arXiv:1411.4180v2 [astro-ph.CO] 22 Jul 2015

Probing the Dark Flow signal in WMAP 9 yr and PLANCK cosmic microwave background maps.

F. Atrio-Barandela^1, A. Kashlinsky^2, H. Ebeling^3, D. J. Fixsen^4, D. Kocevski^5

ABSTRACT

The “dark flow” dipole is a statistically significant dipole found at the position of galaxy clusters in filtered maps of Cosmic Microwave Background (CMB) temperature anisotropies. The dipole measured in WMAP 3, 5 and 7 yr data releases was 1) mutually consistent, 2) roughly aligned with the all-sky CMB dipole and 3) correlated with clusters’ X-ray luminosity. We analyzed WMAP 9 yr and the 1st yr Planck data releases using a catalog of 980 clusters outside the Kp0 mask to test our earlier findings. The dipoles measured on these new data sets are fully compatible with our earlier estimates, being similar in amplitude and direction to our previous results and in disagreement with the results of an earlier study by the Planck Collaboration. Further, in Planck datasets dipoles are found independent of frequency, ruling out the Thermal Sunyaev- Zeldovich as the source of the effect. Both, in WMAP and Planck, we find a clear correlation between the dipole measured at the cluster location in filtered maps with the average anisotropy on the original maps, further proving that the dipole is associated with clusters. The dipole signal is dominated by the most massive clusters, with a statistical significance better than 99%, slightly larger than in WMAP. Since both data sets differ in foreground contributions, instrumental noise and other systematics, the agreement between WMAP and Planck dipoles argues against them being due to systematic effects in either of the experiments.

Subject headings: cosmology: observations – cosmic microwave background – large scale structure of the universe – galaxies: clusters: general

1Física Teórica, Universidad de Salamanca, 37008 Salamanca, Spain; email:atrio@usal.es

2NASA Goddard Space Flight Center and SSAI, Observational Cosmology Lab, Greenbelt, MD 20771 USA; email:Alexander.Kashlinsky@nasa.gov

3Institute for Astronomy, University of Hawaii, Honolulu, HI 96822 USA; email:ebeling@ifa.hawaii.edu

4NASA Goddard Space Flight Center and UMCP, Observational Cosmology Lab, Greenbelt, MD 20771 USA; email:Dale.Fixsen@nasa.gov

5Chemistry-Physics Building, University of Kentucky, Lexington, KY 40508 USA; email:kocevski@pa.uky.edu

– 2 –

1. Introduction.

Measurements of peculiar velocities with galaxies rely on distance indicators to subtract the Hubble expansion, and have achieved notable success in probing peculiar velocities using galaxy surveys out to ≤ 100h^{−1}Mpc (e.g. see review by Strauss & Willick, 1995). However, individual galaxy distance indicator surveys are typically restricted to isolated parts of the sky, which should then be corrected for when reconstructing galaxy flow characteristics, such as the amplitude of the bulk flow on a given scale (e.g. Watkins et al. 2009). SNIa surveys input highly accurately measured individual distances (Turnbull et al. 2012), but are sparse and require corrections for sky coverage effects (Rathaus et al. 2013). More critically, in all of such measurements the galaxy velocity is probed with respect to the frame of the Hubble expansion and translated into the Cosmic Microwave Background (CMB) rest frame after assuming that the entire CMB dipole is of purely kinematic origin caused by the Doppler effect due to the local motion of our Galaxy, Local Group etc. (Kogut et al. 1993, but see the discussion of Wiltshire et al. 2013).

The kinematic Sunyaev-Zel’dovich (KSZ; Sunyaev & Zel’dovich, 1972) measures directly the peculiar velocity of clusters with respect to the CMB and does not require subtracting the velocity due to the Hubble expansion. Therefore KSZ offers an alternative method to probe peculiar velocity field at larger distances potentially inaccessible to galaxy distance indicator methodologies. Its main disadvantage is that the temperature fluctuations due to the peculiar motion of individual clusters are much smaller than the cosmological CMB signal, foreground emissions, instrumental noise or the Thermal Sunyaev-Zeldovich anisotropies (TSZ; Sunyaev & Zel’dovich, 1970) from the thermal motion of electrons in the potential well of clusters. As a result, the peculiar velocity of a single cluster has yet to be determined. Kashlinsky & Atrio-Barandela (2000, hereafter KA-B) thus proposed a method to probe the bulk motion of clusters of galaxies collectively using all-sky CMB maps combined with an all-sky X-ray cluster catalog. They pointed out that one can construct a statistic, the dipole moment evaluated at cluster locations over a fixed aperture containing the entire X-ray emitting gas, which can probe the bulk flow down to cosmologically interesting levels for the WMAP and Planck instrumental configurations. The KA-B method requires filtering out the primary CMB component without removing the KSZ signal, and isolating the TSZ contribution to the measured dipole. For the former, in KA-B we proposed a variant of the Wiener filter, designed to minimize the contribution from primary CMB with the known mean power spectrum, whereas the TSZ component can be attenuated if in clusters the gas X-ray temperature, T_X , decreases toward the outer parts as it was indeed found empirically (Atrio-Barandela et al. 2008).

The KA-B method was first applied to the 3-yr WMAP CMB data coupled with an extended cluster catalog where, surprisingly, a statistically significant dipole over the cluster apertures containing zero monopole was found for a volume of median/mean depth of ∼ 300h^{−1}Mpc (Kashlinsky et al. 2008, 2009, hereafter KABKE, KABKE2). Within the statistical and systematic calibration uncertainties this corresponded to the cluster sample moving at ∼ 600 − 1, 000km/s in the direction of the CMB dipole. KABKE termed this the “dark flow” speculating that it may be reflective of the effective motion across the entire cosmological horizon. If true, this is equivalent to at least a

– 3 –

part of the all-sky CMB dipole being of primordial origin, a possibility that requires an isocurvature component in the primordial density field (Matzner 1980, Turner 1991, Mersini-Houghton & Holman 2009). Using a further expanded cluster catalog and WMAP 5-yr CMB maps Kashlinsky et al. (2010, hereafter KAEEK) showed that the cluster dipole correlated with cluster properties, increasing in amplitude for the most X-ray luminous and massive clusters, as expected from SZ contributions (the TSZ contribution being small over the final apertures as evidenced by the zero monopole there). Atrio-Barandela et al. (2010, hereafter AKEKE) have developed - analytically and numerically - the formalism to understand the error budget of the KA-B method, which can and should be applied to any such measurement as a consistency check^1. Kashlinsky et al. (2011, hereafter KAE11) have shown that the results can be probed with public cluster data which they have posted for interested investigators at www.kashlinsky.info/bulkflows/data_public. The methodology of the analysis, the results and their potential implications have been extensively reviewed in Kashlinsky et al. (2012, hereafter KAE12).

Motivated by the final WMAP 9 yr and Planck 1 yr data releases we have scrutinized our previous “dark flow” measurements with the further developed methodology and present the results here. We do not address our interpretation of the signal here: throughout we refer as the “dark flow signal” to the statistically significant dipole remaining at cluster positions and with an amplitude which correlates with X-ray cluster luminosity pointing, within the uncertainties, in the direction of the all-sky CMB dipole. Because WMAP does not have the frequency coverage required to distinguish a KSZ dipole from the dipole generated by a random distribution of the TSZ anisotropy, we evaluated the final dipoles at apertures containing zero monopole. Since the mean TSZ monopole is an upper bound on the TSZ generated dipole, this aperture guarantees that the measured dipole was not due to the TSZ effect. Importantly, Planck has measured on both sides of the zero-TSZ frequency at 217 GHz and has provided the appropriate data to test whether the dipole contains a significant TSZ contribution. For this data we just require the aperture to be large enough for the errors integrate down and leave a statistically significant dipole. We will show that, at the same aperture, the Planck-based results are fully consistent with those of WMAP, providing a very important consistency check. The measured dipole turns out to be independent of frequency and is consistent with the CMB black body energy spectrum and therefore, cannot be due to TSZ or foreground residuals since those components vary with frequency.

We find the same results as before with the WMAP 9 yr data analysis, but given the lower noise levels of that dataset and the new methodology here we can isolate the signal better. We then apply the methodology to Planck 1 yr data and we find full consistency with the WMAP results. There appears a statistically significant “dark flow” signal at cluster locations with the dipole amplitude which correlates with cluster X-ray luminosity and the direction pointing within

1As we will discuss later and as was pointed out numerous times, Keisler (2009) claims errors which violate the AKEKE analytical and numerical evaluations and are indicative of an error which he confirmed in private correspondence.

– 4 –

the uncertainties to the direction of the all-sky CMB dipole. If the measured signal with all its properties can arise from something other that KSZ, we would welcome this discussion.

This paper is structured as follows: For completeness we briefly revisit the methodology, the data processing pipeline and the error budget of the KA-B measurement. Then in Sec. 3 we present the analysis of the WMAP 9 yr data, which supports empirically the error budget estimations derived in Sec. 2 and our previous measurements. Sec. 4 addresses our measurement of the dark flow signal with the Planck 1 yr data. We find full consistency between the WMAP and Planck results, except that for the map at 30 GHz and in particular cluster configurations, that could be affected by low-level systematics, consistent with the effects of striping due to the Planck observing strategy. The “dark flow” measured in Planck is significant at better than the 99% confidence level. When combined with the fact that the signal correlates with cluster X-ray luminosity and points in the direction of the all-sky CMB dipole, the significance of the existence of the primordial contribution to the CMB dipole, known as ”Dark Flow”, is even larger. Throughout this paper we use the X-ray cluster catalog compiled for the KAEEK study. A more advanced and expanded catalog is now being worked on and upon its completion we will present the results from its application.

2. Methodology, Data Processing and Error Budget.

2.1. KA-B method

A cluster in the direction n̂, moving with a peculiar velocity ⃗v, will generate a temperature anisotropy ΔT_{KSZ} = −T_0τ(⃗v · n̂/c), where τ is the projected electron density along the line of sight, c the speed of light and T_0 is the CMB blackbody temperature. A sample of clusters randomly located in the sky moving with an average velocity ⃗V_{bulk} will produce a temperature anisotropy ΔT_{KSZ} = −T_0τ(V_{bulk}/c) cos θ, where θ is the angle with respect to the apex of the motion. At the position of clusters, microwave temperature anisotropies have several components: primary CMB, TSZ and KSZ components, foreground residuals and instrument noise. KA-B estimated how these terms integrated down with many clusters concluding that at the resolution of WMAP and Planck channels the dominant contribution to the noise of the KSZ measurement would be from primary CMB anisotropies. KA-B proposed to use the known statistical properties of the primary CMB to filter out this contribution and increase the signal-to-noise of the probed KSZ term. The KA-B proposed filter minimizes the difference ⟨(ΔT − N )^2⟩, with N being the instrumental noise (Kashlinsky et al. 2009). AKEKE have shown analytically and numerically that it effectively removes the primary CMB signal down to the cosmic variance. In ℓ-space the KA-B filter is F_ℓ = (C^{sky}_ℓ − C^{th}_ℓ B^2_ℓ )/C^{sky}_ℓ where C^{sky}_ℓ is the actual realization of the radiation power spectrum in our sky that includes noise, TSZ, KSZ, foreground residuals, and primary CMB; C^{th}_ℓ is the power spectrum of the ΛCDM model realization that best fits the data, and B_ℓ is the antenna beam.

– 5 –

2.2. Data processing pipeline

WMAP and Planck have measured the microwave sky at different frequencies with varying angular resolution. We implement our filter taking into account the specifics of each of the WMAP Differencing Assembly (DA) or the Planck channels. Our pipeline for measuring the dark flow signal works as follows:

1. We start with foreground-cleaned all-sky microwave maps.

2. The data of each channel are multiplied by the Galactic and point source mask. To facilitate comparison with our previous results we chose the WMAP Kp0 mask.

3. Next, monopole, dipole, and quadrupole are subtracted from the regions outside the mask.

Then we compute the multipole expansion coefficients a_{ℓm} correcting for the mask.

4. The a_{ℓm} coefficients are multiplied by the filter F_ℓ before transforming them back into real space to create the filtered map. Since the quadrupole and octopole are aligned with the dipole the filter is set to zero for ℓ ≤ 3 to avoid any cross-talk between those scales that could mimic a dipole.

5. The monopole and dipole outside the mask are removed from the filtered maps.

6. The dipoles are computed at the cluster positions using fixed aperture for all clusters for a given depth, X-ray luminosity cutoff configuration.

Our first results, presented in Atrio-Barandela et al. (2008) and KABKE1,2 were obtained using different apertures. We estimated the size of the region that emitted 99% of the X-ray flux, θ_X , for each cluster and computed dipoles in units of θ_X . The results were found to be very similar to those using a fixed aperture zero monopole for all clusters so we present the results using fixed apertures where errors are simpler to compute and can be evaluated by analytic means providing multiple cross-checks (AKEKE).

As indicated in the introduction, KAEEK showed that when binned by cluster X-ray luminosity, the cluster dipole measured in filtered maps correlated with central TSZ anisotropy in unfiltered maps, with larger amplitudes corresponding to the most X-ray luminous clusters, as expected from SZ contributions. Due to the inhomogeneous distribution of clusters on the sky, the mean TSZ anisotropy (or monopole) could generate a significant dipole and/or other higher order multipoles. It is important to demonstrate that the measured dipole was not due to the TSZ effect. WMAP operated in the Rayleigh-Jeans CMB regime and did not provide enough direct information to subtract the TSZ contributions from the measured dipoles. To ensure that in WMAP data the measured dipole was not dominated by the TSZ monopole we used the fact that all TSZ multipoles due to the inhomogeneous distribution of clusters on the sky, including the dipole, would be bounded from above by the monopole. Then, in step [6] we repeated the measurement for different

– 6 –

apertures and selected the dipole measured at the zero monopole aperture to ensure that the TSZ component did not contribute to the measurement. This aperture is no longer necessary when using Planck data, where the TSZ vanishes at 217GHz and any dipole there will be free from TSZ contributions.

2.3. Error budget

We compute errors numerically using the same configurations and apertures that were used to evaluate the dipole at the cluster positions in KAEEK. In KAE12 we discussed four different methods to evaluate numerically the errors and showed their mutual consistency (Sec. 10.3). Our dipole is measured at cluster pixels so the error on this measurement is determined by the distribution of the random dipoles in the data away from the actual clusters. We evaluate these random dipoles by placing filled aperture discs at random positions in the sky with the same angular extent as was used to measure the dipole at the cluster location. We remove all pixels within 80 arcmin from the center of all known clusters to make sure that the randomly distributed discs do not overlap with them. By using the realization of the primary CMB as given by the actual sky to measure the dipole and its error we take into account the effect of all possible systematics existing in the filtered data, such as foreground residuals, inhomogeneous and correlated instrument noise, as well as any artifact that could have been introduced by our pipeline like mode coupling and power leakage between the galactic mask and the cosmological signal remaining in the filtered data. In Atrio-Barandela (2013) we discussed the different biases and inefficiencies that exist between different types of simulations that can result on overestimating the errors. In AKEKE we developed an analytical insight to detail the different contributions to the error bars and their properties when the instrumental noise is Gaussian-distributed and foreground residuals are negligible. More details are given in AKEKE and KAE12 (Sec. 10.3), where it is shown that numerical simulations of the actual CMB sky give errors in excellent agreement with the analytical theory. This formalism clarifies the relation between the errors of the monopole and of the three dipole components and their scaling with the number of clusters; it is briefly summarized below.

The filtered maps have variance σ^2_{fil} = (1/4π) ∑ (2ℓ + 1)F^2_ℓ C^{sky}_ℓ . While the filter erases a large fraction of the primary CMB anisotropy, it leaves a residual due to cosmic variance that is common to all frequencies. The realization of the radiation power spectrum as seen from our location, C^{sky}_ℓ , differs from the underlying power spectrum C^{th}_ℓ by a random variable of zero mean and (cosmic) variance Δ_ℓ = (ℓ +^1_2 )C^{th}_ℓ /f_{sky} (Abbott & Wise 1984). In addition, the instrument noise is also present with a power spectrum N_ℓ. Neglecting foreground residuals in the foreground-cleaned maps, AKEKE have demonstrated that the variance of the filtered map is given by propagating the cosmic variance (also, see Sec 10.3.1 of KAE12 for a more detailed derivation)

σ^2_{fil} = 1 4π ∑ (2ℓ + 1) [ Δ_ℓ C^{th}_ℓ + Δ_ℓ + N_ℓ + N_ℓ C^{th}_ℓ + Δ_ℓ + N_ℓ ] = σ^2_{CV,fil} + σ^2_{N ,fil}(t_{obs}) (1) This expression is valid in the limit of zero TSZ contribution and so does not reflect the fact that

– 7 –

the final errors will depend on the radius of the aperture chosen around each cluster, so they need to be computed numerically. An error-aperture dependence is to be expected since the residual CMB and noise have different spectra as shown in AKEKE (see Fig. 1); the residual cosmological CMB signal dominated at ℓ ≤ 300 while the noise dominated at ℓ ≥ 300. By taking larger apertures the instrument noise integrates down and the residual CMB dominates the error budget. For this reason the final errors on WMAP and Planck will be similar even if they have very different noise levels. For WMAP we chose an aperture that guarantees that there are no contributions to the dipole due to the TSZ effect. At this aperture errors integrate down and leave a statistically significant dipole. Nevertheless, eq. (1) is very instructive since it shows that the variance of the filtered maps depends mainly on two components: (a) the residual CMB not removed by the filter due to cosmic variance (CV) and (b) the noise that decreases with increasing time of observation t_{obs}. Fig. 1 of AKEKE demonstrates empirically the high accuracy of the above expression.

By construction, the filtered maps have no intrinsic monopole or dipole. Since we measure these two moments from a small fraction of the sky, our limited sampling generates an error due to the (random) distribution of these quantities around their mean zero value. This error is proportional to the rms dispersion of the filtered map, the size of the fixed aperture around each cluster and the number of clusters N_{cl} of the catalog. For a fixed aperture, the cosmic variance term of eq (1) scales as N^{−1}_{cl} while the noise term scales as (N_{cl}N_{pix})^{−1}, being N_{pix} the number of pixels within a fixed aperture around each cluster. The sampling variances of the monopole and three components of the dipole (a_0, a_{1m}) depend on how homogeneously clusters sample the sky. A direct calculation shows that the monopole (σ_0) and three dipole (σ_m) errors are:

σ_0 ≡ ⟨a^2_0⟩^{1/2} ≈ σ_{fil} √ N_{cl} , σ_m ≡ ⟨a^2_{1m}⟩^{1/2} = σ_0 ⟨n̂^2_i ⟩ (2) where n̂_i are the clusters’ direction cosines. If clusters were homogeneously distributed in the sky then ⟨n̂^2_i ⟩ = 1/3 and the errors on the dipoles would be related to that on the monopole as expected: σ_m = √ 3σ_0, since three quantities are evaluated from the same data as the monopole. As we will discuss in Sec. 3.2, this expression is only approximately true since, due to the galactic mask, the error on the X and Y components of the dipole is slightly larger than that of the Z-component (see AKEKE, Sec 10.3.2 and Fig 10.7 of KAE12, for a detailed discussion).

The analytical formalism summarized in this section neglects the contribution of possible foreground residuals but they are already included in the numerically computed statistical uncertainties since, as mentioned above, we compute errors using the same realization of the sky than the data and, therefore, including foreground residuals as well as all other systematics. We find that eqs. (1) and (2) agree with the errors found in simulations from the actual sky showing empirically that foreground contributions are small.

– 8 –

2.4. Filtering and Noise

The lower noise levels of Planck as compared with WMAP as well as different and independent systematics, allow a second and in some ways independent measurement of the KSZ signal, providing further test of our filtering scheme. The KA-B filter has been designed to remove the cosmological signal by minimizing the difference between the data and the instrumental noise, i.e., the filter minimizes ⟨(ΔT − N )^2⟩. The filter oscillates around zero, F_ℓ ≃ 0, where the noise is negligible and F_ℓ ≃ 1 where the noise dominates. If the noise decreases, the filter will remove all signals down to the limit imposed by cosmic variance (KABKE2). Since cosmic variance decreases as ℓ^{−1/2}, lowering the noise implies that the filter will remove the signal at high ℓ’s more effectively. Then, whether the TSZ and KSZ signals survive or not, our filtering will depend on how these contributions are distributed in ℓ-space. For instance, the average TSZ anisotropy when evaluated at the cluster locations is a monopole and, in the absence of mask, filtering will distribute it preferentially to even multipoles while the bulk flow due to all the clusters is a dipole and it will be distributed preferentially to odd multipoles. In other words, the filter depends on the instrument noise (see Sec 2.1) and maps with noise of different amplitude will give different filtered maps; this will change the redistribution of the TSZ and KSZ components, intrinsic CMB and foreground residuals, changing the amplitude and direction of the measured dipole. Therefore, due to the difference in noise amplitude and properties, it is important to compare the results obtained with WMAP and Planck to isolate the effect of systematics.

3. The dark flow dipole in WMAP 9 yr data.

We first present the results of our analysis of the dark-flow signal in the final WMAP 9 yr data. To facilitate the comparison with our earlier results, we use the Kp0 mask to remove the Galaxy and the X-ray cluster catalog assembled for the KAEEK study. This catalog contains 980 clusters outside WMAP Kp0 mask, with redshifts z ≤ 0.25 and X-ray luminosities in the ROSAT (0.1−2.4)KeV band of L_X ≥ 0.2×10^{44}erg/s. Of those, 598 have X-ray luminosities L_X > 10^{44}erg/s. We consider four cumulative redshift bins, selecting clusters by redshift: z ≤ (0.12, 0.16, 0.2, 0.25). In each redshift bin, we define three independent cluster subsamples according to their luminosity. These subsamples are L_X = (0.2 − 0.5, 0.5 − 1.0, > 1.0) (in the same units as before) for clusters with z < 0.12 and L_X = (0.5 − 1.0, 1.0 − 2.0, > 2.0) for all other bins. The number of clusters and other properties of each subsample are given in Table 1 of KAAEK. In total we only have 11 different bins since the bins z < 0.2 and z < 0.25 with L_X < 10^{44}erg/s differ by two clusters and their results are almost identical.

– 9 –

Fig. 1.— Wiener filters constructed with the 3, 5, 7, 9 yr data (and noise levels). Top panels correspond to the filter in ℓ-space and the bottom panels to the same filters in real space. In each panel, black, blue, green and red curves from top to bottom correspond to the 3 to 9 yr data. The galactic mask used was the WMAP Kp0 mask.

– 10 –

Fig. 2.— Dipoles measured in WMAP 9 yr maps filtered with 3, 5, 7 and 9 yr noise filters for subsamples with L_X ≥ 2 × 10^{44}erg/s and the indicated redshifts. These bins contain 130, 208 and 322 clusters, respectively. Filled circles represent the averages over all 8 WMAP DA’s; open circles are the averages over the 4 W-band DA’s. The solid lines and shaded regions correspond to the KAEEK values and error bars.

– 11 –

3.1. WMAP filtering and results

In KABKE, KAEEK and KAE11 we have analyzed the subsequent data releases of WMAP 3, 5 and 7 yr data, respectively. We have consistently constructed the filter from the same data that we used to compute the dipoles. With each release, the noise level in the map has decreased, changing the filter. Motivated by the discussion in the Sec. 2.4 we can now test the robustness of the detected dipole signal with respect to the noise level of the filter; i.e., we can test the effect of the noise in redistributing the signal in the ℓ-space of the filtered maps and its effects on the measured dipole. For this purpose, we have constructed four filters for each of the eight single frequency all-sky CMB maps using the data from the 3, 5, 7 and 9 yr releases. During these integrations the rms instrument noise has been reduced by a factor √ 3 and so each subsequent filter would remove progressively a larger fraction of the intrinsic CMB signal. The four different filters were then applied to the WMAP 9 yr data of the ultimate noise achieved with that instrument. The filters in multipole (top panels) and angular (bottom panels) space are shown in Fig. 1, where one can see also the differences in the maps of different resolution going from Q at ∼ 30^′ to W at 12^′. Since the noise is largest at the W DA’s and lowest at Q more structure survives in the former than in the latter filter. However, combining the four W DA’s decreases the instrument noise by a factor of 2.

The overall S/N of the KAEEK measurement is driven by the most luminous X-ray clusters as should be if the dipole arises from the SZ cluster components. In Fig. 2 we show the dipole at zero monopole aperture at the positions of the brightest clusters with L_X ≥ 2 × 10^{44}erg/sec from Table 1 of KAEEK. The three panels correspond to different redshifts, as indicated. These bins contain 130, 208 and 322 clusters, respectively. Solid circles correspond to averaging over all eight WMAP DA’s (Q, V, W bands) and open circles to averaging over four W DA’s which can resolve clusters better. The horizontal axis indicates the data used to construct the filter which is, as we have indicated above, always applied to the the WMAP 9 yr data release. For the different filters, the zero monopole aperture changes from 20-30arcmin depending on the chosen cluster sample. Nevertheless, the difference with the results at a fixed aperture, say 25 or 30arcmin, are negligible since the residual monopole is always small, proving that the dipole is not contaminated by the TSZ monopole. The black line and shaded area correspond to the dipoles measured in KAEEK, obtained from WMAP 5 yr data for the same cluster samples. The figure shows a reassuring consistency between the 9 yr WMAP data (with any filter) with what was obtained in KAEEK for 5 yr WMAP data, which in turn have been demonstrated to be consistent with 3- and 7-yr WMAP CMB data in KAEEK and KAE11.

3.2. The error budget for WMAP filtering

In AKEKE, KAE12 we have discussed the proper methods to compute error bars and have addressed their relative merits and intrinsic biases. In Sec. 10.3.2 of KAE12 we compared four

– 12 –

alternative methods and showed that they all give similar uncertainties. As indicated in Sec. 2.3, we compute error bars by choosing random positions in the sky, outside the known clusters and the mask, and evaluating dipoles subtended by a given aperture around these centers, referred as Method 1 in KAE12. Each run was done with several apertures and with different number of clusters, in the range 100 < N_{clus} < 600. We compute the monopole and dipole at those N_{clus} random positions using the Healpix remove dipole routine. Our errors are the rms deviations of all those monopoles and dipoles, which coincide with the 68% confidence level for these demonstrably gaussian distributions.

As discussed in AKEKE and above, the dipole error budget is driven almost entirely by the error on the monopole, σ_0, which should scale as ∝ N^{−1/2}_{clus} . AKEKE have demonstrated, analytically and numerically, that the errors on the three dipole components should then be σ_{1m} ≃ √ 3σ_0 with σ_{1x} > σ_{1y} > σ_{1z}. The errors claimed by Keisler (2009) do not satisfy this and point to the flaw in his analysis namely, that his error budget is driven by the residual dipole outside the mask in the filtered map, which he failed to subtract prior to compute dipoles at random locations^2, as was demonstrated in AKEKE. The left panels of Fig. 3 show with simulations that for the WMAP 9 yr noise levels one obtains to good accuracy that σ_{1x} ≃ 1.8σ_0, σ_{1y} ≃ 1.55σ_0, σ_{1z} ≃ 1.4σ_0 with a weak aperture dependence. This confirms explicitly that the entire error budget is contained in σ_0.

The middle panels of Fig. 3 show the results of simulated errors on σ_0 for various cluster configurations and the KABKE 3 and 5 yr filters for the 30^′ aperture which correspond approximately to the zero monopole aperture. Solid circles correspond to the average of all 8 DA’s. The panels demonstrate the accuracy of the scaling of σ_0 ∝ N^{−1/2}_{clus} or more explicitly σ_0 ≃ 20N^{−1/2}_{clus} μK with a weak dependence on the selected filter, which is valid in the limit of the instrument noise levels corresponding to 9-yr WMAP and Planck data. This quantifies the errors explicitly.

The right panels of Fig. 3 show the error on the monopole, σ_0 × N^{1/2}_{clus}, as function of the aperture radius when averaging over all 8 DA’s (filled circles) and 4 W-band DA’s (open circles). This is compared with the component of eq. 1 resulting from the cosmic variance of primary CMB discussed in AKEKE, Sec. 10.3.1 of KAE12 and above, shown with a thick horizontal line. The three dipole components show a similar behavior, decreasing with increasing aperture radius as the noise integrates down, and are not shown. One can see explicitly that as the WMAP 9 yr instrument noise decreased with increasing aperture, the monopole errors σ_0 approach this limit very accurately. Any filtering scheme should be able to evaluate similar expressions and then verify whether their particular claims are commensurate with this theoretically justified limit (cf. Planck Collaboration (2014g)). The final zero monopole aperture at ≃ 30^′ (KABKE and KAEEK) is where the instrument noise (and foreground residuals) in WMAP 9 yr CMB maps contribute about ∼ 10% to the total error, and so the latter is driven by cosmic variance from primary CMB.

2It is unfortunate that, despite this, his claims are still occasionally cited at face value.

– 13 –

Fig. 3.— Error estimates. In the left panels the black, blue, red circles correspond to the X, Y, Z components of the error. Circles of increasing size correspond to apertures of 10^′, 15^′, 22^′, 35^′. The plot show the robustness of the error estimates, driven predominantly by that of the monopole. The middle panels represent the monopole error vs the number of clusters for Method 1 (see Sec. 3.2). Filled circles represent the average over all 8 DA’s and open circles the average restricted to the 4 W-band DA’s for apertures at ∼ 30^′. The errors show good accuracy with the analytical theory developed in AKEKE and KAE12, Sec. 10.3. In the right panel we show the error vs aperture with the same convention than in the middle panels. The thick horizontal line shows the zero noise cosmic variance limit σ_{CV,f il} of the error (see eq 1).

– 14 –

3.3. The “dark flow” dipole from the WMAP data

In KAEEK we demonstrated that the measured dipole correlated with cluster X-ray luminosity binning. We selected clusters by their redshift and we divided the samples in three bins according to their X-ray luminosity, L_X . We showed that clusters in the highest luminosity bin, with L_X [0.1 − 2.4KeV ] ≥ 2 × 10^{44}erg/s, had larger monopoles and larger dipoles than the other two bins. In fact, at the cluster locations, the y-component of the dipole in filtered maps was correlated with the average temperature anisotropy measured from the original unfiltered map. This average (or monopole) was always negative, as expected if the anisotropy is dominated by the TSZ effect. Since in CMB maps temperature anisotropies are convolved with the antenna the correlation was not directly established with cluster luminosity or mass. But as the TSZ effect scales with X-ray luminosity and cluster mass, this correlation was a clear indication that both monopole and dipole originated within clusters.

In Fig. 4 we present the final results from the cluster catalog binned by L_X and z per Table 1 of KAEEK. We plot the results of the y, z dipole components, evaluated at zero monopole aperture, vs the central monopole evaluated from unfiltered CMB maps. Like in KAEEK the central monopole was evaluated by averaging over the central 10^′ radius; we used only the four W DA’s with appropriate angular resolution when averaging and we checked that adding the other DA’s gives consistent results. We show as before we recover statistically significant results for the y and z components; the x component is consistent with zero within the errors, but in any event it can be derived from the right panel showing the dipole power, C_1. As in KAEEK the cluster configuration (discussed later for the Planck analysis) results in the value of a_{1y} measured at about 3.3σ and the value of a_{1z} at ≃ 2.5σ fully in agreement with Table 1 of KAEEK. Fig. 4 shows the same dipole-monopole correlation than it was found in KAEEK. When one accounts for the L_X correlation, the overall “dark flow” dipole reaches about ≃ 4σ significance as discussed in AKEKE. In addition, the “dark flow” dipole direction coincides with the all-sky dipole direction (after correction for the local motion as discussed in Kogut et al. 1993); the probability of this happening by chance with the current errors is ∼ 10^{−2}. This argues for the same statistically significant signal pointing to the “dark flow” as in KAEEK.

4. The “dark flow” dipole in Planck data.

In March 2013, the Planck Collaboration released nine Planck Nominal maps from the Low and High Frequency Instruments (LFI and HFI, respectively). LFI has measured the CMB sky at frequencies 30, 44 and 70 GHz, while the HFI has covered the range 100, 143, 217, 353, 545 and 857 GHz (Planck Collaboration 2014a)^3. These maps contain significant foreground contamination

3All Planck data products have been downloaded from the Planck Legacy Archive found in the following web page, http://www.sciops.esa.int/index.php?project=planck&page=Planck Legacy Archive

– 15 –

due to synchrotron and free-free emissions at low frequencies and thermal dust CO emission and zodiacal light at high frequencies. At the HFI frequencies, where zodiacal light contribution is more important, we use HFI maps with this contaminant removed (Planck Collaboration 2014d).

In addition, the Planck Collaboration released four different foreground-cleaned reconstructions of the CMB temperature anisotropies over a large fraction of the sky. These maps were produced using the data from nine Planck channels, without including any other external dataset, by applying different component separation techniques. Together with the foreground-cleaned Planck Nominal maps described below, we will analyze the SMICA (Spectral Matching Independent Component Analysis) map, constructed from a linear combination in harmonic space of the nine single frequency maps of different resolution. The weights of each frequency vary with multipole ℓ. In SMICA the temperature anisotropy was estimated over 97% of the sky. The remaining area of the image shown in Fig. 5 is replaced with a constrained Gaussian realization (Planck Collaboration 2014d). The component analysis used to construct the map does not preserve the TSZ signal, so it can not be used to test the monopole-dipole correlation shown in Fig. 4.

The SMICA map has an angular resolution of 5arcmin, but its harmonic content is cut off at ℓ > 4000. The noise has an average rms of ∼ 17μK with a highly inhomogeneous distribution (see Fig. 15 of Planck Collaboration (2014a)). The method under-subtracts thermal dust emission, but at high latitudes, in the region where the CMB reconstruction is statistically robust, residuals are below a few μK in amplitude. Compared with other reconstructions using different techniques, SMICA produces the map with lowest level of residuals and for this reason it will be the one we will be considering here.

4.1. Cleaning Planck Nominal maps from foreground contributions.

Planck Nominal maps contain foregrounds due to diffuse emissions from the Galaxy and compact sources. The Galactic foregrounds are the main contaminants on large angular scales. The main contributions are synchrotron, free-free and the anomalous microwave emission due to spinning dust grains, thermal dust emission and emission from CO rotational lines. At small scales, extragalactic foregrounds from compact sources and unresolved emission from radio and infrared sources are the dominant contribution (Planck Collaboration 2014d). Foregrounds can be removed through component separation methods or by reconstructing the foreground fields and subtracting them. Component separation methods are usually employed to produce a clean map of CMB temperature anisotropies with very low foreground contamination at the expense of loosing frequency information Planck Collaboration (2014d); Bobin et al. (2013, 2014). The Planck Collaboration provides templates to correct foreground emission at different frequencies and this will be the approach we will use here. A joint analysis of IRAS and Planck three highest frequency channels showed that dust varies strongly on small scales due to dust evolution, extinction and local effects, particularly in high-contrast molecular regions. To correct the thermal dust emission we need to take into account its great variability and to this purpose use the Planck dust model that gives the

– 16 –

three parameters that define the modified black-body emission law (dust-grains temperature, emissivity index and optical depth) at the reference frequency of 353 GHz (Planck Collaboration 2014c). The map of the thermal dust component is given at the same healpix resolution than the HFI data, N_{side} = 2048. To estimate accurately the contribution of this emission at each Planck frequency we evaluate the spectral model in each sky pixel and convolve it with the passband of each detector. We apply this color correction using the publicly-available routine hfi color correction. Similarly, the synchrotron and free-free emissions are cleaned using the data on the amplitude of those contributions at 30 GHz and a spectral index to scale it to other frequencies at each pixel on the sky (Planck explanatory supplement 2013). The data is given with a resolution of N_{side} = 256 and is integrated with the frequency response at each band using the same routine mentioned before to produce the color correction needed to estimate the flux weighted in each band. The maps of the low-frequency and high-frequency foregrounds are subtracted from each frequency map.

The next step of the process is to clean the CO emission. This contribution is only important for the 100, 217 and 353 GHz channels due to the (1-0), (2-1) and (3-2) rotational transition lines. The Planck collaboration has made available three different types of CO correction maps (Planck Collaboration 2014e). Type 1 maps are too noisy to be of use for our purposes, so we use the Type 2 maps to clean the 100 and 217 GHz channels, the only ones for which the correction is available.

Our final foreground-cleaned maps from 30 to 353 GHz, together with SMICA, are shown in Fig. 5. The data is plotted in the range [−300, 300]μK to emphasize the differences in noise and foreground residuals. We work with a Healpix resolution of N_{side} = 1024 (Gorski et al. 2005). In all the maps there are some residuals of Galactic emission along the Galactic plane but outside the signal is clearly dominated by CMB fluctuations. We use the WMAP Kp0 mask to remove the regions around the Galactic plane and to reduce the contamination due to these foreground residuals as well as that of point sources. By using the same mask in Planck and WMAP we use the same fraction of the sky, facilitating the comparison of the respective results. We did test that the COM-MASK-CMB union mask that removes 27% of the sky and is more adequate to mask point source contribution from Planck data, gave the same results than with the Kp0 mask. Note the stronger similarity of the HFI channels with the SMICA map, the reconstruction of the intrinsic CMB anisotropies made by the Planck Collaboration, compared with the LFI channels. The 353 GHz map appears cleaner than the other HFI channels because it was at this frequency where the Planck dust model was evaluated. Dust residuals are larger at other frequencies due to the uncertainties in the modified black-body model or in the determination of the emissivity index. The residual dust contamination in the Galactic plane diminishes at lower frequencies; at 44 and 70 GHz some residual synchrotron and free-free emission remains. Also, stripes associated with Planck scanning strategy are clearly seen at 30 and 70 GHz. The satellite preferentially observes the sky at the ecliptic poles. Since the instrumental noise is higher at 30 and 44 GHz, the noise inhomogeneities due to this uneven sampling are clearly noticeable. We did not consider the maps at 545 and 857 GHz (not shown in Fig. 5) due to their stronger foreground contamination that

– 17 –

affected regions of high galactic latitude.

4.2. Planck Data Power Spectrum

The seven foreground clean maps of Fig. 5 have a FWHM of, approximately, fwhm = [33^′, 28^′, 13^′, 9.7^′, 7.3^′, 5^′, 5^′]. Their power spectrum and the theoretical ΛCDM model, multiplied by the antenna beam, are represented in Fig. 6 by a broken blue line and a smooth solid black line, respectively. The region around the galactic plane was masked using the Kp0 mask to remove the foreground residual contributions near the galactic plane. The theoretical model fits the data rather well, with a flat spectrum, noise being the only other significant difference. In LFI the noise starts to dominate the intrinsic CMB signal at multipoles ℓ > 400 − 600, being much smaller in HFI. In none of the spectra there is a deviation of the theoretical C_ℓ’s due to foreground residuals or other artifacts, a reassuring fact that foregrounds have been removed to the levels required for this project.

4.3. Planck Data systematics.

The Planck satellite observed the sky at nearly great-circles close to ecliptic meridians. The times a given position has been scanned (or ”hit”) varies across the sky, giving rise to stripes with a similar pattern at ecliptic longitudes. The satellite produces one full sky map every 6 months; the initial and final position are matched with 6 months difference, when the instruments are looking in opposite directions in the solar system. Instrument noise, changes in gain, variations on the solar system foregrounds -mainly zodiacal light- and other effects contribute to small offsets between subsequent scans. As a result, the data shows stripes at nearly ecliptic meridians, most noticeably but not exclusively, at the 30 and 70 GHz channels.

In Fig. 7 we present the ratio of the of the hit maps of 30 and 70 GHz (left) and 100 and 217 GHz (right). Before taking the ratio, we divided each hit map by the mean number of observations to correct the differences between frequencies. Since the detectors at each frequency point to slightly different locations in the sky, the number of hits at a given location is different. A blue stripe in Fig. 7 represents a scan where the number of hits on the 70, 217 GHz channels is larger than those on 30, 100 GHz and a red stripe when it happens otherwise. If the sky coverage were uniform this ratio would be a constant. This figure demonstrates that even if in the foreground-cleaned maps of Fig. 5 stripes are only seen in the LFI maps, they are also present at other frequencies. It would be important to precisely estimate the effects of the stripes on the noise. However, without access to the time ordered data or the details of the systematic trends and details of which data came from which time we are unable to build a detailed covariance matrix. If there are residual effects from the stripes in the final data these should show up as differences when comparing to the WMAP data. The WMAP data has much stronger cross-linkages and so its stripes are smaller, at higher

– 18 –

spatial frequencies and less directional.

Finally, let us remark that the right panel of Fig. 7 shows a band of lower number of hits along the ecliptic plane and some rather odd features at (l, b) = (0^0, 45^0) and at (270^0, −45^0). We have no explanation about why data, that has been taken along ecliptic coordinates, would have been removed along galactic parallels and meridians. Although we can not estimate the effect of these noise inhomogeneities on the data, since we compute error bars using the filtered maps used to compute the dipole, like in WMAP, they will be accounted for in our error bar estimates.

4.4. Results

WMAP and Planck scanning strategies are very different, so comparison between both data sets is important to isolate systematics. To facilitate the comparison, we filter the CMB signal and compute the dipole at the cluster location following the same steps as in WMAP. We use the same mask in both datasets, the Kp0 mask. As the input theoretical model we use the ΛCDM radiation power spectrum with the Planck measured parameters. The filters of the seven Planck Nominal maps and the SMICA map are presented in Fig. 8. Blue and red lines corresponds to the first and second frequency indicated in each panel. Due to the higher noise levels in LFI channels, at ℓ ≥ 500 the filter is close to unity while it oscillates around zero up to ℓ ≃ 10^3 for the HFI channels and the SMICA map. Compared with the WMAP filters shown in Fig. 1, the filters of the two lowest LFI frequencies are similar to those of WMAP but the other filters are very different due to differences in resolution and instrument noise. This behaviour can be explained by the functional form of our filter, F_ℓ = (C^{sky}_ℓ − C^{th}_ℓ B^2_ℓ )/C^{sky}_ℓ ; when the noise dominates F_ℓ ≃ 1 and the graph of F_ℓB_ℓ behaves like B_ℓ. This is clearly seen in WMAP and the two lowest LFI frequencies at ℓ ≥ 400. When the noise is negligible, as in SMICA, then C^{sky}_ℓ differs from C^{th}_ℓ B^2_ℓ due to cosmic variance and F_ℓ oscillates around zero till the noise starts to dominate. For the maps with the lowest noise levels, this happens at higher ℓ’s. The exponential cut-off due to the antenna beam occurs at ℓ ∼ 1500 − 2000, almost outside the multipole range shown in Fig. 8, giving the graph an overall different aspect. Therefore, with Planck data we can test the effect of the filter on our results more than it could do with WMAP.

In Fig. 9 we present the dipoles of the same three cluster configurations of Fig. 2. Error bars were computed using Method 1: We generated 1,000 templates of 800 disks randomly placed on the sky and computed the dipoles on the filtered maps of those random templates. For each template we took subsets of 100, 200 and 400 clusters and verified that σ_{1m} ∝ N^{−1/2}_{cl} . Like in WMAP, error bars on the dipole are driven by the error on the monopole and are approximately given by eq. 2.

The results presented in Fig. 9 show a remarkable consistency among themselves and with those of WMAP 5yr data. The measured dipoles are independent of frequency (with the exception of 30 GHz) and the filter used. The filters, shown in Fig. 8, have different structure in ℓ-space since have been designed to remove the intrinsic CMB anisotropies attending to the specifics of each

– 19 –

particular data set. Only the theoretical model C^{th}_ℓ is common to all filters. The consistency of the measured dipoles shows that our results are neither generated by artifacts introduced by our pipeline nor are dominated by systematics present on the data. The spectral distribution confirms our earlier findings with WMAP: The dipole can not be due to the TSZ effect or from a systematic associated with foreground residuals in the data as the measured dipole remains constant at all frequencies except for the offset at 30 GHz, which is most stripe-dominated. The dipole is clearly different of what it would be if it was due to TSZ effect as suggested by Osborne et al. (2011). In this case, the dipole had to be zero at 217 GHz and have the opposite sign at 353 GHz, none of which is observed. It is also different from what it would be if it was due to foreground residuals that correlated with cluster properties. All known foregrounds vary with frequency, contrary to what is shown in Fig. 9, where the dipoles between 40 to 353 GHz remain constant, independent of frequency. Only the dipoles measured in the filtered 30 GHz map appear to be systematically different (at ∼ 1σ level) and closer to zero than those of all the other maps, including the SMICA map. At the other Planck frequencies the dipoles are slightly offset compared with the values measured in WMAP. For example, at z ≤ 0.25 a_{1Y} is systematically above the KAEEK value at more than 1σ. We will discuss later the possible reasons for systematic differences between WMAP and Planck results.

As in Fig. 4, the dipoles measured in Planck data show a clear correlation with the TSZ monopole in the unfiltered map, both in the LFI and the HFI channels. In Fig. 10 we show the dipole components, a_{1Y} and a_{1Z} , the dipole modulus and the statistical significance for the cluster configurations selected according to redshift z ≤ 0.16, 0.2, 0.25 and X-ray luminosities (in units of 10^{44}erg/s) in the range L_X < 1, L_X = [1 − 2] and L_X > 2. The dipoles are plotted vs the monopole a_0 measured over a solid aperture of radius 10arcmin in the original (unfiltered) foreground-cleaned Planck Nominal maps. For simplicity we only show two frequencies: 70 GHz (solid black circles) and 143 GHz (blue squares). The statistical significance has been computed by generating 10^5 random dipoles with zero mean and rms dispersion the uncertainty in each dipole component for each cluster configuration and finding the fraction of random dipoles with amplitude larger than the measured value. The statistical significance exceeds 99% in the three most significant bins, the three bins with the brightest clusters, L_X > 2 × 10^{44}erg/s.

First, notice that at 70 GHz monopoles are larger than those at 143GHz, but the ratio is smaller than ∼ 1.7, i.e., it is smaller than the ratio of the TSZ amplitude at 70GHz to 143GHz. The 70GHz channel has lower resolution (see Sec 4.2) and dilutes cluster anisotropies more than 143GHz. Second, the largest monopoles and dipoles corresponds to the most luminous 130 clusters with z < 0.16 but the highest significance corresponds to the 208 clusters with z < 0.2. The second bin has a larger number of clusters and the dipole components are measured with a slightly better signal-to-noise ratio. This small difference results in great variations on the statistical significance since we are exploring the tail of the distribution.

– 20 –

4.5. Comparison of WMAP and Planck dipoles.

The dipoles measured at the different Planck frequencies display remarkable consistency, except for 30 GHz, and exhibit a strong correlation with the TSZ monopole. These results are consistent with the dipoles measured previously in WMAP. In Fig. 11 we compare the three components of the dipole for the three X-ray luminosity bins of clusters with redshift z ≤ 0.16 measured in WMAP 5, 9yr and Planck at 100GHz, represented by triangles (red), diamonds (blue) and solid circles (black), respectively. In the X-axis, the 5 yr data is shifted by two units to avoid over-plotting data. The results from WMAP 3 and 7 yr data are also consistent with those plotted in the figure but are not shown to avoid overcrowding. The monopoles are computed on apertures of 10arcmin in unfiltered maps while dipoles are computed over apertures of 25arcmin radii, which correspond to the WMAP zero monopole aperture. Although the WMAP W-band frequency of observation is 94GHz, not far from the 100GHz channel shown in the figure, its monopoles are significantly smaller, particularly for the bin containing the most luminous clusters. The difference is due to WMAP having lower angular resolution (∼ 12^′) than Planck (∼ 5^′) at those frequencies and, consequently, the TSZ cluster anisotropy is more diluted.

While WMAP and Planck data are consistent, the data show some small but systematic differences. In Fig. 12 we compare the dipoles of WMAP 9-yr data, averaged over the 4 DA’s of the W band with the dipoles measured in Planck 70 GHz map, of similar angular resolution. Only 11 points (out of the 12 cluster subsamples of KAEEK) are seen since two values merge on the plot, as indicated in Sec. 3. For reference, the red dashed line shows the dipoles having the same value in both data sets. For clarity we do not show the error bars here; for any cluster subsample the dipoles of either satellite differ by less than one standard deviation. Fig. 12 shows that the a_{1x}’s components are randomly distributed above and below the red dashed line, the a_{1y}’s measured in Planck are systematically smaller than those of WMAP and the distribution of the a_{1z}’s is indifferent.

Although the discrepancies in Fig. 12 are not yet relevant, the systematic offset in the ycomponent of the dipole or the discrepant results of the 30 GHz channel could be the result of systematics present in the Planck data. We have already noted in Figs 5 and 7 that foregroundcleaned Planck Nominal maps contain very strong non-gaussian features. Even if stripes correspond to differences in the number of observations (or weights) in the data, they are not erased but are rather enhanced by filtering. The filter depends on the noise, (1/f)-features could introduce some effect, mostly in the 30 GHz map, the channel with the largest intrinsic noise of all the Planck frequencies. There are other effects that could be more pernicious. The low weight stripes are often there because over most of the sky there are 2 distinct sets of observations 6 months apart while at the beginning or end of the period there is only one set of observations. This has several effects, first because there is only one set of data, there is a single correction for long term drifts so whatever effects are there one has fewer data sets to average over. This increases the systematic effects according to the number of data sets which is a small number. Secondly there are fewer data to check these long term drifts against other data. Finally in the middle of a data

– 21 –

set one can interpolate, while at the end one must necessarily extrapolate which is intrinsically more uncertain. These effects lead to higher noise at low frequencies. The pattern of the Planck observations puts the low temporal frequencies at low spatial frequencies. As can be noted from Fig. 11 of Planck Collaboration (2014b) systematic effects have higher than proportional noise at low frequencies and this effect would be largest at 30 GHz, where the noise is higher, than at other channels and could be the underlying reason why the dipole has not been equally preserved by the filter than in WMAP. As indicated in Sec 4.3, understanding the effect of stripes would require to analyze the time ordered data and goes beyond the scope of this paper.

4.6. Comparison with Planck earlier results

Our results differ markedly from an earlier analysis of Planck data using the Internal Linear Combination map (Planck Collaboration (2014g), hereafter PIR-13), a foreground clean map similar to SMICA constructed to measure the KSZ effect. The TSZ contribution in their map was removed to less than a few percent of its original value. The Planck Collaboration claim not to have found any detection of a bulk flow as measured in any comoving sphere extending to the maximum redshift covered by their cluster sample. In fact, they found a dipole for their full cluster sample (see Fig. 10 of PIR-13) similar to ours but overestimated their error bars, diluting the statistical significance of their measurement. The Planck Collaboration used two flawed methods to compute errors. 1) They rotated the cluster template around the z-axis; this method underestimates the error on the z-component and overestimates it in the x and y-components, given an overall increment on the error of modulus (see Atrio-Barandela (2013), Table 1 and Figs. 2 and 3). 2) They computed the errors measuring dipoles with the actual distribution of clusters over simulated CMB skies, but their simulations did not mimic the data accurately enough. In the real sky, filtering leaks power from high galactic latitude to the Galactic plane. In their simulated maps the Planck Collaboration did not apply any galactic mask, preventing the power leakage to the plane of the Galaxy. As a result, their simulated maps contain higher power than the actual sky (see Atrio-Barandela (2013) Figs. 4 and 5), again overestimating their errors by a similar amount than in their rotation method^4 (see Atrio-Barandela 2013 for a full discussion). In addition, they did not find a larger dipole for their 200 most massive clusters. While some differences may arise from the differences in cluster samples, the lack of correlation between dipole and monopole is probably due (A) to their binning and (B) to having eliminated the TSZ component from their map, a component which we have shown not to have an effect on the measured dipole (see Fig. 9). In Figs. 4 and 10 we have demonstrated that the largest dipole originates from clusters with L_X > 2×10^{44}erg/s and z < 0.16. Adding clusters with higher redshift in the same luminosity bin reduces both the monopole and dipole, consistent with clusters being more diluted by the antenna. If their subsample of massive clusters is, on average, at higher redshifts, then their dipole would be smaller than the values we

4This information was passed on by FAB when PIR-13 was being written.

– 22 –

have found. To verify the dipole-monopole correlation they ought to have measured the TSZ from foreground clean maps at different frequencies, to check if their most massive clusters produced the largest TSZ monopole or not.

5. Conclusions

We have computed the dipole at the cluster locations using the same techniques for WMAP and Planck. We find a “dark flow” signal which correlates with X-ray properties, and is therefore likely related to cluster gas, and not to the primary CMB, foregrounds or noise. The results are in excellent agreement with our earlier findings and are consistent both in WMAP 9 yr and in Planck 1 yr. Those instruments used different scanning strategies, which resulted in different systematics and, while small differences remain, the close agreement is reassuring of the real nature of the dipole signal. Specifically we found that:

• The dipole at the zero monopole aperture remains at cluster positions at the same level as in KAEEK.

• The dipole at cluster positions correlates with the TSZ monopole, a proxy for X-ray luminosity.

• The signal is consistent among the different multi-year WMAP integration filters and with all Planck frequencies, except for a small, typically ∼ 1σ, offset at 30 GHz.

• The noise of the measurement in our filtered maps is in good agreement with the analytical and numerical theory developed in AKEKE and summarized here.

• The overall statistical significance of the dipole signal in WMAP is similar to that found in KAEEK, and is larger for Planck than for WMAP.

• Within the uncertainties the signal points in the direction of the all-sky CMB dipole.

• If one accepts the KSZ interpretation of the detected statistically significant signal the equivalent velocity is ∼ 600 − 1, 000km/s, within the systematic and statistical calibration uncertainties discussed by Kashlinsky et al. (2009), KAEEK and Atrio-Barandela et al. (2012).

While we deliberately avoid interpretation here, we note that the measurements are consistent with the “dark flow” proposition (KABKE), namely the existence of a primordial CMB dipole of non-kinematic origin, which then presents itself as an effective motion across the entire cosmological horizon. No other alternative interpretation of the measured signal has been advanced although it would be of scientific interest. Instead, the debate concentrated along the lines of trying alternative filtering schemes, which may erase the signal (Atrio-Barandela et al. 2012). Indeed, an all-sky filtering cannot imprint a dipole exclusively at cluster positions, which would in addition correlate

– 23 –

with cluster X-ray luminosity, but given the still limited significance of the measurement of about (3 − 4)σ, other filtering schemes can reduce the measurement below being statistically significant (see Fig. 13 of Osborne et al. (2011), where such alternative filtering schemes start picking up the KSZ signal at velocities exceeding 4,000-6,000 km/sec).

If the “dark flow” corresponds to a large scale motion it is of interest to compare with peculiar velocities derived using other methods. First, Planck Collaboration (2014f) have measured the aberration of the CMB temperature fluctuations due to our local motion, constraining the amplitude of large scale flows in the direction of the solar motion, i.e., constraining the motion of the Local Group projected in that direction but not the full vector. Velocity estimates relying on distance indicators are affected by their uncertainties. For instance, Watkins & Feldman (2014) argue that their previous results overestimated the flow due to their distances being underestimated by 10%. Probes of the velocity field on scales ≥ 100h^{−1}Mpc depend on the value of the Hubble constant and the current discrepancies between local measurements and the Planck value makes these measurements even more uncertain. Supernovae Type Ia have also been used to measure velocities. Turnbull et al. (2013) find that their sample does not show large-scale bulk flow. However, Wiltshire et al. (2013) argue for the opposite finding that the Hubble expansion exhibits considerably more variance in the rest-frame of the CMB dipole that in the inertial frame of the Local Group. The cosmic radio dipole is also peculiar. It has an amplitude larger than expected from a purely kinematic effect and a significant contribution to this excess could come from a local void or similar structure Rubert et al. (2013). Future work, including by our team, with an expanded cluster catalog now in an advanced stage of preparation, should shed more light on the existence of the “dark flow”.

FAB acknowledges financial support from the Spanish Ministerio de Educación y Ciencia (grant FIS2012-30926). We thank R. Génova-Santos for providing the foreground cleaned maps used in this work.

REFERENCES

Abbott, L.F. & Wise, M. B. 1984, ApJ, 282, L47

Atrio-Barandela, F., 2013, A&A, 557, 116

Atrio-Barandela, F., Kashlinsky, A., Kocevski, D. & Ebeling, H. 2008, ApJ, 675, L57

Atrio-Barandela, F., Kashlinsky, A., Ebeling, H., Kocevski, D. & Edge, A. 2010, ApJ, 719, 77 (AKEKE)

Bobin, J., Starck, J.-L., Sureau, F. & Basak, S. 2013, A&A, 550, 73

Bobin, J., Sureau, F., Starck, J.-L., Basak, S. & Paykari, P. 2014, A&A, 536, 105

– 24 –

Gorski, K. et al 2005, ApJ, 622, 759 Kashlinsky, A. & Atrio-Barandela, F. 2000, Astrophys. J., 536, L67 Kashlinsky, A., Atrio-Barandela, & Ebeling, H. 2012, arXiv:1202.0717 (KAE12) Kashlinsky, A., Atrio-Barandela, F., Kocevski, D. & Ebeling, H. 2008, ApJ, 686, L49 (KABKE) Kashlinsky, A., Atrio-Barandela, F., Kocevski, D. & Ebeling, H. 2009, ApJ, 691, 1479 (KABKE2) Kashlinsky, A., Atrio-Barandela, F., Ebeling, H., Edge, A., & Kocevski, D. 2010, ApJ, 712, L81 (KAEEK) Kashlinsky, A., Atrio-Barandela, F. & Ebeling, H. 2011, ApJ, 732, 1 (KAE11) Kashlinsky, A., Atrio-Barandela, F., Ebeling, H. 2012, Phys. Rep. (commissioned/submitted).

Preprint: arXiv:1202.0717 (KAE12) Keisler, R. 2009, ApJ, 707, L42 Kogut, A. et al 1993, ApJ, 419, 1 Matzner, R. 1980, ApJ, 241, 851 Mersini-Houghton, L. & Holman, R. 2009, JCAP, 2, 6 Osborne, S. J., Mak, D. S. Y., Church, S. E., & Pierpaoli, E. 2011, ApJ, 737, 98 Planck Collaboration. “Planck 2013 Results I: Overview of products and scientific results”, 2014a, A& A, 571, 1 Planck Collaboration. “Planck 2013 Results II: The Low Frequency Instrument data processing”, 2014b, A& A, 571, 2 Planck Collaboration. “Planck 2013 Results XI: All-sky model of thermal dust emission”, 2014c, A& A, 571, 11 Planck Collaboration. “Planck 2013 Results XII: Component Separation”, 2014d, A& A, 571, 12 Planck Collaboration. “Planck 2013 Results XIII: Galactic CO emission”, 2014e, A& A, 571, 13 Planck Collaboration. “Planck 2013 Results XXVII: Doppler boosting of the CMB: Eppur si muove”, 2014f, A& A, 571, 27 Planck Collaboration. “Planck Intermediate Results XIII: Constraints on peculiar velocities”, 2014g, A& A, 561, 97 (PIR-13) Planck Collaboration. Planck explanatory supplement. First release v1.00 2013

Piffaretti, R., Arnaud, M., Pratt, G. W., Pointecouteau, E., & Melin, J.-B. 2011, A& A, 534, A109 Rathaus, B., Kovetz, E. D., Itzhaky, N. 2013, MNRAS, 431, 3678 Rubert, M., Bacon, D., Schwarz, D.J. 2014, A&A, 565, 111 Strauss, M. A. & Willick, J. A. 1995, Phys Rep, 261, 271 Sunyaev, R. A. & Zel’dovich, Y. B. 1970, ApSS, 7, 3 Sunyaev, R. A. & Zel’dovich, Y. B. 1972, CoASP, 4, 173 Turnbull, S. J.; Hudson, M. J., Feldman, H. A., Hicken, M., Kirshner, R. P. & Watkins, R. 2012, MNRAS, 420, 447 Turner, M. S. 1991, Phys. Rev., 44, 3737 Watkins, R., Feldman, H. A. & Hudson, M. J. 2009, MNRAS, 392, 743 Watkins, R., Feldman, H. A. 2014, ArXiv:1407:6940 Wiltshire, D., Smales, P., Mattsson, T. & Watkins, R. 2013, Phys Rev D, 88, 3529

This preprint was prepared with the AAS L^ATEX macros v5.2.

Fig. 4.— Results for W-band data per Table 1 of KAEEK vs the unfiltered central monopole. The dipoles were measured on an aperture of 30arcmin radius and the errors have been computed using Method 1 (see Sec. 3.2).

Fig. 5.— Foreground-cleaned Planck Nominal maps. From top to bottom and left to right, maps correspond to channels 30, 44, 70, 100, 143, 217 and 353 GHz; the bottom right plot corresponds to the SMICA CMB map. 27

Fig. 6.— Radiation power spectra of the maps given in Fig. 5. The blue and red lines correspond to the first and second frequencies specified in the text, respectively. The black lines correspond to the ΛCDM model that best fits the data, multiplied by a gaussian beam at the resolution of each channel.

Fig. 7.— Ratio of the number of hits between the 30 and 70 GHz (left) and the 100 and 217 GHz channels (right). A blue stripe corresponds to number of hits of 70, 217 GHz being larger than those of 30, 100 GHz and otherwise for a red stripe.

Fig. 8.— Filters in ℓ-space of the seven foreground-cleaned Planck and SMICA maps. Lines follow the same convention as in Fig. 6.

Fig. 9.— Comparison of WMAP 5 yr and Planck 1 yr dipoles. Planck dipoles are represented by filled circles with the corresponding error bars computed using Method 1 (see Sec 3.2). Solid lines and shaded areas correspond to the measured dipoles in WMAP 5 yr data for the same cluster configurations, as in Fig. 2.

Fig. 10.— Dipoles for all the cluster configurations measured on apertures of 25’ vs the unfiltered monopole on 10’ and their statistical significance. Error bars have been computed using Method 1. Only two channels are shown: 70 GHz (black solid circles) and 143 GHz (blue squares).

Fig. 11.— Comparison of WMAP and Planck dipoles for the three luminosity bins with of clusters with redshift z ≤ 0.16. Triangles (red), diamonds (blue) and solid circles correspond to WMAP W-band 5, 9 yr data and Planck data, respectively.

Fig. 12.— Comparison of the three dipole components measured in WMAP 9yr W-band data with those of Planck at 70 GHz for the same cluster subsamples. The dashed red line corresponds to the dipoles been equal. For clarity, error bars are not shown. The differences between both data sets are always smaller than 1σ for all configurations.