arXiv:1511.07713v2 [astro-ph.HE] 4 Aug 2016

A Search for X-ray Counterparts of Radio Pulsars

T. Prinz^1 and W. Becker^{1,2}

Submitted for publication to ApJ on 2015 November 14. / revised and updated 1. Juli 2016

ABSTRACT

We describe a systematic search for X-ray counterparts of radio pulsars. The search was accomplished by cross-correlating the radio timing positions of all radio pulsars from the ATNF pulsar database (version 1.54) with archival XMM-Newton and Chandra observations publicly released by July 1^{st} 2016. In total, 178 of the archival XMM-Newton observations and 213 of the archival Chandra datasets where found to have a radio pulsar serendipitously in the field of view. From the 288 radio pulsars covered by these datasets we identified 20 previously undetected X-ray counterparts. For 6 of them the statistics was sufficient to model the energy spectrum with one- or two-component models. For the remaining new detections and for those pulsars for which we determined an upper limit to their counting rate we computed the energy flux by assuming a Crab-like spectrum. Additionally, we derived upper limits on the neutron stars’ surface temperature and on the non-thermal X-ray efficiency for those pulsars for which the spin-down energy was known. The temperature upper limits where compared with predictions from various neutron star cooling models and where found to be in agreement with the minimal cooling paradigm.

Subject headings: stars: neutron - pulsars: individual: PSR J0101–6422, PSR B0114+58, PSR J0337+1715, PSR J0543+2329, PSR B0919+06, PSR J1044–5737, PSR J1112– 6103, PSR B1221–63, PSR J1301–6310, PSR B1338–62, PSR J1600–3053, PSR J1658–5324, PSR J1730–2304, PSR J1731–1847, PSR J1816+4510, PSR J1825– 0935, PSR J1832–0836, PSR J1911–1114, PSR J2017+0603, PSR J2222–0137 - Xrays: stars - dense matter - equation of state

1. Introduction

Neutron stars (NSs) are the most dense objects accessible in the universe by direct observations. They represent unique astrophysical laboratories which allow us to explore the properties

1Max-Planck Institut für extraterrestrische Physik, Giessenbachstrasse 1, 85741 Garching, Germany

2Max-Planck Institut für Radioastronomie, Auf dem Hügel 69, 53121 Bonn, Germany

– 2 –

of matter under the most extreme conditions observable in nature. Studying neutron stars is therefore an interdisciplinary field, where astronomers and astrophysicists work together with a broad community of physicists. Particle, nuclear and solid-state physicists are strongly interested in the internal structure of neutron stars which is largely uncertain because of the unknown nuclear interaction potential at matter densities above the nuclear density ρ_{nuc} = 2.8×10^{14}g cm^{−3}. The structure of the star is usually described by the equation of state (EOS) which is a set of non-linear coupled differential equations respecting general relativity and linking physical parameters like star composition, pressure and density as well as the energy balance, radiative energy transport, opacity and luminosity to each other.

Neutron stars are formed at very high temperatures, ∼10^{11} K, in the imploding core of supernova explosions. Much of the initial thermal energy is radiated away from the interior of the star by various processes of neutrino emission (mainly, Urca processes and neutrino bremsstrahlung), leaving a one-day-old neutron star with an internal temperature of about 10^9–10^{10} K. After ∼ 100 yr (typical time of thermal relaxation), the star’s interior is supposed to become nearly isothermal. The details of neutron star cooling, however, depend very strongly on the chemical composition and the physical behavior of the super-dense neutron star matter, described by its EOS. A very promising approach to constrain that EOS is therefore to look at the thermal evolution of neutron stars by comparing theoretical predictions from various cooling models (i.e. various EOSs) with measured surface temperatures (e.g. Becker 2009, and references therein). In this scenario, Page et al. (2004) introduced the minimal cooling paradigm, which extends and replaces the so-called standard cooling scenario (Tsuruta 1998) to include neutrino emission from the Cooper pair breaking and formation process for temperatures close to the critical temperature of superfluid pairing.

As far as non-thermal emission processes in neutron stars are concerned, several attempts have been made in recent years to explore the fraction of spin-down energy which is emitted into the X-ray band. With every new X-ray observatory and improvement in sensitivity this ratio was reinvested. Often, different authors used different approaches and different energy bands which makes it difficult to compare the various results available in the literature. Different point-spread functions and energy responses used in the various X-ray telescopes sample more or less of an eventually existing diffuse compact pulsar wind nebula. This adds to the complexity of this problem too.

Seward & Wang (1988) used the Einstein observatory to explore the X-ray effeciency of rotation-powered pulsars. Based of only a handful of mostly young and powerful pulsars they found L_X(0.2 − 4 keV) ≈ 10^{1.39}Ė. With ROSAT data and on a much larger dataset, which for the first time included a variety of rotation-powered pulsars at various spin-down ages and energies, Becker & Trümper (1997) fitted L_X(0.1 − 2.4 keV) ≈ 10^{1.03}Ė. Adopting the soft energy spectra measured by ROSAT and assuming that those spectra continue unchanged up to 10 keV, Possenti et al. (2002) derived L_X(2 − 10 keV) ≈ 10^{1.34}Ė. Results from XMM-Newton and Chandra soon

– 3 –

showed that the emission in the soft and hard X-ray band is often based on different emission processes and hence have different efficiencies, invalidating the X-ray efficiencies derived by Possenti et al. (2002). The most recent results which are based on XMM-Newton and Chandra data yield L_X(2 − 10 keV) ≈ 10^{0.92}Ė (Li et al. 2008) and L_X(0.1 − 2 keV) ≈ 10^{0.997}Ė (Becker 2009) for the hard and soft X-ray band, respectively.

Thanks to the collecting power and sensitivity of todays X-ray satellites the sample of rotationpowered pulsars detected in X-rays is steadily increasing. At the end of the ROSAT mission 33 rotation-powered pulsars were detected (e.g. Becker & Trümper 1997, 1999). By July 1^{st} 2016 and about 16 years after the launch of Chandra and XMM-Newton we count 188 X-ray detected neutron stars which are reported in the literature. 123 pulsars are detected in the γ-regime of which 73 are seen in both wavelength bands. Their emission properties are seen to scale with their spin-down age τ = P/(2Ṗ). Among the X-ray detected pulsars 23 turn out to be Crab-like (age τ ≤ 10^4 yrs), 41 Vela-like (10^4 yrs < τ ≤ 10^5 yrs), 17 are classified as cooling neutron stars (10^5 yrs ≤ τ ≤ 10^6 yrs), 13 are so called old field pulsars (10^6 yrs ≤ τ ≤ 10^8 yrs) and 62 are millisecond pulsars (MSPs, τ ≥ 10^8 yrs and P ≤ 20 ms). Of the X-ray detected pulsars 17 are in the category of Anomalous X-ray Pulsars (AXPs) or Soft Gamma-ray Repeaters (SGRs) and 7 are classified as Central Compact Objects (CCOs). A high-energy overview of the soft γ-ray pulsar population was given recently by Kuiper & Hermsen (2015).

Whereas with Einstein, ROSAT, ASCA and BeppoSax mostly the brighter pulsars and those which are seen under a favorable beaming geometry got detected, we now have also apparently less efficient X-ray emitting pulsars in the sample. E.g. PSR J2022+3842 has an X-ray efficiency μ_X = L_X/Ė = 6 × 10^{−5} in the 2–10 keV range (Arzoumanian et al. 2011) and Kargaltsev et al. (2012) found that μ_X of PSR J0940–5428 and PSR J1913+1011 is below 4.0 × 10^{−6} and 3.3 × 10^{−6} in the 0.5–8 keV energy range, respectively. Whether these pulsars are intrinsically less efficient Xray emitters because of differences in the emission process or because of an unfavorable beaming geometry is still unclear. Further indications of apparently underluminos X-ray pulsars is therefore of high importance.

In this paper we report on X-ray counterpart searches for radio pulsars. The search was accomplished by correlating the ATNF Pulsar Catalogue (version 1.54, Manchester et al. 2005)^1 with the XMM-Newton and Chandra data archives to identify those observations which had a radio pulsar serendipitously in the field of view. The structure of the paper is as follows: in section 2 we describe the XMM-Newton and Chandra observations used in our correlation and provide the details of the data processing, source detection as well as counting rate upper-limit determination for undetected pulsars. The spatial and spectral analysis of the detected pulsars as well as flux

1http://www.atnf.csiro.au/research/pulsar/psrcat/

– 4 –

estimates for those pulsars for which we just could determine a count rate upper limit are described in section 3. A discussion of the results and a concluding summary is given in section 5 and 6, respectively.

2. Observations and data reduction

In the past 16 years, Chandra^2 and XMM-Newton^3 have proven to be extremely reliable and successful observatories (e.g. Tananbaum et al. (2014), Schartel (2012)). Both missions release their data to a public archive after a one year proprietary time. End of 2013 the XMM-Newton observatory covered already about 877 deg^2 of the sky (Xmm-Newton Survey Science Centre 2013). For Chandra the sky coverage is predicted to be about 550 deg^2 by the end of 2015 (cf. The Chandra Source Catalog^4 Rev. 2, planned to be released in 2016, B. Wilkes, priv. com.) Many of these observations where targeted at sources located in the galactic plane, where the majority of radio pulsars is located. The chance probability that a pulsar has been covered serendipitously in one of these observations is therefore quite high. We made use of all pointed observations publicly available in these archives by July 1^{st} 2016 and searched for datasets which had one of the ∼2500 known radio pulsars listed in the ATNF Pulsar Catalogue (version 1.54, Manchester et al. 2005) in the field of view. Pulsars which were previously already detected in X-rays where neglected in our search. In total we found 178 XMM-Newton datasets and 213 Chandra datasets which had the position of a pulsar previously undetected in X-rays covered. All these datasets sum up to an on-axis observing time of 8.6 Msec. A summary of these data, listing instruments, observing modes and filters, off-axis angels of pulsar locations as well as on- and off-axis exposure times of the relevant observations is given in Table 1.

For the reduction of XMM-Newton data we used the XMM-Newton Science Analysis Software (SAS), version 15.0.0. In case of the Chandra data we used standard processed level-2 data and the Chandra Interactive Analysis of Observations (CIAO) software, version 4.8.2. In both cases we had to remove flares from the observation. As for XMM-Newton these flares are mostly coming from soft protons hitting the detector. To identify and remove these time intervals of high particle background we created light curves from MOS1/2 and PN event files at energies above 10 keV and of bin size 100s. We detected flares in almost all XMM-Newton data sets and rejected time intervals in which the count rate per bin was 3σ higher than the mean count rate without flares. Regarding Chandra observations we made use of the CIAO deflare script, which applies the

2http://cda.harvard.edu/chaser/

3http://xmm.esac.esa.int/xsa/index.shtml

4http://cxc.harvard.edu/csc2/preliminary/

– 5 –

criterion mentioned above by default.

The effective exposure time t(θ) (θ labels the off-axis angle a pulsar was observed under) was obtained by generating an exposure map with the SAS-tool eexpmap or the CIAO-tool fluximage after correcting for times with high background and dead time correction. In both cases the task takes into account the telescope vignetting at the respective off-axis angle. The net exposure on the source t(θ) and on the background region t_{BG}(θ) was then calculated by averaging the exposure map over the source and background region, respectively. This is required to include the effect of the CCD gaps on the exposure time. The on-axis exposure t_{on-axis} and t(θ) are both listed in Table 1.

2.1. Spatial and image analysis

In order to search for X-ray sources in the selected datasets we applied a sliding box source detection algorithm for XMM-Newton data (SAS-tool edetect chain) using the five standard bands (0.2−0.5 keV, 0.5−2 keV, 2−4.5 keV, 4.5−7.5 keV, and 7.5−12 keV). For Chandra data we applied a wavelet source detection algorithm (CIAO-tool wavdetect) in the energy range 0.1–10 keV. Both procedures turn out to be standard for the source detection in XMM-Newton and Chandra data. We accepted a source to be detected if its significance was ≥ 5σ above the background.

The angular separation in arcseconds between the radio timing position of a pulsar and the centroid of the nearest X-ray source were compared. An X-ray source was considered to be a potential counterpart of a radio pulsar if the angular distance Δ between them was

Δ = � (ΔRA · cos(DEC_X))^2 + ΔDEC^2 ≤ 3σ. (1)

Here ΔRA = RA_R − RA_X and ΔDEC = DEC_R − DEC_X. (RA_X, DEC_X) and (RA_R, DEC_R) denote the positions of the X-ray source and the radio pulsar’s timing position, respectively.

The uncertainty σ is obtained by deducing the error in Δ applying error propagation:

σ = � (ΔRA cos(DEC_X))^2(δRA^2_R + δRA^2_X) + ΔDEC^2δDEC^2_R + (ΔDEC − ΔRA sin(DEC_X))^2δDEC^2_X Δ (2) The uncertainties of the X-ray source positions in right ascension and declination δRA_X, δDEC_X were determined by combining the statistical position errors and the absolute astrometric accuracy of the corresponding X-ray observatory squared. For Chandra ACIS-S, ACIS-I and HRC-S data

– 6 –

the 68% confidence level is ≈ 0.21^{′′}, ≈ 0.4^{′′} and ≈ 0.36^{′′}, respectively^5. The absolute astrometric accuracy for XMM-Newton data is ≈ 2^{′′} (r.m.s.)^6. We note that the uncertainties in the pulsars’ radio timing position δRA_R, δDEC_R are generally at the level of milli-arcseconds. Thus, the dominant source of uncertainty in the X-ray counterpart correlation is the error in the X-ray source position.

To check whether an X-ray source has an optical counterpart we correlated all X-ray sources with the USNO-B catalog. It covers the whole sky and is thought to be complete down to a visible magnitude of V = 21 (Monet et al. 2003). The correlation was done using the online tool VizieR^7 which also allowed us to constraint the X-ray-to-visual flux ratio (Maccacaro et al. 1988)

log( f_X/ f_V) = log( f_X) + V/2.5 + 5.37. (3)

for each of the detected sources. Here f_X is the X-ray flux in the 0.3–3.5 keV band in erg cm^{−2} s^{−1}. If no optical source could be detected within an error circle of radius 3σ we took the limiting magnitude of the USNO-B catalog as an estimate for V. Within the 3σ error box around a potential pulsar X-ray counterpart no optical source was found.

In order to compute the probability P_{coin} of a chance identification with a background source

P_{coin} =

N_X l_{RA}l_{Decl.}

× π δRA_R δDEC_R (4)

we computed the source density in the field of view and multiplied it with the area of the pulsar’s error ellipse, where N_X is the number of sources detected within the field of view of area l_{RA} × l_{Decl.} To exclude a by-chance identification of an X-ray source with the X-ray counterpart of a radio pulsar we set the criteria P_{coin} ≤ 3 · 10^{−3}.

2.2. Spectral analysis

Up to the High-Resolution Channel Plate (HRC) detector all focal plan instruments aboard Chandra and XMM-Newton provide spectral information. However, the quality of spectral fits and the constraints on the spectral model parameters are strongly dependent on the photon statistics and thus vary among the detected potential pulsar counterparts.

5See http://cxc.harvard.edu/cal/ASPECT/celmon/ for more details about Chandra absolute astrometric accuracy.

6More information can be found at xmm.vilspa.esa.es/docs/documents/CAL-TN-0018.pdf.

7http://vizier.u-strasbg.fr/viz-bin/VizieR

– 7 –

For sources detected by XMM-Newton the corresponding response and effective area files for the source and background emission were extracted using the SAS-script especget. For the PN camera we used only those events which have a detection pattern between 1 and 4 (single and double events). For the MOS camera we included triple events as well, having a pattern between 5 and 12. The pattern value indicates which detector pixels surrounding a CCD pixel hit by a X-ray photon are taken into account for the photon energy integration. In case of Chandra observations we extracted the source and background spectra of a potential counterpart and created the corresponding response and effective area files with the CIAO-script specextract.

For potential pulsar counterparts (cf. Table 2) which were detected with more than 70 source counts the statistics just turned out to allow a very brief spectral analysis with mostly one-component power law or blackbody model spectra. The small photon statistics, though, strongly limited the fitting results also in those cases. Often we had to fix the hydrogen column absorption to the one deduced from the radio pulsar’s dispersion measure DM which is listed in the ATNF Pulsar Catalogue (Manchester et al. 2005). This value was estimated by assuming a 10% ionization degree of the interstellar medium (ISM) along the line of sight towards the pulsar. The latter corresponds to a ratio of one free electron per ten neutral hydrogen atoms in the ISM, as commonly assumed in the literature.

For a consistency check we deduced N^{LAB}_H from the LAB Survey of Galactic HI (Kalberla et al. 2005). N^{LAB}_H is based on HI emission line measurements at a radio frequency of 21 cm and refers to the entire hydrogen column density along the line of sight. For all pulsars for which it turned out that N_H towards the source is higher than N^{LAB}_H we used the latter.

The used DM and N_H for the potential X-ray counterparts are listed in Table 4. Additionally, N_H and N^{LAB}_H are given in Table 5 for all analyzed potential counterparts.

As mentioned before, for sources observed with the HRC cameras no spectral information can be obtained from the pulsar. The only informations we have are the position and the counting rate in the energy range of the camera where it is sensitive to incoming photons. In this case and in the case of observations with less than 70 source counts we obtained constraints on the X-ray flux and luminosity by converting the pulsar counting rate into an equivalent flux. First, we obtained the net counting rate for these pulsar counterparts by dividing the source counts derived with the source detection software by the effective exposure time t(θ). The X-ray flux was then deduced for a typical pulsar spectrum using the method described in Section 2.4. As a typical pulsar spectrum we assumed a power law model with photon index 1.7 (Becker 2009) and a hydrogen column density based on the radio pulsar’s dispersion measure as mentioned previously. As the assumption of a spectral shape introduces an extra uncertainty when converting the photon flux to an energy flux we doubled the statistical error in the flux numbers off all potential counterparts which we detected with less than 70 source counts.

– 8 –

2.3. Timing analysis

The timing resolution of the ACIS and the EPIC-MOS cameras (∼ 1 s) were insufficient to study the pulsed emission of the pulsars. Additionally, the time resolution of the EPIC-PN CCDs depends on the used observation mode. For all observations that had a high enough time resolution to study the temporal properties of a rotating neutron star we converted the event time tags to the Barycentric Dynamical Time using the SAS-tool barycen. For this we used the radio timing position. After folding the events with the pulsar’s rotation frequency given by the ATNF Pulsar Catalogue (Manchester et al. 2005) we searched for a periodic signal by applying the H-test (de Jager et al. 1989). However, for none of the detected counterparts pulsed emission could be found with a significance higher than a confidence level of 95%.

2.4. Upper limits

For all observations in which no source was detected sufficiently close to the radio position we derived an upper limit on the count rate as follows: First, we extracted the counts N_i including the background contribution for every single data set from XMM-Newton or Chandra within a circle of radius r = 30^{′′} or r = 2^{′′} around the radio position in the energy band E_{min} to E_{max} = 4.5 keV. E_{min} is 0.2 keV for XMM-Newton and 0.1 keV for Chandra events. For Chandra data sets were the pulsar was observed far off-axis the radius had to be adjusted, because above ≈ 4^′ the point-spread-function broadens significantly. Hence, for an off-axis angle 4^′ < θ ≤ 8^′ the applied radius r = 5^{′′} and for θ > 8^′ the radius r = 10^{′′}. The background counts B_i were extracted from an annulus of inner radius r_{inner} = 1.5r and outer radius r_{outer} = 2.5r. To obtain the background counts in the source region, we had to normalize these counts to the source region by the fraction c_1 between source region area and annulus area and by the fraction c_2 between t(θ) and t_{BG}(θ) . Because we used a finite region, we had to correct for the missing flux in the unselected wings of the point-spread function. This encircled energy fraction (EEF_i) was calculated with the help of the eregionanalyse- (XMM-Newton) and psf-tool (Chandra). If �_{ni} N_i > 20 counts, where n is the number of X-ray observations of a single pulsar, we derived the x · σ upper limit on the count rate with the following equation:

UL(x · σ) = max �_n i N_i−c_1c_2·B_i

EEF_i , 0 � + x ·

�_{ni}

√_{Ni+c21c2 Bi}

EEF_i

�_{ni} t_i(θ_i)

. (5)

Otherwise, the upper limit was derived using the Bayesian approach introduced by Kraft et al. (1991) which has its advantage for observations with very small numbers of counts in the presence of background when compared with the classical method.

– 9 –

Assuming a pure blackbody (BB) spectrum we deduced the 3σ upper limit on the effective temperature T_e = T_∞(1 + z)^8 by minimizing the difference UL(3σ) − UL_{BB} (T_e) (Becker et al. 1993; Becker 1995), where

UL_{BB}(T_e) = const. ·

�_{Emax}

E_{min}

E^2A_{eff}(E) · exp (−σ(E) · N^{ul}_H ) exp (E(1 + z)/k_BT_e) dE. (6)

Here const. =^{2π(1+z)2R20}_{h3c2d2ul} with z the gravitational red shift for a neutron star with radius R_0 = 11.43 km and mass M = 1.4M_⊙, h the Planck constant, c the speed of light and d_{ul} the upper limit of the distance to the pulsar. Furthermore, σ(E) is the interstellar photoelectric absorption cross section (Morrison & McCammon 1983), N^{ul}_H the upper limit of the hydrogen column density, k_B is the Boltzmann constant and A_{eff} is the weighted effective area of all used instruments with which a certain source was observed: A_{eff}(E) =

�_{ni}

A_i(E)t_i(θ_i) �_{ni} t_i(θ_i)

, (7)

where A_i is the on-axis effective area of the instrument used in the i th observation of the pulsar. Because the count rate is already vignetting corrected we used the on-axis effective area obtained with the SAS-task calview for the XMM-Newton EPIC cameras with different filters. The Chandra ACIS and HRC effective area were taken from the Portable, Interactive Multi-Mission Simulator (WebPIMMS), version 4.6.^9 N^{ul}_H is calculated as described in Section 2.2, except that we add the error of DM to obtain the upper limit of N_H.

The distance estimate is based on the work by Verbiest et al. (2012), where they present a detailed analysis of all measured distances to pulsars. For all other sources we used the NE2001 model of Cordes & Lazio (2002) to transform the measured DM to a distance. We apply a distance error of 20 % to 120 % depending on their Galactic coordinates. According to this work the large difference in the used uncertainties is because the error in d is larger for a pulsar in a region of small electron density than in a region with higher density (Cordes & Lazio 2002).

To estimate the 2σ upper limit of the non-thermal X-ray efficiency we derived an expression for UL_{model} in a similar way as for the blackbody spectrum, except that we inserted a power law model (PL) with photon index Γ = 1.7 (Becker 2009) and minimizing UL(2σ) − UL_{PL}(K) with

UL_{PL}(K) = K

�_{Emax}

E_{min}

E^{−Γ} exp (−σ(E) · N^{ul}_H ) · A_{eff}(E)dE. (8)

Using the resulting value for the normalization constant K and the assumed photon index we

8T_∞ denotes the temperature measured by a distant observer.

9See http://heasarc.nasa.gov/docs/software/tools/pimms.html

– 10 –

can derive the flux upper limit in a certain energy range by integrating the power law model with the derived normalization over this energy band.

In the following, all given uncertainties represent the 1σ confidence range for one parameter of interest, unless stated otherwise.

3. Potential X-ray counterparts of radio pulsars

In our search for X-ray counterparts of radio pulsars we found 20 X-ray point sources sufficiently close to the corresponding radio pulsar’s timing positions to claim a match. The X-ray images of these sources are displayed in Figure 1. Their coordinates, the offset between their X-ray position and the radio pulsar’s timing position, Δ, as well as the chance probability P_{coin} and the X-ray to visual flux ratio for each of this sources are displayed in Table 2. Due to a limitation in the photon statistics a detailed spectral analysis was possible only for six of the 20 counterparts. The results of this spectral analysis are summarized in Table 3. In Table 4 the relevant parameters of the radio pulsars are listed along with the flux, the luminosity and the X-ray efficiency μ_{0.1–2 keV} of their potential counterparts.

The following subsections highlight the results for the 20 potential X-ray counterparts and provide background information on the corresponding radio pulsars.

3.1. PSR J0101–6422

The binary millisecond pulsar PSR J0101–6422 was discovered with the Parkes radio telescope in an identification campaign for unidentified Fermi sources (Kerr et al. 2012). It was in the focus of the Chandra telescope for 9.0 ksec. In this observation we detected a faint X-ray point source only 0.^{′′}2 ± 0.^{′′}4 off from the pulsar’s radio position, making it a very likely X-ray counter part of the pulsar. This point source has 34 ± 6 source counts. Converting the photon flux to an energy flux yields F^{0.1–2 keV}_X = (3.0 ± 1.0) × 10^{−14} erg s^{−1} cm^{−2} in the 0.1 to 2 keV range.

3.2. PSR B0114+58

The pulsar PSR B0114+58 (PSR J0117+5914) was first detected in the Princeton-NRAO pulsar survey (Stokes et al. 1985). In the XMM-Newton data archive we found a 9 ksec observation which had the pulsar in the focus of the telescope. Analyzing this data we detected a point source with 113 ± 13 source counts in the PN- and MOS1/2 cameras. It is located only 1.^{′′}6 ± 2.^{′′}1 off

– 11 –

Fig. 1.— X-ray images of the region around all radio pulsars where an X-ray counterpart was detected in our correlation. Each panel has a size of 1.^′5 × 1.^′5 for XMM-Newton observations and 15^{′′} × 15^{′′} for Chandra observations. North is up and east is to the left. The cross marks the radio position of the pulsar and the red circle indicates the 3σ uncertainty in the measured X-ray position.

– 12 –

from the radio pulsar’s timing position, making it a positional match with the pulsar. The detected photons allowed a very brief spectral analysis. To do so we extracted the source counts from a circle of radius 20^{′′} centered on the counterpart. The background spectra were extracted from an annulus with inner and outer radius 45^{′′} and 75^{′′}, respectively. The extracted counts were binned with at least 8 counts/bin in case of the PN data and 5 counts/bin for the MOS1/2 data sets. We first fitted the energy spectra with an absorbed power law and free varying N_H. This resulted in a fit with χ^2 = 12.1 for 12 d.o.f. and N_H = 0.5^{+0.7}_{−0.5} × 10^{22} cm^{−2}, in agreement with the N_H = 0.15 × 10^{22} cm^{−2} as deduce from the radio dispersion measurement DM and the model for the galactic distribution of free electrons by Cordes & Lazio (2002). To put better constraints on the remaining parameters we fixed N_H to the DM-based value. This gave an acceptable fit (χ^2 = 13.2, 13 d.o.f.) with a photon index Γ = 3.3 ± 0.5. Modeling the spectrum with a blackbody fitted the data as well and yielded a χ^2 = 12.2 (13 d.o.f.). The resulting blackbody temperature is 2.1^{+0.4}_{−0.3} × 10^6 K with a normalization factor K = 3.7^{+1.3}_{−1.1} × 10^{−7}. Using the normalization factor K = L_{39}/D^2_{10} (L_{39} = L/10^{39} erg/s and D_{10} = d/10 kpc) we deduced the emitting blackbody radius R_{BB} to be:

R_{BB} = � K · D^2_{10} × 10^{39} erg/s 4πσ_BT^4

= (0.4 ± 0.2) km. (9)

Herein σ_B is the Stefan-Boltzmann constant.

3.3. PSR J0337+1715

J0337+1715 is a millisecond pulsar in a triple system (Ransom et al. 2014). In an ∼ 18 ksec archival XMM-Newton observation which had the pulsar in the focus of the telescope we detected a central point source with 303 ± 21 source counts in the PN and MOS1/2 data. The position of this source matches the radio pulsar’s timing position by only 1.^{′′}7 ± 2.^{′′}1 making it a positional counterpart of the pulsar. During the publication process of this paper a detailed analysis of the PSR J0337+1775 was published on astro-ph by Spiewak et al. (2016). We therefore refer to this publication for further analysis details and source properties.

3.4. PSR B0540+23

PSR B0540+23 (PSR J0543+2329) was first detected by Davies et al. (1972). In archival XMM-Newton data of ∼ 20 ksec observing time in which the pulsar was in the focus of the telescope we detected a faint point source 3.^{′′}4 ± 4.^{′′}8 near to the radio pulsar’s timing position. The positional coincidence makes this X-ray source a very likely counterpart of the radio pulsar. It is

– 13 –

detected with 17 ± 4 source counts in the PN and MOS1/2 data. Converting the photon flux to an energy flux yields F^{0.1–2 keV}_X = (8 ± 4) × 10^{−15} erg s^{−1} cm^{−2} in the 0.1 to 2 keV range.

3.5. PSR B0919+06

The pulsar PSR B0919+06 (PSR J0922+0638) was discovered in the second Molonglo pulsar survey (Manchester et al. 1978). It has a measured parallax which places it at a distance of 1.1±0.2 kpc (Verbiest et al. 2012). In archival XMM-Newton data of ∼ 65 ksec observing time, taken with the pulsar position in the focus of the telescope, we detected a point source 2.^{′′}4 ± 2.^{′′}1 near to the radio pulsar’s timing position. Merging the PN and MOS1/2 data yielded 171 ± 18 source counts which supported a brief spectral analysis.

The energy spectrum was extracted by selecting all events from within a circle of radius 15^{′′} centered on the potential pulsar counterpart. The background spectrum was extracted by selecting all events from an annulus with radii 5^{′′} and 75^{′′}, respectively. The spectra were binned so as to have at least 20 counts/bin in the PN data and 10 counts/bin in the MOS1/2 data. Fitting a power law model to this spectral data gave a χ^2 = 4.0 for 8 d.o.f. and an N_H < 1.2×10^{21}cm^{−2}. The column absorption is in agreement with the value estimated from the radio pulsar’s dispersion measure, N^{DM}_H = 8.42 × 10^{20} cm^{−2}, using the model of Cordes & Lazio (2002). The fitted photon index Γ is 2.3^{+0.8}_{−0.4}. We also tested a single blackbody model but did not find it to fit the data (χ^2 = 15.9 for 8 d.o.f.).

3.6. PSR J1044–5737

PSR J1044–5737 is a young and energetic pulsar. It was discovered in a blind frequency search of Fermi LAT data (Saz Parkinson et al. 2010). No radio dispersion measure has been reported for this pulsar in the literature so far. Its distance is therefore still unconstrained. The Chandra data archive has a 10 ksec deep observation with the pulsar in the telescope focus. Analyzing this data we detected a point source matching the pulsar’s radio timing position by 0.^{′′}6±0.^{′′}9. This source is detected with 30 ± 6 source counts. Converting the photon flux to an energy flux yields F^{0.1–2 keV}

X = 2.4 ± 1.0 × 10^{−14} erg s^{−1} cm^{−2} in the 0.1 to 2 keV range.

– 14 –

3.7. PSR J1112–6103

PSR J1112–6103 was discovered in the Parkes multi-beam pulsar survey (Manchester et al. 2001). Two Chandra observations are covering the radio position of the pulsar. In the first one (Obs.ID 6706) the pulsar position was in the focus of the telescope. The second observation (Obs.ID 8905) was pointed on the HII region NGC 3576 in which the pulsar position was observed 2.^{′′}4 off-axis. In the combined data we detected a point source 0.^{′′}6 ± 0.^{′′}5 near to the pulsar’s timing position which makes it a very likely counterpart of the pulsar. From both observations we have 331 ± 19 source counts which allowed a brief spatial and spectral analysis.

The CIAO-tool srcextent indicated that the source is extended at a 90% confidential level. To explore the existence of a possible PWN around PSR J1112–6103 we produced radial profiles centered on the deduced X-ray position for both ACIS observations. The profiles were obtained by integrating all counts in 12 concentric, equally-spaced annuli with a minimum radius of 0.^{′′}5 and maximum radius 6^{′′} and dividing the selected counts by the respective ring area. This profiles were then compared with the profile of a point source at the same off-axis angle, simulated with MARX^{10} and convolved with a Gaussian with a full width at half maximum (FWHM) of 1^{′′} as used by Romani & Ng (2003) to detect a faint PWN surrounding PSR J0538+2817. Figure 2 shows the resulting diagram obtained for obs.ID 6706. No extension of the X-ray source is visible with a significance of 3σ. Therefore, we see no evidence for a PWN surrounding J1112–6103.

To extract the source counts for spectral analysis we selected all events within an aperture of 3^{′′} centered on the counterpart. All counts were binned to have at least 20 cts/bin.

Testing a power law model yields an excellent fit with χ^2 = 9.7 for 11 d.o.f. and a power law index of 1.5 ± 0.7 (see Figure 3). The fitted column density N_H = 1.2^{+1.1}_{−1.0} × 10^{22} cm^{−2} is in agreement with both, the results of the LAB Survey of Galactic HI (Kalberla et al. 2005), where the column density in the direction to PSR J1112–6103 is between (1.0 − 1.3) × 10^{22} cm^{−2} and 1.8 × 10^{22} cm^{−2} as estimated from the pulsar’s radio dispersion measure DM.

Although a blackbody model fit gives an acceptable description of the spectrum as well (χ^2 = 12.7 for 11 d.o.f.), the resulting blackbody temperature T = (1.4 ± 0.2) × 10^7 K for an emitting radius R_{BB} ∼ 157 ± 28 m is almost an order of magnitude higher than what is observed in other X-ray detected rotation powered pulsars. The blackbody model is rejected for this reason.

10See http://space.mit.edu/cxc/marx/

– 15 –

Fig. 2.— Top: Radial intensity distribution around PSR J1112–6103 in obs.ID 6706. The red line shows the simulated distribution for a point source convolved with a Gaussian with a FWHM=1^{′′}. Bottom: Difference between this two profiles, expressed in terms of the 1σ uncertainty in the derived counts per annulus.

– 16 –

Fig. 3.— X-ray spectrum of PSR J1112–6103 fitted with a power law model. The χ^2 statistic is shown for comparison.

– 17 –

3.8. PSR B1221–63

The radio pulsar PSR B1221–63 (PSR J1224–6407) was first detected by Komesaroff et al. (1973). It was observed on-axis by XMM-Newton with an exposure time of ∼ 7 ksec. Combining the MOS1/2 and PN data we detected a faint X-ray source which matches the pulsar position by 0.^{′′}6 ± 0.^{′′}9. In total we detected (30 ± 8) source counts in the PN and MOS1/2 detectors. Using the net exposure time on this source of 3.9 and 6.4 ksec for the PN and the two MOS1/2 cameras, respectively, the photon flux converts to en energy flux of F^{0.1–2 keV}_X = (1 ± 0.6) × 10^{−14} erg s^{−1} cm^{−2} in the 0.1 to 2 keV range.

3.9. PSR J1301–6310

The middle-aged pulsar PSR J1301–6310 was discovered in the Parkes multi-beam survey (Kramer et al. 2003b). XMM-Newton observed the pulsar position twice for a total of ∼ 60 ksec. In the combined data we detected a X-ray point source with 78 ± 13 source counts in the PN- and MOS1/2 cameras 1.^{′′}9±2.^{′′}3 near to the radio pulsar’s timing position. The recorded events allow for a very coarse spectral analysis for which we extracted the events from within a circle of 20^{′′} radius, centered on the position of the counterpart. Due to the small data statistics both a blackbody and power law spectrum fitted equally good. The fit of a power law results in χ^2 = 15.2 for 15 d.o.f., an N_H < 3.9×10^{21} cm^{−2} and a spectral index of 3.4^{+0.8}_{−0.6}. Using a blackbody spectrum leads to χ^2 = 17.0 for 15 d.o.f. and N_H ≤ 9 × 10^{20} cm^{−2}. After fixing N_H to the DM based value of 2.6 × 10^{21} cm^{−2} both fits still appear to be reasonable (see Table 3), albeit the blackbody radius computed from the blackbody normalization resulted in an unreasonable small value of R_{BB} = 0.09 ± 0.03 km.

3.10. PSR B1338–62

PSR B1338–62 (PSR J1341-6220) is a young, Vela-like pulsar which was discovered in 1985 at the Parkes radio telescope (Manchester et al. 1985). The pulsar is associated with the supernova remnant G308.8–0.1 (Kaspi et al. 1992) and according to Wang et al. (2000) among the most actively glitching pulsars known. The pulsar position was in the field of view of the XMM-Newton telescope for about 42 ksec during two different epochs and with different off-axis angles. Merging the PN- and MOS1/2 data we detected two faint X-ray sources close to the radio pulsar’s timing position: S_1 with the coordinates RA= 13^h41^m43.1^s ± 0.3^s, DEC= −62^∘20^m18^s ± 2^s and S_2 with RA= 13^h41^m43.3^s ± 0.3^s, DEC= −62^∘20^m06^s ± 2^s.

Source S_1 is close to the pulsar position, the difference is 4.^{′′}2 ± 2.^{′′}4. This source is only

– 18 –

distinguishable from S_2 at energies above ∼ 2 keV (see Figure 1). Thus, it has a hard spectrum. For S_2 we found a possible counterpart in the 2MASS All-Sky Catalog of Point Sources, 2MASS J13414307-6220063 with a positional discrepancy of only 1.^{′′}5 ± 2.^{′′}2.

In order to fit the energy spectrum of the detected X-ray source S_1 we extracted the counts from within a radius of 12.^{′′}5, centered on the point source, and excluding events from the region around S_2. The background spectrum was extracted from a region close to S_1. Using a power law to fit the energy spectrum gave an acceptable fit (χ^2 = 3.1 for 8 d.o.f.) with N_H = 4±3×10^{22} cm^{−2}. The column absorption is in agreement with the DM based value of 2.2 × 10^{22} cm^{−2} (Cordes & Lazio 2002). Fixing N_H to this value yields χ^2 = 3.2 for 9 d.o.f. and a photon index Γ = 1.1 ± 0.7. A blackbody model fit gave χ^2 = 2.8 for 7 d.o.f. with fixed N_H, but the resulting blackbody temperature T = 1.3^{+1.8}_{−0.4} × 10^7 K is too high to be consistent with neutron star cooling emission or coming from a hot spot on the neutron star surface.

3.11. PSR J1600–3053

The high galactic latitude binary pulsar PSR J1600–3053 was detected by Jacoby et al. (2007). The XMM-Newton archive contains data from an observation in which the pulsar was in the focus of the telescope for ∼ 25 ksec. As in this observation the PN camera was operated in timing mode, not providing suitable spatial resolution for source detection, we analysed only the two MOS1/2 data sets and detected a faint X-ray source with 37 ± 10 source counts which matches the pulsar’s radio timing position by 0.^{′′}8 ± 2.^{′′}4, making it a very likely counterpart. Converting the photon flux to energy flux results in F^{0.1–2 keV}_X = (6 ± 4) × 10^{−15} erg s^{−1} cm^{−2}.

3.12. PSR J1658–5324

This pulsar was detected in a survey of unidentified Fermi LAT sources with the Parkes radio telescope (Kerr et al. 2012). It is an isolated millisecond pulsar. In the Chandra data archive we found an observation in which this pulsar was in the telescope focus for ∼ 10 ksec. Analyzing this data we detected a faint X-ray point source with 26 ± 5 counts which matches the pulsar position by 0.^{′′}22 ± 0.^{′′}28 what makes it a potential counterpart of the pulsar. Converting the photon flux of this counterpart to energy flux yields F^{0.1–2 keV}_X = (1.6 ± 0.6) × 10^{−14} erg s^{−1} cm^{−2}.

– 19 –

3.13. PSR J1730–2304

The solitary millisecond pulsar J1730–2304 was discovered by Lorimer et al. (1995). The XMM-Newton data archive holds data from an observation in which the pulsar was in the focus of the telescope for ∼ 23 ksec. Analyzing this data we detected an X-ray source with in total 248 ± 21 counts in the PN and MOS1/2 data. It matches the pulsar position by 2.^{′′}7 ± 2.^{′′}1 which makes it a potential X-ray counterpart of the pulsar.

The data statistics allows for a brief spectral analysis for which we extracted the source counts from a circle of radius 20^{′′}, centered on the position of the point source. For the spectral binning we used at least 20 cts/bin and 10 cts/bin for the PN and MOS1/2 data, respectively.

Fitting a single power law or blackbody model to the data showed systematic deviations at ≈ 1.4 keV and did not result in acceptable fits. Adding a Gaussian emission line profile to the power law model improved the fit to yield χ^2 = 17.0 for 16 d.o.f., though the statistical justification for the need of such a spectral line component is barely significant due to the low photon statistics in the spectrum. The line center was fitted to be 1.36^{+0.08}_{−0.1} keV. The blackbody model still showed systematic deviations even after adding a spectral emission line component to the model spectrum. Deeper Chandra observations which provide better data statistics are required to further explore the source spectrum with higher significance.

3.14. PSR J1731–1847

The binary pulsar PSR J1731–1847 was discovered in the High Time Resolution Universe Pulsar survey (Bates et al. 2011). It was observed on axis, both with XMM-Newton and Chandra for ∼ 40 ksec and ∼ 10 ksec, respectively. In the merged XMM-Newton MOS1/2 data a point source is clearly detected 1.^{′′}2 ± 2.^{′′}7 arcsec from the radio position with in total 47 ± 13 counts. The photon flux corresponds to an energy flux of F^{0.1–2 keV}_X = (6 ± 4) × 10^{−15} erg s^{−1} cm^{−2}. The XMM- Newton PN data were not usable for the analysis because of high background flares which strongly reduced the S/N ratio in that data. An optical source with visible magnitude V = 17.34^{mag} is within the 1σ error circle around the position obtained in the XMM-Newton data. However, using the Chandra data we can rule out the possibility that the optical source is the X-ray counterpart of the detected XMM source. The Chandra source position is more than 3^{′′}away from the optical source whereas the positional uncertainty is only 0.^{′′}5.

– 20 –

3.15. PSR J1816+4510

This eclipsing millisecond pulsar was studied in detail in the optical, UV and γ-ray band by Kaplan et al. (2012). The Chandra data archive holds an observation in which the pulsar position was in the focus of the telescope for ∼ 34 ksec. Using this observation we detected a faint potential X-ray counterpart 0.^{′′}4 ± 0.^{′′}3 near to the pulsars timing position. It has 16 ± 4 source counts. The photon flux converts to an energy flux of F^{0.1–2 keV}_X = (3.1 ± 1.6) × 10^{−15} erg s^{−1} cm^{−2}.

3.16. PSR B1822-09

The middle-aged pulsar B1822-09 (PSR J1825–0935) was first mentioned in the literature by Davies et al. (1972). In the XMM-Newton data archive we found a short ∼ 5 ksec deep observation targeted on this pulsar. Using this data we detected an X-ray source 1.^{′′}5 ± 2.^{′′}3 near to the pulsar’s timing position which makes it a potential counterpart of the pulsar. The X-ray source has 46 ± 11 source counts in the merged PN and MOS1/2 data. The photon flux corresponds to an energy flux of F^{0.1–2 keV}

X = (1.7 ± 0.8) × 10^{−14} erg s^{−1} cm^{−2}.

3.17. PSR J1832–0836

This isolated millisecond pulsar was discovered in the radio band during the High Time Resolution Universe Pulsar survey (Burgay et al. 2013). In an archival observation of AX J1832.3–0840, a low luminous X-ray pulsator (Kaur et al. 2010), the pulsar was observed ∼ 4^′ off-axis. In the merged EPIC-PN and MOS1/2 data a faint X-ray source was detected 1.^{′′}8 ± 2.^{′′}6 near to the radio timing position with 34±9 counts, making it a potential pulsar counterpart. Its photon flux converts to an energy flux of F^{0.1–2 keV}_X = (3.8 ± 2.0) × 10^{−15} erg s^{−1} cm^{−2}.

3.18. PSR J1911–1114

Radio emission from the binary millisecond pulsar PSR J1911–1114 was discovered by Lorimer et al. (1996). The XMM-Newton data archive holds a ∼ 50 ksec deep observation of this pulsar in which the PN was operated in timing mode. Using the EPIC MOS1/2 data we detected an X-ray source 3.^{′′}1 ± 2.^{′′}8 near to the pulsars position. It as 54 ± 13 source counts in the merged MOS1 and MOS2 data. The photon flux converts to an energy flux of F^{0.1–2 keV}_X = 3.7±1.8×10^{−15} erg s^{−1} cm^{−2}.

– 21 –

3.19. PSR J2017+0603

PSR J2017+0603 is a millisecond pulsar in a binary system. It was first detected by its pulsed γ-ray emission with the Fermi satellite (Cognard et al. 2011). In the discovery paper the authors derived an upper limit on the X-ray flux in the 0.5−8 keV band of F^{0.5–8 keV}_X < 6×10^{−14} erg s^{−1}cm^{−2}. Using an archival Chandra ACIS-S observation aimed on this pulsar we detected an X-ray source 0.^{′′}2 ± 0.^{′′}2 near to the radio pulsar’s timing position, making it a potential X-ray counterpart of the pulsar. It has 19 ± 5 source counts which we convert to an energy flux of F^{0.1–2 keV}_X = (1.1 ± 0.6) × 10^{−14} erg s^{−1}cm^{−2}.

3.20. PSR J2222–0137

The binary millisecond pulsar PSR J2222–0137 (Boyles et al. 2012) was observed on-axis for ∼ 30 ksec with the Chandra ACIS-S camera. In this data we detected an X-ray source with 26 ± 5 source counts 0.1 ± 0.2 arcsec near to the pulsar’s radio position, making it a potential pulsar counterpart. The photon flux corresponds to an energy flux of F^{0.1–2 keV}_X = 4.5 ± 2.0 × 10^{−15} erg s^{−1}cm^{−2}.

4. Upper limits on the X-ray counterparts of radio pulsars

In Table 5 the non-thermal flux F^{PL}_{0.1–2 keV} and the upper limits on the blackbody temperature T_∞, as measured by a distant observer at infinity, are listed for all rotation-powered pulsars for which no X-ray counterpart was detected in the archival data. Furthermore, the non-thermal luminosity L^{PL}_{0.1–2 keV} = 4πd^2_{UL}F^{PL}_{0.1–2 keV} and the X-ray efficiency μ^{PL}_{0.1–2 keV} = L^{PL}_{0.1–2 keV}/Ė are listed there as well. Therein Ė = −4π^2IṖP^{−3} is the spin-down luminosity and I = 10^{45} g cm^2 the canonical moment of inertia for a neutron star with a mass of 1.4 M_⊙ and a radius of 10 km. In Table 6 the pulsars with the lowest X-ray efficiency upper-limit are displayed separately.

Figure 4 displays the correlation of the isotropic X-ray luminosity L^{0.1−2}_X in the 0.1–2 keV band with the pulsar’s spin-down luminosity Ė. In red color we plotted the X-ray luminosity for all potential pulsar counterparts for which we were able to perform a brief spectral analysis. Blue error bars indicate the X-ray luminosity of potential counterparts for which we had to assume the spectral shape to convert the photon flux to an energy flux resp. X-ray luminosity. In addition we added the 2σ upper limits on the non-thermal X-ray luminosity for all pulsars, for which at least a dispersion measure based distance estimate is known. The gray shaded region in this graph shows the correlation between L^{0.1−2}_X and Ė as found by Becker (2009):

– 22 –

L^{0.1−2}_X = 10^{−3.24+0.26−0.66}Ė^{−0.997+0.008−0.001} . (10)

For this fit the authors used ≈ 80 rotation-powered pulsars for which spectral information was obtained in XMM-Newton and Chandra observations, respectively.

If no association between a pulsar and e.g. a hosting supernova remnant is possible, the only way to estimate the age of a pulsar is by its spin-down age τ = 2P/Ṗ. The Crab pulsar is the only pulsar for which the true historic age is known (Green & Stephenson 2003). In this case the difference between the spin-down age τ and the true historic age is of the order of ≈ 20%. In Figure 5 we plotted the derived 3σ temperature upper limits T_∞ against the spin-down age of the pulsars. In this figure we show an error bar for the pulsar age only if kinematic informations are available, i.e., the age is known with accurately determined errors.

To compare the data with actual cooling models we used the cooling curves of Page et al. (2009). For the computation of the curves Page et al. (2009) used a 1.4 M_⊙ neutron star with the equation of state taken from Akmal et al. (1998), different neutron^1S_0, proton^1S_0, and neutron 3P_2 gap models were taken from Page et al. (2004). The authors showed that the cooling of a neutron star in the minimal cooling paradigm is only slightly dependent on the neutron star mass and the used neutron and proton^1S_0 gap model. The main uncertainties in the minimal cooling paradigm are a possible evolution of the chemical composition of the envelope of the neutron star and hence its opacity, as well as the number of different gap models that are allowed by current measurements. In Figure 5 we therefore compare our data with the allowed temperature range of these models.

The lower panel in Figure 5 shows the bolometric luminosity plotted against the pulsars’ spindown age. We added all pulsars from the literature for which thermal emission from their surface has been detected or upper limits on the temperature have been published. In this plot the upper limits derived in this paper are indicated by gray arrows. The cooling models shown are computed for a 1.4 M_⊙ star with the equation of state adopted from Akmal et al. (1998), different neutron 1S_0, proton^1S_0, and neutron^3P_2 gap models as introduced by Page et al. (2004). The area in dark and light gray contain cooling models computed with heavy- and light-element dominated envelopes, respectively. The error bars indicate the error range in temperature or bolometric luminosity of all pulsars with detected thermal emission, e.g. (1) Cas A: Shternin et al. (2011); Fesen et al. (2006); (2) J0822–4300: Zavlin et al. (1999); Becker et al. (2012); (3) J1210–5226: Zavlin et al. (1998); Roger et al. (1988); (4) B0833–45: Pavlov et al. (2001); Aschenbach et al. (1995); (5) B1706–44: McGowan et al. (2004); Koribalski et al. (1995); (6) B0656+14: Marshall & Schulz (2002); Brisken et al. (2003); (7) J0633+1748: Halpern & Wang (1997); Caraveo et al. (2001); (8) B1055–52: De Luca et al. (2005); Kramer et al. (2003b); (9) J1856–3754: Burwitz et al. (2003); Mignani et al. (2013); (10) J0720–3125: Kaplan et al. (2003); Tetzlaff et al. (2011);

– 23 –

Fig. 4.— Spin-down luminosity dE/dt plotted against the isotropic X-ray luminosity L^{0.1−2}_X in the 0.1–2 keV band. The red error bars represent the 1σ confidence range and indicate those potential pulsar counterparts for which we could perform a brief spectral analysis in order to obtain the energy flux and X-ray luminosity. Values for the remaining potential counterparts are plotted in blue. In the case of the non-detected pulsars the 2σ upper limit is indicated by an arrow. The straight line represent the relation found by Becker (2009) with an uncertainty range indicated by the gray shaded region.

– 24 –

Fig. 5.— Comparison of the derived upper limits on the temperature (upper panel) and bolometric luminosity (lower panel) of the radio pulsars for which data where found in the XMM-Newton or Chandra archives. The plotted cooling curves were taken from Page et al. (2009) (see text for more informations).

– 25 –

(11) J0538+2817: Zavlin & Pavlov (2004b); Kramer et al. (2003a); (12) B2334+61: McGowan et al. (2006); Yar-Uyaniker et al. (2004); (13) J1119–6127: Safi-Harb & Kumar (2008); Kumar et al. (2012).

All pulsars with derived temperature upper limit are indicated by a red arrow, e.g. (a) Crab: Weisskopf et al. (2011); (b) J0205+6449: Slane et al. (2004a); Fesen et al. (2008); (c) J1124–5916: Hughes et al. (2003); Camilo et al. (2002); (d) RX J0007.0+7302: Halpern et al. (2004); Slane et al. (2004b); (e) B2224+65: Gonzalez et al. (2004); (f) B1929+10: Hui & Becker (2007); (g) B0950+08: Becker et al. (2006); Chatterjee et al. (2004); (h) B0628–28: Zavlin & Pavlov (2004a); Brisken et al. (2002); (i) B0823+26: Becker et al. (2005); (k) J2043+2740: Becker et al. (2004); Brisken et al. (2002). We added the error in the age for pulsars with known kinematic age. These data are taken from Page et al. (2004, 2009), Özel (2013), and Zhu et al. (2011). Additionally, for the central compact object in Puppis-A we adopted the new age estimate of (5.2 ± 1.0) × 10^3 years (Becker et al. 2012). In Table 7 we summarize the neutron stars which have the lowest 3σ upper limit on the surface temperature in our sample. They are indicated by a black arrow in the upper panel of Figure 5.

The ATNF Pulsar Catalog (Catalogue version number = 1.54) which we used to searched for potential X-ray counterparts in the XMM-Newton or Chandra data archives has currently about 2500 rotation-powered pulsars in its database (Manchester et al. 2005). However, only about 2000 of them have published period derivatives and spindown energies. For some others no dispersion measure has been published so far, so that it is not possible to get an estimate on their distance and hence no estimate on their X-ray luminosity or luminosity upper limit and/or X-ray efficiency.

5. Conclusion

We have systematically searched the archives of the X-ray observatories Chandra and XMM- Newton for serendipitous datasets which include a radio pulsar in the field of view. All 20 detected X-ray counterparts of radio pulsars fulfill the following criteria (see also Section 2): The discrepancy between the radio and X-ray source position is less than 3σ, the probability that an X-ray source is by-chance at the pulsar’s position is below 3σ and no optical source having a X-ray-to-visual flux ratio typical for stars is found within the 3σ error box around the pulsar’s counterpart.

The non-thermal X-ray efficiency of all potential counterparts and or their upper limits are in agreement with the predictions made by Becker (2009). Only a small scatter is noticeable which is in agreement with statistical fluctuations (e.g. Becker et al. 2010, figure 18) and the uncertainties introduced by e.g. assuming the spectral parameters for the pulsars with less than 70 detected counts. The uncertainties that can cause the scatter in equation 10 is addressed separately in the

– 26 –

next section.

Four of the 20 potential counterpart which we detected in our correlation were mentioned in the literature during the analysis and publication process of this paper. J1341–6220 is listed as radio pulsar with X-ray counterpart in Kaplan et al. (2004) and Smith et al. (2008), but no detailed analysis of the X-ray properties of PSR J1341–6220 was presented by the authors. For the radio pulsars PSR J1112–6103 and PSR J2222–0137 a detection is claimed by Townsley et al. (2011) and Boyles et al. (2011), respectively, but these authors did not investigate the X-ray data in detail too. In any case, we consider this as a confirmation of our findings which strengthens the detections of the other potential counterparts too.

5.1. Non-thermal X-ray emission

In a first step, the consistency of the measured upper limits on the non-thermal X-ray emission was verified. This was done by comparing the values derived in Section 2.4 with upper limits found in the literature. The limits on μ_X of Kargaltsev et al. (2012) were confirmed, even though a different energy band and a larger confidential level of 95.4 % was used in this work. Only in the case of PSR J1837–0604 our derived upper limit on the flux is three times higher. However, this can be explained by the fact that in Kargaltsev et al. (2012) the counts were not corrected for the encircled energy fraction.

Thereafter, the non-thermal X-ray luminosity for the 20 X-ray counterparts and the upper limits derived for the 262 remaining pulsars were used to further study the scatter in the relation of the non-thermal X-ray luminosity to the spin-down power. Eleven sources were found with upper limits on μ_{0.1–2 keV} below 10^{−4}. This confirms the trend for finding smaller X-ray efficiencies with increasing sample size and higher sensitivity of X-ray observatories. The X-ray efficiency of a rotation-powered pulsar can be as high as 1.9 × 10^{−3}, e.g., for the Crab pulsar (Becker 2009), but also be below 2.2 × 10^{−6} as for PSR J0940–5428.

It should be noted that young pulsars with Ė > Ė_c ≈ 4 × 10^{36} erg/s could manifest a distinct pulsar wind nebula (PWN, Gotthelf 2004). If such a PWN exists and/or thermal emission from the pulsar’s surface is hot enough to contribute to the X-ray emission, the non-thermal X-ray efficiency of several pulsars could be even lower than the determined upper limit.

Theory predicts a distinct relation between the X-ray efficiency and the spin-down power (e.g. Wang & Zhao 2004). The detected large scatter contradicts such a tight relation and favors the interpretation of Becker (2009) that the efficiency of μ_X ∼ 10^{−3} represents more the maximum efficiency rather than a fixed correlation. It might be seen for pulsars which are seen with an optimal viewing geometry. Because the orientation of the pulsar’s magnetic axes with respect to the

– 27 –

observer’s line of sight might not have been optimal for observation and no beaming correction can be applied to the observed luminosity, the X-ray efficiency of pulsars observed with an unfavorable viewing geometry appears to be smaller than that for pulsars observed with an optimal viewing geometry. A reason for the large dispersion in μ_X then would be mostly caused by the viewing geometry and the inability to apply a beaming correction (Becker 2009, and references therein).

Kargaltsev & Pavlov (2010) reviewed all known PWNe and investigated their X-ray efficiency. They found a scatter in the measured luminosities too, despite of the fact that PWN emission is thought to be unbeamed (Gaensler & Slane 2006). Therefore, the beaming angle might be only one of several parameters which might cause the observed scatter in μ_X for pulsars.

Certainly, erroneous distances contribute to the uncertainty in the derived X-ray luminosities too. Although the errors in the distance measurement were included in our μ_X calculations, most distances used in this work are based on the radio dispersion measure DM and large fluctuations in it are not included in the model calculations. This could easily introduce a scatter of roughly one order of magnitude in the derived X-ray luminosity for some sources.

Finally, another reason for the scatter in μ_X could be a wrongly determined spin-down luminosity. In the last years several intermittent pulsars have been discovered (e.g., Kramer et al. 2006; Camilo et al. 2012; Lorimer et al. 2012), which at first seemed to be ordinary radio pulsars, but later have been seen to switch their radio emission off quasi-periodically, then showing different spin-down rates at time scales from months to years. In the so called on-state the spin-down rate increases by a factor of 2 to 3 compared to the off-state. Because the spin-down luminosity is proportional to the spin-down rate and for some radio pulsars only a few observations exist, it can not be excluded that some sources have indeed a lower Ė than calculated from their period and period derivatives.

5.2. Thermal X-ray emission

As for the non-thermal X-ray emission, the consistency of the measured upper limits were tested. Temperature upper limits for eight pulsars can be found in the literature (Gonzalez et al. 2004; Kaplan et al. 2009; Olausen et al. 2013; Keane et al. 2013), including the coolest pulsar in the sample presented in this work, PSR J2144–3933. For six pulsars similar values for the temperature upper limit were found, with a minor deviation of ±10 %. This small discrepancy may be due to the fact that Olausen et al. (2013) did not include the distance error in their calculations. Additionally, it is difficult to compare the results in detail because all aforementioned authors used slightly different methods to calculate the upper limits and no detailed information is given in Olausen et al. (2013) about the effective exposure time and radius of the annulus they used to compute the

– 28 –

upper limits for PSRs J1814–1744 and J1847–0130. However, the method used in this work makes use of all archival observations of a pulsar and, thus, in general derives deeper upper limits. In the case of PSR B1845–19 (Olausen et al. 2013) and PSR J0157+6212 (Gonzalez et al. 2004) the temperature upper limits we deduced in this work are 32% and 36% lower than what is reported in the literature. For PSR B1845–19 this is because two archival XMM-Newton observations were used rather than one as in Olausen et al. (2013). In the case of PSR J0157+6212 the difference appears partly due to a different N_H value, though a large, and yet unexplained, difference remains between the measured upper limit in our work and that by Gonzalez et al. (2004).

In total, 3σ upper limits on the blackbody temperature for 263 pulsars were derived, ranging from 2.2 × 10^5 K for PSR J2144–3933 to 2.7 × 10^6 K for PSR J1822–1617. All measured temperature upper limits are in agreement with current cooling models, which assume only nuclear matter in the core of a neutron star and Cooper-pair breaking and formation as the main source of neutrino emission. These models include the uncertainties regarding the allowed amounts of light elements in the envelope of the star and the different possible neutron^3P_2 gap models. A comparison of the upper limits with other cooling curves (e.g. Tsuruta 1998; Yakovlev & Pethick 2004; Tsuruta 2009) shows that they are in agreement with models that assume standard cooling with Cooper-pair breaking and formation too.

6. Future prospects

In Table 6 and 7 we list those pulsars which appear to have a rather low X-ray efficiency or 3σ temperature upper limit. Further observations of these sources will allow to explore them in more detail which might result in even tighter constraints on the cooling models or the theories that try to explain the pulsar’s non-thermal X-ray efficiency. Detecting, for example, thermal X-ray emission from a neutron star with a surface temperature lower than what is predicted by the minimal cooling paradigm would require to include enhanced cooling mechanisms in those models to explain that observation.

In fall 2017 the eROSITA Observatory (extended ROentgen Survey with an Imaging Telescope Array) is scheduled for launch on the Russian Spectrum X-Gamma Satellite. Three month after the start it will begin to survey the X-ray sky with an XMM-Newton like sensitivity (Merloni et al. 2012). This data will enable us to study all ≈ 2500 known pulsars in the X-ray band with three times better spatial resolution and ≈ 20 times higher sensitivity than possible in the ROSAT All-Sky Survey. The eROSITA survey will provide unique X-ray data which enables us to investigate a larger and even more unbiased pulsar sample than possible with the data available in the XMM-Newton and Chandra data archives.

– 29 –

Acknowledgments We acknowledge the use of the XMM-Newton and Chandra data archive. T.P. acknowledges support from and participation in the International Max Planck Research School on Astrophysics at the Ludwig Maximilian University of Munich, Germany, IMPRS.

REFERENCES Akmal, A., Pandharipande, V. R., & Ravenhall, D. G. 1998, Phys. Rev. C, 58, 1804 Arzoumanian, Z., Gotthelf, E. V., Ransom, S. M., et al. 2011, ApJ, 739, 39 Aschenbach, B., Egger, R., & Trümper, J. 1995, Nature, 373, 587 Bates, S. D., Bailes, M., Bhat, N. D. R., et al. 2011, MNRAS, 416, 2455 Becker, W. 1995, PhD thesis, LMU, Germany Becker, W. 2009, in Astrophysics and Space Science Library, Vol. 357, Astrophysics and Space Science Library, ed. W. Becker, 91 Becker, W., Huang, H. H., & Prinz, T. 2010, ArXiv e-prints, arXiv:1006.0335 Becker, W., Jessner, A., Kramer, M., Testa, V., & Howaldt, C. 2005, ApJ, 633, 367 Becker, W., Prinz, T., Winkler, P. F., & Petre, R. 2012, ApJ, 755, 141 Becker, W., & Trümper, J. 1997, A&A, 326, 682 —. 1999, A&A, 341, 803 Becker, W., Trümper, J., & Ögelman, H. 1993, in Isolated Pulsars, ed. K. A. van Riper, R. I.

Epstein, & C. Ho, 104 Becker, W., Weisskopf, M. C., Tennant, A. F., et al. 2004, ApJ, 615, 908 Becker, W., Kramer, M., Jessner, A., et al. 2006, ApJ, 645, 1421 Boyles, J., Lorimer, D. R., McLaughlin, M. A., et al. 2011, in American Institute of Physics Conference Series, Vol. 1357, American Institute of Physics Conference Series, ed. M. Burgay, N. D’Amico, P. Esposito, A. Pellizzoni, & A. Possenti, 32–35 Boyles, J., Lynch, R. S., Ransom, S. M., et al. 2012, ArXiv e-prints, arXiv:1209.4293

– 30 –

Brisken, W. F., Benson, J. M., Goss, W. M., & Thorsett, S. E. 2002, ApJ, 571, 906 Brisken, W. F., Thorsett, S. E., Golden, A., & Goss, W. M. 2003, ApJ, 593, L89 Burgay, M., Bailes, M., Bates, S. D., et al. 2013, MNRAS, 433, 259 Burwitz, V., Haberl, F., Neuhäuser, R., et al. 2003, A&A, 399, 1109 Camilo, F., Manchester, R. N., Gaensler, B. M., Lorimer, D. R., & Sarkissian, J. 2002, ApJ, 567, L71 Camilo, F., Ransom, S. M., Chatterjee, S., Johnston, S., & Demorest, P. 2012, ApJ, 746, 63 Caraveo, P. A., De Luca, A., Mignani, R. P., & Bignami, G. F. 2001, ApJ, 561, 930 Chatterjee, S., Cordes, J. M., Vlemmings, W. H. T., et al. 2004, ApJ, 604, 339 Cognard, I., Guillemot, L., Johnson, T. J., et al. 2011, ApJ, 732, 47 Cordes, J. M., & Lazio, T. J. W. 2002, ArXiv Astrophysics e-prints, arXiv:astro-ph/0207156 Davies, J. G., Lyne, A. G., & Seiradakis, J. H. 1972, Nature, 240, 229 de Jager, O. C., Raubenheimer, B. C., & Swanepoel, J. W. H. 1989, A&A, 221, 180 De Luca, A., Caraveo, P. A., Mereghetti, S., Negroni, M., & Bignami, G. F. 2005, ApJ, 623, 1051 Fesen, R., Rudie, G., Hurford, A., & Soto, A. 2008, ApJS, 174, 379 Fesen, R. A., Hammell, M. C., Morse, J., et al. 2006, ApJ, 645, 283 Gaensler, B. M., & Slane, P. O. 2006, ARA&A, 44, 17 Gonzalez, M. E., Kaspi, V. M., Lyne, A. G., & Pivovaroff, M. J. 2004, ApJ, 610, L37 Gotthelf, E. V. 2004, in IAU Symposium, Vol. 218, Young Neutron Stars and Their Environments, ed. F. Camilo & B. M. Gaensler, 225 Green, D. A., & Stephenson, F. R. 2003, in Lecture Notes in Physics, Berlin Springer Verlag, Vol.

598, Supernovae and Gamma-Ray Bursters, ed. K. Weiler, 7–19 Halpern, J. P., Gotthelf, E. V., Camilo, F., Helfand, D. J., & Ransom, S. M. 2004, ApJ, 612, 398 Halpern, J. P., & Wang, F. Y.-H. 1997, ApJ, 477, 905 Hughes, J. P., Slane, P. O., Park, S., Roming, P. W. A., & Burrows, D. N. 2003, ApJ, 591, L139

– 31 –

Hui, C. Y., & Becker, W. 2007, A&A, 467, 1209 Jacoby, B. A., Bailes, M., Ord, S. M., Knight, H. S., & Hotan, A. W. 2007, ApJ, 656, 408 Kalberla, P. M. W., Burton, W. B., Hartmann, D., et al. 2005, A&A, 440, 775 Kaplan, D. L., Esposito, P., Chatterjee, S., et al. 2009, MNRAS, 400, 1445 Kaplan, D. L., Frail, D. A., Gaensler, B. M., et al. 2004, ApJS, 153, 269 Kaplan, D. L., van Kerkwijk, M. H., Marshall, H. L., et al. 2003, ApJ, 590, 1008 Kaplan, D. L., Stovall, K., Ransom, S. M., et al. 2012, ApJ, 753, 174 Kargaltsev, O., Durant, M., Pavlov, G. G., & Garmire, G. 2012, ApJS, 201, 37 Kargaltsev, O., & Pavlov, G. G. 2010, X-ray Astronomy 2009; Present Status, Multi-Wavelength Approach and Future Perspectives, 1248, 25 Kaspi, V. M., Manchester, R. N., Johnston, S., Lyne, A. G., & D’Amico, N. 1992, ApJ, 399, L155 Kaur, R., Wijnands, R., Paul, B., Patruno, A., & Degenaar, N. 2010, MNRAS, 402, 2388 Keane, E. F., McLaughlin, M. A., Kramer, M., et al. 2013, ApJ, 764, 180 Kerr, M., Camilo, F., Johnson, T. J., et al. 2012, ApJ, 748, L2 Komesaroff, M. M., Ables, J. G., Cooke, D. J., Hamilton, P. A., & McCulloch, P. M. 1973, Astrophys. Lett., 15, 169 Koribalski, B., Johnston, S., Weisberg, J. M., & Wilson, W. 1995, ApJ, 441, 756 Kraft, R. P., Burrows, D. N., & Nousek, J. A. 1991, ApJ, 374, 344 Kramer, M., Lyne, A. G., Hobbs, G., et al. 2003a, ApJ, 593, L31 Kramer, M., Lyne, A. G., O’Brien, J. T., Jordan, C. A., & Lorimer, D. R. 2006, Science, 312, 549 Kramer, M., Bell, J. F., Manchester, R. N., et al. 2003b, MNRAS, 342, 1299 Kuiper, L., & Hermsen, W. 2015, MNRAS, 449, 3827 Kumar, H. S., Safi-Harb, S., & Gonzalez, M. E. 2012, ApJ, 754, 96 Li, X.-H., Lu, F.-J., & Li, Z. 2008, ApJ, 682, 1166 Lorimer, D. R., Lyne, A. G., Bailes, M., et al. 1996, MNRAS, 283, 1383

– 32 –

Lorimer, D. R., Lyne, A. G., McLaughlin, M. A., et al. 2012, ApJ, 758, 141 Lorimer, D. R., Nicastro, L., Lyne, A. G., et al. 1995, ApJ, 439, 933 Maccacaro, T., Gioia, I. M., Wolter, A., Zamorani, G., & Stocke, J. T. 1988, ApJ, 326, 680 Manchester, R. N., Damico, N., & Tuohy, I. R. 1985, MNRAS, 212, 975 Manchester, R. N., Hobbs, G. B., Teoh, A., & Hobbs, M. 2005, AJ, 129, 1993 Manchester, R. N., Lyne, A. G., Taylor, J. H., et al. 1978, MNRAS, 185, 409 Manchester, R. N., Lyne, A. G., Camilo, F., et al. 2001, MNRAS, 328, 17 Marshall, H. L., & Schulz, N. S. 2002, ApJ, 574, 377 McGowan, K. E., Zane, S., Cropper, M., et al. 2004, ApJ, 600, 343 McGowan, K. E., Zane, S., Cropper, M., Vestrand, W. T., & Ho, C. 2006, ApJ, 639, 377 Merloni, A., Predehl, P., Becker, W., et al. 2012, ArXiv e-prints, arXiv:1209.3114 Mignani, R. P., Vande Putte, D., Cropper, M., et al. 2013, MNRAS, 429, 3517 Monet, D. G., Levine, S. E., Canzian, B., et al. 2003, AJ, 125, 984 Morrison, R., & McCammon, D. 1983, ApJ, 270, 119 Olausen, S. A., Zhu, W. W., Vogel, J. K., et al. 2013, ApJ, 764, 1 Özel, F. 2013, Reports on Progress in Physics, 76, 016901 Page, D., Lattimer, J. M., Prakash, M., & Steiner, A. W. 2004, ApJS, 155, 623 —. 2009, ApJ, 707, 1131 Pavlov, G. G., Zavlin, V. E., Sanwal, D., Burwitz, V., & Garmire, G. P. 2001, ApJ, 552, L129 Possenti, A., Cerutti, R., Colpi, M., & Mereghetti, S. 2002, A&A, 387, 993 Ransom, S. M., Stairs, I. H., Archibald, A. M., et al. 2014, Nature, 505, 520 Roger, R. S., Milne, D. K., Kesteven, M. J., Wellington, K. J., & Haynes, R. F. 1988, ApJ, 332, 940 Romani, R. W., & Ng, C.-Y. 2003, ApJ, 585, L41

– 33 –

Safi-Harb, S., & Kumar, H. S. 2008, ApJ, 684, 532 Saz Parkinson, P. M., Dormody, M., Ziegler, M., et al. 2010, ApJ, 725, 571 Schartel, N. 2012, Mem. Soc. Astron. Italiana, 83, 97 Seward, F. D., & Wang, Z.-R. 1988, ApJ, 332, 199 Shternin, P. S., Yakovlev, D. G., Heinke, C. O., Ho, W. C. G., & Patnaude, D. J. 2011, MNRAS, 412, L108 Slane, P., Helfand, D. J., van der Swaluw, E., & Murray, S. S. 2004a, ApJ, 616, 403 Slane, P., Zimmerman, E. R., Hughes, J. P., et al. 2004b, ApJ, 601, 1045 Smith, D. A., Guillemot, L., Camilo, F., et al. 2008, A&A, 492, 923 Spiewak, R., Kaplan, D. L., Archibald, A., et al. 2016, ArXiv e-prints, arXiv:1602.00655 Stokes, G. H., Taylor, J. H., Welsberg, J. M., & Dewey, R. J. 1985, Nature, 317, 787 Tananbaum, H., Weisskopf, M. C., Tucker, W., Wilkes, B., & Edmonds, P. 2014, Reports on Progress in Physics, 77, 066902 Taylor, J. H., & Cordes, J. M. 1993, ApJ, 411, 674 Tetzlaff, N., Eisenbeiss, T., Neuhäuser, R., & Hohle, M. M. 2011, MNRAS, 417, 617 Townsley, L. K., Broos, P. S., Chu, Y.-H., et al. 2011, ApJS, 194, 16 Tsuruta, S. 1998, Phys. Rep., 292, 1 Tsuruta, S. 2009, in Astrophysics and Space Science Library, Vol. 357, Astrophysics and Space Science Library, ed. W. Becker, 289 Verbiest, J. P. W., Weisberg, J. M., Chael, A. A., Lee, K. J., & Lorimer, D. R. 2012, ApJ, 755, 39 Wang, N., Manchester, R. N., Pace, R. T., et al. 2000, MNRAS, 317, 843 Wang, W., & Zhao, Y. 2004, ApJ, 601, 1038 Weisskopf, M. C., Tennant, A. F., Yakovlev, D. G., et al. 2011, ApJ, 743, 139 Xmm-Newton Survey Science Centre, C. 2013, VizieR Online Data Catalog, 9044, 0 Yakovlev, D. G., & Pethick, C. J. 2004, ARA&A, 42, 169

– 34 –

Yar-Uyaniker, A., Uyaniker, B., & Kothes, R. 2004, ApJ, 616, 247 Zavlin, V. E., & Pavlov, G. G. 2004a, ApJ, 616, 452 —. 2004b, Mem. Soc. Astron. Italiana, 75, 458 Zavlin, V. E., Pavlov, G. G., & Trumper, J. 1998, A&A, 331, 821 Zavlin, V. E., Trümper, J., & Pavlov, G. G. 1999, ApJ, 525, 959 Zhu, W. W., Kaspi, V. M., McLaughlin, M. A., et al. 2011, ApJ, 734, 44

This preprint was prepared with the AAS L^ATEX macros v5.2.

– 35 –

Table 1:: Used observations.

PSR satellite^{(α)} obsID date instrument^{(β)} filter t_{on-axis} t(θ) θ^{(γ)} count rate^{(δ)} flag^{(δ)} ksec ksec arcmin cts/ksec

J0051+0423 C 15968 2013-12-22 ACIS-S - 3.6 3.5 0.2 0.83 ul J0101–6422 C 15363 2013-02-17 ACIS-I - 9.8 9.0 0.7 - d J0117+5914 X 0112200201 2002-07-09 PN/FF Medium 5.8 5.1 1.7 - d X 0112200201 2002-07-09 MOS1 Medium 7.9 7.7 1.7 - d X 0112200201 2002-07-09 MOS2 Medium 8.1 7.9 1.7 - d J0134–2937 X 0654800501 2010-12-30 PN/FF Medium 30.4 11.8 11.4 3.44 ul X 0654800501 2010-12-30 MOS1 Medium 39.0 2.1 11.4 1.44 ul X 0654800501 2010-12-30 MOS2 Medium 39.5 19.1 11.4 1.55 ul J0137+1654 C 15969 2013-12-27 ACIS-S - 3.6 3.5 0.2 0.83 ul J0139+5814 X 0103262501 2003-01-16 PN/FF Medium 2.7 2.4 1.7 2.86 ul X 0103262501 2003-01-16 MOS1 Medium 4.4 4.3 1.7 1.95 ul X 0103262501 2003-01-16 MOS2 Medium 4.4 4.2 1.7 0.74 ul J0157+6212 X 0150820201 2003-03-06 PN/SW Thin 12.1 8.4 1.8 4.06 ul X 0150820201 2003-03-06 MOS1 Medium 12.8 12.6 1.8 0.94 ul X 0150820201 2003-03-06 MOS2 Medium 13.3 11.4 1.8 1.23 ul J0248+6021 C 13289 2012-09-25 ACIS-I - 9.3 8.6 0.3 1.15 ul J0335+4555 C 15970 2013-12-25 ACIS-S - 3.6 3.5 0.2 0.89 ul J0337+1715 X 0722920101 2013-08-01 PN/FF Thin 16.8 14.8 1.8 - d X 0722920101 2013-08-01 MOS1 Thin 18.4 17.2 1.8 - d X 0722920101 2013-08-01 MOS2 Thin 18.2 17.2 1.8 - d J0520–2553 C 15971 2013-12-28 ACIS-S - 3.6 3.5 0.2 0.83 ul J0543+2329 X 0103262801 2003-10-09 PN/FF Medium 5.5 4.9 1.7 - d X 0103262801 2003-10-09 MOS1 Medium 7.6 7.5 1.7 - d X 0103262801 2003-10-09 MOS2 Medium 7.5 7.1 1.7 - d J0609+2130 C 12687 2011-04-14 ACIS-S - 5.1 5.0 0.3 0.62 ul J0622+3749 C 12842 2011-01-29 ACIS-I - 2.1 1.9 2.2 1.56 ul J0636+5129 X 0722920201 2013-10-12 MOS1 Thin 16.4 15.0 1.7 4.49 ul X 0722920201 2013-10-12 MOS2 Thin 16.2 15.4 1.7 3.98 ul J0645+5158 X 0722920301 2014-03-29 MOS1 Thin 18.8 17.2 1.7 0.86 ul X 0722920301 2014-03-29 MOS2 Thin 18.4 16.5 1.7 0.71 ul J0656–5449 C 15972 2014-04-06 ACIS-S - 3.6 3.5 0.2 0.83 ul J0742–2822 X 0103262401 2002-10-11 PN/FF Medium 2.7 2.4 1.7 14.54 ul X 0103262401 2002-10-11 MOS1 Medium 5.1 5.0 1.7 3.54 ul X 0103262401 2002-10-11 MOS2 Medium 5.7 5.5 1.7 2.22 ul J0828–3417 X 0400020101 2006-11-13 PN/FF Thin 35.4 30.6 1.7 1.34 ul X 0400020101 2006-11-13 MOS1 Thin 41.5 40.7 1.7 0.58 ul X 0400020101 2006-11-13 MOS2 Thin 42.3 40.8 1.7 0.54 ul J0847–4316 C 7626 2007-02-08 ACIS-I - 10.8 8.6 1.1 0.54 ul J0907–5157 X 0112930101 2001-12-11 PN/EFF Thin 12.1 5.5 9.0 8.10 ul X 0112930101 2001-12-10 MOS1 Thin 23.0 11.2 9.0 2.91 ul X 0112930101 2001-12-10 MOS2 Thin 23.8 13.2 9.0 3.77 ul C 9147 2008-08-26 ACIS-I - 42.2 20.7 9.3 1.44 ul C 10572 2008-08-27 ACIS-I - 23.1 11.1 9.3 1.45 ul J0922+0638 X 0502920101 2007-11-09 PN/LW Thin 15.5 14.2 1.7 - d X 0502920101 2007-11-09 MOS1 Thin 25.2 24.7 1.7 - d X 0502920101 2007-11-09 MOS2 Thin 24.9 23.5 1.7 - d J0940–5428 C 9077 2008-08-20 ACIS-I - 10.2 9.1 0.8 0.34 ul J0943+1631 X 0046940201 2001-05-07 MOS1 Medium 5.2 1.8 11.6 1.72 ul X 0046940201 2001-05-07 MOS2 Medium 4.9 2.0 11.6 1.54 ul X 0046940401 2001-11-02 MOS1 Medium 14.9 5.3 14.7 0.58 ul X 0046940401 2001-11-02 MOS2 Medium 14.7 4.4 14.7 0.71 ul Continued on next page

– 36 –

Table 1 – continued from previous page

PSR satellite^{(α)} obsID date instrument^{(β)} filter t_{on-axis} t(θ) θ^{(γ)} count rate^{(δ)} flag^{(δ)}

J1001–5939 C 12561 2011-10-08 ACIS-S - 19.0 17.2 0.2 0.24 ul J1038+0032 C 13801 2012-01-18 ACIS-S - 3.5 3.5 0.2 0.89 ul J1044–5737 C 15361 2013-08-25 ACIS-I - 10.1 9.5 0.7 - d J1055–6022 X 0600030101 2010-01-21 PN/FF Medium 16.5 10.5 4.4 3.56 ul X 0600030101 2010-01-21 MOS1 Medium 18.9 9.2 4.4 1.90 ul X 0600030101 2010-01-21 MOS2 Medium 20.0 11.8 4.4 1.33 ul J1055–6028 X 0600030101 2010-01-21 PN/FF Medium 16.5 10.8 5.5 3.52 ul X 0600030101 2010-01-21 MOS1 Medium 18.9 14.6 5.5 1.48 ul X 0600030101 2010-01-21 MOS2 Medium 20.0 14.6 5.5 1.36 ul J1103–5403 C 12538 2011-09-08 ACIS-S - 10.0 9.9 0.2 0.80 ul J1104–6103 C 4380 2002-10-01 ACIS-S - 11.9 8.0 7.6 1.55 ul C 2780 2002-09-29 ACIS-S - 11.8 7.9 7.6 0.30 ul J1105–6107 C 4380 2002-10-01 ACIS-S - 11.9 11.5 2.0 1.15 ul C 2780 2002-09-29 ACIS-S - 11.8 11.4 2.0 0.53 ul J1107–5907 C 12688 2011-03-31 ACIS-S - 5.1 5.0 0.3 1.67 ul J1112–6103 C 6706 2006-09-16 ACIS-S - 34.6 33.3 0.1 - d C 8905 2007-11-10 ACIS-I - 59.1 53.0 2.4 - d J1115+5030 C 15021 2013-07-07 ACIS-S - 22.1 19.5 6.4 0.16 ul J1157–6224 X 0503780301 2008-02-16 PN/FF Medium 15.9 4.5 12.8 12.20 ul X 0503780301 2008-02-16 MOS1 Medium 18.8 5.3 12.8 3.80 ul X 0503780301 2008-02-16 MOS2 Medium 17.6 5.2 12.8 2.99 ul X 0550170101 2008-08-16 MOS1 Medium 45.3 15.0 14.2 2.51 ul X 0550170101 2008-08-16 MOS2 Medium 45.9 18.8 14.2 1.58 ul J1159–7910 X 0550120601 2009-03-16 PN/FF Medium 2.9 0.6 11.7 15.38 ul X 0550120601 2009-03-16 MOS1 Medium 9.7 3.0 11.7 4.30 ul X 0550120601 2009-03-16 MOS2 Medium 9.2 1.1 11.7 8.11 ul J1224–6407 X 0103260901 2002-08-10 PN/FF Medium 4.3 3.9 1.7 - d X 0103260901 2002-08-10 MOS1 Medium 6.6 6.4 1.7 - d X 0103260901 2002-08-10 MOS2 Medium 6.6 6.4 1.7 - d J1225–6408 X 0103260901 2002-08-10 MOS1 Medium 6.6 3.2 9.2 0.95 ul X 0103260901 2002-08-10 MOS2 Medium 6.6 2.7 9.2 3.64 ul X 0653030501 2010-08-08 MOS2 Thick 17.7 7.7 5.7 0.40 ul X 0653030601 2010-08-14 MOS1 Medium 18.5 2.4 5.7 1.28 ul X 0653030601 2010-08-14 MOS2 Thick 18.6 8.7 5.7 2.14 ul X 0653030701 2010-08-16 MOS1 Medium 18.3 4.7 5.8 3.19 ul X 0653030701 2010-08-16 MOS2 Thick 18.6 8.5 5.8 1.32 ul J1253–5820 X 0720300401 2013-08-20 PN/FF Medium 4.8 2.7 9.5 8.72 ul X 0720300401 2013-08-20 MOS1 Medium 5.7 3.7 9.5 6.03 ul X 0720300401 2013-08-20 MOS2 Medium 7.3 4.6 9.5 2.51 ul J1300+1240 C 5518 2005-05-22 ACIS-S - 20.1 19.8 0.7 0.23 ul C 7577 2007-05-03 ACIS-S - 18.5 18.2 0.4 0.27 ul J1301–6310 X 0303440101 2005-07-12 PN/LW Thin 27.1 24.9 1.8 - d X 0303440101 2005-07-12 MOS1 Medium 29.8 27.3 1.8 - d X 0303440101 2005-07-12 MOS2 Medium 29.7 28.5 1.8 - d X 0302340101 2005-07-14 PN/FF Medium 24.2 11.4 11.3 - d X 0302340101 2005-07-14 MOS1 Medium 30.1 15.0 11.3 - d X 0302340101 2005-07-14 MOS2 Medium 30.5 16.3 11.3 - d J1302–6313 X 0302340101 2005-07-14 MOS1 Medium 30.0 25.6 5.2 0.74 ul X 0302340101 2005-07-14 MOS2 Medium 30.7 26.0 5.2 1.35 ul X 0303440101 2005-07-12 MOS1 Medium 29.8 19.7 5.3 0.90 ul X 0303440101 2005-07-12 MOS2 Medium 29.7 20.0 5.3 1.26 ul C 6098 2004-09-25 ACIS-I - 4.7 3.8 3.9 0.76 ul J1303–6305 X 0302340101 2005-07-14 MOS1 Medium 30.3 19.2 8.5 1.40 ul X 0302340101 2005-07-14 MOS2 Medium 30.6 17.6 8.5 1.24 ul Continued on next page

– 37 –

Table 1 – continued from previous page

PSR satellite^{(α)} obsID date instrument^{(β)} filter t_{on-axis} t(θ) θ^{(γ)} count rate^{(δ)} flag^{(δ)}

X 0303440101 2005-07-12 MOS1 Medium 29.8 10.4 12.3 1.44 ul X 0303440101 2005-07-12 MOS2 Medium 29.8 10.5 12.3 1.59 ul C 6098 2004-09-25 ACIS-I - 4.7 3.6 6.2 1.30 ul J1305–6256 X 0303100201 2005-08-25 PN/FF Medium 5.1 1.4 13.1 45.55 ul J1306–6242 X 0303100201 2005-08-25 PN/FF Medium 8.1 4.6 6.9 6.12 ul X 0303100201 2005-08-25 MOS1 Medium 7.3 4.9 6.9 2.78 ul X 0303100201 2005-08-25 MOS2 Medium 10.7 7.0 6.9 2.14 ul J1309–6526 X 0090030201 2004-07-20 PN/FF Thick 75.7 33.8 8.1 1.31 ul X 0090030201 2004-07-20 MOS1 Thick 84.9 39.8 8.1 0.98 ul X 0090030201 2004-07-20 MOS2 Thick 90.4 36.2 8.1 0.95 ul X 0605670201 2009-07-19 PN/FF Thick 52.3 22.5 8.1 1.74 ul X 0605670201 2009-07-19 MOS1 Thick 53.7 25.0 8.1 1.11 ul X 0605670201 2009-07-19 MOS2 Thick 53.2 20.9 8.1 1.27 ul J1317–5759 X 0406450101 2006-07-16 PN/SW Thin 25.1 17.3 1.8 3.80 ul X 0406450101 2006-07-16 MOS1 Thin 29.7 28.7 1.8 1.36 ul X 0406450101 2006-07-16 MOS2 Thin 30.6 28.9 1.8 1.03 ul J1317–6302 C 9049 2008-09-11 ACIS-I - 5.1 4.1 7.9 0.69 ul J1320–3512 C 13797 2012-03-20 ACIS-S - 3.5 3.4 0.2 0.90 ul J1322–6329 X 0691550101 2013-03-02 PN/FF Medium 33.6 16.4 4.6 2.21 ul X 0691550101 2013-03-02 MOS1 Medium 44.8 4.2 4.6 0.73 ul X 0691550101 2013-03-02 MOS2 Medium 48.5 26.9 4.6 0.91 ul C 14812 2013-09-24 ACIS-S - 47.8 42.0 5.9 0.07 ul J1324–6302 C 1913 2001-09-10 ACIS-S - 5.1 3.2 11.4 2.09 ul J1333–4449 C 13800 2012-03-28 ACIS-S - 3.5 3.4 0.2 0.85 ul J1334–5839 C 15973 2014-01-02 ACIS-S - 3.6 3.5 0.2 1.42 ul J1339–4712 C 13799 2012-05-13 ACIS-S - 3.5 3.4 0.2 0.85 ul J1341–6220 X 0301740101 2005-07-26 PN/LW Thick 35.5 32.6 1.7 - d X 0301740101 2005-07-26 MOS1 Thick 37.3 34.1 1.7 - d X 0301740101 2005-07-26 MOS2 Thick 36.9 35.8 1.7 - d X 0143400201 2003-07-17 PN/LW Thick 6.2 5.7 1.7 - d X 0143400201 2003-07-17 MOS1 Thick 6.6 6.5 1.7 - d X 0143400201 2003-07-17 MOS2 Thick 6.5 6.3 1.7 - d X 0143400101 2003-02-11 PN/LW Thick 5.3 4.9 1.7 - d X 0143400101 2003-02-11 MOS1 Thick 4.9 4.8 1.7 - d X 0143400101 2003-02-11 MOS2 Thick 5.3 5.0 1.7 - d J1355–5925 X 0007422301 2001-02-08 PN/FF Medium 12.1 3.1 12.5 7.56 ul X 0007422301 2001-02-08 MOS1 Medium 14.8 4.7 12.5 0.66 ul X 0007422301 2001-02-08 MOS2 Medium 14.6 4.6 12.5 3.21 ul J1355–6206 C 13806 2012-05-28 ACIS-S - 3.5 3.4 0.2 0.85 ul J1359–6038 X 0007421101 2002-02-13 MOS1 Medium 10.3 3.4 14.6 0.90 ul X 0007421101 2002-02-13 MOS2 Medium 10.5 3.7 14.6 0.83 ul J1406–6121 C 14888 2013-09-19 ACIS-I - 13.1 9.7 9.9 1.34 ul J1410–7404 C 15974 2014-01-03 ACIS-S - 3.6 3.5 0.2 0.88 ul J1412–6145 C 1985 2001-07-26 ACIS-I - 9.4 8.5 0.3 0.36 ul J1413–6141 C 1985 2001-07-26 ACIS-I - 9.4 6.9 8.7 0.81 ul J1425–5723 C 12686 2011-06-02 ACIS-S - 5.1 5.0 0.3 0.62 ul J1432–5032 X 0690210101 2012-08-10 PN/FF Thick 11.5 7.7 3.8 2.32 ul X 0690210101 2012-08-10 MOS1 Thick 13.1 8.8 3.8 1.39 ul X 0690210101 2012-08-10 MOS2 Thick 13.1 10.4 3.8 1.68 ul J1444–5941 C 8235 2007-10-19 ACIS-S - 1.8 0.9 9.6 3.35 ul J1453–6413 X 0103261001 2001-02-28 PN/SW Medium 4.8 3.3 1.8 5.82 ul X 0103261001 2001-02-28 MOS1 Medium 5.7 5.6 1.8 2.35 ul X 0103261001 2001-02-28 MOS2 Medium 5.6 4.9 1.8 0.63 ul J1457–5900 C 11880 2010-05-05 ACIS-S - 10.2 9.9 0.6 0.31 ul Continued on next page

– 38 –

Table 1 – continued from previous page

PSR satellite^{(α)} obsID date instrument^{(β)} filter t_{on-axis} t(θ) θ^{(γ)} count rate^{(δ)} flag^{(δ)}

J1457–5902 C 11880 2010-05-05 ACIS-S - 10.2 10.0 1.0 0.31 ul J1507–6640 X 0551430301 2009-02-02 PN/FF Medium 26.3 7.6 11.2 5.41 ul X 0551430301 2009-02-02 MOS1 Medium 30.6 9.4 11.2 2.08 ul X 0551430301 2009-02-02 MOS2 Medium 30.9 10.7 11.2 2.00 ul J1511–5835 C 11881 2010-06-14 ACIS-S - 10.0 6.7 13.0 0.46 ul J1514–5925 X 0207050101 2004-09-14 PN/FF Medium 4.7 0.9 9.9 35.44 ul X 0207050101 2004-09-14 MOS1 Medium 10.5 4.1 9.9 10.17 ul X 0207050101 2004-09-14 MOS2 Medium 10.6 4.6 9.9 8.28 ul X 0302730101 2005-08-07 PN/FF Medium 15.9 4.7 10.1 19.55 ul X 0302730101 2005-08-07 MOS2 Medium 13.9 6.5 10.1 5.93 ul J1517–4636 X 0204710901 2004-08-03 PN/FF Medium 6.4 2.2 11.3 18.10 ul X 0204710901 2004-08-03 MOS1 Medium 14.1 6.6 11.3 10.31 ul X 0204710901 2004-08-03 MOS2 Medium 15.5 8.1 11.3 3.41 ul J1524–5706 C 2784 2002-07-16 ACIS-I - 28.2 21.2 8.8 0.15 ul J1529–5611 C 12417 2011-06-22 ACIS-I - 5.2 3.6 2.8 0.80 ul J1535–4114 X 0652610201 2011-02-25 PN/FF Thick 72.4 33.6 6.1 1.59 ul X 0652610201 2011-02-25 MOS1 Thick 102.3 80.3 6.1 0.62 ul X 0652610201 2011-02-25 MOS2 Thick 80.9 64.3 6.1 0.60 ul J1538–5551 C 10509 2009-01-24 ACIS-S - 4.6 2.8 8.8 1.12 ul C 9600 2008-05-24 HRC-I - 1.2 0.9 10.6 10.56 ul J1542–5034 C 12429 2011-10-09 ACIS-I - 5.1 4.8 13.0 1.49 ul J1548–4821 C 13805 2012-07-28 ACIS-S - 3.5 3.4 0.2 0.85 ul J1549–4848 X 0740970101 2014-09-03 MOS1 Medium 89.5 81.4 1.7 0.43 ul X 0740970101 2014-09-03 MOS2 Medium 92.0 85.9 1.7 0.42 ul J1549+2113 X 0136040101 2002-02-18 PN/FF Thin 15.6 4.4 14.2 5.82 ul X 0136040101 2002-02-18 MOS1 Thin 17.7 6.5 14.2 1.83 ul X 0136040101 2002-02-18 MOS2 Thin 17.8 5.5 14.2 2.10 ul J1553–5456 C 1955 2001-07-15 ACIS-I - 49.9 40.4 7.1 0.08 ul J1554–5512 C 13767 2012-05-24 ACIS-I - 143.5 120.8 7.1 0.03 ul C 13768 2012-05-22 ACIS-I - 161.5 135.9 7.1 0.02 ul C 14430 2012-05-27 ACIS-I - 37.1 31.5 7.1 0.18 ul J1555–2341 X 0112380101 2000-08-26 PN/FF Medium 34.8 13.8 12.6 2.21 ul X 0112380101 2000-08-26 MOS1 Medium 37.8 17.1 12.6 1.22 ul X 0112380101 2000-08-26 MOS2 Medium 39.4 12.6 12.6 1.23 ul J1600–3053 X 0503190401 2008-02-17 MOS1 Medium 25.0 24.5 1.7 - d X 0503190401 2008-02-17 MOS2 Medium 25.3 23.5 1.7 - d J1604–4909 X 0724700101 2013-09-17 PN/FF Thin 28.1 14.6 6.5 1.77 ul X 0724700101 2013-09-17 MOS1 Thin 0.3 0.1 6.5 109.62 ul X 0724700101 2013-09-17 MOS2 Thin 0.4 0.2 6.5 53.62 ul J1607–6449 C 15975 2014-01-16 ACIS-S - 3.6 3.5 0.2 1.42 ul J1611–5847 C 13802 2012-05-21 ACIS-S - 3.5 3.4 0.2 0.91 ul J1613–5211 X 0555660101 2008-08-15 PN/FF Medium 21.6 18.1 2.9 3.78 ul X 0555660101 2008-08-15 MOS1 Medium 32.3 29.1 2.9 1.20 ul X 0555660101 2008-08-15 MOS2 Medium 31.7 30.0 2.9 1.08 ul J1614–5144 X 0406650101 2006-08-15 PN/EFF Medium 19.7 14.8 3.3 2.61 ul X 0406650101 2006-08-15 MOS1 Medium 30.9 27.8 3.3 0.97 ul X 0406650101 2006-08-15 MOS2 Thin 30.7 28.2 3.3 1.04 ul X 0406550101 2007-02-13 PN/FF Medium 7.7 2.9 4.5 7.73 ul X 0406550101 2007-02-13 MOS1 Medium 12.0 10.0 4.5 6.55 ul X 0406550101 2007-02-13 MOS2 Medium 11.7 10.1 4.5 1.86 ul J1616–5109 X 0302390101 2005-08-23 MOS1 Medium 60.8 25.7 12.3 1.45 ul X 0302390101 2005-08-23 MOS2 Medium 60.1 28.3 12.3 1.72 ul J1616–5208 C 2546 2002-10-23 ACIS-S - 41.4 30.5 11.7 0.70 ul J1620–4927 X 0406750201 2007-02-25 PN/FF Medium 6.0 1.3 11.5 13.71 ul Continued on next page

– 39 –

Table 1 – continued from previous page

PSR satellite^{(α)} obsID date instrument^{(β)} filter t_{on-axis} t(θ) θ^{(γ)} count rate^{(δ)} flag^{(δ)}

X 0406750201 2007-02-25 MOS1 Medium 7.6 2.4 11.5 3.92 ul X 0406750201 2007-02-25 MOS2 Medium 3.7 0.7 11.5 11.14 ul J1621–5039 C 14531 2013-06-25 ACIS-I - 61.1 50.9 3.6 0.06 ul J1622–4944 C 10929 2009-07-10 ACIS-I - 20.1 15.8 6.1 0.20 ul C 8161 2007-06-13 ACIS-S - 2.9 2.5 3.0 1.23 ul J1623–4949 X 0654110101 2011-02-22 MOS1 Thin 55.6 25.1 12.3 2.99 ul X 0654110101 2011-02-22 MOS2 Thin 55.6 27.1 12.3 1.56 ul C 8161 2007-06-13 ACIS-S - 2.9 1.3 10.9 3.12 ul J1625–4904 X 0403280201 2007-02-14 MOS1 Medium 15.2 5.3 10.2 7.59 ul X 0403280201 2007-02-14 MOS2 Medium 15.6 5.8 10.2 4.78 ul J1625–4913 X 0403280201 2007-02-14 PN/FF Medium 7.6 2.7 10.7 8.39 ul X 0403280201 2007-02-14 MOS1 Medium 15.2 5.8 10.7 4.49 ul X 0403280201 2007-02-14 MOS2 Medium 17.7 6.4 10.7 3.50 ul J1627–4845 X 0724560101 2013-08-14 PN/FF Medium 18.7 13.7 4.5 1.77 ul X 0724560101 2013-08-14 MOS1 Medium 21.6 18.9 4.5 0.90 ul X 0724560101 2013-08-14 MOS2 Medium 21.5 18.0 4.5 0.88 ul J1627–5936 C 15976 2014-01-19 ACIS-S - 3.6 3.5 0.2 0.89 ul J1632–4757 X 0128531101 2003-03-04 PN/LW Medium 4.8 3.0 8.9 5.03 ul X 0128531101 2003-03-04 MOS2 Medium 5.0 2.8 8.9 3.61 ul X 0201700301 2004-08-19 PN/FF Thin 35.2 22.8 4.0 1.92 ul X 0556140101 2008-08-14 PN/FF Thin 5.5 3.6 4.0 4.86 ul X 0556140101 2008-08-14 MOS1 Thin 9.4 6.3 4.0 1.93 ul X 0556140101 2008-08-14 MOS2 Thin 9.1 6.9 4.0 1.82 ul X 0556140201 2008-08-16 PN/FF Thin 2.5 1.7 3.9 11.80 ul X 0556140201 2008-08-16 MOS1 Thin 3.5 2.4 3.9 1.30 ul X 0556140201 2008-08-16 MOS2 Thin 3.5 2.8 3.9 2.08 ul X 0556140301 2008-08-18 PN/FF Thin 5.0 3.3 4.0 8.47 ul X 0556140301 2008-08-18 MOS1 Thin 6.7 4.5 4.0 2.69 ul X 0556140301 2008-08-18 MOS2 Thin 6.1 4.8 4.0 4.00 ul X 0556140401 2008-08-20 PN/FF Thin 8.3 5.1 4.0 3.87 ul X 0556140401 2008-08-20 MOS1 Thin 12.5 8.5 4.0 1.63 ul X 0556140401 2008-08-20 MOS2 Thin 12.5 9.9 4.0 1.48 ul X 0556140501 2008-08-21 PN/FF Thin 2.0 1.3 4.0 10.54 ul X 0556140501 2008-08-21 MOS1 Thin 4.9 3.4 4.0 0.92 ul X 0556140501 2008-08-21 MOS2 Thin 4.3 3.4 4.0 0.91 ul X 0556140601 2008-08-22 PN/FF Thin 10.7 5.7 4.1 3.17 ul X 0556140601 2008-08-22 MOS1 Thin 14.0 9.5 4.1 1.55 ul X 0556140601 2008-08-22 MOS2 Thin 13.4 10.4 4.1 1.49 ul X 0556140701 2008-08-24 PN/FF Thin 6.2 3.3 3.9 10.42 ul X 0556140701 2008-08-24 MOS1 Thin 10.0 6.9 3.9 1.71 ul X 0556140701 2008-08-24 MOS2 Thin 9.8 7.7 3.9 1.73 ul X 0556140801 2008-08-26 PN/FF Thin 8.9 4.5 4.0 3.94 ul X 0556140801 2008-08-26 MOS1 Thin 11.1 7.7 4.0 1.77 ul X 0556140801 2008-08-26 MOS2 Thin 11.2 8.8 4.0 1.56 ul X 0556141001 2008-09-17 PN/FF Thin 4.2 2.5 4.0 5.02 ul X 0556141001 2008-09-17 MOS1 Thin 7.0 4.9 4.0 2.68 ul X 0556141001 2008-09-17 MOS2 Thin 6.4 5.0 4.0 0.62 ul C 10088 2009-06-22 ACIS-I - 9.8 7.0 8.3 0.44 ul C 8155 2007-10-23 HRC-I - 2.7 1.9 12.7 1.65 ul J1633–4805 C 10982 2010-06-05 ACIS-S - 100.0 65.1 8.2 0.25 ul J1636–4803 C 9007 2008-05-27 HRC-I - 1.2 0.9 14.3 3.57 ul J1637–4553 X 0103261101 2002-02-23 PN/FF Medium 4.0 3.5 1.8 14.91 ul X 0103261101 2002-02-23 MOS1 Medium 5.3 5.2 1.8 3.97 ul X 0103261101 2002-02-23 MOS2 Medium 6.2 5.8 1.8 3.88 ul Continued on next page

– 40 –

Table 1 – continued from previous page

PSR satellite^{(α)} obsID date instrument^{(β)} filter t_{on-axis} t(θ) θ^{(γ)} count rate^{(δ)} flag^{(δ)}

J1637–4642 C 12518 2011-06-11 ACIS-I - 19.8 15.1 8.6 0.93 ul J1637–4721 X 0204500201 2004-02-16 MOS1 Thin 18.1 6.6 14.4 2.18 ul X 0204500201 2004-02-16 MOS2 Thin 18.0 7.1 14.4 2.42 ul X 0204500301 2004-09-04 PN/FF Thin 28.7 7.8 13.9 3.42 ul X 0204500301 2004-09-04 MOS1 Thin 32.2 5.5 13.9 4.61 ul X 0307170201 2005-08-19 PN/FF Medium 42.2 18.0 12.8 2.34 ul X 0307170201 2005-08-19 MOS1 Medium 63.8 28.8 12.8 1.96 ul X 0307170201 2005-08-19 MOS2 Medium 69.9 32.0 12.8 0.91 ul C 12525 2011-06-14 ACIS-I - 19.8 18.5 13.1 1.00 ul C 12522 2011-06-13 ACIS-I - 19.3 15.8 5.4 0.20 ul C 12523 2011-06-14 ACIS-I - 19.3 16.0 6.6 0.19 ul C 12503 2011-02-05 HRC-I - 1.2 0.8 13.8 3.64 ul J1638–4725 C 12522 2011-06-13 ACIS-I - 19.3 16.1 6.4 0.19 ul C 6261 2005-05-04 ACIS-S - 10.2 9.9 0.6 0.42 ul J1640–4648 C 12510 2011-06-09 ACIS-I - 20.2 17.9 0.7 0.28 ul C 12513 2011-06-27 ACIS-I - 20.4 19.2 12.7 0.88 ul J1643–1224 X 0742520101 2014-09-12 MOS1 Medium 11.3 10.3 1.7 3.68 ul X 0742520101 2014-09-12 MOS2 Medium 11.4 10.6 1.7 4.01 ul J1646–4346 X 0553110201 2009-03-09 PN/FF Medium 2.7 1.5 2.2 21.27 ul X 0553110201 2009-03-09 MOS1 Medium 3.1 3.0 2.2 9.41 ul X 0553110201 2009-03-09 MOS2 Medium 2.8 2.7 2.2 21.95 ul J1648–4458 X 0512180101 2008-03-21 MOS2 Medium 27.2 10.0 12.3 1.91 ul J1648–4611 C 11836 2010-01-24 ACIS-I - 10.2 8.7 4.9 0.35 ul J1649–4349 C 6270 2005-10-21 HRC-I - 4.2 4.1 0.2 0.75 ul J1650–4341 C 13777 2012-06-22 ACIS-S - 8.1 7.9 0.2 0.39 ul J1652–4406 C 8145 2007-10-25 ACIS-S - 2.2 1.0 11.2 3.13 ul J1653–4315 C 13774 2012-07-07 ACIS-S - 5.1 5.0 0.2 0.62 ul J1654–4140 X 0109490101 2001-09-05 PN/FF Thick 29.8 12.1 10.7 3.05 ul X 0109490101 2001-09-05 MOS1 Thick 32.9 16.4 10.7 1.01 ul X 0109490101 2001-09-05 MOS2 Thick 32.5 15.6 10.7 1.61 ul X 0109490201 2001-09-06 PN/FF Thick 16.4 6.9 10.7 5.14 ul X 0109490201 2001-09-06 MOS1 Thick 19.3 9.6 10.7 1.79 ul X 0109490201 2001-09-06 MOS2 Thick 19.4 9.3 10.7 1.49 ul X 0109490301 2001-09-07 PN/FF Thick 28.7 12.5 10.8 2.46 ul X 0109490301 2001-09-07 MOS1 Thick 33.2 16.6 10.8 1.24 ul X 0109490301 2001-09-07 MOS2 Thick 34.0 16.3 10.8 1.23 ul X 0109490401 2001-09-08 PN/FF Thick 11.8 5.3 10.7 3.86 ul X 0109490401 2001-09-08 MOS1 Thick 19.7 10.0 10.7 2.30 ul X 0109490401 2001-09-08 MOS2 Thick 19.4 9.3 10.7 2.83 ul X 0109490501 2001-09-09 PN/FF Thick 24.9 11.1 10.8 2.50 ul X 0109490501 2001-09-09 MOS1 Thick 30.9 15.5 10.8 1.46 ul X 0109490501 2001-09-09 MOS2 Thick 30.9 14.8 10.8 1.32 ul X 0109490601 2001-09-10 PN/FF Thick 30.3 13.4 10.8 3.22 ul X 0109490601 2001-09-10 MOS1 Thick 32.8 16.4 10.8 1.30 ul X 0109490601 2001-09-10 MOS2 Thick 32.8 15.7 10.8 1.80 ul C 5372 2005-07-03 ACIS-I - 77.2 58.6 9.6 0.22 ul J1658–5324 C 12535 2011-01-25 ACIS-S - 10.0 9.4 4.4 - d J1702–4217 C 13776 2012-06-24 ACIS-S - 8.7 8.5 0.2 0.57 ul J1702–4306 C 9083 2009-01-30 ACIS-I - 9.8 9.4 3.2 0.33 ul J1702–4310 C 9083 2009-01-30 ACIS-I - 9.8 9.6 0.8 0.32 ul J1703–4851 C 4446 2004-02-04 ACIS-S - 29.8 18.2 11.9 0.57 ul J1705–1906 X 0112200501 2002-03-14 PN/FF Medium 3.6 3.2 1.7 9.64 ul X 0112200501 2002-03-14 MOS1 Medium 6.0 5.9 1.7 3.67 ul X 0112200501 2002-03-14 MOS2 Medium 6.2 5.7 1.7 2.76 ul Continued on next page

– 41 –

Table 1 – continued from previous page

PSR satellite^{(α)} obsID date instrument^{(β)} filter t_{on-axis} t(θ) θ^{(γ)} count rate^{(δ)} flag^{(δ)}

J1705–4108 X 0406750301 2007-02-25 PN/FF Medium 5.9 5.2 2.3 2.54 ul X 0406750301 2007-02-25 MOS1 Medium 7.6 7.0 2.3 1.40 ul X 0406750301 2007-02-25 MOS2 Medium 7.4 6.4 2.3 0.48 ul J1706–4310 C 3791 2003-06-19 HRC-I - 1.0 0.9 8.1 3.60 ul J1707–4053 X 0144080101 2002-09-27 PN/FF Medium 10.9 9.6 0.9 1.94 ul X 0144080101 2002-09-27 MOS1 Medium 17.0 16.5 0.9 0.89 ul X 0144080101 2002-09-27 MOS2 Medium 17.0 16.0 0.9 1.94 ul J1709–3626 C 12505 2011-03-06 HRC-I - 1.1 1.0 7.7 6.23 ul J1709–4401 X 0105470201 2000-09-11 MOS1 Medium 13.4 5.9 9.9 3.89 ul X 0105470201 2000-09-11 MOS2 Medium 13.4 4.8 9.9 8.16 ul X 0105470501 2001-08-28 MOS1 Medium 6.0 2.5 9.8 9.93 ul X 0105470501 2001-08-28 MOS2 Medium 6.8 2.2 9.8 10.93 ul J1711–3826 C 13621 2012-06-30 ACIS-I - 49.8 35.3 8.3 0.32 ul C 13276 2013-02-11 ACIS-I - 30.1 23.4 7.5 0.13 ul J1712–2715 X 0206610101 2004-08-29 PN/EFF Thin 43.3 9.6 14.1 3.30 ul X 0206610101 2004-08-29 MOS1 Thin 47.9 15.5 14.1 1.30 ul X 0206610101 2004-08-29 MOS2 Thin 47.8 15.9 14.1 1.26 ul J1715–3859 C 8976 2008-09-22 ACIS-I - 1.2 0.9 6.4 3.52 ul J1716–3720 C 9607 2008-09-20 ACIS-S - 1.4 0.8 12.8 4.11 ul J1717–3737 C 2785 2002-05-13 ACIS-S - 56.5 18.0 15.2 1.15 ul J1717–4043 C 7536 2007-10-23 HRC-I - 1.2 1.1 4.8 4.19 ul J1718–3714 C 2785 2002-05-13 ACIS-S - 56.5 43.0 11.8 0.37 ul C 10768 2009-10-23 ACIS-S - 37.7 32.5 5.0 0.10 ul J1718–4539 X 0200680201 2004-09-22 MOS1 Medium 14.0 5.3 14.4 2.73 ul X 0200680201 2004-09-22 MOS2 Thick 22.6 9.1 14.4 1.59 ul J1719–1438 X 0674950201 2012-02-20 PN/FF Thin 3.3 2.9 1.7 5.99 ul X 0674950201 2012-02-20 MOS1 Thin 3.9 3.8 1.7 0.80 ul X 0674950201 2012-02-20 MOS2 Thin 3.9 3.5 1.7 0.87 ul J1720–3659 C 10525 2009-02-08 ACIS-S - 7.8 4.7 8.8 0.66 ul J1721–1936 C 9957 2009-07-10 ACIS-S - 16.0 6.7 2.5 0.46 ul J1723–3659 X 0103261201 2002-02-24 MOS1 Medium 6.4 2.4 11.7 6.51 ul X 0103261201 2002-02-24 MOS2 Medium 6.1 2.7 11.7 3.35 ul J1725–3546 C 10514 2009-02-06 ACIS-S - 5.5 3.3 12.9 0.94 ul C 8222 2007-10-23 HRC-I - 1.2 0.9 13.2 14.82 ul J1726–3530 C 8154 2007-10-26 ACIS-S - 2.3 1.5 13.3 2.01 ul C 10514 2009-02-06 ACIS-S - 5.5 3.9 5.0 0.75 ul J1730–2304 X 0650140101 2011-03-29 PN/FF Thin 9.1 7.8 1.7 - d X 0650140101 2011-03-29 MOS1 Thin 22.6 20.7 1.7 - d X 0650140101 2011-03-29 MOS2 Thin 22.6 21.1 1.7 - d J1730–3350 C 9080 2008-10-27 ACIS-I - 10.1 9.8 0.8 0.31 ul J1730–3353 C 9080 2008-10-27 ACIS-I - 10.1 9.0 5.5 0.82 ul J1731–1847 X 0694710101 2012-08-31 MOS1 Medium 36.5 33.4 1.7 - d X 0694710101 2012-08-31 MOS2 Medium 38.3 37.2 1.7 - d C 13290 2013-02-19 ACIS-I - 9.8 9.6 0.8 - d J1732–3426 X 0405680201 2007-03-21 MOS2 Medium 24.6 7.9 12.1 5.95 ul J1733–3030 C 8686 2008-05-22 ACIS-I - 2.2 2.0 14.1 6.54 ul J1733–3322 X 0553850101 2009-03-09 MOS1 Medium 10.5 1.3 11.5 2.38 ul X 0553850101 2009-03-09 MOS2 Medium 10.6 3.8 11.5 8.10 ul X 0653320101 2011-03-11 MOS2 Medium 39.7 14.5 11.4 1.69 ul C 674 2000-08-02 HRC-I - 15.1 13.1 6.8 0.70 ul J1733–3716 C 12683 2011-05-06 ACIS-S - 2.0 1.3 8.5 2.36 ul J1735–3258 X 0654190101 2011-03-06 PN/FF Medium 18.0 11.8 8.1 3.06 ul X 0654190101 2011-03-06 MOS1 Medium 21.4 15.4 8.1 1.22 ul X 0654190101 2011-03-06 MOS2 Medium 21.3 13.9 8.1 1.39 ul Continued on next page

– 42 –

Table 1 – continued from previous page

PSR satellite^{(α)} obsID date instrument^{(β)} filter t_{on-axis} t(θ) θ^{(γ)} count rate^{(δ)} flag^{(δ)}

C 9050 2009-02-06 ACIS-I - 4.8 3.9 8.1 0.79 ul J1736–2843 C 9993 2009-02-03 ACIS-I - 2.2 2.0 4.9 1.56 ul J1739–2903 X 0304220101 2005-09-29 MOS1 Medium 6.8 3.6 10.5 0.86 ul X 0304220101 2005-09-29 MOS2 Medium 6.4 3.6 10.5 0.85 ul C 8678 2008-05-18 ACIS-I - 2.2 1.8 7.1 1.71 ul C 8679 2008-05-18 ACIS-I - 2.2 1.6 7.7 1.80 ul J1739–3023 X 0554720101 2008-10-01 PN/LW Medium 32.8 14.7 5.3 5.24 ul X 0554720101 2008-10-01 MOS1 Medium 39.3 25.1 5.3 0.96 ul X 0561580101 2009-03-11 MOS1 Thin 34.0 24.4 8.1 1.85 ul X 0561580101 2009-03-11 MOS2 Thin 33.2 21.7 8.1 1.12 ul J1739–3049 C 2687 2002-05-07 ACIS-I - 21.0 14.2 13.9 0.22 ul J1739–3951 C 12685 2011-02-01 ACIS-S - 5.1 5.0 0.3 0.62 ul J1740–3052 X 0301730101 2006-03-05 PN/FF Thick 55.6 25.2 10.7 1.61 ul X 0301730101 2006-03-05 MOS1 Thick 61.3 31.7 10.7 0.84 ul X 0301730101 2006-03-05 MOS2 Thick 60.7 32.9 10.7 0.95 ul C 11837 2010-07-24 ACIS-I - 10.0 8.1 7.5 0.38 ul J1741–2719 C 8667 2008-05-17 ACIS-I - 2.2 1.7 5.9 1.83 ul J1741–2733 C 8666 2008-05-18 ACIS-I - 2.2 0.8 4.9 3.49 ul J1743–3150 C 13573 2011-11-02 ACIS-I - 2.0 0.4 9.5 7.90 ul C 13576 2011-11-02 ACIS-I - 2.0 1.8 6.1 1.64 ul J1743–3153 C 13576 2011-11-02 ACIS-I - 2.0 1.9 0.9 1.51 ul J1744–3130 C 8751 2008-05-15 ACIS-I - 2.2 1.9 3.3 1.52 ul J1744–3922 X 0304960301 2006-02-28 PN/SW Medium 3.8 2.6 1.7 11.88 ul X 0304960301 2006-02-28 MOS2 Medium 4.5 4.3 1.7 2.69 ul J1745–3040 X 0103261301 2001-03-21 PN/FF Medium 4.3 3.8 1.7 3.57 ul X 0103261301 2001-03-21 MOS1 Medium 7.3 7.2 1.7 1.69 ul X 0103261301 2001-03-21 MOS2 Medium 7.4 6.7 1.7 1.75 ul J1747–2802 C 1036 2000-10-27 ACIS-S - 35.5 22.3 9.0 0.53 ul C 2274 2001-07-16 ACIS-I - 10.6 10.0 12.5 0.31 ul J1748–3009 C 8756 2008-05-13 ACIS-I - 2.2 1.5 10.0 1.91 ul C 8755 2008-05-13 ACIS-I - 2.2 2.0 13.0 3.20 ul C 8744 2008-05-15 ACIS-I - 2.2 1.9 4.0 1.49 ul J1749–3002 C 8755 2008-05-13 ACIS-I - 2.2 1.9 3.6 1.53 ul J1751–2857 X 0603850201 2010-04-07 MOS1 Medium 18.6 10.0 12.1 2.96 ul X 0603850201 2010-04-07 MOS2 Medium 19.1 8.6 12.1 4.01 ul C 7562 2008-02-05 ACIS-S - 4.8 3.0 11.2 4.39 ul C 8722 2008-05-13 ACIS-I - 2.2 2.0 12.9 1.51 ul C 8710 2008-05-13 ACIS-I - 2.2 1.6 1.9 3.07 ul J1753–1914 C 13803 2012-07-18 ACIS-S - 3.5 3.4 0.2 0.85 ul J1754–3443 X 0300690101 2006-04-02 PN/FF Thick 38.3 19.1 10.1 2.50 ul X 0300690101 2006-04-02 MOS1 Thick 42.0 23.8 10.1 1.18 ul X 0300690101 2006-04-02 MOS2 Thick 41.8 22.8 10.1 1.18 ul J1755–2725 C 8717 2008-05-14 ACIS-I - 2.2 1.5 8.7 2.00 ul C 8718 2008-05-14 ACIS-I - 2.2 1.9 6.1 1.66 ul J1757–2421 X 0112201501 2002-09-09 PN/FF Medium 4.2 1.8 3.9 9.20 ul X 0112201501 2002-09-09 MOS1 Medium 5.8 5.6 3.9 2.08 ul X 0112201501 2002-09-09 MOS2 Medium 5.7 5.1 3.9 3.13 ul J1759–2205 C 7471 2007-10-23 HRC-I - 1.2 1.1 6.6 2.89 ul C 12506 2011-02-20 HRC-I - 1.1 1.0 6.6 3.12 ul J1759–2302 X 0135742301 2003-03-20 PN/FF Medium 2.9 1.1 3.8 2.73 ul X 0135742301 2003-03-20 MOS1 Medium 4.0 3.7 3.8 2.42 ul X 0135742301 2003-03-20 MOS2 Medium 4.2 3.9 3.8 0.79 ul J1759–2307 X 0135742301 2003-03-20 PN/FF Medium 2.9 1.9 5.7 6.33 ul X 0135742301 2003-03-20 MOS1 Medium 4.0 3.2 5.7 0.96 ul Continued on next page

– 43 –

Table 1 – continued from previous page

PSR satellite^{(α)} obsID date instrument^{(β)} filter t_{on-axis} t(θ) θ^{(γ)} count rate^{(δ)} flag^{(δ)}

X 0135742301 2003-03-20 MOS2 Medium 4.2 3.0 5.7 1.02 ul J1759–3107 C 10083 2009-08-05 HRC-I - 1.2 0.7 14.4 32.44 ul J1801–2304 X 0135742501 2003-03-20 PN/FF Medium 2.3 1.8 5.5 11.30 ul X 0135742501 2003-03-20 MOS1 Medium 3.3 2.8 5.5 1.09 ul X 0135742501 2003-03-20 MOS2 Medium 3.2 2.6 5.5 1.19 ul J1804–0735 C 8949 2008-10-31 ACIS-S - 15.2 15.0 0.2 0.37 ul J1805–1504 X 0405390301 2007-03-03 MOS1 Medium 13.1 7.2 11.5 2.28 ul C 7275 2006-03-28 HRC-I - 1.1 0.9 10.0 4.10 ul J1806–2125 X 0405750201 2007-03-02 PN/FF Medium 10.7 4.9 11.3 5.09 ul X 0405750201 2007-03-02 MOS1 Medium 14.9 8.5 11.3 3.99 ul X 0405750201 2007-03-02 MOS2 Medium 15.4 6.5 11.3 2.49 ul J1807–0847 C 15979 2014-02-21 ACIS-S - 3.6 3.5 0.2 0.88 ul J1808–2701 X 0692210101 2012-09-15 PN/FF Thin 4.8 4.2 1.7 4.48 ul X 0692210101 2012-09-15 MOS1 Medium 16.5 15.1 1.7 1.60 ul X 0692210101 2012-09-15 MOS2 Medium 16.7 16.1 1.7 1.93 ul J1809–1850 X 0152835701 2003-10-09 PN/FF Medium 7.3 2.3 11.4 10.88 ul X 0152835701 2003-10-09 MOS1 Medium 9.2 4.3 11.4 4.79 ul X 0152835701 2003-10-09 MOS2 Medium 9.9 5.0 11.4 2.62 ul J1809–2004 X 0152832901 2003-10-12 PN/FF Medium 6.3 4.4 7.2 4.78 ul X 0152832901 2003-10-12 MOS1 Medium 7.7 6.2 7.2 1.82 ul X 0152832901 2003-10-12 MOS2 Medium 8.0 5.6 7.2 1.51 ul J1810–1820 C 13775 2012-04-22 ACIS-S - 5.1 5.0 0.2 0.97 ul J1811–1049 C 9005 2009-02-15 HRC-I - 1.2 1.0 9.4 7.83 ul J1811–1835 C 8167 2007-10-26 ACIS-S - 3.0 1.8 12.7 1.69 ul C 8162 2007-05-04 ACIS-S - 2.8 1.8 8.4 5.49 ul J1812–1910 X 0152835501 2003-09-12 MOS2 Medium 2.9 1.0 11.6 3.00 ul J1813+1822 C 15980 2014-02-21 ACIS-S - 3.3 3.2 0.2 0.90 ul J1814–1744 X 0207010101 2004-09-14 PN/FF Medium 0.9 0.7 1.5 38.36 ul X 0207010101 2004-09-14 MOS1 Medium 6.0 5.7 1.5 3.60 ul X 0207010101 2004-09-14 MOS2 Medium 5.9 5.7 1.5 6.61 ul J1815–1738 X 0207010101 2004-09-14 PN/FF Medium 0.9 0.1 10.3 25.56 ul X 0207010101 2004-09-14 MOS1 Medium 6.0 2.6 10.3 10.08 ul X 0207010101 2004-09-14 MOS2 Medium 5.9 2.5 10.3 6.16 ul J1816+4510 C 13724 2012-12-09 ACIS-S - 34.0 33.4 0.2 - d J1816–5643 C 13804 2012-04-24 ACIS-S - 3.5 3.4 0.2 0.91 ul J1817–3618 C 2011 2001-10-24 ACIS-S - 29.0 28.6 0.6 0.24 ul J1818–1448 C 5530 2005-05-23 ACIS-S - 9.2 6.9 11.9 0.87 ul C 6288 2005-05-25 ACIS-S - 5.0 3.7 11.9 0.82 ul C 6289 2005-05-28 ACIS-S - 15.1 11.4 11.9 1.29 ul J1818–1519 X 0152834901 2003-04-04 PN/FF Medium 5.6 2.1 10.2 19.92 ul X 0152834901 2003-04-04 MOS1 Medium 7.6 2.8 10.2 4.31 ul X 0152834901 2003-04-04 MOS2 Medium 7.2 2.9 10.2 1.06 ul J1818–1541 X 0152834801 2003-04-06 PN/FF Medium 5.8 1.7 12.8 13.53 ul X 0152834801 2003-04-06 MOS1 Medium 6.8 1.9 12.8 7.97 ul X 0152834801 2003-04-06 MOS2 Medium 7.0 1.4 12.8 8.46 ul J1818–1556 C 7617 2007-10-21 ACIS-S - 5.1 4.6 6.5 0.67 ul C 9609 2008-02-19 ACIS-S - 1.7 1.2 3.1 2.38 ul J1819–1008 X 0403410101 2006-09-18 MOS1 Thin 2.6 1.4 12.2 10.90 ul X 0403410101 2006-09-18 MOS2 Medium 2.6 1.2 12.2 2.49 ul X 0403410101 2006-09-18 MOS1 Thin 44.6 23.2 12.2 1.89 ul X 0403410101 2006-09-18 MOS2 Medium 45.9 22.3 12.2 1.26 ul J1819–1510 X 0505240101 2008-03-31 PN/FF Medium 52.3 16.0 14.8 3.36 ul X 0505240101 2008-03-31 MOS1 Medium 65.7 24.7 14.8 2.23 ul X 0505240101 2008-03-31 MOS2 Medium 65.8 21.0 14.8 2.57 ul Continued on next page

– 44 –

Table 1 – continued from previous page

PSR satellite^{(α)} obsID date instrument^{(β)} filter t_{on-axis} t(θ) θ^{(γ)} count rate^{(δ)} flag^{(δ)}

J1821–1419 X 0004210201 2001-03-08 PN/FF Medium 3.5 1.5 10.1 8.47 ul X 0004210201 2001-03-08 MOS1 Medium 6.4 3.7 10.1 0.83 ul X 0004210201 2001-03-08 MOS2 Medium 6.5 3.8 10.1 2.09 ul J1821–1432 C 11835 2010-08-14 ACIS-I - 10.0 9.0 3.5 0.34 ul J1822–1617 C 13511 2011-07-28 HRC-I - 1.2 0.8 13.7 25.76 ul J1823–1347 X 0040140201 2002-03-23 PN/FF Medium 11.8 8.1 6.6 4.87 ul X 0040140201 2002-03-23 MOS1 Medium 15.2 12.4 6.6 1.48 ul X 0040140201 2002-03-23 MOS2 Medium 15.4 11.7 6.6 1.85 ul J1824–1159 X 0051940101 2001-03-08 PN/FF Medium 4.7 1.0 10.1 12.07 ul X 0051940101 2001-03-08 MOS1 Medium 7.5 3.4 10.1 3.99 ul X 0051940101 2001-03-08 MOS2 Medium 7.6 3.5 10.1 2.57 ul J1825–0935 X 0112201001 2002-04-08 PN/FF Medium 1.5 1.3 1.6 - d X 0112201001 2002-04-08 MOS1 Medium 3.8 3.8 1.6 - d X 0112201001 2002-04-08 MOS2 Medium 4.7 4.3 1.6 - d J1825–1446 X 0505530101 2008-04-10 PN/FF Medium 29.0 10.8 11.0 2.80 ul X 0505530101 2008-04-10 MOS1 Medium 33.6 13.9 11.0 1.77 ul X 0505530101 2008-04-10 MOS2 Medium 33.6 13.7 11.0 1.30 ul C 5341 2004-07-11 ACIS-I - 18.2 15.4 5.9 0.91 ul C 4600 2004-07-09 ACIS-I - 11.2 9.5 5.9 1.60 ul J1826–1131 X 0051940301 2001-03-10 PN/FF Medium 5.8 4.7 5.0 4.45 ul X 0051940301 2001-03-10 MOS1 Medium 8.5 7.3 5.0 0.42 ul X 0051940301 2001-03-10 MOS2 Medium 8.5 6.9 5.0 0.45 ul J1828–1007 X 0135741201 2001-09-10 PN/FF Medium 1.2 0.6 7.1 5.04 ul X 0135741201 2001-09-10 MOS1 Medium 3.1 2.3 7.1 2.74 ul X 0135741201 2001-09-10 MOS2 Medium 3.3 2.5 7.1 3.51 ul X 0135745701 2002-09-27 PN/FF Medium 5.6 3.0 7.3 3.73 ul X 0135745701 2002-09-27 MOS1 Medium 7.4 4.6 7.3 0.67 ul X 0135745701 2002-09-27 MOS2 Medium 7.4 5.5 7.3 0.56 ul J1828–1057 X 0104460401 2000-10-12 PN/FF Medium 3.3 1.3 11.4 2.36 ul X 0104460401 2000-10-12 MOS1 Medium 6.6 2.9 11.4 1.06 ul X 0104460401 2000-10-12 MOS2 Medium 7.6 3.2 11.4 3.83 ul X 0135747001 2003-09-15 PN/FF Medium 4.1 1.6 11.5 8.64 ul X 0135747001 2003-09-15 MOS1 Medium 6.4 2.9 11.5 1.07 ul X 0135747001 2003-09-15 MOS2 Medium 6.5 2.7 11.5 1.16 ul J1828–1101 X 0104460401 2000-10-12 PN/FF Medium 3.3 2.2 6.8 5.30 ul X 0104460401 2000-10-12 MOS1 Medium 6.6 4.2 6.8 2.02 ul X 0104460401 2000-10-12 MOS2 Medium 6.7 3.6 6.8 0.86 ul X 0135747001 2003-09-15 PN/FF Medium 4.1 2.3 6.9 9.05 ul X 0135747001 2003-09-15 MOS1 Medium 6.4 4.0 6.9 2.11 ul X 0135747001 2003-09-15 MOS2 Medium 6.5 3.3 6.9 0.95 ul J1830–1059 X 0135745901 2002-10-03 MOS1 Medium 8.9 3.0 12.3 1.02 ul X 0135745901 2002-10-03 MOS2 Medium 7.6 2.9 12.3 8.33 ul J1831–0952 X 0135741701 2002-03-29 PN/FF Medium 3.3 1.5 11.5 14.95 ul X 0135741701 2002-03-29 MOS1 Medium 6.8 3.4 11.5 6.72 ul X 0135741701 2002-03-29 MOS2 Medium 6.9 3.3 11.5 3.98 ul J1831–1223 X 0601270501 2010-03-11 PN/FF Thin 20.7 9.5 9.9 3.24 ul X 0601270501 2010-03-11 MOS1 Thin 28.3 4.2 9.9 3.31 ul X 0601270501 2010-03-11 MOS2 Thin 28.8 16.2 9.9 2.33 ul C 9055 2008-04-27 ACIS-I - 4.8 3.6 10.3 0.87 ul J1832+0029 C 9145 2007-10-19 ACIS-S - 20.1 19.8 0.3 0.20 ul C 12556 2011-03-28 ACIS-S - 23.0 22.7 0.3 0.18 ul J1832–0836 X 0511010801 2007-10-16 PN/FF Medium 25.3 4.7 5.0 - d X 0511010801 2007-10-15 MOS1 Medium 28.3 20.7 5.0 - d X 0511010801 2007-10-15 MOS2 Medium 28.7 22.6 5.0 - d Continued on next page

– 45 –

Table 1 – continued from previous page

PSR satellite^{(α)} obsID date instrument^{(β)} filter t_{on-axis} t(θ) θ^{(γ)} count rate^{(δ)} flag^{(δ)}

J1832–1021 X 0122700401 2000-04-15 PN/FF Medium 15.4 4.0 10.1 7.89 ul X 0122700401 2000-04-15 MOS1 Medium 15.4 5.9 10.1 2.79 ul X 0122700401 2000-04-15 MOS2 Medium 15.5 5.7 10.1 2.93 ul J1833–1055 X 0122700201 2000-04-09 PN/FF Medium 24.5 8.7 13.8 2.39 ul J1835–1106 C 9082 2008-10-27 ACIS-I - 10.1 9.0 0.8 0.34 ul J1837–0559 C 1986 2001-07-02 ACIS-S - 9.1 5.4 9.5 0.57 ul J1837–0604 C 1986 2001-07-02 ACIS-S - 9.1 8.5 5.1 1.48 ul J1837–0653 X 0400910301 2006-10-18 MOS2 Medium 8.5 3.3 11.9 2.88 ul X 0400910401 2006-10-18 PN/FF Medium 7.5 3.1 11.6 5.21 ul X 0400910401 2006-10-18 MOS1 Medium 8.8 4.1 11.6 0.75 ul X 0400910401 2006-10-18 MOS2 Medium 8.8 4.4 11.6 0.70 ul X 0552950101 2008-10-16 MOS1 Medium 56.6 26.4 13.7 1.13 ul X 0552950101 2008-10-16 MOS2 Medium 58.3 24.5 13.7 1.07 ul C 6719 2006-08-19 ACIS-I - 20.2 16.0 7.1 0.18 ul C 7545 2007-05-28 HRC-I - 1.2 0.9 11.7 13.97 ul J1838–0537 X 0690010101 2012-09-13 PN/FF Medium 12.8 5.2 13.1 4.52 ul X 0690010101 2012-09-13 MOS1 Medium 23.3 11.0 13.1 2.24 ul X 0690010101 2012-09-13 MOS2 Medium 23.8 10.3 13.1 2.36 ul J1838–0549 C 7493 2008-03-09 ACIS-I - 19.5 18.8 11.6 0.96 ul J1840–1419 C 12463 2011-02-20 ACIS-S - 29.4 10.1 0.3 0.31 ul J1841–0345 C 9084 2008-08-22 ACIS-I - 10.1 9.1 0.8 0.54 ul J1841–0500 C 729 2000-07-23 ACIS-S - 29.6 20.4 3.2 0.15 ul C 6732 2006-07-30 ACIS-S - 25.2 18.6 3.1 0.17 ul J1841–0524 C 7552 2008-03-03 ACIS-I - 19.1 16.7 3.9 0.71 ul J1842–0359 X 0302970301 2006-04-13 PN/EFF Medium 22.1 13.0 4.7 7.92 ul X 0302970301 2006-04-13 MOS1 Medium 26.1 12.0 4.7 4.46 ul X 0302970301 2006-04-13 MOS2 Medium 26.5 14.2 4.7 2.38 ul J1843–0137 X 0301880501 2006-04-07 PN/FF Medium 6.6 2.0 9.0 29.44 ul X 0301880501 2006-04-07 MOS1 Medium 12.7 5.8 9.0 7.80 ul X 0301880501 2006-04-07 MOS2 Medium 14.0 6.6 9.0 5.64 ul J1843–0355 C 2298 2001-05-20 ACIS-I - 99.9 74.7 6.5 0.04 ul J1843–0408 C 949 2000-02-25 ACIS-I - 41.8 37.7 5.2 0.21 ul C 1523 2000-02-24 ACIS-I - 58.5 54.1 5.1 0.13 ul C 8169 2008-02-29 ACIS-S - 3.2 1.8 13.5 3.78 ul J1843–1113 C 9114 2008-10-31 HRC-S - 20.1 19.9 0.3 1.45 ul J1844–0244 X 0602350101 2010-04-14 MOS2 Medium 50.4 16.8 10.8 2.35 ul X 0602350201 2010-04-16 MOS2 Medium 42.0 14.5 10.8 1.49 ul C 1964 2002-03-03 HRC-I - 19.7 14.4 12.0 3.11 ul C 3897 2003-09-14 ACIS-S - 11.9 7.2 13.0 0.43 ul C 7583 2007-11-05 ACIS-S - 5.2 2.5 14.2 1.22 ul C 7582 2007-09-18 ACIS-S - 5.1 2.8 14.1 1.10 ul C 7579 2007-04-22 ACIS-S - 5.0 3.7 10.7 0.83 ul J1844–0310 C 11801 2010-06-17 ACIS-I - 30.0 25.0 6.4 0.24 ul C 11232 2009-08-11 ACIS-I - 29.9 25.5 4.4 0.25 ul C 3897 2003-09-14 ACIS-S - 11.9 7.3 13.3 0.42 ul C 7582 2007-09-18 ACIS-S - 5.1 3.7 12.2 0.85 ul C 8163 2007-05-24 ACIS-S - 2.8 2.5 5.6 1.16 ul J1844–0433 X 0306170401 2006-04-03 PN/FF Medium 17.2 6.9 5.5 4.16 ul X 0306170401 2006-04-03 MOS1 Medium 18.5 11.6 5.5 1.85 ul X 0306170401 2006-04-03 MOS2 Medium 19.0 12.4 5.5 1.30 ul J1845–0434 X 0306170401 2006-04-03 PN/FF Medium 17.2 8.8 9.8 3.78 ul X 0306170401 2006-04-03 MOS1 Medium 18.5 11.3 9.8 1.68 ul X 0306170401 2006-04-03 MOS2 Medium 19.0 9.3 9.8 2.14 ul C 7505 2008-02-27 ACIS-S - 5.0 1.7 8.3 2.75 ul Continued on next page

– 46 –

Table 1 – continued from previous page

PSR satellite^{(α)} obsID date instrument^{(β)} filter t_{on-axis} t(θ) θ^{(γ)} count rate^{(δ)} flag^{(δ)}

J1846+0919 C 13793 2012-06-12 ACIS-S - 15.1 14.9 0.1 0.21 ul J1846–0257 C 748 2000-10-15 ACIS-S - 37.8 30.4 3.1 0.17 ul C 6686 2006-06-07 ACIS-S - 55.3 52.9 1.7 0.09 ul C 7337 2006-06-05 ACIS-S - 17.8 17.0 1.7 0.25 ul C 7338 2006-06-09 ACIS-S - 40.1 38.4 1.7 0.08 ul C 7339 2006-06-12 ACIS-S - 45.1 43.1 1.7 0.07 ul J1847–0130 X 0207010201 2004-10-22 PN/FF Medium 16.9 14.8 1.7 1.47 ul J1848–0055 C 2786 2002-08-03 ACIS-S - 61.6 39.0 9.7 0.23 ul J1848–0123 C 6587 2006-08-15 ACIS-S - 46.5 29.9 9.1 0.26 ul J1848–1952 X 0653300101 2011-03-16 PN/LW Thin 18.2 16.6 1.8 2.56 ul X 0653300101 2011-03-16 MOS1 Thin 36.2 35.6 1.8 1.23 ul X 0653300101 2011-03-16 MOS2 Thin 37.5 35.5 1.8 0.77 ul X 0554140401 2009-03-15 PN/LW Thin 11.3 10.2 1.8 12.77 ul X 0554140401 2009-03-15 MOS1 Thin 9.7 9.2 1.8 2.96 ul X 0554140401 2009-03-15 MOS2 Thin 10.8 9.7 1.8 2.78 ul J1850–0026 X 0136030101 2003-09-25 MOS1 Medium 17.1 15.5 1.3 1.81 ul X 0136030101 2003-09-25 MOS2 Medium 17.2 16.2 1.3 1.19 ul J1850–0031 X 0136030101 2003-09-25 MOS1 Medium 17.2 9.2 7.0 1.51 ul X 0136030101 2003-09-25 MOS2 Medium 17.1 7.5 7.0 1.00 ul J1852+0008 X 0017740401 2003-10-05 PN/FF Medium 23.3 6.3 13.5 8.25 ul X 0017740501 2003-10-21 PN/FF Medium 17.9 4.9 13.3 4.26 ul J1852+0031 X 0204970201 2004-10-18 MOS1 Medium 30.8 17.5 8.2 1.06 ul X 0204970201 2004-10-18 MOS2 Medium 30.4 19.8 8.2 0.95 ul X 0204970301 2004-10-23 MOS1 Medium 30.6 18.4 8.2 1.40 ul X 0204970301 2004-10-23 MOS2 Medium 30.6 18.8 8.2 1.43 ul X 0400390201 2006-10-08 MOS2 Medium 28.1 18.5 8.0 1.01 ul X 0400390301 2007-03-20 MOS1 Medium 33.1 16.3 9.9 1.23 ul X 0400390301 2007-03-20 MOS2 Medium 33.8 15.2 9.9 1.36 ul X 0550670201 2008-09-19 MOS2 Medium 21.8 14.3 7.8 1.26 ul X 0550670301 2008-09-21 MOS2 Medium 30.7 20.2 7.8 1.03 ul X 0550670401 2008-09-23 MOS2 Medium 36.0 23.6 7.8 2.00 ul X 0550670501 2008-09-29 MOS2 Medium 33.3 21.9 7.8 1.01 ul X 0550670601 2008-10-11 MOS2 Medium 36.0 23.5 8.0 1.51 ul X 0550671001 2009-03-16 MOS1 Medium 22.5 10.3 9.9 1.74 ul X 0550671001 2009-03-16 MOS2 Medium 24.8 11.3 9.9 1.44 ul X 0550670901 2009-03-17 MOS1 Medium 25.5 12.0 9.9 1.52 ul X 0550670901 2009-03-17 MOS2 Medium 25.3 11.4 9.9 2.39 ul X 0550671201 2009-03-23 MOS1 Medium 17.8 9.0 9.9 2.98 ul X 0550671201 2009-03-23 MOS2 Medium 22.4 10.0 9.9 1.88 ul X 0550671101 2009-03-25 MOS1 Medium 7.5 3.8 9.8 0.81 ul X 0550671101 2009-03-25 MOS2 Medium 8.7 3.9 9.8 0.80 ul X 0550671301 2009-04-04 MOS1 Medium 22.2 11.4 9.8 2.47 ul X 0550671301 2009-04-04 MOS2 Medium 22.9 10.6 9.8 3.24 ul X 0550671901 2009-04-10 MOS1 Medium 16.7 8.6 9.7 1.94 ul X 0550671901 2009-04-10 MOS2 Medium 17.5 8.2 9.7 1.75 ul X 0550671801 2009-04-22 MOS1 Medium 28.5 14.5 9.6 1.27 ul X 0550671801 2009-04-22 MOS2 Medium 28.3 14.0 9.6 1.78 ul C 1982 2001-07-31 ACIS-I - 29.9 23.8 8.3 0.46 ul J1852–0118 X 0652760201 2010-09-20 PN/FF Medium 25.0 9.2 12.1 4.37 ul X 0652760201 2010-09-20 MOS1 Medium 26.4 11.1 12.1 1.74 ul X 0652760201 2010-09-20 MOS2 Medium 26.3 9.4 12.1 1.85 ul J1852–0127 X 0652760201 2010-09-20 PN/FF Medium 25.0 17.8 2.8 2.47 ul X 0652760201 2010-09-20 MOS1 Medium 26.3 23.5 2.8 1.64 ul X 0652760201 2010-09-20 MOS2 Medium 26.4 24.5 2.8 1.03 ul Continued on next page

– 47 –

Table 1 – continued from previous page

PSR satellite^{(α)} obsID date instrument^{(β)} filter t_{on-axis} t(θ) θ^{(γ)} count rate^{(δ)} flag^{(δ)}

J1853+1303 X 0503190301 2008-04-20 MOS1 Medium 14.8 14.6 1.7 2.00 ul X 0503190301 2008-04-20 MOS2 Medium 18.5 17.7 1.7 1.44 ul J1856+0102 X 0112201101 2003-03-27 PN/FF Medium 2.4 0.9 13.7 3.59 ul X 0112201101 2003-03-27 MOS1 Medium 3.3 1.4 13.7 2.20 ul X 0112201101 2003-03-27 MOS2 Medium 3.9 1.5 13.7 2.08 ul X 0551060101 2009-04-24 PN/FF Medium 47.0 15.7 13.7 3.37 ul X 0551060101 2009-04-24 MOS1 Medium 67.0 25.3 13.7 1.78 ul X 0551060101 2009-04-24 MOS2 Medium 67.3 22.6 13.7 1.16 ul J1857+0943 X 0742520201 2014-09-27 MOS1 Medium 7.8 7.5 1.7 3.15 ul X 0742520201 2014-09-27 MOS2 Medium 7.4 6.7 1.7 1.83 ul J1901+0124 C 12500 2011-03-07 HRC-I - 1.1 1.1 3.5 3.83 ul J1901+0435 X 0742820101 2014-10-10 MOS1 Medium 20.6 8.4 10.1 3.15 ul X 0742820101 2014-10-10 MOS2 Medium 20.5 9.4 10.1 2.01 ul J1901+0510 X 0136030201 2003-09-21 MOS1 Medium 13.8 5.6 12.5 2.26 ul X 0136030201 2003-09-21 MOS2 Medium 15.3 5.9 12.5 3.45 ul J1905+0709 C 8147 2007-07-12 ACIS-S - 2.2 1.3 11.6 1.85 ul J1905+0902 C 3793 2003-05-26 ACIS-I - 13.5 12.1 0.2 0.25 ul J1906+0746 C 7618 2007-08-10 ACIS-I - 32.0 28.2 0.8 0.11 ul C 14821 2013-07-08 ACIS-I - 57.1 51.2 1.7 0.09 ul J1906+0912 C 1954 2001-06-17 ACIS-I - 30.1 20.8 13.0 1.23 ul C 6731 2006-06-04 ACIS-I - 25.0 18.1 13.0 0.17 ul J1907+0534 C 7049 2006-06-28 ACIS-I - 10.1 9.0 15.3 0.34 ul J1907+0918 C 1954 2001-06-17 ACIS-I - 30.1 27.1 2.4 0.11 ul C 3449 2002-03-11 ACIS-S - 2.7 2.6 2.3 1.11 ul C 6731 2006-06-04 ACIS-I - 25.0 14.4 2.4 0.22 ul J1908+0734 C 9614 2008-02-28 ACIS-S - 1.5 0.5 11.5 7.74 ul J1908+0839 C 8223 2007-06-26 ACIS-S - 3.5 2.2 7.7 1.43 ul J1908+0916 C 3481 2002-04-15 ACIS-S - 1.1 0.7 9.2 4.17 ul J1911+1758 C 15981 2014-03-16 ACIS-S - 3.6 3.5 0.2 0.88 ul J1911–1114 X 0406620201 2007-04-27 MOS1 Medium 52.5 51.5 1.8 - d X 0406620201 2007-04-27 MOS2 Medium 51.7 48.7 1.8 - d J1913+0446 X 0075140401 2004-09-30 PN/FF Medium 29.7 13.2 10.4 3.10 ul X 0075140401 2004-09-30 MOS1 Medium 31.8 13.5 10.4 1.79 ul X 0075140401 2004-09-30 MOS2 Medium 31.6 17.0 10.4 2.20 ul J1913+1011 C 3854 2003-07-15 ACIS-S - 19.8 18.1 0.6 0.33 ul J1921+2153 X 0670940101 2012-03-20 PN/FF Thin 4.1 3.6 1.7 7.03 ul X 0670940101 2012-03-20 MOS1 Thin 8.2 7.5 1.7 2.10 ul X 0670940101 2012-03-20 MOS2 Thin 8.6 8.3 1.7 1.50 ul C 15364 2012-12-14 ACIS-I - 9.8 9.0 0.7 0.55 ul J1926–1314 X 0742620101 2014-09-29 MOS1 Thin 69.5 63.9 1.7 0.42 ul X 0742620101 2014-09-29 MOS2 Thin 71.4 67.9 1.7 0.43 ul J1928+1746 C 9081 2008-03-01 ACIS-I - 10.0 9.0 0.8 0.34 ul J1933+2421 C 7335 2006-07-20 ACIS-S - 9.4 9.2 0.1 0.53 ul J1933–6211 C 9115 2007-12-09 HRC-S - 20.2 19.9 0.3 1.68 ul J1946+3417 X 0304200301 2006-04-21 PN/LW Medium 8.7 3.4 10.7 6.04 ul X 0304200301 2006-04-21 MOS1 Medium 14.4 5.9 10.7 2.89 ul X 0304200301 2006-04-21 MOS2 Medium 14.7 5.8 10.7 4.56 ul J1954+2836 C 12148 2011-12-26 ACIS-I - 10.0 0.6 0.9 5.32 ul J1954+2923 C 12684 2010-12-22 ACIS-S - 5.1 5.0 0.3 0.62 ul J2005+3547 X 0556260301 2009-04-16 PN/FF Medium 43.5 21.2 7.1 2.05 ul X 0556260301 2009-04-16 MOS1 Medium 50.0 25.3 7.1 1.03 ul X 0556260301 2009-04-16 MOS2 Medium 51.0 28.2 7.1 1.56 ul J2007+2722 C 6438 2006-12-10 ACIS-I - 22.9 17.8 5.8 0.17 ul C 7254 2006-01-07 ACIS-I - 21.1 17.9 5.9 0.17 ul Continued on next page

– 48 –

Table 1 – continued from previous page

PSR satellite^{(α)} obsID date instrument^{(β)} filter t_{on-axis} t(θ) θ^{(γ)} count rate^{(δ)} flag^{(δ)}

C 8492 2007-01-29 ACIS-I - 51.1 47.6 6.0 0.06 ul J2017+0603 C 12537 2011-07-30 ACIS-S - 10.0 9.9 0.3 - d J2043+1711 C 15366 2012-12-18 ACIS-I - 10.1 9.3 0.7 1.83 ul J2048+2255 C 15982 2014-01-02 ACIS-S - 3.3 3.2 0.2 0.90 ul J2129–5721 X 0406620401 2007-04-19 MOS1 Medium 55.4 54.4 1.7 1.60 ul X 0406620401 2007-04-19 MOS2 Medium 55.6 53.6 1.7 0.72 ul J2144–3933 X 0604550101 2009-10-24 PN/FF Thin 18.0 15.4 1.7 3.22 ul X 0604550101 2009-10-23 MOS1 Thin 28.1 27.6 1.7 0.89 ul X 0604550101 2009-10-23 MOS2 Thin 28.0 27.0 1.7 0.91 ul J2156+2618 C 15983 2013-12-31 ACIS-S - 3.6 3.5 0.2 0.83 ul J2222+2923 C 15984 2014-01-15 ACIS-S - 3.6 3.5 0.2 0.89 ul J2222–0137 C 12237 2010-09-26 ACIS-S - 30.0 27.2 0.3 - d J2235+1506 C 13798 2011-12-30 ACIS-S - 3.5 3.4 0.2 0.91 ul J2238+5903 C 13286 2012-04-21 ACIS-I - 10.0 8.8 4.1 5.32 ul J2307+2225 C 15985 2014-05-19 ACIS-S - 3.3 3.2 0.2 0.96 ul

Notes.^{(α)} C:Chandra X:XMM-Newton;^{(β)} in the case of XMM-Newton EPIC-PN observations the used observation mode is added (EFF: Extended Full Frame; FF: Full Frame; LW: Large Window; SW: Small Window)^{(γ)} off-axis angle;^{(δ)} If flagged with ul than 2σ upper limit on count rate, otherwise see text.

6.43873E-07,-1.10052e-07,1.29864e-07

Table 5:: Pulsar parameters, flux upper limits and X-ray efficiency upper limits for pulsars for which no X-ray counterpart was detected in the XMM-Newton and Chandra archival data by June 1^{st} 2016.

PSR DM P log(Age) log(Ė) N_H/N^{LAB}_H d f^{PL}_{0.1–2 keV} log(L^{PL}_{0.1–2 keV}) μ^{PL}_{0.1–2 keV} log(T_∞) pc cm^{−3} ms yrs erg s^{−1} 10^{21} cm^{−2} kpc erg s^{−1} cm^{−2} erg s^{−1} K

J0051+0423 13.9 354 8.9 30.8 0.4/7.5 0.6 [2] 4.6 × 10^{−15} 29.6 < 6.6 × 10^{−2} 5.61 J0134–2937 21.806 136 7.4 33.1 0.7/5.0 0.6 [2] 4.0 × 10^{−15} 29.5 < 2.5 × 10^{−4} 5.51 J0137+1654 26.6 414 8.7 30.8 0.8/0.5 1.2 [2] 4.8 × 10^{−15} 30.2 < 2.5 × 10^{−1} 5.70 J0139+5814 73.779 272 5.6 34.3 2.3/0.5 2.6 [1] 7.8 × 10^{−15} 30.9 < 3.8 × 10^{−4} 5.85 J0157+6212 30.21 2351 5.3 32.8 0.9/8.2 1.7 [2] 5.3 × 10^{−15} 30.6 < 6.4 × 10^{−3} 5.74 J0248+6021 370 217 4.8 35.3 11.4/7.5 23.2 [3] 2.0 × 10^{−14} 33.5 < 1.4 × 10^{−2} 6.29 J0335+4555 47.153 269 8.8 31.2 1.5/4.2 1.6 [2] 6.2 × 10^{−15} 30.7 < 3.4 × 10^{−1} 5.85 J0520–2553 33.77 241 8.1 31.9 1.0/4.4 1.7 [2] 5.3 × 10^{−15} 30.6 < 4.5 × 10^{−2} 5.81 J0609+2130 38.73 55 9.6 31.7 1.2/7.1 1.2 [2] 4.1 × 10^{−15} 30.3 < 3.4 × 10^{−2} 5.79 J0622+3749 - 333 5.3 34.4 -/2.2 - 1.4 × 10^{−14} - - - J0636+5129 11.11 2 10.1 33.8 0.3/0.9 0.6 [3] 2.4 × 10^{−14} 30.4 < 4.2 × 10^{−4} 5.65 J0645+5158 18.25 8 10.5 32.4 0.6/0.8 5.1 [3] 3.8 × 10^{−15} 31.4 < 9.6 × 10^{−2} 5.83 J0656–5449 67.5 183 8.0 32.3 2.1/10.2 3.9 [2] 6.4 × 10^{−15} 31.2 < 8.2 × 10^{−2} 5.92 J0742–2822 73.782 166 5.2 35.2 2.3/7.6 2.0 [1] 1.7 × 10^{−14} 31.3 < 1.2 × 10^{−4} 5.89 J0828–3417 52.2 1848 7.5 30.8 1.6/8.5 0.5 [2] 2.3 × 10^{−15} 29.1 < 1.9 × 10^{−2} 5.63 J0847–4316 292.5 5977 5.9 31.3 9.0/11.7 5.1 [2] 5.3 × 10^{−15} 31.4 < 1.1 5.97 J0907–5157 103.72 253 6.3 33.6 3.2/8.0 0.9 [2] 2.0 × 10^{−14} 30.5 < 6.5 × 10^{−4} 5.84 J0940–5428 134.5 87 4.6 36.3 4.2/8.9 3.0 [2] 2.9 × 10^{−15} 30.6 < 2.2 × 10^{−6} 5.86 J0943+1631 20.32 1087 8.3 30.4 0.6/9.8 0.8 [2] 8.2 × 10^{−15} 30.1 < 4.5 × 10^{−1} 5.68 J1001–5939 113 7733 6.3 30.7 3.5/0.7 2.8 [2] 2.2 × 10^{−15} 30.5 < 5.7 × 10^{−1} 5.87 J1038+0032 26.59 28 9.8 32.0 0.8/10.2 1.2 [2] 5.5 × 10^{−15} 30.3 < 1.6 × 10^{−2} 5.77 J1055–6022 590 947 5.2 33.6 18.2/1.2 12.5 [2] 1.3 × 10^{−14} 32.5 < 7.9 × 10^{−2} 6.15 J1055–6028 635.9 99 4.7 36.1 19.6/2.4 15.5 [2] 6.9 × 10^{−15} 32.5 < 2.4 × 10^{−4} 6.04 Continued on next page

– 49 –

Table 5 – continued from previous page

PSR DM P log(Age) log(Ė) N_H/N^{LAB}_H d f^{PL}_{0.1–2 keV} log(L^{PL}_{0.1–2 keV}) μ^{PL}_{0.1–2 keV} log(T_∞)

J1103–5403 103.915 3 10.2 33.6 3.2/12.3 2.5 [2] 7.2 × 10^{−15} 30.9 < 2.2 × 10^{−3} 5.91 J1104–6103 78.506 280 6.4 33.5 2.4/0.8 1.9 [2] 5.5 × 10^{−15} 30.5 < 1.0 × 10^{−3} 5.81 J1105–6107 271.01 63 4.8 36.4 8.4/3.7 5.0 [2] 3.5 × 10^{−15} 31.2 < 6.0 × 10^{−6} 5.75 J1107–5907 40.2 252 8.6 31.3 1.2/1.1 1.3 [2] 1.1 × 10^{−14} 30.5 < 1.4 × 10^{−1} 5.79 J1115+5030 9.195 1656 7.0 31.3 0.3/3.6 0.4 [2] 8.5 × 10^{−16} 28.7 < 2.4 × 10^{−3} 5.48 J1157–6224 325.2 400 6.2 33.4 10.0/0.9 4.0 [1] 1.3 × 10^{−14} 31.8 < 2.4 × 10^{−2} 6.01 J1159–7910 59.24 525 6.5 32.9 1.8/11.5 1.9 [2] 3.2 × 10^{−14} 31.3 < 2.6 × 10^{−2} 5.88 J1225–6408 415.1 419 6.8 32.7 12.8/12.2 10.4 [2] 1.7 × 10^{−14} 32.5 < 6.2 × 10^{−1} 6.19 J1253–5820 100.584 255 6.3 33.7 3.1/0.12 2.2 [2] 8.9 × 10^{−15} 30.9 < 1.4 × 10^{−3} 5.68 J1300+1240 10.16550 6 8.9 34.3 0.3/0.9 0.6 [1] 8.7 × 10^{−16} 28.8 < 3.5 × 10^{−6} 5.49 J1302–6313 500 967 6.4 32.4 15.4/17.4 8.9 [2] 3.7 × 10^{−15} 31.7 < 1.8 × 10^{−1} 5.90 J1303–6305 343 2306 7.2 30.8 10.6/3.5 6.2 [2] 1.3 × 10^{−14} 31.9 < 1.2 × 10^{+1} 6.12 J1305–6256 967 478 6.6 32.9 29.8/18.3 11.9 [2] 7.6 × 10^{−14} 33.3 < 2.4 6.08 J1306–6242 480 981 6.4 32.4 14.8/8.4 8.2 [2] 7.2 × 10^{−15} 31.9 < 3.4 × 10^{−1} 5.85 J1309–6526 340 398 8.5 31.1 10.5/0.2 7.6 [2] 3.2 × 10^{−15} 31.5 < 2.7 5.95 J1317–5759 145.3 2642 6.5 31.4 4.5/18.5 3.1 [2] 8.6 × 10^{−15} 31.2 < 5.3 × 10^{−1} 5.95 J1317–6302 678.1 261 7.6 32.4 20.9/16.6 12.1 [2] 1.5 × 10^{−14} 32.6 < 1.7 6.19 J1320–3512 16.42 458 9.6 29.9 0.5/2.9 0.7 [2] 5.2 × 10^{−15} 29.6 < 5.3 × 10^{−1} 5.64 J1322–6329 659 2764 6.6 31.3 20.3/3.3 12.4 [2] 3.7 × 10^{−15} 32.0 < 4.8 6.03 J1324–6302 497 2483 7.6 30.4 15.3/15.6 8.2 [2] 1.5 × 10^{−14} 32.2 < 7.0 × 10^{+1} 6.04 J1333–4449 44.3 345 10.0 29.7 1.4/1.9 1.4 [2] 4.3 × 10^{−15} 30.1 < 2.7 5.59 J1334–5839 119.2978 107 7.9 32.8 3.7/15.2 2.4 [2] 7.1 × 10^{−15} 30.9 < 1.0 × 10^{−2} 5.95 J1339–4712 39.9 137 9.6 30.9 1.2/14.2 1.2 [2] 5.4 × 10^{−15} 30.1 < 1.7 × 10^{−1} 5.75 J1355–5925 354.8 1213 6.5 32.1 10.9/17.2 7.3 [2] 1.0 × 10^{−14} 32.0 < 7.2 × 10^{−1} 5.93 J1355–6206 547 276 9.2 30.8 16.9/11.8 8.3 [2] 4.4 × 10^{−15} 31.7 < 9.0 5.87 J1359–6038 293.71 127 5.5 35.1 9.1/7.8 5.0 [1] 3.7 × 10^{−14} 32.3 < 1.8 × 10^{−3} 6.16 J1406–6121 542.3 213 4.8 35.3 16.7/5.4 8.1 [2] 3.1 × 10^{−14} 32.5 < 1.6 × 10^{−3} 6.13 J1410–7404 54.24 278 8.8 31.1 1.7/14.3 1.5 [2] 5.4 × 10^{−15} 30.3 < 1.8 × 10^{−1} 5.83 J1412–6145 514.7 315 4.7 35.1 15.9/1.9 7.8 [2] 9.5 × 10^{−15} 32.0 < 8.0 × 10^{−4} 6.18 J1413–6141 677 285 4.1 35.8 20.9/12.8 10.1 [2] 1.0 × 10^{−14} 32.3 < 3.2 × 10^{−4} 6.10 J1425–5723 43.4 353 8.4 31.3 1.3/7.2 1.2 [2] 4.3 × 10^{−15} 30.0 < 5.1 × 10^{−2} 5.77 J1432–5032 113 2034 6.7 31.4 3.5/2.4 2.8 [2] 7.3 × 10^{−15} 31.0 < 3.4 × 10^{−1} 5.91 J1444–5941 177.1 2760 6.7 31.2 5.5/1.2 3.3 [2] 3.8 × 10^{−14} 31.8 < 4.5 6.07 J1453–6413 71.07 179 6.0 34.3 2.2/15.6 2.8 [1] 1.0 × 10^{−14} 31.3 < 1.1 × 10^{−3} 5.90 J1457–5900 175 1498 6.8 31.6 5.4/10.5 3.2 [2] 2.3 × 10^{−15} 30.6 < 9.6 × 10^{−2} 5.86 J1457–5902 477.2 390 5.7 33.9 14.7/2.7 6.8 [2] 1.6 × 10^{−15} 31.1 < 1.5 × 10^{−3} 5.77 J1507–6640 129.8 355 6.7 33.0 4.0/8.3 3.6 [2] 1.0 × 10^{−14} 31.3 < 2.2 × 10^{−2} 5.90 J1511–5835 332 301 7.1 32.7 10.2/1.1 5.0 [2] 2.6 × 10^{−15} 31.0 < 2.2 × 10^{−2} 5.81 J1514–5925 194.1 148 5.9 34.5 6.0/7.3 3.5 [2] 4.5 × 10^{−14} 32.0 < 2.7 × 10^{−3} 6.06 J1517–4636 127.0 886 6.8 32.1 3.9/17.9 3.2 [2] 4.0 × 10^{−14} 32.4 < 1.9 6.09 J1524–5706 833 1116 4.7 34.0 25.7/1.0 11.4 [2] 1.4 × 10^{−15} 31.5 < 3.1 × 10^{−3} 5.99 J1529–5611 149 822 6.5 32.5 4.6/4.5 2.7 [2] 1.1 × 10^{−14} 31.2 < 4.9 × 10^{−2} 6.00 J1535–4114 66.28 432 6.2 33.3 2.0/1.4 2.0 [2] 3.5 × 10^{−15} 30.9 < 4.0 × 10^{−3} 5.86 J1538–5551 603 104 5.7 35.0 18.6/20.2 7.5 [2] 1.9 × 10^{−14} 32.8 < 5.7 × 10^{−3} 6.08 J1542–5034 91.0 599 6.4 32.9 2.8/19.7 3.2 [2] 1.7 × 10^{−14} 32.0 < 1.4 × 10^{−1} 6.06 J1548–4821 126.0 145 9.5 31.0 3.9/1.6 4.4 [2] 8.2 × 10^{−15} 32.0 < 8.9 6.05 J1549+2113 24.8 1262 7.4 31.2 0.8/12.0 2.1 [2] 7.8 × 10^{−15} 30.9 < 4.8 × 10^{−1} 5.76 J1549–4848 55.983 288 5.5 34.4 1.7/1.4 2.7 [2] 2.5 × 10^{−15} 31.0 < 4.4 × 10^{−4} 5.84 J1553–5456 210 1081 6.0 32.7 6.5/2.7 3.8 [2] 1.2 × 10^{−15} 31.0 < 2.1 × 10^{−2} 6.02 J1554–5512 450 3418 6.2 31.5 13.9/17.2 6.4 [2] 1.1 × 10^{−15} 31.4 < 8.7 × 10^{−1} 6.10 J1555–2341 51.901 532 7.1 32.3 1.6/6.2 1.9 [2] 4.6 × 10^{−15} 30.5 < 1.7 × 10^{−2} 5.77 J1604–4909 140.8 327 6.7 33.1 4.3/7.3 5.1 [2] 8.5 × 10^{−15} 32.1 < 1.1 × 10^{−1} 6.05 J1607–6449 89.39 298 8.3 31.6 2.8/1.5 2.1 [2] 1.2 × 10^{−14} 31.0 < 2.5 × 10^{−1} 5.87 J1611–5847 79.9 354 9.4 30.3 2.5/15.7 1.7 [2] 6.1 × 10^{−15} 31.0 < 5.7 5.88 Continued on next page

– 50 –

Table 5 – continued from previous page

PSR DM P log(Age) log(Ė) N_H/N^{LAB}_H d f^{PL}_{0.1–2 keV} log(L^{PL}_{0.1–2 keV}) μ^{PL}_{0.1–2 keV} log(T_∞)

J1613–5211 360.1 457 5.6 33.9 11.1/5.5 6.4 [2] 8.5 × 10^{−15} 32.3 < 2.6 × 10^{−2} 6.10 J1614–5144 748 1534 6.5 31.9 23.1/0.4 9.9 [2] 1.3 × 10^{−14} 32.9 < 8.8 6.21 J1616–5109 1160 1219 6.0 32.6 35.8/0.2 15.2 [2] 2.5 × 10^{−14} 33.5 < 8.2 6.35 J1616–5208 488 1025 5.7 33.0 15.1/0.2 7.8 [2] 1.4 × 10^{−14} 32.7 < 4.7 × 10^{−1} 6.23 J1620–4927 - 171 5.4 34.9 -/16.9 - 1.7 × 10^{−14} - - - J1621–5039 261 1084 6.1 32.6 8.1/18.2 4.6 [2] 6.3 × 10^{−16} 30.9 < 1.9 × 10^{−2} 5.93 J1622–4944 755 1072 6.0 32.7 23.3/10.0 8.2 [2] 4.0 × 10^{−15} 32.2 < 2.9 × 10^{−1} 6.19 J1623–4949 183.3 725 5.4 33.6 5.7/18.3 3.6 [2] 1.6 × 10^{−14} 32.1 < 2.7 × 10^{−2} 5.97 J1625–4904 684.8 460 5.6 33.8 21.1/14.2 7.4 [2] 2.9 × 10^{−14} 33.0 < 1.3 × 10^{−1} 6.05 J1625–4913 720 355 5.9 33.8 22.2/12.4 7.7 [2] 4.4 × 10^{−14} 33.2 < 2.6 × 10^{−1} 6.28 J1627–4845 557.8 612 6.4 32.8 17.2/4.8 6.2 [2] 5.6 × 10^{−15} 32.1 < 2.0 × 10^{−1} 6.07 J1627–5936 99.3 354 8.8 30.9 3.1/12.2 2.2 [2] 5.9 × 10^{−15} 31.2 < 2.3 5.97 J1632–4757 578 228 5.4 34.7 17.8/1.5 6.3 [2] 8.0 × 10^{−15} 31.7 < 1.1 × 10^{−3} 6.14 J1633–4805 1120 710 5.2 33.9 34.6/1.7 10.7 [2] 4.7 × 10^{−15} 32.0 < 1.1 × 10^{−2} 6.15 J1636–4803 503 1204 6.0 32.7 15.5/7.0 5.8 [2] 1.3 × 10^{−13} 32.9 < 1.6 6.15 J1637–4553 193.23 118 5.8 34.9 6.0/1.9 3.2 [2] 3.5 × 10^{−14} 31.8 < 8.1 × 10^{−4} 6.05 J1637–4642 417.0 154 4.6 35.8 12.9/1.9 5.1 [2] 1.5 × 10^{−14} 31.8 < 1.0 × 10^{−4} 6.08 J1637–4721 448 1165 6.6 32.0 13.8/1.9 5.3 [2] 2.8 × 10^{−15} 31.1 < 1.2 × 10^{−1} 5.84 J1638–4725 552.1 763 6.4 32.6 17.0/14.5 6.1 [2] 2.9 × 10^{−15} 31.3 < 4.4 × 10^{−2} 6.11 J1640–4648 474 178 6.5 33.7 14.6/2.0 5.5 [2] 1.1 × 10^{−14} 31.8 < 1.0 × 10^{−2} 6.14 J1643–1224 62.4121 4 9.6 33.9 1.9/10.4 0.4 [1] 3.1 × 10^{−14} 30.0 < 1.3 × 10^{−4} 5.74 J1646–4346 490.4 231 4.5 35.6 15.1/4.4 5.8 [2] 1.3 × 10^{−13} 32.9 < 2.1 × 10^{−3} 6.19 J1648–4458 925 629 6.7 32.5 28.5/10.6 9.3 [2] 4.6 × 10^{−14} 32.8 < 2.3 6.26 J1648–4611 392.9 164 5.0 35.3 12.1/6.8 5.0 [2] 4.0 × 10^{−15} 31.2 < 8.1 × 10^{−5} 5.99 J1649–4349 398.6 870 8.5 30.4 12.3/10.5 5.0 [2] 1.6 × 10^{−14} 31.8 < 2.7 × 10^{+1} 5.95 J1650–4341 673 309 8.5 31.3 20.8/0.5 7.5 [2] 7.6 × 10^{−15} 31.9 < 3.3 6.15 J1652–4406 786 7707 7.1 29.9 24.3/10.2 8.4 [2] 6.4 × 10^{−14} 32.9 < 9.5 × 10^{+2} 6.27 J1653–4315 337 419 8.6 30.9 10.4/10.6 4.6 [2] 1.0 × 10^{−14} 31.6 < 4.5 6.09 J1654–4140 307 1273 8.2 30.4 9.5/12.9 4.3 [2] 4.6 × 10^{−15} 31.2 < 5.9 6.04 J1702–4217 629 227 8.5 31.6 19.4/13.4 7.1 [2] 4.4 × 10^{−15} 31.6 < 9.9 × 10^{−1} 5.97 J1702–4306 537 215 5.5 34.6 16.6/8.0 6.7 [2] 3.2 × 10^{−15} 31.4 < 6.2 × 10^{−4} 5.98 J1702–4310 377 240 4.2 35.8 11.6/7.8 5.2 [2] 6.3 × 10^{−15} 31.5 < 4.5 × 10^{−5} 6.09 J1703–4851 150.29 1396 6.6 31.9 4.6/3.5 3.0 [2] 5.7 × 10^{−15} 30.9 < 1.2 × 10^{−1} 5.93 J1705–1906 22.907 298 6.1 33.8 0.7/1.0 0.9 [2] 1.4 × 10^{−14} 30.3 < 3.1 × 10^{−4} 5.69 J1705–4108 1077 861 5.6 33.3 33.2/4.3 11.4 [2] 4.0 × 10^{−15} 32.0 < 4.2 × 10^{−2} 5.91 J1706–4310 656.1 616 6.2 33.0 20.2/1.9 10.0 [2] 1.8 × 10^{−13} 33.5 < 2.9 6.27 J1707–4053 360.0 581 6.7 32.6 11.1/12.2 4.0 [1] 6.9 × 10^{−15} 31.5 < 7.7 × 10^{−2} 6.02 J1709–3626 393.6 447 6.5 33.0 12.1/1.0 5.9 [2] 5.1 × 10^{−13} 33.5 < 3.1 6.29 J1709–4401 225.8 865 6.3 32.7 7.0/1.4 4.4 [2] 4.8 × 10^{−14} 32.2 < 3.5 × 10^{−1} 6.08 J1711–3826 376 465 6.0 33.5 11.6/6.6 4.7 [2] 3.0 × 10^{−15} 31.1 < 3.9 × 10^{−3} 6.00 J1712–2715 92.64 255 6.5 33.5 2.9/11.5 2.1 [2] 7.1 × 10^{−15} 30.7 < 1.7 × 10^{−3} 5.85 J1715–3859 817 928 6.5 32.3 25.2/8.6 9.5 [2] 8.0 × 10^{−14} 33.1 < 5.7 6.29 J1716–3720 682.7 630 5.7 33.5 21.1/11.7 7.9 [2] 3.0 × 10^{−14} 32.5 < 1.1 × 10^{−1} 6.09 J1717–3737 525.8 682 6.3 32.8 16.2/0.8 5.7 [2] 8.1 × 10^{−15} 31.7 < 7.0 × 10^{−2} 5.96 J1717–4043 452.6 397 5.7 33.9 14.0/12.3 6.3 [2] 1.3 × 10^{−13} 33.0 < 1.2 × 10^{−1} 6.13 J1718–3714 833 1289 5.9 32.7 25.7/2.0 9.9 [2] 2.0 × 10^{−15} 31.5 < 7.1 × 10^{−2} 5.97 J1718–4539 254 590 6.1 33.2 7.8/2.8 6.4 [2] 2.5 × 10^{−14} 32.2 < 1.2 × 10^{−1} 6.14 J1719–1438 36.766 5 10.1 33.2 1.1/6.0 1.2 [2] 7.5 × 10^{−15} 30.3 < 1.2 × 10^{−3} 5.72 J1720–3659 381.6 351 8.2 31.5 11.8/2.2 4.6 [2] 4.7 × 10^{−15} 31.2 < 5.7 × 10^{−1} 5.92 J1721–1936 75.7 1004 7.0 31.8 2.3/3.9 1.9 [2] 3.7 × 10^{−15} 30.4 < 3.7 × 10^{−2} 5.85 J1723–3659 254.2 202 5.6 34.6 7.8/1.4 3.5 [2] 4.9 × 10^{−14} 32.0 < 2.8 × 10^{−3} 6.04 J1725–3546 744 1032 6.0 32.7 23.0/2.8 8.7 [2] 6.6 × 10^{−14} 32.9 < 1.6 6.24 J1726–3530 727 1110 4.2 34.5 22.4/5.5 8.4 [2] 9.3 × 10^{−15} 32.1 < 3.3 × 10^{−3} 6.15 J1730–3350 259 139 4.4 36.1 8.0/3.3 3.5 [2] 5.5 × 10^{−15} 31.1 < 9.7 × 10^{−6} 6.04 Continued on next page

– 51 –

Table 5 – continued from previous page

PSR DM P log(Age) log(Ė) N_H/N^{LAB}_H d f^{PL}_{0.1–2 keV} log(L^{PL}_{0.1–2 keV}) μ^{PL}_{0.1–2 keV} log(T_∞)

J1730–3353 256 3270 6.4 31.4 7.9/3.3 3.5 [2] 1.3 × 10^{−14} 31.4 < 1.1 6.05 J1732–3426 513.5 332 7.1 32.6 15.8/6.2 5.8 [2] 4.9 × 10^{−14} 32.4 < 6.5 × 10^{−1} 6.03 J1733–3030 636 362 6.5 33.1 19.6/6.2 9.5 [2] 6.8 × 10^{−14} 33.0 < 7.8 × 10^{−1} 6.17 J1733–3322 524.0 1245 6.7 31.9 16.2/6.2 5.8 [2] 2.8 × 10^{−14} 32.2 < 1.9 6.16 J1733–3716 153.5 337 5.6 34.2 4.7/6.2 2.8 [2] 2.5 × 10^{−14} 31.5 < 2.1 × 10^{−3} 6.02 J1735–3258 754 350 5.3 34.4 23.3/6.2 9.6 [2] 1.3 × 10^{−14} 32.3 < 8.5 × 10^{−3} 6.17 J1736–2843 331 6445 6.5 30.6 10.2/6.2 4.9 [2] 3.0 × 10^{−14} 32.1 < 2.7 × 10^{+1} 6.15 J1739–2903 138.56 322 5.8 34.0 4.3/8.6 2.5 [2] 1.4 × 10^{−14} 31.2 < 1.5 × 10^{−3} 5.93 J1739–3023 170.0 114 5.2 35.5 5.2/9.3 2.9 [2] 1.2 × 10^{−14} 31.2 < 5.7 × 10^{−5} 5.97 J1739–3049 573.2 239 6.2 33.8 17.7/5.4 6.4 [2] 3.3 × 10^{−15} 31.4 < 3.7 × 10^{−3} 6.05 J1739–3951 24.6 341 8.4 31.3 0.8/2.6 0.8 [2] 3.8 × 10^{−15} 29.6 < 2.0 × 10^{−2} 5.68 J1740–3052 738.78 570 5.5 33.7 22.8/3.5 9.5 [2] 3.9 × 10^{−15} 31.8 < 1.1 × 10^{−2} 5.97 J1741–2719 361.9 346 7.8 31.9 11.2/4.0 5.2 [2] 2.2 × 10^{−14} 32.0 < 1.3 6.08 J1741–2733 149.2 892 8.0 30.9 4.6/5.8 2.7 [2] 4.8 × 10^{−14} 31.8 < 7.3 6.07 J1743–3150 193.05 2414 5.5 32.5 6.0/4.8 3.3 [2] 1.6 × 10^{−14} 31.5 < 8.8 × 10^{−2} 6.01 J1743–3153 505.7 193 5.5 34.8 15.6/11.9 6.6 [2] 1.4 × 10^{−14} 32.0 < 1.8 × 10^{−3} 6.04 J1744–3130 192.9 1066 5.9 32.8 6.0/0.7 3.3 [2] 2.2 × 10^{−14} 31.6 < 6.1 × 10^{−2} 6.06 J1744–3922 148.1 172 9.2 31.1 4.6/8.5 3.1 [2] 2.5 × 10^{−14} 31.6 < 3.4 5.93 J1745–3040 88.373 367 5.7 33.9 2.7/8.6 1.9 [2] 8.6 × 10^{−15} 30.7 < 6.4 × 10^{−4} 5.85 J1747–2802 835 2780 7.3 30.6 25.8/8.8 11.1 [2] 5.5 × 10^{−15} 32.1 < 2.7 × 10^{+1} 6.10 J1748–3009 420.2 9 - - 13.0/5.0 5.1 [2] 2.2 × 10^{−14} 32.0 - 6.12 J1749–3002 509.4 609 6.1 33.1 15.7/6.1 5.8 [2] 1.4 × 10^{−14} 31.9 < 6.0 × 10^{−2} 6.02 J1751–2857 42.808 3 9.7 33.9 1.3/3.0 1.1 [2] 1.9 × 10^{−14} 30.6 < 5.4 × 10^{−4} 5.79 J1753–1914 105.3 62 8.7 32.5 3.2/2.4 2.2 [2] 5.1 × 10^{−15} 30.6 < 1.3 × 10^{−2} 5.79 J1754–3443 187.7 361 7.0 32.7 5.8/12.0 4.1 [2] 9.4 × 10^{−15} 31.4 < 5.9 × 10^{−2} 6.02 J1755–2725 115 261 8.5 31.5 3.5/2.6 2.4 [2] 1.1 × 10^{−14} 31.0 < 3.6 × 10^{−1} 5.98 J1757–2421 179.454 234 5.5 34.6 5.5/11.9 4.4 [2] 1.4 × 10^{−14} 31.7 < 1.2 × 10^{−3} 5.98 J1759–2205 177.157 460 5.8 33.6 5.5/2.9 3.6 [2] 6.5 × 10^{−14} 32.2 < 3.3 × 10^{−2} 6.07 J1759–2302 889 810 6.1 32.9 27.4/3.4 11.6 [2] 2.6 × 10^{−14} 32.8 < 7.4 × 10^{−1} 6.22 J1759–2307 812.6 558 6.4 32.9 25.1/0.8 10.9 [2] 3.1 × 10^{−14} 32.8 < 7.3 × 10^{−1} 6.22 J1759–3107 128.6 1078 6.7 32.1 4.0/12.4 2.8 [2] 9.5 × 10^{−13} 33.1 < 1.1 × 10^{+1} 6.14 J1801–2304 1073.9 415 4.8 34.8 33.1/10.8 4.0 [1] 2.2 × 10^{−14} 31.8 < 1.0 × 10^{−3} 5.98 J1804–0735 186.316 23 8.9 33.2 5.7/3.2 5.0 [2] 3.3 × 10^{−15} 31.2 < 9.6 × 10^{−3} 5.94 J1805–1504 225 1181 7.8 30.8 6.9/5.9 4.4 [2] 2.5 × 10^{−14} 31.9 < 1.3 × 10^{+1} 6.01 J1806–2125 750.4 481 4.8 34.6 23.2/11.1 9.9 [2] 1.3 × 10^{−14} 32.3 < 5.2 × 10^{−3} 6.07 J1807–0847 112.3802 163 8.0 32.4 3.5/10.4 2.7 [2] 8.1 × 10^{−15} 31.0 < 4.0 × 10^{−2} 5.94 J1808–2701 95 2457 5.8 32.2 2.9/12.4 1.8 [2] 1.0 × 10^{−14} 30.7 < 3.2 × 10^{−2} 5.85 J1809–1850 598 1124 6.2 32.5 18.5/1.7 7.2 [2] 5.4 × 10^{−14} 32.7 < 1.6 6.21 J1809–2004 867.1 434 6.0 33.5 26.8/1.7 10.9 [2] 6.4 × 10^{−15} 32.1 < 3.7 × 10^{−2} 5.94 J1810–1820 452.2 153 7.7 32.8 14.0/1.7 5.6 [2] 8.2 × 10^{−15} 31.7 < 7.9 × 10^{−2} 6.00 J1811–1049 253.3 2623 7.7 30.2 7.8/8.7 5.5 [2] 1.5 × 10^{−13} 32.9 < 4.3 × 10^{+2} 6.06 J1811–1835 761 557 6.1 33.2 23.5/1.3 9.3 [2] 2.1 × 10^{−14} 32.5 < 2.2 × 10^{−1} 6.11 J1812–1910 892 430 5.3 34.3 27.5/10.9 11.2 [2] 6.2 × 10^{−14} 33.1 < 7.3 × 10^{−2} 6.29 J1813+1822 60.8 336 8.4 31.3 1.9/11.8 2.9 [2] 6.7 × 10^{−15} 31.1 < 6.2 × 10^{−1} 5.91 J1814–1744 792 3975 4.9 32.7 24.4/14.3 9.6 [2] 9.0 × 10^{−14} 33.2 < 3.0 6.26 J1815–1738 728 198 4.6 35.6 22.5/14.7 8.8 [2] 9.4 × 10^{−14} 33.1 < 3.2 × 10^{−3} 6.26 J1816–5643 52.4 217 9.3 30.9 1.6/4.4 1.5 [2] 5.9 × 10^{−15} 30.4 < 3.3 × 10^{−1} 5.80 J1817–3618 94.3 387 6.5 33.1 2.9/6.6 2.4 [2] 2.1 × 10^{−15} 30.3 < 1.5 × 10^{−3} 5.84 J1818–1448 644 281 5.9 34.0 19.9/11.6 7.4 [2] 1.1 × 10^{−14} 32.0 < 9.8 × 10^{−3} 6.10 J1818–1519 845 939 6.6 32.3 26.1/10.5 9.6 [2] 3.3 × 10^{−14} 32.7 < 2.6 6.10 J1818–1541 690 551 6.0 33.4 21.3/0.7 7.8 [2] 4.4 × 10^{−14} 32.7 < 2.1 × 10^{−1} 6.10 J1818–1556 230 952 7.3 31.5 7.1/5.0 3.9 [2] 4.7 × 10^{−15} 31.1 < 3.8 × 10^{−1} 5.95 J1819–1008 404 301 6.6 33.3 12.5/8.3 7.2 [2] 2.8 × 10^{−14} 32.4 < 1.3 × 10^{−1} 6.18 J1819–1510 421.7 226 8.7 31.4 13.0/1.8 5.3 [2] 1.7 × 10^{−14} 31.9 < 3.1 6.14 Continued on next page

– 52 –

Table 5 – continued from previous page

PSR DM P log(Age) log(Ė) N_H/N^{LAB}_H d f^{PL}_{0.1–2 keV} log(L^{PL}_{0.1–2 keV}) μ^{PL}_{0.1–2 keV} log(T_∞)

J1821–1419 1123 1656 4.5 33.9 34.7/12.0 11.3 [2] 3.2 × 10^{−14} 32.8 < 9.0 × 10^{−2} 6.22 J1821–1432 570 1915 6.8 31.5 17.6/10.6 6.5 [2] 5.0 × 10^{−15} 31.6 < 1.2 6.06 J1822–1617 647 831 6.8 32.1 20.0/0.4 9.4 [2] 2.1 × 10^{−12} 34.5 < 2.5 × 10^{+2} 6.43 J1823–1347 1044 617 6.0 33.2 32.2/1.6 10.5 [2] 8.5 × 10^{−15} 32.2 < 1.0 × 10^{−1} 6.00 J1824–1159 463.4 362 6.0 33.6 14.3/9.5 5.6 [2] 2.4 × 10^{−14} 32.1 < 2.9 × 10^{−2} 5.97 J1825–1446 357 279 5.3 34.6 11.0/0.4 5.1 [2] 5.7 × 10^{−15} 31.4 < 6.1 × 10^{−4} 5.97 J1826–1131 320.58 2093 6.8 31.3 9.9/14.2 4.6 [2] 6.3 × 10^{−15} 31.4 < 1.1 5.84 J1828–1007 302.6 153 6.6 33.8 9.3/6.0 4.4 [2] 1.2 × 10^{−14} 31.6 < 6.1 × 10^{−3} 6.04 J1828–1057 245 246 5.3 34.7 7.6/15.9 4.0 [2] 1.6 × 10^{−14} 31.6 < 7.9 × 10^{−4} 6.02 J1828–1101 607.4 72 4.9 36.2 18.7/5.5 6.6 [2] 1.3 × 10^{−14} 32.0 < 6.3 × 10^{−5} 6.05 J1830–1059 161.50 405 5.0 34.6 5.0/16.4 3.2 [2] 5.0 × 10^{−14} 31.9 < 2.4 × 10^{−3} 6.06 J1831–0952 247 67 5.1 36.0 7.6/7.3 4.1 [2] 5.9 × 10^{−14} 32.2 < 1.5 × 10^{−4} 6.12 J1831–1223 342 2857 6.9 31.0 10.6/6.5 5.0 [2] 1.7 × 10^{−14} 31.9 < 8.2 6.12 J1832+0029 28.3 533 6.7 32.6 0.9/1.7 1.3 [2] 6.8 × 10^{−16} 29.5 < 7.2 × 10^{−4} 5.66 J1832–1021 475.7 330 6.1 33.7 14.7/16.8 5.8 [2] 2.8 × 10^{−14} 32.2 < 3.5 × 10^{−2} 6.13 J1833–1055 543 633 7.3 31.9 16.8/15.9 7.1 [2] 1.8 × 10^{−14} 32.2 < 1.9 6.16 J1835–1106 132.679 165 5.1 35.3 4.1/18.3 2.8 [2] 4.5 × 10^{−15} 30.8 < 3.5 × 10^{−5} 5.97 J1837–0559 317.8 201 6.0 34.2 9.8/16.7 5.4 [2] 8.8 × 10^{−15} 31.7 < 2.8 × 10^{−3} 6.10 J1837–0604 462 96 4.5 36.3 14.3/13.2 6.4 [2] 2.9 × 10^{−14} 32.3 < 1.0 × 10^{−4} 6.18 J1837–0653 316.1 1905 7.6 30.6 9.8/12.5 5.3 [2] 1.0 × 10^{−14} 31.7 < 1.1 × 10^{+1} 6.09 J1838–0537 - 145 3.7 36.8 -/14.8 - 5.4 × 10^{−15} - - - J1838–0549 274 235 5.0 35.0 8.5/15.9 5.1 [2] 1.7 × 10^{−14} 31.9 < 7.9 × 10^{−4} 6.11 J1840–1419 19.4 6597 7.2 29.9 0.6/3.3 0.8 [2] 1.8 × 10^{−15} 29.3 < 2.5 × 10^{−1} 5.63 J1841–0345 194.32 204 4.7 35.4 6.0/1.7 4.8 [2] 8.2 × 10^{−15} 31.5 < 1.2 × 10^{−4} 6.05 J1841–0500 532 912 5.6 33.3 16.4/11.3 7.0 [2] 1.6 × 10^{−15} 31.1 < 7.4 × 10^{−3} 6.08 J1841–0524 289 445 4.5 35.0 8.9/9.0 5.3 [2] 1.3 × 10^{−14} 31.8 < 6.4 × 10^{−4} 6.11 J1842–0359 195.98 1839 7.8 30.5 6.0/10.4 4.7 [2] 3.7 × 10^{−14} 32.1 < 4.3 × 10^{+1} 6.08 J1843–0137 486 669 6.6 32.5 15.0/13.3 7.9 [2] 8.9 × 10^{−14} 33.1 < 4.0 6.26 J1843–0355 797.6 132 6.3 34.2 24.6/2.1 8.8 [2] 4.3 × 10^{−16} 30.8 < 3.2 × 10^{−4} 5.92 J1843–0408 246 781 6.7 32.3 7.6/1.1 5.2 [2] 2.5 × 10^{−15} 31.1 < 5.9 × 10^{−2} 6.02 J1843–1113 59.96 1 9.5 34.8 1.9/11.8 1.7 [2] 3.2 × 10^{−14} 31.2 < 2.7 × 10^{−4} 5.85 J1844–0244 429 507 5.7 33.7 13.2/8.2 6.6 [2] 2.7 × 10^{−14} 32.3 < 4.0 × 10^{−2} 6.17 J1844–0310 836.1 525 5.9 33.4 25.8/11.4 9.2 [2] 6.2 × 10^{−16} 31.0 < 3.3 × 10^{−3} 5.98 J1844–0433 123.158 991 6.6 32.2 3.8/3.8 2.9 [2] 8.3 × 10^{−15} 31.1 < 7.7 × 10^{−2} 5.91 J1845–0434 230.8 486 5.8 33.6 7.1/16.4 5.1 [2] 1.6 × 10^{−14} 31.8 < 1.8 × 10^{−2} 6.07 J1846+0919 - 225 5.6 34.5 -/0.5 - 9.5 × 10^{−16} - - - J1846–0257 237 4476 5.6 31.8 7.3/16.4 5.2 [2] 1.3 × 10^{−16} 29.8 < 8.8 × 10^{−3} 5.78 J1847–0130 667 6707 4.9 32.2 20.6/7.4 8.4 [2] 1.2 × 10^{−14} 32.3 < 1.1 6.18 J1848–0055 1166 274 6.5 33.4 36.0/10.0 14.9 [2] 4.7 × 10^{−15} 32.4 < 9.4 × 10^{−2} 6.19 J1848–0123 159.531 659 6.3 32.9 4.9/2.8 4.4 [1] 2.8 × 10^{−15} 30.9 < 1.1 × 10^{−2} 5.94 J1848–1952 18.23 4308 6.5 31.1 0.6/15.5 0.8 [2] 4.5 × 10^{−15} 29.6 < 3.8 × 10^{−2} 5.58 J1850–0026 947 166 4.8 35.5 29.2/8.5 11.1 [2] 9.0 × 10^{−15} 32.4 < 7.8 × 10^{−4} 6.02 J1850–0031 895 734 7.0 32.1 27.6/12.3 10.5 [2] 2.2 × 10^{−14} 32.8 < 4.6 6.23 J1852+0008 254.9 467 6.1 33.3 7.9/14.7 5.7 [2] 2.8 × 10^{−14} 32.3 < 9.7 × 10^{−2} 6.13 J1852+0031 787 2180 5.6 32.6 24.3/2.5 8.0 [1] 4.9 × 10^{−15} 31.8 < 1.6 × 10^{−1} 6.12 J1852–0118 286 451 6.6 32.9 8.8/4.5 5.9 [2] 8.8 × 10^{−15} 31.9 < 9.6 × 10^{−2} 5.96 J1852–0127 431 428 6.1 33.4 13.3/11.9 7.2 [2] 1.3 × 10^{−14} 32.2 < 5.9 × 10^{−2} 6.16 J1853+1303 30.5701 4 9.9 33.7 0.9/11.3 2.1 [2] 1.0 × 10^{−14} 31.0 < 2.1 × 10^{−3} 5.81 J1856+0102 554 620 6.9 32.3 17.1/1.5 8.5 [2] 1.6 × 10^{−14} 32.4 < 1.3 6.20 J1857+0943 13.300 5 9.7 33.7 0.4/3.7 0.9 [1] 1.4 × 10^{−14} 30.3 < 4.4 × 10^{−4} 5.67 J1901+0124 314.4 318 6.2 33.6 9.7/13.1 5.2 [2] 2.1 × 10^{−13} 33.1 < 3.4 × 10^{−1} 6.20 J1901+0435 1042.6 690 6.1 33.0 32.2/1.2 19.4 [2] 1.7 × 10^{−14} 33.2 < 1.4 6.14 J1901+0510 429 614 5.5 33.7 13.2/1.3 7.3 [2] 4.7 × 10^{−14} 32.8 < 1.1 × 10^{−1} 6.23 J1905+0709 245.34 648 6.3 32.9 7.6/1.9 5.7 [2] 1.5 × 10^{−14} 32.1 < 1.6 × 10^{−1} 6.02 Continued on next page

– 53 –

Table 5 – continued from previous page

PSR DM P log(Age) log(Ė) N_H/N^{LAB}_H d f^{PL}_{0.1–2 keV} log(L^{PL}_{0.1–2 keV}) μ^{PL}_{0.1–2 keV} log(T_∞)

J1905+0902 433.4 218 6.0 34.1 13.4/4.2 9.1 [2] 3.0 × 10^{−15} 31.8 < 4.4 × 10^{−3} 6.06 J1906+0746 217.780 144 5.1 35.4 6.7/6.6 5.4 [2] 6.4 × 10^{−16} 30.6 < 1.6 × 10^{−5} 5.93 J1906+0912 265 775 8.0 31.0 8.2/9.3 6.4 [2] 7.6 × 10^{−15} 31.9 < 6.6 6.09 J1907+0534 524 1138 6.8 31.9 16.2/4.0 9.6 [2] 4.5 × 10^{−15} 32.0 < 1.1 6.09 J1907+0918 357.9 226 4.6 35.5 11.0/10.0 7.8 [2] 1.4 × 10^{−15} 31.3 < 6.4 × 10^{−5} 6.08 J1908+0734 11.104 212 6.6 33.5 0.3/1.2 1.0 [2] 4.3 × 10^{−14} 31.0 < 2.9 × 10^{−3} 5.77 J1908+0839 512.1 185 6.1 34.2 15.8/1.9 9.3 [2] 1.2 × 10^{−14} 32.4 < 1.6 × 10^{−2} 6.10 J1908+0916 249.8 830 8.1 30.8 7.7/3.1 5.9 [2] 3.7 × 10^{−14} 32.5 < 4.6 × 10^{+1} 6.12 J1911+1758 48.971 460 8.7 30.7 1.5/8.6 2.8 [2] 6.2 × 10^{−15} 31.0 < 2.1 5.90 J1913+0446 109.1 1616 5.0 33.4 3.4/9.1 3.8 [2] 1.2 × 10^{−14} 31.6 < 1.6 × 10^{−2} 5.96 J1913+1011 178.8 35 5.2 36.5 5.5/1.1 4.8 [2] 3.8 × 10^{−15} 31.3 < 6.9 × 10^{−6} 6.00 J1921+2153 12.455 1337 7.2 31.3 0.4/0.6 1.1 [2] 4.8 × 10^{−15} 30.1 < 6.1 × 10^{−2} 5.63 J1926–1314 40.83 4864 6.3 31.1 1.3/6.4 1.5 [2] 2.4 × 10^{−15} 30.0 < 7.2 × 10^{−2} 5.71 J1928+1746 176.68 68 4.9 36.2 5.5/0.6 5.8 [2] 4.3 × 10^{−15} 31.5 < 2.1 × 10^{−5} 6.04 J1933+2421 106.03 813 6.2 32.8 3.3/0.2 4.6 [2] 4.7 × 10^{−15} 31.4 < 3.9 × 10^{−2} 5.97 J1933–6211 11.499 3 10.2 33.5 0.4/0.5 0.5 [2] 2.2 × 10^{−14} 30.5 < 1.0 × 10^{−3} 5.64 J1946+3417 - 3 10.1 33.7 3.4/7.3 6.4 [3] 1.1 × 10^{−14} 32.1 < 2.6 × 10^{−2} 5.92 J1954+2836 - 92 4.8 36.0 -/6.4 - 4.4 × 10^{−14} - - - J1954+2923 7.932 426 9.6 29.9 0.2/6.4 0.7 [2] 3.3 × 10^{−15} 29.6 < 4.3 × 10^{−1} 5.57 J2005+3547 401.6 615 7.5 31.7 12.4/6.4 30.0 [3] 3.1 × 10^{−15} 32.9 < 1.6 × 10^{+1} 6.06 J2007+2722 127.0 24 8.6 33.4 3.9/6.4 5.4 [2] 3.5 × 10^{−16} 30.4 < 9.3 × 10^{−4} 5.87 J2043+1711 20.70987 2 9.9 34.2 0.6/6.4 1.8 [2] 1.6 × 10^{−14} 31.1 < 7.7 × 10^{−4} 5.91 J2048+2255 68.8 283 8.5 31.4 2.1/6.4 4.0 [2] 7.0 × 10^{−15} 31.4 < 1.0 5.95 J2129–5721 31.853 3 9.5 34.2 1.0/6.4 0.4 [1] 7.7 × 10^{−15} 29.5 < 2.1 × 10^{−5} 5.64 J2144–3933 3.35 8509 8.4 28.5 0.10/6.4 0.2 [1] 3.3 × 10^{−15} 28.1 < 4.0 × 10^{−1} 5.34 J2156+2618 48.8 498 8.7 30.7 1.5/6.4 3.2 [2] 5.8 × 10^{−15} 31.1 < 3.0 5.89 J2222+2923 49.38 281 8.9 31.0 1.5/6.4 3.3 [2] 6.2 × 10^{−15} 31.2 < 1.4 5.91 J2235+1506 18.09 59 9.8 31.5 0.6/6.4 1.1 [2] 5.3 × 10^{−15} 30.2 < 4.9 × 10^{−2} 5.72 J2238+5903 - 162 4.4 35.9 -/6.4 - 4.4 × 10^{−14} - - - J2307+2225 7.08 535 9.0 30.3 0.2/6.4 0.6 [2] 5.1 × 10^{−15} 29.8 < 2.7 × 10^{−1} 5.59

References. [1] Verbiest et al. (2012); [2] Cordes & Lazio (2002); [3] Taylor & Cordes (1993).

– 54 –

Table 2. Pulsars and coordinates of their potential X-ray counterparts along with their positional discrepancy, chance probability for a false detection, signal-to-noise and X-ray to visual flux ratio.

PSR RA DEC Δ S/N P_{coin} log( f_X / f_V ) hh:mm:ss dd:mm:ss arcsec σ^{(α)}_G

J0101–6422 01 : 01 : 11.11 ± 0.06 −64 : 22 : 30.4 ± 0.4 0.2 ± 0.4 15.9 5.5 × 10^{−6} > 0.2 J0117+5914 01 : 17 : 38.5 ± 0.3 +59 : 14 : 38 ± 2 1.6 ± 2.1 16.9 1.3 × 10^{−4} > 0.2 J0337+1715 03 : 37 : 43.7 ± 0.1 +17 : 15 : 13 ± 2 1.7 ± 2.1 33.0 3.0 × 10^{−4} > −1.1 J0543+2329 05 : 43 : 09.5 ± 0.2 +23 : 29 : 07 ± 2 3.4 ± 4.8 5.9 2.8 × 10^{−4} > −0.4 J0922+0638 09 : 22 : 14.16 ± 0.14 +06 : 38 : 24 ± 2 2.4 ± 2.1 17.8 6.3 × 10^{−4} > −0.7 J1044–5737 10 : 44 : 32.87 ± 0.05 −57 : 37 : 19.1 ± 0.4 0.6 ± 0.9 12.6 5.9 × 10^{−5} > 0.1 J1112–6103 11 : 12 : 14.87 ± 0.03 −61 : 03 : 30.7 ± 0.2 0.6 ± 0.5 43.0 4.1 × 10^{−4} > 0.0 J1224–6407 12 : 24 : 21.8 ± 0.3 −64 : 07 : 55 ± 2 2.9 ± 2.3 6.1 2.3 × 10^{−4} > −0.3 J1301–6310 13 : 01 : 28.2 ± 0.3 −63 : 10 : 42 ± 2 1.9 ± 2.3 10.4 2.0 × 10^{−4} > −0.2 J1341–6220 13 : 41 : 43.1 ± 0.3 −62 : 20 : 18 ± 2 4.2 ± 2.4 6.4 3.4 × 10^{−3} > −0.8 J1600–3053 16 : 00 : 51.8 ± 0.2 −30 : 53 : 49 ± 2 0.8 ± 2.4 5.8 3.0 × 10^{−5} > −0.6 J1658–5324 16 : 58 : 39.35 ± 0.05 −53 : 24 : 06.8 ± 0.3 0.2 ± 0.3 9.6 6.2 × 10^{−6} > −0.1 J1730–2304 17 : 30 : 21.5 ± 0.2 −23 : 04 : 30 ± 2 2.7 ± 2.1 24.4 5.5 × 10^{−4} > −0.2 J1731–1847 17 : 31 : 17.7 ± 0.2 −18 : 47 : 31 ± 2 1.2 ± 2.7 5.1 1.1 × 10^{−4} > −0.6 J1816+4510 18 : 16 : 35.90 ± 0.03 +45 : 10 : 33.9 ± 0.2 0.3 ± 0.3 6.4 2.9 × 10^{−5} > −1.9 J1825–0935 18 : 25 : 30.7 ± 0.2 −09 : 35 : 23 ± 2 1.5 ± 2.3 6.7 2.4 × 10^{−5} > −1.1 J1832–0836 18 : 32 : 27.7 ± 0.2 −08 : 36 : 54 ± 2 1.8 ± 2.6 5.9 1.9 × 10^{−3} > −0.8 J1911–1114 19 : 11 : 49.5 ± 0.2 −11 : 14 : 23 ± 2 3.1 ± 2.8 6.5 8.7 × 10^{−4} > −0.8 J2017+0603 20 : 17 : 22.70 ± 0.01 +06 : 03 : 05.4 ± 0.2 0.2 ± 0.2 8.7 3.6 × 10^{−6} > −0.3 J2222–0137 22 : 22 : 05.95 ± 0.01 −01 : 37 : 15.7 ± 0.2 0.1 ± 0.2 8.9 2.0 × 10^{−5} > −0.7

ασ_G = 1 + � c_{bg} + 0.75, where c_{bg} are the background counts.

– 55 –

Table 3. Spectral parameters of model spectra fitted to potential pulsar counterparts which were detected with sufficient photon statistics to allow for a brief spectral analysis.

PSR model χ^2/d.o.f. N_H Γ/T_{emit} Norm^β R_{emit} 10^{22} cm^{−2} -/keV km

J0117+5914 BB^α 12.2/13 < 0.48 0.18^{+0.04}_{−0.03} 3.7^{+1.3}_{−1.1} × 10^{−7} 0.4 ± 0.2 PL^α 13.2/13 0.5^{+0.7}_{−0.5} 3.3 ± 0.5 (8 ± 2) × 10^{−6} - J0922+0638 PL 4.0/8 < 0.12 2.3^{+0.8}_{−0.4} 1.9^{+0.9}_{−0.4} × 10^{−6} - J1301-6310 BB^α 23.8/16 < 0.09 0.25^{+0.08}_{−0.07} 9^{+4}_{−2} × 10^{−8} 0.08^{+0.04}_{−0.03} PL^α 16.4/16 < 0.39 3.4^{+0.8}_{−0.6} (3.2 ± 0.7) × 10^{−6} - J1341-6220 BB^α 12.8/23 < 2.2 1.2^{+1.6}_{−0.4} 3^{+4}_{−2} × 10^{−7} 0.04^{+0.06}_{−0.02} PL^α 13.6/23 4 ± 3 1.1 ± 0.7 1.5^{+2.1}_{−1.0} × 10^{−6} - J1730-2304 BB^α 12.2/18 < 0.53 0.26^{+0.06}_{−0.21} 1.5^{+0.4}_{−0.7} × 10^{−7} 0.026^{+0.009}_{−0.023} PL^α 17.0/17 < 0.47 2.7^{+0.9}_{−0.5} 3.3^{+0.9}_{−1.2} × 10^{−6} - J1112-6103 BB 12.7/11 0^{+0.5} 1.18^{+0.17}_{−0.18} 6.5^{+1.3}_{−1.1} × 10^{−7} 0.157^{+0.028}_{−0.028} PL 9.7/11 1.2^{+1.1}_{−1.0} 1.5 ± 0.7 1.3^{+2.3}_{−0.8} × 10^{−5} -

αSpectral parameters were obtained with N_H fixed to DM based value and we added the result of N_H before fixing.

βPL: photons keV^{−1} cm^{−2} s^{−1} at 1 keV; BB: L[10^{39}erg/s]/(D[10kpc])^2, where L is the source luminosity and D the distance to the source.

– 56 –

Table 4. Essential radio pulsar parameters along with the flux, luminosity and X-ray efficiency of the potential X-ray counterparts for thermal (BB) and/or non-thermal (PL) emission.

PSR DM P log(Age) log(Ė) n_H d model f_{0.1–2 keV} L_{0.1–2 keV} μ_{0.1–2 keV} pc cm^{−3} ms yrs erg s^{−1} 10^{21} cm^{−2} kpc erg s^{−1} cm^{−2} erg s^{−1}

J0117+5914 49.423 101 5.4 35.3 1.5 2.2 BB (3.1 ± 0.6) × 10^{−14} (1.8 ± 0.4) × 10^{31} (8 ± 2) × 10^{−5} PL 1.8^{+1.4}_{−0.8} × 10^{−13} 1.1^{+0.9}_{−0.4} × 10^{32} (5 ± 2) × 10^{−4} J0337+1715 - 2 9.4 34.5 0.7 1.4 PL^α (2.17 ± 0.15) × 10^{−14} 5.1^{+0.3}_{−0.4} × 10^{30} (1.49 ± 0.10) × 10^{−4} J0543+2329 77.7115 245 5.4 34.6 2.4 2.1 PL^α (8 ± 2) × 10^{−15} (4.1 ± 1.1) × 10^{30} (10 ± 3) × 10^{−5} J0922+0638 27.271 430 5.7 33.8 0.8 1.1 PL 1.2^{+1.4}_{−0.6} × 10^{−14} 1.7^{+2.0}_{−0.9} × 10^{30} (2.5 ± 1.4) × 10^{−4} J1224-6407 97.47 216 5.8 34.3 3.0 4.0 PL^α (10 ± 3) × 10^{−15} (1.9 ± 0.5) × 10^{31} (10 ± 3) × 10^{−4} J1301-6310 86.1 663 5.3 33.9 2.7 1.9 BB (7.4 ± 1.4) × 10^{−15} (3.0 ± 0.6) × 10^{30} (4.0 ± 0.8) × 10^{−4} PL 9^{+7}_{−4} × 10^{−14} 3^{+3}_{−2} × 10^{31} (5 ± 2) × 10^{−3} J1341-6220 717.3 193 4.1 36.1 22.1 11.1 PL 5^{+4}_{−3} × 10^{−15} 7^{+6}_{−4} × 10^{31} (5 ± 3) × 10^{−5} J1600-3053 52.3262 3 9.8 33.9 1.6 2.4 PL^α (6 ± 2) × 10^{−15} (4.1 ± 1.1) × 10^{30} (5.1 ± 1.3) × 10^{−4} J1730-2304 9.617 8 9.8 33.2 0.3 0.5 BB 1.4^{+0.1}_{−0.2} × 10^{−14} 4.9^{+0.4}_{−0.6} × 10^{29} (3.3 ± 0.4) × 10^{−4} PL 3.5^{+1.8}_{−1.1} × 10^{−14} 1.2^{+0.6}_{−0.4} × 10^{30} (8 ± 2) × 10^{−4} J1731-1847 106.56 2 9.2 34.9 3.3 2.6 PL^α (6 ± 2) × 10^{−15} (4.4 ± 1.3) × 10^{30} (6 ± 2) × 10^{−5} J1825-0935 19.38 769 5.4 33.7 0.6 0.9 PL^α (1.7 ± 0.4) × 10^{−14} (1.6 ± 0.4) × 10^{30} (3.4 ± 0.8) × 10^{−4} J1832-0836 28.18 2 9.7 34.2 0.9 1.1 PL^α (3.8 ± 1.0) × 10^{−15} (5.6 ± 1.5) × 10^{29} (3.3 ± 0.9) × 10^{−5} J1911-1114 30.9750 3 9.6 34.1 1.0 1.2 PL^α 3.7^{+0.9}_{−0.8} × 10^{−15} 6.5^{+1.6}_{−1.5} × 10^{29} (5.6 ± 1.3) × 10^{−5} J0101-6422 11.926 2 9.9 34.1 0.4 0.6 PL^α (3.0 ± 0.5) × 10^{−14} (1.1 ± 0.2) × 10^{30} (9 ± 2) × 10^{−5} J1044-5737 - 139 4.6 35.9 1.0 - PL^α 2.4^{+0.5}_{−0.4} × 10^{−14} - - J1112-6103 599.1 64 4.5 36.7 18.5 12.3 PL 4^{+3}_{−2} × 10^{−14} 6^{+5}_{−4} × 10^{32} (1.4 ± 0.9) × 10^{−4} J1658-5324 30.8 2 9.5 34.5 1.0 0.9 PL^α (1.6 ± 0.3) × 10^{−14} (1.7 ± 0.3) × 10^{30} (5.6 ± 1.1) × 10^{−5} J1816+4510 38.8 3 9.1 34.7 1.2 2.4 PL^α (3.1 ± 0.8) × 10^{−15} (2.1 ± 0.5) × 10^{30} (4.1 ± 1.1) × 10^{−5} J2017+0603 23.918 2 9.7 34.1 0.7 1.6 PL^α (1.1 ± 0.3) × 10^{−14} (3.3 ± 0.8) × 10^{30} (2.4 ± 0.6) × 10^{−4} J2222-0137 3.27511 32 9.9 31.8 0.10 0.3 PL^α 4.5^{+1.0}_{−0.9} × 10^{−15} (5.2 ± 1.1) × 10^{28} (8 ± 2) × 10^{−4}

αFlux derived using PIMMS with a power law model and a photon index of 1.7.

– 57 –

Table 6. The pulsars with an X-ray efficiency upper limit below 5 × 10^{−5}.

PSR^Ė_{4πd2} log(Ė) μ^{PL}_{0.1–2 keV} d log(τ) B_{surf} erg s^{−1} cm^{−2} erg s^{−1} kpc yrs G

J0940–5428 1.9 × 10^{−09} 36.3 2.2 × 10^{−6} 3.0 4.6 1.7 × 10^{+12} J1300+1240 4.4 × 10^{−10} 34.3 3.5 × 10^{−6} 0.6 8.9 8.5 × 10^{+08} J1105–6107 8.3 × 10^{−10} 36.4 6.0 × 10^{−6} 5.0 4.8 1.0 × 10^{+12} J1913+1011 1.1 × 10^{−09} 36.5 6.9 × 10^{−6} 4.8 5.2 3.5 × 10^{+11} J1730–3350 8.2 × 10^{−10} 36.1 9.7 × 10^{−6} 3.5 4.4 3.5 × 10^{+12} J1906+0746 7.7 × 10^{−11} 35.4 1.6 × 10^{−5} 5.4 5.1 1.7 × 10^{+12} J2129–5721 8.3 × 10^{−10} 34.2 2.1 × 10^{−5} 0.4 9.5 2.8 × 10^{+08} J1928+1746 3.9 × 10^{−10} 36.2 2.1 × 10^{−5} 5.8 4.9 9.6 × 10^{+11} J1835–1106 1.9 × 10^{−10} 35.3 3.5 × 10^{−5} 2.8 5.1 1.9 × 10^{+12} J1702–4310 2.0 × 10^{−10} 35.8 4.5 × 10^{−5} 5.2 4.2 7.4 × 10^{+12}

Table 7. The pulsars with the lowest 3σ temperature upper limit (indicated by a black arrow in the upper panel of Figure 5). Top: Young neutron stars with τ ≤ 5 × 10^4 yrs. Bottom: Neutron stars with τ > 5 × 10^4 yrs.

PSR log(age) T_∞ yrs 10^5 K

J0940–5428 4.63 7.3 J1524–5706 4.70 9.8 J1730–3350 4.42 11.0 J1637–4642 4.62 12.1 J1907+0918 4.58 12.1 J1702–4310 4.23 12.3 J1413–6141 4.13 12.6 J1841–0524 4.48 12.8 J1726–3530 4.16 14.1 J1837–0604 4.53 15.2 J1646–4346 4.51 15.6 J0157+6212 5.29 5.5 J1105–6107 4.80 5.7 J1457–5902 5.70 5.8 J1846–0257 5.65 6.0 J0742–2822 5.20 7.8 J1906+0746 5.05 8.4 J1913+0446 4.96 9.2 J1801–2304 4.77 9.6 J1850–0026 4.83 10.6 J1928+1746 4.92 10.9 J1055–6028 4.73 11.1 J1828–1101 4.89 11.1 J1841–0345 4.75 11.3 J1806–2125 4.80 11.7