum, where the simulation well reproduces the structure with multiple peaks, but the first peak below 0.3 mrad is more populated than in data. These features of the angular and of the energy spectra are clearly correlated, since the higher energy photons are emitted at smaller angles with respect to the radiating particles. Therefore, an excess of higher energy X-rays corresponds to an excess of photons emitted at small angles. The simulation also yields an overestimation of the low-energy photons, a feature which is clearly visible for muons. These discrepancies can be associated to the inaccurate representation of the material thicknesses and values of the absorption lengths of X-rays which are implemented in the simulation. In fact, from Eq. 2 it is evident that an overestimation, as well as an underestimation of the absorption in the materials between the radiator and the detector, would affect the number of absorbed X-rays. This effect is also clearly seen in Figure 10, where the comparison between the measured spectra and those predicted by the Monte Carlo simulation is shown for 3-sets of the polyethylene radiator. As in case of the mylar radiator the data are fairly well described by the Monte Carlo simulation. The simulation slightly overestimates the number of detected X-rays, particularly those with energies above 20 keV emitted at small angles.

4.3. Polypropylene radiator

The polypropylene radiator has a fine structure (see Table 3) and any fluctuations of the foil and gap thicknesses can significantly affect the results of simulation. It was found that the best agreement with experimental data is obtained when the polypropylene radiator is simulated as a slightly irregular radiator, with σ_{d1} = 0.1d_1 = 1.5 μm and σ_{d2} = 0.05d_2 = 10.5 μm. Figure 11 shows a comparison of the measured spectra with those obtained from the simulation of the polypropylene radiator for the four types of beam particles. As for other radiators the shapes of the spectra are well reproduced, including interference peak positions. However, significant discrepancies are observed in the normalizations. These discrepancies are at the level of a few percent in the run with 20 GeV/c electrons, and increase with decreasing Lorentz factor of the radiating particles. The discrepancies in the normalization of the spectra

Figure 9: Comparison between the measured and simulated differential spectra in energy (left column) and in angle (right column) of the TR X-rays produced by 20 GeV/c electrons and 290, 180 and 120 GeV/c muons crossing the 1-set mylar radiator. The data have been corrected subtracting the background measured in the runs with dummy radiators.

Figure 10: Comparison between the measured and simulated differential spectra in energy (left column) and in angle (right column) of the TR X-rays produced by 20 GeV/c electrons and 290, 180 and 120 GeV/c muons crossing the 3-sets polyethylene radiator. The data have been corrected subtracting the background measured in the runs with dummy radiators.

could be due to differences between the polypropylene absorption lengths used in the simulation and the real ones. This may also reflect the fact that exact TR turn-on curve strongly depends on the foil thickness and its density. Significant fluctuations of these parameters may lead to a change of the TR yield below the saturation level.

4.4. Fiber radiator

The fiber radiator is made of polypropylene fibers with diameter of about 15 μm. The density of this radiator is close to that of the polypropylene one. In general, one should expect similar TR production properties of these two radiators. The measured and the simulated TR spectra obtained with this radiator are shown in Figure 12. As the fiber radiator is highly irregular, in the simulation large variations of its parameters were assumed: σ_{d1} = d_1 and σ_{d2} = d_2. As in the case of the polypropylene regular radiator, we see that the shapes of the spectra are quite well reproduced, even though also in this case discrepancies (increasing with decreasing Lorentz factor) are observed in the normalizations.

5. Conclusions

Simultaneous measurements of the energy and emission angle of TR X-rays produced by fast particles crossing different types of radiators were performed using a double-sided silicon strip detector. Tests were done with particles covering a wide range of Lorentz factors from about 10^3 to about 4 × 10^4. The test beam data were compared with the results of dedicated Monte Carlo simulations, which use the parameterizations of the TR yield derived from theoretical calculations. The simulations reproduce very well the shapes of the measured energy and angular distributions of TR X-rays for all radiators and types of beam particles. However, the simulations systematically overestimate the number of photons, particularly for particles with low Lorentz factors. This phenomenon requires a dedicated study.

Figure 11: Comparison between the measured and simulated differential spectra in energy (left column) and in angle (right column) of the TR X-rays produced by 20 GeV/c electrons and 290, 180 and 120 GeV/c muons crossing the 10-sets polypropylene radiator. The measured spectra have been corrected subtracting the background measured in the runs with dummy radiators.

Figure 12: Comparison between the measured and simulated differential spectra in energy (left column) and in angle (right column) of the TR X-rays produced by 20 GeV/c electrons and 180 and 120 GeV/c muons crossing the fiber radiator. The measured spectra have been corrected subtracting the background measured in the runs with dummy radiators.

Our data also show that interference effects between foils may significantly change the angular distribution of the TR. For instance, for 20 GeV/c electrons crossing the polypropylene radiator, the most probable TR emission angle is about 0.8 mrad instead of 0.025 mrad, as expected from the commonly used law θ ≈ 1/γ. These studies show that simultaneous measurements of both the energy and the emission angles of the TR X-rays could be used to enhance the particle identification performances of TRDs. For example, new generation TRDs based on high-granularity detectors, might be able to discriminate different species of hadrons in the gamma-factor ranges where conventional identification methods are unreliable.

Acknowledgments

We gratefully acknowledge the financial support from Russian Science Foundation grant (project No. 16-12-10277). We would also like to thank the CERN staff for providing logistics and technical support at the SPS beam line.

[1] V. L. Ginzburg, I. M. Frank, Radiation of a uniformly moving electron due to its transition from one medium into another, J. Phys.(USSR) 9 (1945) 353–362, [Zh. Eksp. Teor. Fiz.16,15(1946)].

[2] G. M. Garibian, Contribution to the Theory of Transition Radiation, Sov.

Phys. JETP 6 (1958) 1079.

[3] G. M. Garibian, Transition Radiation Effects in Particle Energy Losses, Sov. Phys. JETP 10 (1960) 372.

[4] X. Artru, G. B. Yodh, G. Mennessier, Practical Theory of the Multilayered Transition Radiation Detector, Phys. Rev. D12 (1975) 1289.

doi:10.1103/PhysRevD.12.1289.

[5] G. Aad, et al., The ATLAS Experiment at the CERN Large Hadron Collider, JINST 3 (2008) S08003. doi:10.1088/1748-0221/3/08/S08003.

[6] K. Aamodt, et al., The ALICE experiment at the CERN LHC, JINST 3 (2008) S08002. doi:10.1088/1748-0221/3/08/S08002.

[7] T. Kirn, The AMS-02 TRD on the international space station, Nucl. Instrum. Meth. A706 (2013) 43–47. doi:10.1016/j.nima.2012.05.010.

[8] M. Tanabashi, et al., Review of Particle Physics, Phys. Rev. D98 (3) (2018) 030001. doi:10.1103/PhysRevD.98.030001.

[9] M. Brigida, et al., Investigation of the transition radiation produced by fast electrons crossing multifoil and fiber radiators, Nucl. Instrum. Meth. A550 (2005) 157–168. doi:10.1016/j.nima.2005.04.080.

[10] M. Brigida, et al., A silicon transition radiation detector for space and accelerator applications, Nucl. Instrum. Meth. A564 (2006) 115–125.

doi:10.1016/j.nima.2006.03.034.

[11] M. Brigida, et al., Beam test results with a reduced scale Silicon Transition Radiation Detector prototype, Nucl. Instrum. Meth. A577 (2007) 519–522.

doi:10.1016/j.nima.2007.04.133.

[12] C. W. Fabjan, et al., Practical Prototype of a Cluster Counting Transition Radiation Detector, Nucl. Instrum. Meth. 185 (1981) 119.

doi:10.1016/0029-554X(81)91202-7.

[13] A. G. Oganesian, A. S. Sarkisian, M. Atac, An Unconventional Transition Radiation Detector, Nucl. Instrum. Meth. 145 (1977) 251.

doi:10.1016/0029-554X(77)90417-7.

[14] V. Commichau, M. Deutschmann, H. Goddeke, K. Hangarter, U. Putzhofen, R. Schulte, W. Struczinski, A Ttansition Radiation Detector for Pion Identification in the 100 GeV/c momentum region, Nucl. Instrum. Meth. 176 (1980) 325–331. doi:10.1016/0029-554X(80)90724-7.

[15] M. Deutschmann, et al., Particle Identification Using the Angular Distribution of Transition Radiation, Nucl. Instrum. Meth. 180 (1981) 409.

doi:10.1016/0029-554X(81)90080-X.

[16] T. Ludlam, et al., Particle Identification by Electron Cluster Detection of Transition Radiation Photons, Nucl. Instrum. Meth. 180 (1981) 413.

doi:10.1016/0029-554X(81)90081-1.

[17] M. Albrow, A Very Forward Hadron Spectrometer for the LHC and Cosmic Ray PhysicsarXiv:1811.02047.

[18] N. Belyaev, et al., Test beam studies of possibilities to separate particles with gamma factors above 10^3 with straw based Transition Radiation Detector, J. Phys. Conf. Ser. 934 (1) (2017) 012053.

doi:10.1088/1742-6596/934/1/012053.

[19] N. Belyaev, et al., Measurements of angular distribution and spectrum of transition radiation with a GridPix detector, J. Phys. Conf. Ser. 934 (1) (2017) 012049. doi:10.1088/1742-6596/934/1/012049.

[20] E. J. Schioppa, et al., First measurements of the spectral and angular distribution of transition radiation using a silicon pixel sensor on a Timepix3 chip, Submitted to Nucl. Instrum. Meth. A.

doi:10.1016/j.nima.2018.11.062.

[21] D. Lietti, A. Berra, M. Prest, E. Vallazza, A microstrip silicon telescope for high performance particle tracking, Nucl. Instrum. Meth. A729 (2013) 527–536. doi:10.1016/j.nima.2013.07.066.

[22] Centre Suisse d’Electronique et Microtechnique, Neuchatel,

http://www.csem.ch.

[23] http://ideas.no/ideas-ic-products/.

[24] O. Toker, S. Masciocchi, E. Nygard, A. Rudge, P. Weilhammer, VIKING: A CMOS low noise monolithic 128-channel front end for Si strip detector readout, Nucl. Instrum. Meth. A340 (1994) 572–579.

doi:10.1016/0168-9002(94)90140-6.

[25] G. Barbiellini, G. Fedel, F. Liello, F. Longo, C. Pontoni, M. Prest, M. Tavani, E. Vallazza, The AGILE silicon tracker: Testbeam results of the prototype silicon detector, Nucl. Instrum. Meth. A490 (2002) 146–158.

doi:10.1016/S0168-9002(02)01062-8.

[26] http://www.ecrin.com/datasheets/GEFIP/618-3.pdf.

[27] S. Bonfanti, The high resolution silicon telescope of the INSULAB group, Master’s thesis, Insubria U., Como (2012).

[28] Analog Devices AD9221/9223/9220 data sheet,

http://www.analog.com/media/en/technical-documentation/data-sheets/AD9221_9223_9220.pdf.

[29] M. Brigida, et al., A new Monte Carlo code for full simulation of silicon strip detectors, Nucl. Instrum. Meth. A533 (2004) 322–343.

doi:10.1016/j.nima.2004.05.127.

[30] H. Bichsel, Straggling in Thin Silicon Detectors, Rev. Mod. Phys. 60 (1988) 663–699. doi:10.1103/RevModPhys.60.663.

[31] M. L. Cherry, G. Hartmann, D. Muller, T. A. Prince, Transition radiation from relativistic electrons in periodic radiators, Phys. Rev. D10 (1974) 3594–3607. doi:10.1103/PhysRevD.10.3594.

[32] M. L. Cherry, Measurements of the Spectrum and Energy Dependence of x-Ray Transition Radiation, Phys. Rev. D17 (1978) 2245–2260.

doi:10.1103/PhysRevD.17.2245.

[33] G. M. Garibian, L. A. Gevorgian, C. Yang, The calculation of X-ray transition radiation generated in regular and irregular-layered media, Nucl. Instrum. Meth. 125 (1975) 133–137. doi:10.1016/0029-554X(75)90565-0.

[34] https://www.nist.gov/pml/x-ray-mass-attenuation-coefficients.

[35] M. N. Mazziotta, A Monte Carlo code for full simulation of a transition radiation detector, Comput. Phys. Commun. 132 (2000) 110–123.

arXiv:physics/9912042, doi:10.1016/S0010-4655(00)00146-6.