arXiv:1509.03724v2 [hep-ex] 8 Dec 2015

Search for double-beta decay of^{136}Xe to excited states of^{136}Ba with the KamLAND-Zen experiment

K. Asakura^a, A. Gando^{a,∗}, Y. Gando^a, T. Hachiya^a, S. Hayashida^a, H. Ikeda^a, K. Inoue^{a,b}, K. Ishidoshiro^a, T. Ishikawa^a, S. Ishio^a, M. Koga^{a,b}, S. Matsuda^a, T. Mitsui^a, D. Motoki^a, K. Nakamura^{a,b}, S. Obara^a, M. Otani^{a,1}, T. Oura^a, I. Shimizu^a, Y. Shirahata^a, J. Shirai^a, A. Suzuki^a, H. Tachibana^a, K. Tamae^a, K. Ueshima^a, H. Watanabe^a, B.D. Xu^{a,2}, H. Yoshida^{a,3}, A. Kozlov^b, Y. Takemoto^b, S. Yoshida^c, K. Fushimi^d, T.I. Banks^e, B.E. Berger^{e,b}, B.K. Fujikawa^{e,b}, T. O’Donnell^e, L.A.

Winslow^f, Y. Efremenko^{g,h,b}, H.J. Karwowski^i, D.M. Markoff^i, W. Tornow^{i,b}, J.A. Detwiler^{j,b}, S. Enomoto^{j,b}, M.P. Decowski^{k,b}

aResearch Center for Neutrino Science, Tohoku University, Sendai 980-8578, Japan bKavli Institute for the Physics and Mathematics of the Universe (WPI), The University of Tokyo Institutes for Advanced Study, The University of Tokyo, Kashiwa, Chiba 277-8583, Japan cGraduate School of Science, Osaka University, Toyonaka, Osaka 560-0043, Japan dFaculty of Integrated Arts and Science, University of Tokushima, Tokushima, 770-8502, Japan ePhysics Department, University of California, Berkeley, and Lawrence Berkeley National Laboratory, Berkeley, California 94720, USA fMassachusetts Institute of Technology, Cambridge, Massachusetts 02139, USA gDepartment of Physics and Astronomy, University of Tennessee, Knoxville, Tennessee 37996, USA hNational Research Nuclear University, Moscow, Russia iTriangle Universities Nuclear Laboratory, Durham, North Carolina 27708, USA and Physics Departments at Duke University, North Carolina Central University, and the University of North Carolina at Chapel Hill jCenter for Experimental Nuclear Physics and Astrophysics, University of Washington, Seattle, Washington 98195, USA

∗Corresponding author.

Email address: azusa@awa.tohoku.ac.jp (A. Gando) 1Present address: High Energy Accelerator Research Organization (KEK), Tsukuba, Ibaraki, Japan

2Present address: Kavli Institute for the Physics and Mathematics of the Universe (WPI), The University of Tokyo Institutes for Advanced Study, The University of Tokyo, Kashiwa, Chiba 277-8583, Japan

3Present address: Graduate School of Science, Osaka University, Toyonaka, Osaka 560- 0043, Japan

Preprint submitted to Nuclear Physics A January 14, 2018 kNikhef and the University of Amsterdam, Science Park, Amsterdam, the Netherlands

Abstract

A search for double-beta decays of^{136}Xe to excited states of^{136}Ba has been performed with the first phase data set of the KamLAND-Zen experiment. The 0^+_1 , 2^+_1 and 2^+_2 transitions of 0νββ decay were evaluated in an exposure of 89.5 kg·yr of^{136}Xe, while the same transitions of 2νββ decay were evaluated in an exposure of 61.8 kg·yr. No excess over background was found for all decay modes. The lower half-life limits of the 2^+_1 state transitions of 0νββ and 2νββ decay were improved to T^{0ν}_{1/2}(0^+ → 2^+_1 ) > 2.6 × 10^{25} yr and T^{2ν}_{1/2}(0^+ → 2^+_1 ) > 4.6 × 10^{23} yr (90% C.L.), respectively. We report on the first experimental lower half-life limits for the transitions to the 0^+_1 state of 136Xe for 0νββ and 2νββ decay. They are T^{0ν}_{1/2}(0^+ → 0^+_1 ) > 2.4 × 10^{25} yr and T^{2ν}_{1/2}(0^+ → 0^+_1 ) > 8.3 × 10^{23} yr (90% C.L.). The transitions to the 2^+_2 states are also evaluated for the first time to be T^{0ν}_{1/2}(0^+ → 2^+_2 ) > 2.6 × 10^{25} yr and T^{2ν}_{1/2}(0^+ → 2^+_2 ) > 9.0 × 10^{23} yr (90% C.L.). These results are compared to recent theoretical predictions.

Keywords: Double-beta decay,^{136}Xe, Excited state

1. Introduction

Double-beta decay is a rare nuclear process with fundamental connections to particle physics, nuclear physics and possibly cosmology. Double-beta decay can be a leading process in the decay of a nucleus if the first order decay is energetically forbidden or highly suppressed. Two neutrino double-beta (2νββ) decay, (A,Z) → (A, Z+2) + 2e^− + 2ν̄_e, is an established second order process in the standard model of the electroweak interaction. 2νββ decay to the ground state has been observed in eleven nuclei with half-lives in the range from 10^{19} to 10^{24} yr [1, 2, 3]. The 2νββ transition to the 0^+_1 excited state of the daughter nucleus was also measured for two nuclei (^{100}Mo and^{150}Nd) [1, 4], although it is strongly suppressed in comparison with the transition to the ground state due to the smaller transition energies. The measured half-life of 2νββ decay can experimentally constrain the relevant nuclear matrix element (NME). Measurement of different transitions provides useful information for the development of theoretical schemes to calculate NMEs. The understanding of 2νββ decay NMEs is important for investigations of nuclear structure and of nuclear interactions associated with neutrinoless double-beta (0νββ) decay [5].

Neutrino oscillation experiments demonstrated that neutrinos have nonzero mass and therefore the question arises whether neutrinos are Majorana or Dirac particles. 0νββ decay is possible if the neutrino is a massive Majorana particle [6]. Various experimental efforts exist to search for this lepton number violating process since it implies physics beyond the standard model. In addition, if the decay is mediated by light Majorana neutrino exchange, the 0νββ decay rate can translate into an effective neutrino mass, ⟨m_{ββ}⟩ ≡ |Σ_iU^2_{ei}m_{νi} |, via the NME and a phase-space factor, where U_{ei} is the corresponding element of the Pontecorvo-Maki-Nakagawa-Sakata mixing matrix. It would constrain the absolute mass scale, and could provide information on the neutrino mass ordering. To obtain the effective neutrino mass, detailed knowledge of the NME for 0νββ decay is essential. The decay can proceed to the ground state as well as through transitions to excited states. Studies of these transitions provide additional information on the double-beta decay and associated NME calculations. Once 0νββ decay is observed, the measurement of the branching ratios of the 0νββ decay to the ground and excited states allow the possibility to distinguish between different 0νββ mechanisms, such as those mediated through light or heavy Majorana neutrinos, or the R-parity breaking mechanism [7].

In this article, we report limits on the double-beta decay of^{136}Xe to the 0^+_1 , 2^+_1 and 2^+_2 excited states of^{136}Ba for both the 2νββ and 0νββ decay modes. These limits were obtained with the first phase data set of the KamLAND-Zen (KamLAND ZEro-Neutrino double-beta decay) experiment. The decay scheme of^{136}Xe to^{136}Ba is shown in Fig. 1. The Q value of^{136}Xe double-beta decay is 2458 keV [8].

2. The KamLAND-Zen experiment

The KamLAND-Zen experiment is a modification of the existing neutrino detector KamLAND [10] located in the Kamioka mine, Gifu, Japan. A schematic diagram of the detector is shown in Fig. 2. The initial phase of the KamLAND-Zen experiment uses 13 tons of Xe-loaded liquid scintillator (Xe-LS) contained in a 3.08-m-diameter spherical inner balloon (IB), suspended at the center of the detector, as the double-beta decay source

Figure 1: Decay scheme of^{136}Xe to^{136}Ba. The energy levels and the branching ratios for the de-excitations are taken from Ref. [9]. Only the investigated 0^+ and 2^+ levels are shown. In the 0^+_1 → 0^+ transition, conversion electron emission is dominant.

Figure 2: Schematic diagram of the KamLAND-Zen detector.

and detection medium. The IB is constructed from heat-welded 25-μm-thick transparent clean nylon film. Outside of the IB is 1 kton of liquid scintillator (LS), which acts as an active shield for external γ’s and as a detector for internal radiation from the Xe-LS and/or IB. The LS is contained in a 13-m-diameter spherical outer balloon, made of 135-μm-thick nylon/EVOH^1 composite film. The density difference between Xe-LS and KamLAND LS is carefully controlled within 0.04% to reduce the load on the IB. The Xe-LS consists of 82% of decane and 18% pseudocumene (1,2,4-trimethylbenzene) by volume, 2.7 g/liter of the fluor PPO (2,5-diphenyloxazole), and 2.44 or 2.48% by weight of enriched xenon gas for data set 1 and 2, respectively (see Section 3). The isotopic abundances in the enriched xenon were measured by a residual gas analyzer to be (90.93±0.05)%^{136}Xe and (8.89±0.01)%^{134}Xe; the amount of other xenon isotopes is negligible. The scintillation light due to energy deposits in the detector is monitored by 1325 17-inch and 554 20- inch photomultiplier tubes (PMTs) mounted on the 18-m-diameter spherical stainless-steel tank. The total photo-cathode coverage is 34%. The stainlesssteel tank is surrounded by the outer detector (OD) filled with 3.2 kton of pure water. It shields the LS from external radiation and acts as Cherenkov veto for identifying cosmic ray muons using 225 20-inch PMTs.

The data-acquisition system is triggered when the number of 17-inch PMTs hit is more than 70 within a 125 nsec window, the so-called primary trigger. This corresponds to a threshold of ∼0.4 MeV. After each primary trigger, the threshold is lowered to ∼0.25 MeV for 1 ms to study sequential decays. The event energy (visible energy) and position are reconstructed based on the photon hit-time and charge distribution. The energy response is calibrated with three kinds of sources; (i)^{208}Tl 2.614 MeV γ’s from an artificial ThO_2-W calibration source [11], (ii) 2.225 MeV γ’s from spallation neutrons capturing on protons, and (iii)^{214}Bi (β + γ) from^{222}Rn (τ = 5.5 days) introduced during the initial filling of the liquid scintillator. The energy resolution is estimated to be σ = (6.6 ± 0.3)%/ √ E(MeV) from the energy distribution of (i). The systematic variation of the energy reconstruction with position or time is monitored by (ii), and is less than 1.0%. Energy nonlinearity effects caused by scintillator quenching and Cherenkov light production are constrained by the gamma peak of (i) and the spectral shape of (iii). The vertex resolution is estimated from the radial distribution

1Ethylene vinyl alcohol copolymer

of radioactive contaminants to be σ ∼15 cm/ √ E(MeV) [11].

In KamLAND-Zen, the scintillation light of two coincident electrons generated from^{136}Xe double-beta decay cannot be separated, only their summed energy is observed. 2νββ decay to the ground state has a continuous energy spectrum spanning from zero to the Q-value of^{136}Xe. Decays to the excited states have similar spectra, but they begin at different values of visible energy spectra depending on the energies of the de-excitation emissions. In contrast to 2νββ decay, 0νββ decay produces a mono-energetic peak at the Q-value with width determined by the energy resolution. The peak position is shifted for different decay modes since quenching effects of the liquid scintillator depend on the identities of the emitted particles (electron or γ ray) and their energies. Fig. 3 shows the predicted energy spectra of^{136}Xe double-beta decay to various excited states as well as to the ground state. The spectra have been convolved with the KamLAND-Zen detector response function, including energy resolution and particle-dependent energy scale non-linearities.

3. Data sets and event selection

The analysis is based on data collected from October 12, 2011 to June 14, 2012, the same period used in Ref. [12]. This corresponds to the first phase data set. The data set is divided into two sets separated by detector maintenance work done in February 2012 aiming to remove radioactive impurities. In the earlier analysis [12],^{110m}Ag was identified as a likely background in the 0νββ decay search. During the maintenance, a total of 37 m^3, or 2.3 full volume exchanges, of Xe-LS were passed through a 50 nm filter. The Xe-LS was circulated with two Teflon tubes placed at the bottom of a corrugated tube and the IB, which was inserted just before the filtration started and remained there until the second data taking period finished. During the filtration, 4.3 ± 0.5 kg of Xe is added to Xe-LS. The data-set period before the filtration is denoted as DS-1 and the data-set period after filtration is denoted as DS-2.

Double-beta decay candidate events are selected by performing the following series of cuts: (i) The reconstructed vertices of events are within the fiducial volume (FV) defined for each data set and transition. (ii) Muons and post-muon events within a time window of 2 msec are rejected. Muons are identified by events which leave more than 10,000 p.e. in the LS or produce more than 5 OD hits. (iii) Time and space correlated events which occurred

Figure 3: Visible energy spectra of^{136}Xe double-beta decay to various excited states of 136Ba. The upper figure shows 2νββ decays and the lower figure shows 0νββ decays. The 2νββ and 0νββ decays to the ground state are also shown for reference. All decays are shown on a linear scale.

within 3 msec and 300 cm are eliminated to avoid backgrounds from sequential Bi-Po decays. The dead time introduced by this coincidence cut is less than 0.1%. (iv) A background mainly from reactor ν_e’s is eliminated by vetoing delayed coincidence of positrons (prompt signals) and neutron capture γ’s (delayed signals). (v) After applying the above selection criteria, any remaining noise events are rejected by a vertex-time-charge (VTQ) test. This test compares the observed charge and hit-time distribution with the expectation based on the reconstructed vertex, filtering unphysical events. This cut reduces the selection efficiency by less than 0.1%.

The 2νββ and 0νββ analyses use different fiducial volume cuts to optimize the signal-to-background for the given energy region of interest. For 2νββ decay, the main background is^{134}Cs (see Section 4), predominantly found on the surface of the IB, so a reduction of the fiducial volume suppresses this background. On the other hand, the main backgrounds for the 0νββ decay analysis are^{214}Bi on the IB and^{110m}Ag in the Xe-LS. For DS-1, 1.2- m-radius and 1.35-m-radius cuts are found to be optimal for the 2νββ and 0νββ decay analysis, respectively. For DS-2, the fiducial radii are the same as DS-1, but additional cuts were made to avoid backgrounds from Teflon tubes inserted into the IB between DS-1 and DS-2. The additional cuts are a 0.2- m-radius cylindrical cut along the central vertical axis and a 1.2-m-radius spherical cut around the stainless steel inlet tip of the Teflon tube. The total livetime after removing periods of high background rate due to^{222}Rn daughters introduced during filtration is 213.4 days. The total^{136}Xe exposure is 61.8 kg·yr and 89.5 kg·yr for the search of 2νββ and 0νββ decays to the excited states, respectively. The livetime, Xe concentration, fiducial Xe-LS mass,^{136}Xe mass, and^{136}Xe exposure for each data set are summarized in Table 1.

4. Background estimation

The main backgrounds to the double-beta decay study can be divided into three categories: (i) radioactive impurities from and external to the IB, (ii) those within the Xe-LS and (iii) spallation products generated by cosmicray muons. As reported in Ref. [11], the external background is dominated by^{134}Cs (β + γ^′s) in the energy region 1.2 < E < 2.0 MeV (the 2νββ energy window), most likely due to balloon film contamination by fallout from the Fukushima I reactor accident in March, 2011. The existence of^{137}Cs (0.662 MeV γ) on the IB surface is also confirmed. The IB was fabricated 100

Table 1: Data sets used for the analysis of^{136}Xe double-beta decay to excited states. R_{1.20m} (R_{1.35m}) refers to the R < 1.20 m (R < 1.35 m) cut. R^∗_{1.20m} (R^∗_{1.35m}) refers to the radius cut and the Teflon tube cuts that were introduced to avoid potential backgrounds due to that tube.

DS-1 DS-2 Total livetime (days) 112.3 101.1 213.4 Xe concentration (% by weight) 2.44 2.48 - 2νββ decay R_{1.20m} R^∗_{1.20m} fiducial Xe-LS mass (ton) 5.65 3.73 - 136Xe mass (kg) 125 84.0 - 136Xe exposure (kg·yr) 38.6 23.2 61.8 0νββ decay R_{1.35m} R^∗_{1.35m} fiducial Xe-LS mass (ton) 8.04 5.55 - 136Xe mass (kg) 179 125 - 136Xe exposure (kg·yr) 54.9 34.6 89.5

km from the Fukushima reactor site a few months after the accident. In the energy region 2.2 < E < 3.0 MeV (the 0νββ energy window), the dominant external contaminant is^{214}Bi (β + γ’s) from the^{238}U chain.

The main radioactivity in the Xe-LS comes from the U and Th decay chains. Their contaminations are investigated using^{214}Bi-^{214}Po (β-α) and 212Bi-^{212}Po (β-α) decays. Assuming secular equilibrium, the^{238}U and^{232}Th concentrations are estimated to be (1.3 ± 0.2) × 10^{−16} g/g and (1.8 ± 0.1) × 10^{−15} g/g, respectively [12]. To allow for the possibility of decay chain nonequilibrium, however, the Bi-Po measurements are used to constrain only the rates for the^{222}Rn-^{210}Pb sub-chain of the^{238}U series and the^{228}Th-^{208}Pb subchain of the^{232}Th series, while other background rates in both series are left unconstrained.

Neutrons produced by muons are captured on the main components of the liquid scintillator, protons (2.225 MeV γ) and^{12}C (4.946 MeV). In addition, neutrons may be captured on^{136}Xe (4.026 MeV) or^{134}Xe (6.364 MeV). The expected neutron capture fractions on protons,^{12}C,^{136}Xe and^{134}Xe are 0.994, 0.006, 9.5 × 10^{−4}, and 9.4 × 10^{−5}, respectively. The neutron capture product^{137}Xe (β^−, τ = 5.5 min, Q = 4.17 MeV) may be produced by^{136}Xe as a potential background for 0νββ decay, but its expected rate is negligible. Event rates of carbon spallation products at KamLAND-Zen were obtained in Ref. [10]. They are 1.11 ± 0.18 (ton·day)^{−1} and (2.11 ± 0.18) × 10^{−2} (ton·day)^{−1} for^{11}C (β^+, τ = 29.4 min, Q = 1.98 MeV) and^{10}C (β^+, τ = 27.8 s, Q = 3.65 MeV), respectively. For the muon induced products from xenon, we have no past experimental data. Spallation products from 136Xe whose half-live are less than 100 sec, are studied with the present data. This is done by searching for time-correlations of events within a distance of 1.50 m from track-reconstructed muons depositing more than ∼3 GeV of energy (so-called showering muons). Events in a time window of 0-500 sec after muon passage are assumed to be potentially the decays of muon spallation products, while events in a time window of 500-5000 sec are used to estimate the accidental background. No correlated events are found in the energy range 1.2 < E < 2.0 MeV and 2.2 < E < 3.0 MeV.

In addition to the three categories of background, a peak was found in the 0νββ energy window. As extensively discussed in Ref. [11, 12], we concluded that it is most likely due to a background from^{110m}Ag (β^−, τ = 360 days, Q = 3.01 MeV) in Xe-LS. Only four nuclei can give a possible background in this energy window:^{60}Co (β^−,τ = 7.61 yrs, Q = 2.82 MeV),^{88}Y (electron capture (EC), τ = 154 days, Q = 3.62 MeV),^{110m}Ag, and^{208}Bi (EC, τ = 5.31 × 10^5 yrs, Q = 2.88 MeV). Due to their different lifetimes and the increased exposure time of this data set, the event rate time variation in the energy range 2.2 < E < 3.0 MeV exhibits a strong preference for the lifetime of^{110m}Ag [12]. In addition, the combined data set of DS-1 and DS-2 indicates that^{110m}Ag is also distributed on the IB. This activity is estimated from two-dimensional fits in radius and energy, assuming that the only contributions on the IB are from^{214}Bi and^{110m}Ag [12]. The fit results for the 214Bi and^{110m}Ag event rates on the IB are given in Table 2 for the two data sets. The^{214}Bi rates are estimated after removing^{214}Bi-^{214}Po sequential

Table 2: Fitted event rates of^{214}Bi and^{110m}Ag on the IB.

DS-1 DS-2 214Bi (day^{−1}) 19.0 ± 1.8 15.2 ± 2.3

110mAg (day−1) 3.3 ± 0.4 2.2 ± 0.4

decays and are consistent between DS-1 and DS-2, while the^{110m}Ag rates are consistent with the decay time of this isotope. The rejection efficiencies

(0νββ window) of the FV cut R < 1.35 m against^{214}Bi and^{110m}Ag on the IB are (96.8 ± 0.3)% and (93.8 ± 0.7)%, respectively, where the uncertainties include the uncertainty in the absolute IB position. For R < 1.20 m, they are both (99.2 ± 0.1)%.

5. Systematic uncertainties

Systematic uncertainties are summarized in Table 3 for the two data sets. The dominant contribution comes from the fiducial volume uncertainty. For DS-1, the Xe-LS volume in the 1.2-m-radius and 1.35-m-radius is 7.24 and 10.3 m^3, respectively. The volume ratio of the fiducial volume to the total volume is 0.438 ± 0.005 and 0.624 ± 0.006, where the total volume was measured by the flow meter to be (16.51 ± 0.17) m^3 during Xe-LS filling. The FV fraction is also estimated from the ratio of^{214}Bi events which pass the FV cuts to the total number in the entire Xe-LS volume after subtraction of the IB surface contribution. The results for DS-1 are 0.421 ± 0.007(stat) ± 0.001(syst) and 0.620 ± 0.007(stat) ± 0.021(syst) for 1.2-m-radius and 1.35- m-radius, respectively. The difference in these values is taken as a measure of the systematic uncertainty on the vertex-defined FV. Combining the errors, we obtain 5.6% and 3.9% systematic uncertainties on the 1.20-m-radius and 1.35-m-radius for DS-1. Similarly, the error for DS-2 is estimated to be 6.3% and 4.1%. The uncertainty for DS-1 at 1.20-m-radius is slightly different from Ref. [2] due to improved energy/vertex reconstruction. The total systematic uncertainties for the double-beta decay half-life measurements for DS-1/DS- 2 are 5.6%/6.3% and 3.9%/4.1% [12], obtained by adding all uncertainties listed in Table 3 in quadrature.

6. Results

The upper limits of the^{136}Xe 2νββ and 0νββ decay rates to the excited states studied in the present work are estimated from a likelihood fit to the binned energy distribution between 0.5 and 4.8 MeV for each data set except for 2νββ decays to 0^+_1 and 2^+_2 excited states. The fit range of these two decays is between 1.2 and 2.3 MeV. The 2νββ decay spectra were calculated based on the approximated differential rate [13] and Fermi function [14]. Backgrounds from decay chains of^{222}Rn-^{210}Pb and^{228}Th-^{208}Pb in the Xe- LS, the spallation products^{10}C and^{11}C, contributions from the IB including the decay chains of^{222}Rn-^{210}Pb and^{228}Th-^{208}Pb,^{134}Cs,^{137}Cs and^{110m}Ag

Table 3: Estimated systematic uncertainties used for the^{136}Xe double-beta decay half-life measurement.

Source Systematic Uncertainty (%) 2νββ decay 0νββ decay Ref.

DS-1 DS-2 DS-1 DS-2 R_{1.20m} R^∗_{1.20m} R_{1.35m} R^∗_{1.35m} Fiducial volume 5.6 6.3 3.9 4.1 [12]^† Enrichment factor of^{136}Xe 0.05 0.05 0.05 0.05 [11] Xenon concentration 0.34 0.37 0.34 0.37 [12] Detector energy scale 0.3 0.3 0.3 0.3 [11] Detection efficiency 0.2 0.2 0.2 0.2 [12] Total 5.6 6.3 3.9 4.1 † Only for 0νββ decay.

are allowed to vary in the fit, but are constrained by their estimated rates. In addition, the event rates of^{136}Xe 0νββ,^{110m}Ag,^{208}Bi, external^{110m}Ag and^{222}Rn-^{210}Pb are constrained by the time variation of the observed event rate in 2.2 < E < 3.0 MeV considering their half-lives. The uncertainties of the energy scale parameters are constrained from the^{208}Tl calibration and radon-induced^{214}Bi data. Other events, such as 2νββ decays to the ground state and contributions from the Xe-LS such as^{210}Bi,^{85}Kr, and^{110m}Ag, are unconstrained in the fit. The energy spectra of selected events for the combined data from DS-1 and DS-2 are shown in Fig. 4.

To estimate the limits on decay to the 0^+_1 , 2^+_1 and 2^+_2 excited states of 136Ba, each branch was individually fitted simultaneously with the dominant contribution from 2νββ decay to the ground state. The 90% C.L. upper limits on the number of events in each transition are estimated from the single rate that gives Δχ^2=2.71 compared with the best-fit spectrum for each data set (DS-1 and DS-2). The resulting upper limits for each transition are drawn in Fig. 4, and the corresponding half-life limits are summarized in Table 4, together with theoretical estimates from Ref. [15]. The limits of the 2νββ and 0νββ decays to the 2^+_1 excited state of^{136}Ba are improved by a factor 49 and 4.0×10^3, respectively, relative to previous results in Refs. [16, 17]. The limits on the 2νββ and 0νββ decays to the 0^+_1 and 2^+_2 excited states are

Figure 4: Energy spectrum of selected double-beta decay candidates (data points) with best-fit backgrounds (gray dashed curve) and total (red curve). Data of DS-1 and DS-2 are combined. The 90% upper limits for^{136}Xe double-beta decay to the excited states of^{136}Ba are shown in blue for 2νββ (top figure) and 0νββ (bottom figure). The peak around 0.5 MeV in the background spectrum mainly comes from^{85}Kr in the Xe-LS and from^{137}Cs in the IB. The two peaks at 1.2 < E < 2.0 MeV are largely due to external 134Cs. The main contributions in the region 2.0 < E < 3.0 MeV are^{110m}Ag in the Xe-LS and external^{214}Bi from the^{238}U decay chain. In 3.0 < E < 4.8 MeV range, the dominant backgrounds are^{208}Tl (^{232}Th decay chain) in the Xe-LS and those from the IB.

Table 4: Half-life lower limits for^{136}Xe double-beta decay to excited states of^{136}Ba at 90% C.L. Theoretical estimates of the half-life of the 2νββ decays including the range of values calculated using the four models taken from Ref. [15]

Transition

T_{1/2} (yr, 90% C.L.)

This work Previous work Theoretical Est. [15] 2νββ decay 0^+ → 0^+_1 8.3 × 10^{23} - (1.3 − 8.9) × 10^{23} 0^+ → 2^+_1 4.6 × 10^{23} 9.4 × 10^{21} [16] (1.6 − 48) × 10^{25} 0^+ → 2^+_2 9.0 × 10^{23} - (1.2 − 6.3) × 10^{30} 0νββ decay 0^+ → 0^+_1 2.4 × 10^{25} - 0^+ → 2^+_1 2.6 × 10^{25} 6.5 × 10^{21} [17] 0^+ → 2^+_2 2.6 × 10^{25} -

estimated for the first time. The obtained limit for the 2νββ decay to the 0^+_1 excited state can constrain three of four theoretical models discussed in Ref. [15]. From the limit on the^{136}Xe 0νββ decay (0^+ → 0^+_1 ) half-life, we obtain a 90% C.L. upper limit of ⟨m_{ββ} ⟩ < 0.36-0.84 eV using nuclear matrix elements evaluated in Refs. [18, 19].

7. Summary and conclusion

We used the KamLAND-Zen first phase data set to search for 2νββ and 0νββ decays of^{136}Xe to the 0^+_1 , 2^+_1 and 2^+_2 excited states of^{136}Ba. No signal was observed and half-life limits at 90% C.L. were obtained as summarized in Table 4. The lower limits on 0^+ → 0^+_1 for 2νββ and 0νββ decay were improved by a factor of 49 and 4.0×10^3, respectively, from previous measurements. The decays of 0^+ → 0^+_1 and 0^+ → 2^+_2 for 2νββ and 0νββ decay were investigated for the first time. The limit of 0^+ → 0^+_1 for 2νββ decay allows to constrain some theoretical predictions.

The current results for the corresponding 0νββ transitions are mainly limited by the background from^{110m}Ag and^{214}Bi. Distillation of the LS to remove the^{110m}Ag and replacement of the IB to reduce^{214}Bi should improve the sensitivity. The dominant background of the 2νββ decay to the 0^+_1 excited states comes from external^{134}Cs. Replacement of the IB will reduce this radioactivity and provide improved sensitivity to this decay. 8. Acknowledgements

The KamLAND-Zen experiment is supported by JSPS KAKENHI Grant Numbers 21000001 and 26104002; Stichting FOM in the Netherlands; and under the U.S. Department of Energy (DOE) Grant No. DE-AC02-05CH11231, as well as other DOE and NSF grants to individual institutions. The Kamioka Mining and Smelting Company has provided service for activities in the mine. We acknowledge the support of NII for SINET4. References [1] A. Barabash, Phys. Rev. C 81 (2010) 035501. [2] A. Gando, et al., Phys. Rev. C 86 (2012) 021601. [3] M. Auger, et al., Phys. Rev. Lett. 109 (2012) 032505. [4] M. F. Kidd, J. H. Esterline, S. W. Finch, W. Tornow, Phys. Rev. C 90 (2014) 055501.

[5] J. Suhonen, O. Civitarese, J. Phys. G: Nucl. Part. Phys. 39 (2012) 124005.

[6] J. Schechter, J. Valle, Phys. Rev. D 25 (1982) 2951. [7] F. Simkovic, A. Faessler, Prog. Part. Nucl. Phys. 48 (2002) 201–209. [8] M. Redshaw, E. Wingfield, J. McDaniel, E. Myers, Phys. Rev. Lett. 98 (2007) 053003.

[9] R. Firestone, et al., Table of Isotopes (1999). [10] S. Abe, et al., Phys. Rev. C 81 (2010) 025807. [11] A. Gando, et al., Phys. Rev. C 85 (2012) 045504. [12] A. Gando, et al., Phys. Rev. Lett. 110 (2013) 062502.

[13] W. Haxton, G. J. Stephenson Jr., Prog. Part. Nucl. Phys. 12 (1984) 409 – 479.

[14] G. Schenter, P. Vogel, Nucl. Sci. Eng. 83 (1983) 393–396. [15] P. Pirinen, J. Suhonen, Phys. Rev. C 91 (2015) 054309. [16] R. Bernabei, et al., Phys. Lett. B 546 (2002) 23–28. [17] E. Bellotti, et al., J. Phys. G 17 (1991) S231–S241.

[18] F. Šimkovic, M. Nowak, W. A. Kamiński, A. A. Raduta, A. Faessler, Phys. Rev. C 64 (2001) 035501.

[19] J. Suhonen, Nucl. Phys. A 853 (2011) 36 – 60.