arXiv:1407.5844v1 [nucl-ex] 22 Jul 2014

Investigation of rare nuclear decays with BaF_2 crystal scintillator contaminated by radium

P. Belli^1, R. Bernabei^{1,2,a}, F. Cappella^{3,4}, V. Caracciolo^5, R. Cerulli^5, F.A. Danevich^6, A. Di Marco^2, A. Incicchitti^3, D.V. Poda^6, O.G. Polischuk^{3,6}, and V.I. Tretyak^{3,6}

1 INFN, Sezione di Roma “Tor Vergata”, I-00133 Rome, Italy 2 Dipartimento di Fisica, Università di Roma “Tor Vergata”, I-00133 Rome, Italy 3 INFN, Sezione di Roma, I-00185 Rome, Italy 4 Dipartimento di Fisica, Università di Roma “La Sapienza”, I-00185 Rome, Italy 5 INFN, Laboratori Nazionali del Gran Sasso, I-67100 Assergi (AQ), Italy 6 Institute for Nuclear Research, MSP 03680 Kyiv, Ukraine

Received: date / Revised version: date

Abstract. The radioactive contamination of a BaF2 scintillation crystal with mass of 1.714 kg was measured over 101 hours in the low-background DAMA/R&D set-up deep underground (3600 m w.e.) at the Gran Sasso National Laboratories of INFN (LNGS, Italy). The half-life of^{212} Po (present in the crystal scintillator due to contamination by radium) was measured as T_{1/2}(^{212}Po) = 298.8±0.8(stat.)±1.4(syst.) ns by analysis of the events’ pulse profiles. The^{222}Rn nuclide is known as 100% decaying via emission of α particle with T_{1/2} = 3.82 d; however, its β decay is also energetically allowed with Q_β = 24 ± 21 keV. Search for decay chains of events with specific pulse shapes characteristic for α or for β/γ signals and with known energies and time differences allowed us to set, for the first time, the limit on the branching ratio of^{222}Rn relatively to β decay as B_β < 0.13% at 90% C.L. (equivalent to limit on partial half-life T^β_{1/2} > 8.0 y). Half-life limits

of^{212}Pb,^{222}Rn and^{226} Ra relatively to 2β decays are also improved in comparison with the earlier results.

PACS. 23.40.-s β decay; double β decay; electron and muon capture – 27.80.+w 190 ≤ A ≤ 219 – 27.90.+b A ≥ 220 – 29.40.Mc scintillation detectors

1 Introduction

The BaF_2 crystal is a promising scintillator for different applications, including detection of high energy gamma rays [1] and neutrons [2]. The scintillation material is also widely used in medicine for positron emission tomography (PET) [3]. The compound looks a promising detector to search for double beta (2β) decay of barium. 2β decay is a transformation of nuclide (A, Z) to (A, Z ± 2) with simultaneous emission of two electrons or positrons and two (anti)neutrinos. This rare nuclear decay is allowed by the Standard Model (SM). On the other hand, neutrinoless double β decay is forbidden by the SM due to violation of the lepton number L by 2 units, but it is predicted by many SM extensions. It is considered as one of priority topics in current nuclear and particle physics because it allows one to test the nature of neutrino (Dirac or Majorana particle), the L conservation, the absolute scale and the hierarchy of the neutrino masses, the existence of right-handed admixtures in the weak interaction, the existence of Majorons and other interesting subjects [4]. Natural barium contains two potentially 2β ac-

a e-mail: rita.bernabei@roma2.infn.it tive isotopes,^{130}Ba (Q_{2β} = 2618.7(2.6) keV) and^{132}Ba (Q_{2β} = 844.0(1.1) keV) [5,6]. The^{130}Ba isotope is of particular interest because of two reports on the observation in geochemical experiments of double electron capture with half-life T_{1/2} = (2.2 ± 0.5) × 10^{21} y [7] and T_{1/2} = (6.0 ± 1.1) × 10^{20} y [8]. The first direct laboratory search for 2β decays of^{130}Ba was performed with BaF_2 crystal scintillator in Ref. [9], where only T_{1/2} limits were obtained on the level of ≃ 10^{17} yr. Thus, further R&D’s for BaF_2 detectors are desirable.

Typically, high level of radioactive contamination of BaF_2 scintillation crystals by uranium and thorium is the main source of background of the detectors [9]; however, this feature allows us to use the detector for measurements of some short-lived isotopes in U/Th chains (e.g. of^{212}Po). Results of measurements of radioactive contamination of a large volume BaF_2 crystal scintillator are presented in this work (section 2). We have also derived a half-life value of 212Po from the data by using pulse-shape analysis of^{212}Bi –^{212}Po events (section 3). In section 4, search for decay chains of events with specific pulse shapes characteristic for α or for β/γ signals, and with known energies and time differences allowed us to set, for the first time, the limit on the β decay of^{222}Rn. Half-life limits of^{212}Pb,^{222}Rn and^{226}Ra relatively to 2β decays are also improved in comparison with the earlier results [10].

2 Experimental measurements and data analysis

2.1 Experiment

The radioactive contamination of a BaF_2 crystal (⊘3^{′′} × 3^{′′}, 1.714 kg) was measured over 101 hours in the lowbackground DAMA/R&D set-up deep underground (3600 m w.e.) at the Labotatori Nazionali del Gran Sasso of INFN (LNGS, Italy). The BaF_2 crystal scintillator was viewed through two light-guides (⊘3^{′′} × 100 mm) by two low radioactive 3^{′′} photomultipliers (PMT, ETL 9302FLA). The detector was surrounded by Cu bricks and sealed in a low radioactive air-tight Cu box continuously flushed by high purity nitrogen gas to avoid the presence of residual environmental radon. The Cu box was surrounded by a passive shield made of high purity Cu, 10 cm of thickness, 15 cm of low radioactive lead, 1.5 mm of cadmium and 4 to 10 cm of polyethylene/paraffin to reduce the external background. The shield was contained inside a Plexiglas box, also continuously flushed by high purity nitrogen gas.

An event-by-event data acquisition system is operative in the set-up. In details, the output signals of each PMT, after being pre-amplified, were summed and sent to a 1 GSample/s Transient Digitizer (TD, Acqiris DC2 model) that recorded the signal profile over a time window of 4000 ns. The preamplifier has 0 – 250 MHz bandwidth, a factor 10 gain and a voltage integral linearity 0.2%. Therefore no sizable distortion of the PMT signals is expected. A leading edge discriminator with threshold about –25 mV provided discriminated signal for each PMT. The feed of the discriminator was obtained after filtering the PMT signal by an Ortec Time Filter Amplifier (TFA). The trigger of the acquisition and of the TD was obtained by requiring the coincidence of the 2 PMT discriminated signals in a 50 ns time window. In such a way a hardware energy threshold of about 30 keV was obtained. The trigger rate was around 75 counts/s. For each recorded event the area (“amplitude”) of the pulse profile in a window of 1600 ns was calculated.

The energy scale of the BaF_2 detector and its energy resolution in the range of interest have been determined by means of^{22}Na (γ lines at 511, 1275 keV),^{137}Cs (662 keV),^{241}Am (60 keV),^{60}Co (1173, 1333 keV),^{133}Ba (356 keV) and^{228}Th (239, 2615 keV) sources. The energy resolution (full width at half maximum, FWHM) for 662 keV γ quanta of^{137}Cs was 15.5%, while for 511 and 1275 keV γ lines of^{22}Na source the energy resolution was 16.4% and 10.8%, respectively (see Fig. 1^1). The energy dependence of the energy resolution can be approximated as: FWHM_γ (keV) = [397(54) + 15.6(3) × E_γ ]^{1/2}, where E_γ is the energy of the γ quanta in keV.

1 In all the figures the energy is given in γ scale.

Fig. 1. (Color online) Energy spectra accumulated with the BaF2 detector when irradiated by the^{137}Cs and^{22}Na γ sources. The peak at the energy of ≃ 1.3 MeV in the^{137} Cs spectrum is due to pile-ups of events. The peculiarities above ≃ 1.3 MeV are caused by contamination of the crystal by Ra.

We would like to make here a remark on equivalence of the energy scale for γ quanta and β particles. Some scintillators, e.g. the liquid organic ones, have quite big nonproportionality of the relative light output L(E)/E. The examples can be seen in [11] for the Borexino liquid scintillator (LS) and in [12] for the Double Chooz LS. Value of L(E)/E is 90 − 95% at ≃ 100 keV in comparison with 100% at ≃ 1000 keV and quickly drops further at lower energies. Liquid organic scintillators consist mainly from light elements C and H with small cross-sections of interaction with γ’s, and – as an example – 1 MeV γ quantum has a few Compton scatterings before its total absorption in LS. Each of the produced Compton electrons has only part of the total energy of 1 MeV, and thus lower L(E)/E value. When scintillation signals from all these electrons are collected, total signal in result has a smaller amplitude in comparison with that is expected from single 1 MeV electron. Thus, in big-size scintillators non-proportionality leads to worse energy resolution and to energy shift for γ quanta. For example, in [13] position of the 1461 keV^{40}K γ peak corresponds to 1360 keV of energy deposited for an electron. Size of scintillator is important because in smaller detectors γ quantum will give the peak of total absorption preferably through photoeffect producing only one electron with high energy and L(E)/E value closer to 100%.

For BaF_2 scintillator, non-proportionality in L(E)/E is much lower than that for organic LS, as demonstrated e.g. in [14,15]. In addition, volume of our BaF_2 crystal is 3 − 4 orders of magnitude lower than those of the Borexino and Double Chooz detectors. Thus, one can expect much lower difference between γ and β signals in the BaF_2 (which additionally is masked by rather poor energy resolution). This effect surely exists in our BaF_2 detector, but in the present article it is not taken into account and considered as not very important for the aims of this work.

2.2 Pulse-shape discrimination of α, β/γ and Bi-Po events

Scintillation signals from events of different origin (α particles; γ quanta or β particles; PMT noise; etc.) have different time profiles, and this can be used for their discrimination. We utilize here modification of a pulse-shape discrimination (PSD) technique based on a mean time of events (see e.g. [9,16]). Time profile of an event, stored in 4000 channels with 1 ns channel’s width, is used to calculate its mean time as: ⟨t⟩ = ∑ a_i · t_i/ ∑ a_i, where the sum is over time channels i starting from the origin of the pulse up to certain time, and a_i is the digitized amplitude (at the time t_i) of a given signal.

The scatter plot of the mean time versus energy for background runs is shown in Fig. 2 which demonstrates pulse-shape discrimination ability of the BaF_2 detector. Mean time distributions (similar to the one presented in Inset of Fig. 2) were built for 18 energy intervals of 100 keV wide in the range of 1200−3000 keV using the data of the background measurements. Then the mean time distributions were fitted by two Gaussians which represent α’s and γ’s, with the centre and width dependent on energy. The following dependencies were obtained: τ_γ (E) = 556(12), σ_γ (E) = 0.9(1) + 653(23)/ √ E, τ_α(E) = 490(13) + 6(3) × 10^{−3} × E, σ_α(E) = 3.1(1) + 512(22)/ √ E, where E is in keV, and τ and σ are in ns. Using these dependencies, ±3σ contours were calculated where 99% of the corresponding events were contained (see Fig. 2).

If the time interval between two subsequent signals is shorter than 4000 ns, the data acquisition system will record them as one event. Nevertheless, such events can be recognized by analysis of their time profile. Events in the fast chains^{212}Bi–^{212}Po (from^{232}Th family), with T_{1/2}(^{212}Po) = 299 ns and^{214}Bi–^{214}Po (from^{238}U), with T_{1/2}(^{214}Po) = 164.3 μs belong to this category (the socalled Bi-Po events). An example of the^{212}Bi →^{212}Po → 208Pb event in the BaF_2 scintillator is presented in Fig. 3. The Bi-Po events can be separated from α and β/γ events by the pulse-shape discrimination because of their specific time profile which leads to different mean time distribution (see Fig. 2). The time intervals between β events (of 212Bi or^{214}Bi) and subsequent α events (of^{212}Po or^{214}Po) were obtained by analysis of the pulse profiles.

The background energy spectrum accumulated over 101 hours with the BaF_2 crystal scintillator is presented in Fig. 4. A substantial increase of the counting rate in the energy interval 1.3 – 3.4 MeV is due to α activity of^{238}U and^{232}Th daughters from radium contamination (see below) of the BaF_2 crystal. Separation of the α and β/γ signals was done event by event using the PSD technique (corresponding spectra are also shown in Fig. 4).

The energy spectrum of α events selected from the background data with the help of the pulse-shape discrimination is presented in Fig. 5. We use asymmetric cut which

Fig. 2. (Color online) Scatter plot of the mean time versus energy accumulated by the BaF2 scintillation detector during one background run (≃ 2 h). The contours give regions where 99% of α or β/γ events are concentrated. The population of events in the energy interval ≃ 1 − 6 MeV with mean time values mainly above the β/γ and α regions are caused by the decays of the fast^{212} Bi–^{212} Po sub-chain of^{228}Th (Bi-Po events, see text). (Inset) The mean time spectrum in the energy interval 2000 – 2100 keV. The α and β/γ events distributions are fitted by Gaussian functions (solid lines).

Fig. 3. (Color online) Example of the Bi-Po event in the BaF2 scintillator.

selects 98% of α events^2; around 18% of γ/β events also are present in the resulting data. The α spectrum was fitted by a model built by α peaks from^{235}U,^{238}U and^{232}Th and their daughters, assuming broken equilibrium in the chains. The equilibrium can be broken due to different chemical properties of nuclides in U/Th chains (in com-

2 We have selected events in the interval of the mean time values from 300 ns up to the value of τα where 98% of the integral is reached (taking into account the τα(E) and σα(E) energy dependencies).

Fig. 4. (Color online) Background energy spectrum of the BaF2 scintillator collected during 101 hours. The spectrum of β/γ events separated by the pulse-shape discrimination is shown by dotted line.

parison with those of barium) and relatively big half-lives of some nuclides in the chains. Therefore the activities of the following nuclides and sub-chains (^{232}Th,^{228}Th– 212Pb;^{238}U,^{234}U,^{230}Th,^{226}Ra–^{214}Po,^{210}Po;^{235}U,^{231}Pa, 227Ac–^{211}Bi) were taken as free parameters of the fit. Furthermore, values of the energy resolution of the detector to α particles and α/β ratio (relative light output for α particles as compared with that for β particles (γ rays) of the same energy) were also introduced into the fit as free parameters. According to the fit, the α/β ratio for the BaF_2 scintillation detector depends on energy of α particles as α/β = 0.200(1) + 0.0245(1) × E_α, where E_α is energy of α particles in MeV. The energy resolution for α particles is FWHM_α (keV) = (28 × E^γ_α)^{1/2}, where E^γ_α is the energy of α particles in γ scale (in keV). Some difference between the fit and the spectrum of the selected α’s in Fig. 5 can be due to not perfectly Gaussian shape of the α peaks, nonlinear dependence of the α/β ratio on energy in wide energy interval, some broadening and shift of the^{222}Rn and^{218}Po peaks due to nonuniformity of light collection caused by diffusion of radon in the crystal. The radioactive contaminations of the BaF_2 crystal obtained from the fit are presented in Table 1.

One can conclude that the BaF_2 crystal is contaminated by radium which was not removed from the BaF_2 during the material preparation and the crystal growth because of chemical similarity of barium and radium, while all other elements which belong to U/Th chains were effectively removed that resulted in broken secular equilibrium. Residual contamination by^{226}Ra (T_{1/2} = 1600 y) lead to related activities of daughter α decaying^{222}Rn and 218Po (in equilibrium with^{226}Ra). Area of^{214}Po α peak is smaller in comparison with the peak of^{226}Ra (see Fig. 5) due to the dead time of the detector of 1.65 ms, big compared with^{214}Po half-life (164 μs). Equilibrium at^{210}Pb is also broken that is related with its big half-life (22.3 y) in comparison with the time passed from production of the BaF_2 crystal (few years); this results also in lower activity of its α decaying daughter^{210}Po in Fig. 5. Similarly, presence of^{228}Th,^{224}Ra,^{220}Rn,^{216}Po,^{212}Bi in the α spectrum can be explained by residual contamination of the BaF_2 crystal by^{228}Ra (T_{1/2} = 5.75 y). Contribution from^{212}Bi in Fig. 5 is smaller because of its ≃ 36% branching in the^{228}Ra chain.^{228}Ra itself does not contribute to the α spectrum because it decays with emission of β’s and γ’s.

Fig. 5. (Color online) Energy spectrum of α events selected by pulse-shape discrimination from the data of low-background measurements with the BaF2 crystal over 101 hours (points). Fit of the data by the model built from α decays of^{238} U and 232Th daughters is shown by solid black line (individual components of the fit are presented by colored lines).

Table 1. Radioactive contaminations of the BaF2 crystal. Limits are given at 90% C.L.

Chain Nuclide Activity, Bq/kg

232Th^{232}Th <0.004 228Th 1.35(6)

238U^{238}U <0.0002 226Ra 7.8(1) 210Pb 0.99(1)

235U^{235}U <0.0006 231Pa <0.0007 227Ac <0.07

2.3 Analysis of Bi-Po events

The Bi-Po events were selected as events with energy E > 30 keV and the time difference between the first and second signals in the range of 30 ns to 3000 ns; discrimination by mean time method was not used.

The energy spectra of the first events (β decay of^{212}Bi with Q_β = 2254 keV and^{214}Bi with Q_β = 3272 keV) and of the second events (α decay of^{212}Po with Q_α = 8954 keV and^{214}Po with Q_α = 7833 keV) selected from the Bi-Po pulse profiles are presented in Fig. 6.

Fig. 6. (Color online) Energy spectra of the first (mainly^{212}Bi with Q_β = 2254 keV; top) and of the second (mainly^{212}Po, Qα = 8954 keV; bottom) events selected by the pulse-shape analysis of the background data accumulated with the BaF2 crystal scintillator over 101 hours. Red lines show individual components of the fit, while black line represents the total fit. Beta spectrum below ≃ 300 keV is distorted by the energy threshold effects.

We have estimated activity of^{228}Th from the Bi-Po analysis as 1.17(12) Bq/kg, which is in reasonable agreement with the result obtained from the fit of the alpha spectrum presented in Fig. 5.

3 Half-life of^{212}Po

The distribution of the time intervals between two subsequent signals in the Bi-Po events is presented in Fig. 7. In order to suppress the contribution of the^{214}Bi–^{214}Po chain (with the half-life of^{214}Po T_{1/2} = 164.3 μs), the energy of the second event was selected in the energy interval 3000 – 3800 keV (see bottom part in Fig. 6). In the following, an energy threshold of 300 keV was chosen for the first events to decrease jitter of the event time determination. The time spectrum was fitted by sum of two exponential functions that represent the decays of^{212}Po and^{214}Po and constant which describes contribution from randomly coincident events (with the total counting rate of 75 counts/s, this contribution is < 1%). The half-life of the second exponent was not exactly fixed but restricted in the interval of T_{1/2} = 164.3±2.0 μs taking into account the table uncertainty of the^{214}Po T_{1/2} [17].

To estimate a systematic error of the half-life value, the time spectra (with time bins of 1, 2 and 3 ns per channel) were fitted by the chi-square method in 30 different time intervals (for each binning). The starting point in the fit varied from 100 ns to 250 ns, and the end point from 1350 ns to 1550 ns. All the fits gave the χ^2/n.d.f. values in the range of 0.92 – 1.15 (where n.d.f. is the number of degrees of freedom). The obtained values of^{212}Po halflife lay in quite narrow range of 297.4 – 299.8 ns with an average value of 298.8±0.8(stat.) ns. Different binning of the time spectrum contributes to the systematic error for 1.05 ns, and the change of the fitting interval provides 0.96 ns; summing them quadratically, they give the systematic error of 1.4 ns. This value is considered as reliable: for example, the fitting procedure with the time bin increased to 10 ns gives an average T_{1/2} value of 300.2±0.8(stat.) ns which is inside the systematic error.

The obtained final half-life T_{1/2} = 298.8 ±0.8(stat.) ±1.4(syst.) ns is in an excellent agreement with the table value 299 ± 2 ns [17,18], and in reasonable agreement with the recent result of the Borexino collaboration T_{1/2} = 294.7 ±0.6(stat.) ±0.8(syst.) ns [19].

Fig. 7. (Color online) The time distribution for the fast sequence of β (^{212}Bi) and α (^{212}Po) decays selected from the data accumulated with the BaF2 scintillation detector over 101 hours. The obtained half-life T_{1/2} = 298.8±0.8(stat.)±1.4(syst.) ns is in good agreement with the table value 299 ± 2 ns [17,18].

4 Search for rare β and 2β decays in U/Th chains

The quite-high level of contamination of the BaF_2 detector by Ra gives the possibility to search for rare β and 2β decays of some nuclides in U/Th chains, which cannot be easily studied in the usual way since they fastly decay through α and/or β channels and cannot be accumulated in big quantities. The idea to search for 2β decay of unstable nuclides was discussed in [10], motivated by the fact that sometimes unstable nuclides can have quite big energy release Q_{2β} (≃ 43 MeV for^{19}B and^{22}C) while for the “standard” 69 double β nuclides (present in natural mixture of elements) the maximal value is ≃ 4.3 MeV (^{48}Ca) [6]. The probability of neutrinoless (0ν) double β decay for big energy releases depends on Q_{2β} value roughly as Q^5_{2β} , and the probability of two neutrino (2ν) double β decay as Q^{11}_{2β}. Thus these processes proceed faster for nuclides with high Q_{2β}. While no nuclide for immediate breakthrough was found in [10], few interesting candidates were identified (^{42}Ar,^{126}Sn,^{208}Po), and first T^{2β}_{1/2} limits were set for nuclides in U/Th chains by analysis of energy spectra of CaWO_4, CdWO_4 and Gd_2SiO_5 crystal scintillators.

The half-life limit on 2β decay can be calculated with the following formula: lim T^{2β}_{1/2} = ε · ln 2 · N · t/ lim S, where ε is the efficiency to detect the 2β process, N is the number of the 2β decaying nuclei, t is the time of measurements, and lim S is the number of 2β events which can be excluded with a given confidence level on the basis of experimental data. The number of unstable nuclei in radioactive chain can be determined from its decay rate (which is the same for all nuclides in equilibrium): R^{α/β} = dN/dt = ln 2 · N/T^{α/β}_{1/2} . Here T^{α/β}_{1/2} is the isotope’s half-life for the usual α or β decay (the small contribution from 2β decay can be neglected). Finally, one can get:

lim T^{2β}_{1/2} = ε · t · R^{α/β} · T^{α/β}_{1/2} / lim S. (1)

In the present work we improve T^{2β}_{1/2} limits for some nuclides by searching for chains of decay resulting from 2β decay of initial nuclide. Moreover, we give the first limit for the single β decay of^{222}Rn.

4.1 First search for β decay of^{222}Rn

While^{222}Rn is considered as 100% decaying through emission of α particle [17,20], its single beta decay is also energetically allowed, with the energy release Q_β = 24±21 keV in accordance with the last atomic mass tables [5]. The ground state to the ground state β decay^{222}Rn(0^+) → 222Fr(2^−) proceeds with change in spin and parity ΔJ^{Δπ} = 2^−, and thus is classified as first forbidden unique. The expected half-life can be estimated in the following way.

A recent compilation of Log ft values [21] gives the average value Log ft = 9.5 ± 0.8 for all known 216 first forbidden unique β decays. Using the LOGFT tool at the National Nuclear Data Center, USA [22], one can find that the central value of Log ft = 9.5 corresponds to half-life T^β_{1/2} = 4.8 × 10^5 y for Q_β = 24 keV. Taking into account the uncertainties in the Q_β value, the half-life is equal to 6.7 × 10^4 y for Q_β = 45 keV and 2.4 × 10^8 y for Q_β = 3 keV.

To our knowledge, there were no previous attempts to experimentally search for β decay of^{222}Rn. This is related, in particular, with the small half-life relatively to α decay (3.82 d [20]), the low Q_β value (typically below the energy threshold) and the usually high background at low energies. To realize such a search with the help of the BaF_2 detector, we note that β decay of^{222}Rn leads to a chain of subsequent decays: 222 86 Rn^{β? ≃4.8×105 y} −−−−−−−−−−→ 24 keV 222 87 Fr^{β 14.2 m} −−−−−−→ 2028 keV 222 88 Ra^{α 38.0 s} −−−−−−→ 6679 keV 218 86 Rn^{α 35 ms} −−−−−−→ 7263 keV 214 84 Po^{α 164.3 μs} −−−−−−−→ 7833 keV 210 82 Pb (22.3 y). (2) The quite-high activity of^{226}Ra (parent of^{222}Rn) of 13.4 Bq in the BaF_2 crystal, the difference in scintillation responses, which allows to discriminate α and β/γ events by pulse-shape analysis, and the knowledge of the expected energies and time differences between events give the possibility to search for this chain in the accumulated data. It should be noted, however, that: (a) due to high total events rate in the BaF_2 detector (75 counts/s) it is unfeasible to look for events with T_{1/2} = 14.2 m (^{222}Fr β decay) because of many events of other origin; at most, we should restrict ourselves by α decay of^{222}Ra with T_{1/2} = 38.0 s; (b) unfortunately, we cannot use also α decay of^{214}Po with T_{1/2} = 164.3 μs due to the big dead time in the present measurements (1.65 ms), that results in a very low efficiency (the probability of a^{214}Po decay after the dead time is only 9.1×10^{−4}) and in a low sensitivity. Practically, we can only use the chain of decays:^{222}Fr →^{222}Ra →^{218}Rn searching for the following sequence of events:

(1) an event with energy from 30 to 2207 keV (^{222}Fr Q_β + FWHM_γ ) and mean time which is characteristic for β events (it should be in interval where 99% of β events are expected);

(2) next event with energy between 2109 and 2623 keV (^{222}Ra E_α in the γ scale of the BaF_2 scintillator ± FWHM_α), mean time characteristic for α events and in the time interval [1.65 ms, 1.65 ms + 5 × 38.0 s];

(3) the last event with energy between 2398 and 2946 keV (^{218}Rn E^γ_α ± FWHM_α), mean time characteristic for α events and in the time interval [1.65 ms, 1.65 ms + 5×35 ms].

There are 7.0 × 10^5 events in the accumulated data which satisfy all the above listed criteria simultaneously. The energy spectrum of the last events in the chain is shown in Fig. 8, top (where also data in wider energy region 2100 − 3300 keV are presented). It is obvious that it also contains additional events of other origin due to high counting rate in the BaF_2. The maximal possible number of^{218}Rn α decays can be calculated very conservatively just requiring that the expected gaussian distribution should not exceed the experimental energy spectrum at any region, but in some proper interval, where theoretical effect is closest to the experimental spectrum, their areas should be equal. Such a curve is also shown in Fig. 8, top; the corresponding area is 1.3 × 10^5 counts (which takes into account also uncertainty in the experimental statistics at 90% C.L.).

Fig. 8. (Color online) Top: Energy spectrum of possible events of^{218} Rn α decay in the chain^{222}Fr →^{222}Ra →^{218}Rn (see text): experimental data and maximal effect consistent with the data. Bottom: Fit of the selected data by sum of the background model built from α peaks of isotopes in U/Th chain together with the excluded^{218} Rn α peak.

One can calculate limit on T^β_{1/2} of^{222}Rn, using the formula similar to Eq. (1):

lim T^β_{1/2} = ε · t · R^α · T^α_{1/2}/ lim S,

and values lim S = 1.3 × 10^5, ε = 0.849 (taking into account the time and energy intervals used and efficiency for pulse-shape discrimination), t = 101 h, R^α = 13.4 Bq (we can use activity for^{222}Rn the same as for^{226}Ra because 222Rn is in equilibrium with^{226}Ra), T^α_{1/2} = 3.8235 d for

222Rn. The result is equal: T^β_{1/2}(^{222}Rn) > 122 d at 90% C.L.

However, it is evident that this estimation is too conservative: there is no reason to ascribe all the events at ≃ 2.75 MeV only to the effect searched for. One can estimate the effect in a more realistic way, fitting the spectrum by the sum of (1) some model which represents the background and (2) gaussian with known center and width which corresponds to the^{218}Rn peak searched for. In fact, shape of the spectrum of the selected possible^{218}Rn α events in Fig. 8 is similar to the spectrum of all α events shown in Fig. 5. The isotopes in^{232}Th and^{238}U chains randomly give contributions to the data of Fig. 8 due to big time interval used in the selection (≃ 5 × 38 s) and high counting rate (75 counts/s). Thus, we build the background model from α peaks of nuclei in U/Th chains similarly to Fig. 5. Fit of the data in the energy interval 2110 – 3260 keV (see Fig. 8, bottom) by this model and the^{218}Rn gaussian results in the area of the gaussian S = 3023±1476 counts^3. In accordance with the Feldman-Cousins procedure [23], the limit on the area is lim S = 5444 counts at 90% C.L. This gives the following T^β_{1/2}(^{222}Rn):

T^β_{1/2}(^{222}Rn) > 8.0 y at 90% C.L.

which corresponds to limit on branching ratio B_β < 0.13%.

4.2 2β decay of^{222}Rn

In the chain presented by Eq. (2),^{222}Rn transforms to 222Ra by two subsequent β decays: 222 86 Rn^{β ≃4.8×105 y} −−−−−−−−−−→ 24 keV 222 87 Fr^{β 14.2 m} −−−−−−→ 2028 keV 222 88 Ra.

However, in principle, it can transform to^{222}Ra in one step through 2β decay: 222 86 Rn^{2β}−−−−−−→ 2052 keV 222 88 Ra

(there is no law which forbids this, at least for two neutrino 2β decay allowed by the Standard Model). The energy release is equal Q_{2β} = 2052 keV, only slightly higher than Q_β = 2028 keV in β decay of^{222}Fr. The chain of decays 222Rn →^{222}Ra →^{218}Rn is very similar to the chain^{222}Fr →^{222}Ra →^{218}Rn, which we searched for in the previous section. The only difference is that we should search for the first event which has mean time characteristic for β events (as previously) but its energy is from 0 to 2231 keV for 2β2ν decay of^{222}Rn or in the interval of 2052±180 keV for its 2β0ν decay. Efficiency of selection of events is equal to 0.849 (0.841) for 2β2ν (2β0ν) decay. The maximal number of events in the chain is found as lim S = 5.4 × 10^3 (both for 2β2ν and 2β0ν processes due to high counting rate in the BaF_2); hence, the following limit can be achieved:

T^{2β(0ν+2ν)}

1/2 (^{222}Rn) > 8.0 y at 90% C.L.

The obtained value is better than those obtained in [10] (2.8 y for 2β0ν and 40 d for 2β2ν at 68% C.L.). In terms of the branching ratio, the limit is equal B < 0.13%.

4.3 2β decay of^{226}Ra

226Ra is known as decaying with emission of α particle to^{222}Rn with T_{1/2} = 1600 y [17] practically with 100%

3 The fit gives activities of^{228}Th and^{226}Ra as 1.5(1) Bq/kg and 7.6(2) Bq/kg, respectively, in good agreement with the results obtained by the fit of the total α spectrum (see Fig. 5 and Table 1).

(small probability of 3.2 × 10^{−9}% exists to emit^{14}_6 C clusters [17]). However, 2β decay of this nuclide is also energetically possible with energy release Q_{2β} = 472 ± 5 keV [5]. In this case we should see the following chain of subsequent decays: 226 88 Ra^{2β?}−−−−−→ 472 keV 226 90 Th^{α 30.57 m} −−−−−−−→ 6451 keV 222 88 Ra^{α 38.0 s} −−−−−−→ 6679 keV 218 86 Rn^{α 35 ms} −−−−−−→ 7263 keV 214 84 Po^{α 164.3 μs} −−−−−−−→ 7833 keV 210 82 Pb (22.3 y). (3) This chain is very similar to the chain in Eq. (2). Now, instead to look for the sequence of decays^{222}Fr →^{222}Ra →^{218}Rn considered in section 4.1, we should search for 226Th →^{222}Ra →^{218}Rn sub-chain having initial decay with energy between 2000 and 2502 keV (^{226}Th E_α in the γ scale of the BaF_2 scintillator ± FWHM_α) and mean time characteristic for α events (the last two steps are the same as in section 4.1). The procedure gives lim S = 5.4 × 10^3 counts and ε = 0.833. Using formula (1) with R^α = 13.4 Bq and T^α_{1/2} = 1600 yr, one gets:

T^{2β(0ν+2ν)}

1/2 (^{226}Ra) > 1.2 × 10^6 y at 90% C.L.

or, in terms of the branching ratio, B < 0.13%. This result is 2−3 orders of magnitude better than the limits obtained in [10] (4.1 × 10^4 y for 2β0ν and 4.5 × 10^3 y for 2β2ν at 68% C.L.).

4.4 2β decay of^{212}Pb

The situation with^{212}Pb is very similar to that considered in section 4.2 for^{222}Rn. While^{212}Pb usually transforms to^{212}Po through two subsequent single β decays: 212 82 Pb^{β 10.64 h} −−−−−−−→ 574 keV 212 83 Bi^{β 60.55 m} −−−−−−−→ 2254 keV 212 84 Po (299 ns),

in principle, it can jump to^{212}Po in one step through 2β decay: 212 82 Pb^{2β}−−−−−−→ 2828 keV 212 84 Po (299 ns).

In this case we can use the energy spectrum of β events already obtained by the analysis of the fast Bi-Po events (see Fig. 6). The high energy part of the spectrum is shown in Fig. 9 together with the maximal^{212}Pb 2β0ν and 2β2ν effects consistent with the experimental data (the corresponding values of areas are equal to lim S = 46.6 counts for 2β0ν and 1.1×10^5 counts for 2β2ν, which take into account also the statistical uncertainties in the experimental data). Because in chain of decays^{228}Th → ... →^{212}Pb all intermediate nuclides have half-lives small (from seconds to days) in comparison with time elapsed from the BaF_2 crystal growth (few years),^{212}Pb is in secular equilibrium with^{228}Th, and we can use for its activity the value of R^β = 2.31 Bq (the same as for^{228}Th, see Table 1). Using Eq. (1) and ε = 0.92, T^β_{1/2} = 10.64 h, one obtains:

T^{2β0ν}_{1/2} (^{212}Pb) > 20 y at 90% C.L.,

T^{2β2ν}_{1/2} (^{212}Pb) > 75 h at 90% C.L.

The value for 2β0ν decay is 3 times better than that obtained in [10] (6.7 y at 68% C.L.). The corresponding limits on the branching ratios are: B_{2β0ν} < 6.0 × 10^{−3}%, B_{2β2ν} < 14%.

All the obtained results on T_{1/2}’s are summarized in Table 2.

Fig. 9. (Color online) The energy spectrum of β events in the fast decay chain^{212} Bi–^{212} Po together with maximal effects of 212Pb 2β0ν and 2β2ν decays consistent with the experimental data.

5 Discussion and conclusions

The radioactive contaminations of a BaF_2 crystal scintillator were estimated to be at level of few Bq/kg for 226Ra and^{228}Th. Taking into account 3 orders of magnitude lower activity of^{238}U and^{232}Th (only limits <0.0002 Bq/kg for^{238}U and <0.004 Bq/kg for^{232}Th were obtained) and broken equilibrium in the chains, one can conclude that the BaF_2 crystal is contaminated by radium (which is chemically close to barium). The response of the BaF_2 crystal scintillator to α particles has been investigated in a wide energy interval (4.8 – 9.0 MeV) and the capability of pulse-shape discrimination between α particles and γ quanta (electrons) has been demonstrated.

The analysis of the distribution of the time intervals between β and α decays in the fast Bi-Po chains allowed us to estimate the half-life of^{212}Po as T_{1/2} = 298.8±0.8(stat.) ±1.4(syst.) ns, which is in agreement with the table value [17,18].

First limit on β decay of^{222}Rn was found as T^β_{1/2}(^{222}Rn) > 8.0 y at 90% C.L. This is still quite far from the theoretical estimation T^β_{1/2}(^{222}Rn) = 4.8 × 10^5 y (for Q_β = 24 keV). The half-life limits of^{212}Pb,^{222}Rn and^{226}Ra relatively to 2β decays were also improved in comparison to the earlier work. The big dead time of 1.65 ms in the present measurements did not allow us to use decay of 214Po as the last step in searching for specific chains of events. Therefore, the obtained results can be highly improved with a detector with smaller dead time and better energy resolution (in comparison with FWHM ≃ 12% at 1 MeV for the used BaF_2 crystal scintillator).

The contamination of the BaF_2 crystal by radium is the main problem in applications of this scintillator to search for double beta decay of barium. An R&D of methods to purify barium from radium traces is in progress at the Gran Sasso National Laboratories with an aim to develop radiopure BaF_2 crystal scintillators to search for double beta decay of^{130}Ba and^{132}Ba. Such a counting experiment is of particular interest, taking into account positive indications obtained in two geochemical experiments on double beta decay of^{130}Ba.

References

1. S.E. Rathi et al., Nucl. Instr. Meth. A 482, 355 (2002). 2. C. Guerrero et al., Nucl. Instr. Meth. A 608, 424 (2009). 3. D.M. Seliverstov et al., Nucl. Instr. Meth. A 695, 369 (2012).

4. J.D. Vergados et al., Rep. Prog. Phys. 75, 106301 (2012);

A. Giuliani, A. Poves, AHEP 857016 (2012); J.J. Gomez-Cadenas et al., Riv. Nuovo Cim. 35, 29 (2012); B. Schwingenheuer, Ann. Phys. 525, 269 (2013); R. Saakyan, Annu. Rev. Nucl. Part. Sci. 63, 503 (2013); J. Maalampi, J. Suhonen, AHEP 505874 (2013); O. Cremonesi, M. Pavan, AHEP 951432 (2014).

5. M. Wang et al., Chinese Phys. C 36, 1603 (2012). 6. V.I. Tretyak, Yu.G. Zdesenko, At. Data Nucl. Data Tables 61, 43 (1995); 80, 83 (2002).

7. A.P. Meshik et al., Phys. Rev. C 64, 035205 (2001). 8. M. Pujol et al., Geochim. Cosmochim. Acta 73, 6834 (2009).

9. R. Cerulli et al., Nucl. Instr. Meth. A 525, 535 (2004). 10. V.I. Tretyak et al., Europhys. Lett. 69, 41 (2005); more detailed version: arXiv:nucl-ex/0404016.

11. H.O. Back et al., Phys. Lett. B 525, 29 (2002). 12. C. Aberle et al., JINST 06, P11006 (2011). 13. H.O. Back et al., Phys. Lett. B 563, 23 (2003). 14. P. Dorenbos et al., IEEE Trans. Nucl. Sci. 42, 2190 (1995). 15. I.V. Khodyuk et al., IEEE Trans. Nucl. Sci. 59, 3320 (2012).

16. S. Pecourt et al., Astropart. Phys. 11, 457 (1999). 17. R.B. Firestone et al., Table of Isotopes (John Wiley & Sons, N.Y., 1996) and 1998 CD update.

18. E. Browne, Nucl. Data Sheets 104, 427 (2005). 19. G. Bellini et al., Eur. Phys. J. A 49, 92 (2013). 20. S. Singh, A.K. Jain, J.K. Tuli, Nucl. Data Sheets 112, 2851 (2011).

21. B. Singh et al., Nucl. Data Sheets 84, 487 (1998). 22. National Nuclear Data Center, http://www.nndc.bnl.gov/logft/.

23. G.J. Feldman, R.D. Cousins, Phys. Rev. D 57, 3873 (1998).

Table 2. Branching ratios and half-life values or limits (at 90% C.L.) obtained in this work in comparison with other results. T_{1/2} limits in [10] were given at 68% C.L.

Nuclide Main channel of T_{1/2} (and branching ratio, B)

decay and T_{1/2} [17] This work Other works

212 Po α 299 ± 2 ns 298.8±0.8(stat.)±1.4(syst.) 294.7±0.6(stat.)±0.8(syst.) [19] 299 ± 2 [18] 212 Pb β 10.64 h 2β2ν > 75 h (B < 14%) > 146 h [10] 2β0ν > 20 y (B < 6.0 × 10^{−3} %) > 6.7 y [10] 222 Rn α 3.8235 d β > 8.0 y (B < 0.13%) – 2β2ν > 8.0 y (B < 0.13%) > 40 d [10] 2β0ν > 8.0 y (B < 0.13%) > 2.8 y [10] 226 Ra α 1600 y 2β2ν > 1.2 × 10^6 y (B < 0.13%) > 4.5 × 10^3 y [10] 2β0ν > 1.2 × 10^6 y (B < 0.13%) > 4.1 × 10^4 y [10]