arXiv:1112.2591v1 [astro-ph.CO] 12 Dec 2011

Using the XMM Optical Monitor to Study Cluster Galaxy Evolution

Neal A. Miller^1

nmiller@astro.umd.edu

Richard O’Steen^2

Steffi Yen^1

K.D. Kuntz^{3,4}

Derek Hammer^{3,4}

ABSTRACT

We explore the application of XMM-Newton Optical Monitor (XMM-OM) ultraviolet (UV) data to study galaxy evolution. Our sample is constructed as the intersection of all Abell clusters with z < 0.05 and having archival XMM-OM data in either the UV M2 or UV W 1 filters, plus optical and UV photometry from the Sloan Digital Sky Survey and GALEX, respectively. The eleven resulting clusters include 726 galaxies with measured redshifts, 520 of which have redshifts placing them within their parent Abell clusters. We develop procedures for manipulating the XMM-OM images and measuring galaxy photometry from them, and confirm our results via comparison with published catalogs. Color magnitude diagrams (CMDs) constructed using the XMM-OM data along with SDSS optical data show promise for evolutionary studies, with good separation between red and blue sequences and real variation in the width of the red sequence that is likely indicative of differences in star formation history. This is particularly true for UV W 1 data, as the relative abundance of data collected using this filter and its depth make it an attractive choice. Available tools that use stellar synthesis libraries to fit the UV and optical photometric data may also be used, thereby better describing star formation history within the past Gyr and providing estimates of total stellar mass that include contributions from young stars. Finally, color-color diagrams that include XMM-OM UV data appear useful to the photometric identification of both extragalactic and stellar sources.

Subject headings: Galaxies — Astrophysical Data — Data Analysis and Techniques

1Department of Astronomy, University of Maryland, College Park, MD 20742

2Department of Physics and Astronomy, University of North Carolina, Chapel Hill, NC 27599

3Department of Physics & Astronomy, Johns Hopkins University, Baltimore, MD 21218

4Laboratory for X-ray Astrophysics, NASA Goddard Space Flight Center, Code 662.0, Greenbelt, MD 20771

– 2 –

1. Introduction

The power of ultraviolet (UV) data has been demonstrated by numerous publications driven by data collected with the Galaxy Evolution Explorer satellite (GALEX, Martin et al. 2005). UV emission comes primarily from young stars, with the youngest and most massive stars dominating the far-UV while stars with lifetimes of about a Gyr dominate the near-UV. The addition of GALEX UV photometry to optical photometry from the Sloan Digital Sky Survey (SDSS; York et al. 2000) thus allows for improved classification of millions of stars and galaxies (Bianchi et al. 2007). In fact, GALEX UV photometry is invaluable for identification of hot stars and white dwarfs within the Milky Way (Bianchi et al. 2011). It is also vital in estimating the dust attenuation in galaxies and thus properly evaluating star formation rates (Treyer et al. 2007; Johnson et al. 2007; Salim et al. 2007).

One of the simple and yet powerful tools in applying UV data to the understanding of galaxies and their evolution is the color-magnitude diagram (CMD). Galaxies are known to separate well into red and blue populations (e.g., Baldry et al. 2004), forming a tight red sequence and a broader but still well-described blue cloud. Colors formed using near-UV data paired with optical data produce a larger separation between red and blue galaxies, thereby producing cleaner assignments of galaxies (Wyder et al. 2007). More significantly, CMDs constructed using near-UV and optical data reveal a population of objects intermediate to the red sequence and blue cloud and dubbed the “green valley” (Wyder et al. 2007). These may represent an important transitory population consisting of star-forming galaxies and active galactic nuclei (AGN) fading into quiescence and an eventual home as “dead and red” galaxies on the red sequence (Schiminovich et al. 2007; Martin et al. 2007). Alternatively, they may be rejuvenated red sequence galaxies to which a “frosting” of younger stars has been added (Trager et al. 2000). Along these same lines, the spread in the UV-optical color at a given absolute magnitude for early-type galaxies can be explained by a significant fraction (∼ 30%) having experienced star formation within the past Gyr (Kaviraj et al. 2007).

The XMM-Newton satellite (Jansen et al. 2001) is also equipped with an Optical Monitor telescope (Mason et al. 2001, XMM-OM). This instrument provides concurrent observation of XMM’s X-ray targets in a selection from among six filters, three of which approximate the Johnson U B V filters and three of which reside in the UV (UV W 2, UV M2, and UV W 1). Although of smaller aperture and with a smaller field of view than GALEX, XMM-OM provides higher resolution images with a point spread function that is roughly a factor of three finer than that of GALEX. The UV M2 filter has an effective wavelength and width comparable to GALEX NUV , and thus can directly emulate the science performed with that filter. The XMM-OM data might also prove useful in evaluating the age and abundance of old stellar populations and hence elliptical galaxies. The region of the spectrum of a stellar population between about 2000Å and 3200Å, and hence the UV W 1 filter, should be dominated by main sequence stars near the main sequence turn-off. Photometry in this wavelength range can help break the age-metallicity degeneracy that plagues optical filter measurements by placing a strong lower limit on the metallicity of that population (Dorman, O’Connell, & Rood 2003).

– 3 –

In this paper, we investigate the usage of XMM-OM data to study galaxies. We ultimately strive to apply the XMM-OM photometry to understand the star formation histories of cluster galaxies, and evaluate such information in relation to evolutionary processes believed to be at work in cluster environments. XMM is a popular choice for X-ray observations of galaxy clusters on account of its sensitivity to the extended emission of the hot intracluster medium from thermal bremsstrahlung, implying that there is a large and nearly untapped database of associated UV observations of galaxy clusters made by XMM-OM. Prior publications capitalizing on XMM-OM data associated with observations of galaxy clusters have focused on solely the brightest cluster galaxies and used the UV data to evaluate star formation in such objects and cluster cooling flows (Mittaz et al. 2001; Hicks & Mushotzky 2005; Donahue et al. 2010). Our work utilizes the full field of view of XMM-OM in order to compile a database with hundreds of galaxies having UV photometry to pair with SDSS data. Unless otherwise noted, all magnitudes are in the AB system and we assume a standard ΛCDM cosmology with Ω_m = 0.3, Ω_Λ = 0.7, and H_0 = 70 km sec^{−1} Mpc^{−1}.

We describe the sample construction and data sources in Section 2. Our procedures for processing the images and measuring galaxy photometry are described in Section 3, followed by the construction of multiwavelength catalogs in Section 4.1 and their usage as checks of calibration in Section 4.2. The remainder of the paper is devoted to applications of the XMM-OM UV data, including construction and assessment of CMDs (Section 5.1), evaluation of star formation history (Section 5.3), inclusion of XMM-OM UV data in photometric redshift and galaxy stellar mass estimation (Section 5.4), and selection of unusual objects via color-color diagrams including XMM-OM UV data (Section 5.5). A summary is provided in Section 6.

2. Sample Construction and Data Sources

2.1. Sample Construction

Our goal is to produce well-calibrated UV data that can be added to optical photometry to yield more robust star formation histories of cluster galaxies. For this reason we selected clusters with coverage in both the SDSS and GALEX surveys, allowing us to piggy-back off of their calibration. We are thus able to test and calibrate the XMM-OM filters since they lie at wavelengths between the GALEX and SDSS surveys. We also imposed a cut-off in cluster systemic redshift of z ≤ 0.05, guided by the expectation that this would produce reasonable numbers of UV-detected galaxies per cluster. A large elliptical galaxy (M_r = −22) at this maximum redshift would have r ≈ 14.7 and NUV ≈ 20.7, just fainter than the magnitude limit of the GALEX All-Sky Imaging Survey (AIS, with m_{NUV} ∼ 20.5 Martin et al. 2005). We correlated the XMM “Master” catalog, obtained through NASA’s High Energy Astrophysics Science Archive Research Center (HEASARC), with the Abell catalog (Abell, Corwin, & Olowin 1989) using a matching radius of 8^′ to insure that the cluster cores would be represented in the 17^′ square FOV of the XMM-OM. This produced a sample

– 4 –

of 11 clusters with either UVM2 or UVW1 data, z ≤ 0.05, and coverage in both the SDSS and GALEX surveys. Table 1 provides the details of the clusters and their XMM observations.

For some of the clusters – most notably A1656, or Coma – XMM-OM observations of regions outside the cluster cores are also available. As these provide piecemeal coverage of the clusters and are often non-contiguous with the XMM-OM observations of the cluster cores, we have not included such data in the present study. Thus, the galaxies in our sample are exclusively those in or projected upon the cluster cores. For reference, the farthest cluster in our sample (A119) has z_{sys} = 0.0442 and thus 1^{′′} equals about 0.9 kpc while for the nearest (A1656) z_{sys} = 0.0231 and 1^{′′} is about 0.5 kpc. These translate to coverage from the core out to 0.63 Mpc (A119, diagonal of 17^′ × 17^′ XMM-OM image) at best, and 0.24 Mpc (A1656, center to edge of XMM-OM image) at worst.

2.2. XMM-Newton Optical Monitor

XMM-OM is a 30cm diameter Ritchey-Chrétien telescope that is coaligned with the X-ray telescopes of XMM-Newton (Mason et al. 2001). Its filter wheel provides six broad-band imaging filters in addition to a blocked aperture, a pair of grisms, a magnifier, and a “white” filter. The detector is a microchannel plate intensified CCD, wherein incident photons strike a photocathode and the resulting electrons are amplified through a pair of microchannel plates. The final electrons illuminate a phosphor screen where they are registered by the 256 × 256 pixel CCD. The CCD is read out rapidly, once every 11 μs, and the centroids of each event are recorded to 1/8th of a pixel. The FOV is a 17^′ square, although limitations to onboard memory and centroiding require observations of this full area to be built up from a sequence of “science windows.” In the standard imaging mode, a small region (5^′ × 5^′) at the center of the FOV is observed continuously at “high resolution” (i.e., keeping the centroid information to 1/8th of a CCD pixel and providing an output image with ∼0.^{′′}5 pixels) while a sequence of five science windows cover nearly the full FOV through a “low resolution” mosaic (using 2 × 2 binning and producing ∼1^{′′} pixels). Note that the PSF of an unresolved source (roughly 2^{′′} for the UV filters) is the same for either the high resolution or low resolution modes, with the only difference being the sampling. The mosaic pattern for this standard low resolution imaging mode is a central square surrounded by four overlapping rectangular regions (see Figure 2 of Mason et al. 2001). Since these regions overlap, the integration time across the full FOV is not constant even if that in each science window is identical. In another commonlyused imaging mode, the small high resolution window is dropped and the full 17^′ field is observed through four rectangular science windows with the same output pixel size as the aforementioned low resolution mosaic (“ENG-4”; see Figure 2 of Kuntz et al. 2008). For our work we use the full 17^′ “low resolution” images, from either the standard five science window mosaic or the four science window “ENG-4” mode, to encompass greater areas and consequently obtain photometry on larger numbers of objects.

As noted previously, three of the XMM-OM broad-band filters have effective wavelengths

– 5 –

placing them within the UV portion of the spectrum (see Figure 1). The shortest wavelength filter, UVW2, has poor throughput, suffers from a red leak (Talavera et al. 2008), and is not substantially different from the UVM2 filter in terms of effective wavelength and width. Consequently, in this work we focus our efforts on data collected using the UVM2 and UVW1 filters.

2.3. SDSS

The Sloan Digital Sky Survey (SDSS; York et al. 2000) is an imaging and spectroscopic survey mainly focused on the northern Galactic cap. The 2.5m diameter telescope used for the survey has a wide (3^∘) field of view and a camera that images in five broad-band filters (u, g, r, i, and z) simultaneously through drift-scan observations (Gunn et al. 1998). The images typically have 1.^{′′}5 resolution and have a 95% completeness limit at about r = 22.2 (Abazajian et al. 2004). Spectra are then collected based on the imaging catalogs, using color information to select targets likely to belong to a range of source classes (e.g., normal galaxies, luminous red galaxies, quasars, etc.). The SDSS spectrograph uses drilled plug plates with 3^{′′} fibers to collect 640 spectra in a single field. The SDSS has been released to the public through a series of data releases; a comprehensive description of the data can be found in the Early Data Release (Stoughton et al. 2002) with revisions to the determination of key parameters noted in subsequent releases up through the recent Seventh Data Release (DR7; Abazajian et al. 2009). Each data release is cumulative, and we use the DR7 for the present work.

2.4. GALEX

GALEX is a 50cm diameter Ritchey-Chrétien telescope dedicated to imaging and grism spectroscopy in the ultraviolet (Martin et al. 2005). Like XMM-OM, it also uses microchannel plates and photocathodes for source detection although separate systems for NUV and FUV allow it to image both filters simultaneously (see Figure 1 for filter curves). The GALEX resolution is more coarse than that of XMM-OM (4.^{′′}5 - 6^{′′}; Morrissey et al. 2005) on account of several factors including both the instrument itself and how the data analysis pipeline reconstructs photon events. The large effective area of GALEX and its much larger field of view (1.^∘25) significantly differentiate it from XMM-OM.

The GALEX data pipeline faces the complicated task of translating photon positions and pulse heights into a corrected output image upon which source detection and photometry may be performed; Morrissey et al. (2007) provides a thorough description. Data are collected through a 1.^′5 spiral dither pattern in order to smooth over variations in the flat field and avoid having bright sources striking the same regions of the microchannel plates for any length of time. Observations of white dwarf standards have shown that GALEX magnitudes are accurate to an rms of about 0.05 in FUV and 0.03 in NUV. Once the final flux calibrated and astrometrically registered image has

– 6 –

been created, catalogs are constructed using the Source Extractor (“SExtractor,” Bertin & Arnouts 1996) package. Our data correspond to the fifth GALEX data release (GR5).

In addition to guest investigator observations, GALEX performed several surveys (Martin et al. 2005; Morrissey et al. 2007). The AIS, mentioned previously, is intended to cover the entire sky and has limiting magnitudes of m_{F UV} ∼ 19.9 and m_{NUV} ∼ 20.8 through short exposures (100 seconds). The Medium Imaging Survey (MIS) increases the integration time to about 1500 seconds and depth to m_{F UV} ∼ 22.6 and m_{NUV} ∼ 22.7. It will cover the roughly one-quarter of the sky coincident with the SDSS. There are also a Deep Imaging Survey (DIS) and an Ultra-Deep Imaging Survey (UDIS) for several fields of interest determined through existing multiwavelength surveys, a Nearby Galaxies Survey (NGS), and multiple spectroscopic surveys typically centered on DIS or UDIS regions.

3. XMM-OM Image Processing and Photometry

3.1. XMM-OM Image Processing

HEASARC contains the low resolution images as processed by Kuntz et al. (2008) for the construction of OMCat. These were produced using SAS^1, and the individual science windows have been stitched together to produce the full ∼17^′ square images. They have also been corrected to match the astrometry of the USNO-B1 catalog (Monet et al. 2003). We obtained these images and used them as the starting point for our processing. Table 1 includes the XMM ObsID’s and other summary information.

The source detection and photometry procedures of SAS are designed for point sources and not extended objects like galaxies, and thus we do not use OMCat photometry nor do we use SAS for such purposes. This produces some extra complications in our image processing, as SAS automatically performs some corrections when performing photometry. Most notable among these are corrections for coincidence loss and time sensitivity degradation. The former is a reflection of the photon counting nature of the system, as multiple photons may arrive at the detector within the brief time between reads of the CCD. Fortunately, this is only a problem for very bright and unresolved sources and amounts to about a 10% effect for stars with m_{UV W 1} ≈ 16.1 and m_{UV W 1} ≈ 14.7 in Vega magnitudes (m_{UV M2} ≈ 14.9 and m_{UV M2} ≈ 13.3 in AB magnitudes; the OM Calibration Manual Talavera et al. 2008). These magnitudes are roughly the same as the integrated magnitudes of the brightest galaxies in our sample, which have spread their flux over tens of arcseconds. We therefore make no explicit corrections for coincidence loss (see Section 4.2 for a discussion on the validity of this assumption). Sensitivity degradation is the decline in throughput of XMM-OM over time presumably through degradation of its photocathode. Regular

1Version 6.5.0. SAS was developed by members of the XMM-Newton Science Survey Centre, a consortium of 10 institutions led by Prof. M. Watson of the University of Leicester.

– 7 –

monitoring of a collection of standard stars has shown that this degradation can be fit linearly such that the correction factor is equal to A + B × MJD, where MJD is Modified Julian Date. The slope and intercept pairs are determined for each filter and provided in Talavera et al. (2008)^2. For our data, the correction factors range from about 1.07 to 1.13 for the UVM2 observations and from about 0.98 to 1.07 for the UVW1 observations. Thus, the total counts for each observation can be corrected to a standard “zero epoch” for accurate photometry.

The SAS-produced HEASARC images are normalized to units of count rate per 1000 seconds, regardless of actual integration time. We split off the image extension corresponding to the pixelby-pixel integration time, multiplied this exposure map with the science image, divided by 1000 to convert the units to net counts, and multiplied by the correction factor to account for time sensitivity degradation. In several cases, there were multiple XMM-OM observations in a single filter for a given galaxy cluster. Having corrected the count rate of each to the same zero epoch, we simply translated them to the same astrometric grid and summed their counts. For A1656, we masked out the large diffraction spikes and artifacts associated with a bright star prior to performing the sum. As the roll angle of the observation was different for each A1656 observation, this masking does not remove sky coverage in the final image. The same translation to a common astrometric grid and sum (and masking for A1656) was performed on the exposure maps, and our science images are the net count maps divided by the net exposure maps (hereafter we will refer to this image, with units of counts per second, as our “science image”). The final step was additional astrometric correction, as described below in Section 3.3.

3.2. Source Detection and Photometry

As with GALEX data, SExtractor was used to perform source detection and photometry. SExtractor was run in the “pseudo-dual-image” mode where both the detection and measurement images were the science image, with the advantage being that this mode allows the use of separate weightings for detection and measurement. In this way we are able to detect sources using the science image but compute their errors properly based on the exposure map. Thus, a single zero point magnitude appropriate for an image with units of counts per second can be applied yet regions with deeper total exposure will have smaller errors. This is accomplished by setting the “GAIN” parameter to the average exposure time (in units of seconds) of the image. For the zero points, we used 17.41 for the UVM2 filter and 18.57 for the UVW1 filter as specified in Talavera et al. (2008). The background map, subtracted from the image for performing photometry, was determined locally from the science image itself using the standard SExtractor estimation which uses the mean or an estimate of the mode based on the mean and median, depending on the background distribution. For images with very low background rates this is erroneous

2More recent monitoring has shown that post-2008 the loss of sensitivity over time has slowed. The most recent observational data we use were collected in 2006, so we adopt the original correction factors.

– 8 –

as the background is better described as a Poisson distribution, as done in the GALEX pipeline (Morrissey et al. 2007). Our typical background levels (≈ 2 × 10^{−3} cts s^{−1} arcsec^{−2} for UVM2 and ≈ 3 × 10^{−3} cts s^{−1} arcsec^{−2} for UVW1) are slightly higher than those in GALEX data because the XMM-OM filters are at longer wavelengths, and our comparison of photometry suggests any resulting magnitude errors are small (see Section 4.2) so we relied upon the standard SExtractor estimation. We did adjust the background mesh size to 48 pixels and use 3 × 3 pixel median filtering, similar to the parameters used in the GALEX pipeline after accounting for the differences in instrumental resolution. The background mesh size was chosen through several trials, and is large enough not to be overly influenced by extended sources yet fine enough to handle real variations (for example, regions of deeper total integration caused by the mosaic pattern of the default XMM-OM image acquisition or stacking of multiple images). We also found it valuable to create and use a flag image, since the initial mosaic images are rectangular with the standard North-up, East-left orientation with the measured pixels covering only a subset of the full area. The input flag image thus had all non-covered pixels, plus those within about 4^{′′} of a non-covered pixel, set to one while pixels covered by the XMM-OM observation were set to zero.

Our main output is the “MAG AUTO,” or Kron-like, aperture magnitudes along with simple source characterization (position in both pixels and RA/Dec, Kron radius, star/galaxy classification, and flags). The choice of MAG AUTO over aperture magnitudes was driven mainly by the GALEX pipeline also producing MAG AUTO magnitudes, and that these are the standard ones applied for deriving colors in combination with SDSS data (e.g., Bianchi et al. 2007; Wyder et al. 2007). The star/galaxy classification assumed that the PSF of the UVM2 images was 1.^{′′}8 while that of the UVW1 images was 2^{′′} (Talavera et al. 2008), although the XMM-OM-based star/galaxy classification was generally ignored as we associate our sources with SDSS counterparts and rely on the SDSS photometry for identification of stars (see Section 4.1).

3.3. Astrometric Correction

Even when an external catalog such as the USNO-B1 is used, the astrometric correction within SAS can often fail (Kuntz et al. 2008). Furthermore, our intention to combine our UV catalogs with exisiting optical and UV data made it a natural choice to tie our astrometry to the SDSS. We correlated our initial XMM-OM catalogs with the SDSS catalog, separately for UVM2 and UVW1, assigning each XMM-OM source a nearest neighbor from the SDSS. We then selected all XMM- OM/SDSS matches with positional separations less than 3^{′′}, SDSS type designations as stars, and no flags in their XMM-OM photometry. These objects were then used to correct the astrometry of the UVM2 and UVW1 images to the same frame as the SDSS. The fit allowed shifting of both the x and y coordinates (while maintaining the assumption that the axes remained perpendicular), as well as field rotation. The procedure was iterative in that we performed the transformation, inspected the residuals for the individual stars that were used in it, and removed those with large residuals. Many of these objects with high residuals are saturated stars with poorly-identified centers or mis-

– 9 –

matched objects. For the typical UVM2 images, the final fits were based on about 25 stars spread over the full field and not including the 5 to 10 that were removed, while for the UVW1 images these numbers were on the order of 100 and 15 to 20. Shifts of about an arcsecond were typical, with all rotations very close to zero (≲ 0.05 degrees). For one of the A2199 images (XMM ObsID 0008030301, UVW1 filter) the initial astrometry was off by more than 3^{′′} and a preliminary round of astrometric correction was required. Figure 2 depicts the resulting improvement in separation between XMM-OM objects and their nearest SDSS counterpart (both stars and galaxies). Once the astrometric correction was determined, it was applied to each image for that cluster and filter to produce final images (i.e., the science image with units of counts per second, the net exposure map, and the flag image). All source detection and photometry procedures were then repeated to produce the final XMM-OM object catalogs.

4. Multiwavelength Catalogs and Calibration

4.1. Construction of Multiwavelength Catalogs

Based on the results just shown in Figure 2, we accepted as matches all XMM-OM catalog objects that had an SDSS counterpart within 2^{′′}. We then adopted the SDSS position to do all further associations. In some cases, multiple SDSS objects were associated with a single XMM-OM object in which case we manually inspected each association to select the most likely counterpart (usually the brightest SDSS object). Once an association had been made, the SDSS model magnitudes (model magnitudes are recommended for determining colors of extended objects; Abazajian et al. 2004) and errors were saved along with the SDSS position and type designation (i.e., star or galaxy). After the final matched XMM-OM/SDSS catalog was constructed, we searched for GALEX counterparts within 4^{′′} of each object’s SDSS position (e.g., see Bianchi et al. 2007, for justification of this matching radius). When multiple GALEX tiles covered the position, we selected the measurements corresponding to the tile with the longer integration time. As with the XMM-OM SExtractor photometry, we used the GALEX “MAG AUTO” FUV and NUV magnitudes and errors. The pairing of SDSS model magnitudes and GALEX MAG AUTO ones is consistent with the majority of work that investigates UV/optical colors of galaxies (e.g., Bianchi et al. 2007; Wyder et al. 2007). Similarly, the Blanton & Roweis (2007) kcorrect software which we will use in later analysis relies on these measurements.

Finally, we collected publicly-available redshifts for the matched sources using the SDSS as our primary spectroscopic data source and the NASA/IPAC Extragalactic Database (NED) as our secondary source. That is, if an object had both an SDSS redshift and one from NED we adopted the SDSS value. In the case of the NED associations, an allowable matching radius of 6^{′′} was used. We further augmented our redshift list by using the Marzke et al. (in preparation) spectroscopic catalog for Abell 1656, which is also based on SDSS object positions. In addition to the redshift, we save its source (SDSS, NED, or other) and SDSS identifier (Plate, MJD, and Fiber) where

– 10 –

applicable.

In summary, our data catalog for analysis includes photometry from nine filters and their errors: FUV, NUV, UVM2, UVW1, u, g, r, i, and z. It is XMM-OM selected, in that the prerequisite for inclusion is the presence of either a UVM2 or UVW1 measured magnitude and a matched entry from the SDSS. We do include objects with flags on their XMM-OM photometry, as these flags often indicate benign considerations such as noting that an object was deblended or relatively close to an image boundary. The coordinates for each object in the catalog are those from the SDSS, although we do maintain the measured XMM-OM positions for comparison. Finally, any spectroscopically-measured redshift for each object is also included in its catalog entry.

Table 2 summarizes the multiwavelength catalog. In total, we have 3,311 XMM-OM-detected objects with counterparts in the SDSS. Most individual clusters have around 300 objects, with A119 and A400 having signficantly fewer (64 and 58, respectively). In the case of A119, this is partially a reflection of its Southern declination as the SDSS only covers about half of the area in the XMM-OM images. In addition, the UVW1 integration for A119 is the shortest of all clusters with such data. As this filter has greater transmission than UVM2 and coincides with an intrinsically brighter portion of the SED of most galaxies, there are typically three or four times as many UVW1 detections per cluster as there are UVM2 detections for equal integration times. This is also the explanation for the lesser number of detected objects in A400, as this cluster has only UVM2 data and no coverage with UVW1. A1656 has the largest number of objects (652) on account of its deep coverage (i.e., the co-addition of seven or eight separate XMM-OM observations) in both UVM2 and UVW1.

Approximately one-quarter of all XMM-OM-detected objects in our sample have an available redshift (768/3311, or 23%). Of these, the majority (726) are galaxies with 0.001 < z < 0.999 which will be used in SED fitting and associated analysis (Section 4.3 and Section 5). Most of the 42 objects with redshifts outside of this range are stars, although up to six possible quasars are detected: three certain quasars with SDSS spectra, two objects with redshifts from NED, and one SDSS object with an “uncertain” spectral classification. We will discuss these objects further in Section 5. For simplicity, we isolate the potential cluster members by applying cuts of z_{sys} ± 0.01 as this is approximately 3σ for a rich cluster having a velocity dispersion of 1,000 km s^{−1}. This yields 518 cluster galaxies in the catalog. For A2197, the lesser number of galaxies with measured redshift (and measured redshift placing them within the cluster) is likely due to the XMM-OM observation being offset from the cluster core by over 6^′.

4.2. Comparison with Other Catalogs

With resources such as OMCat and GALEX available, we take advantage of their catalogs to provide checks on our photometry and image processing procedures. First, we match our photometry catalogs with those of OMCat as shown in Figure 3. All matches with SDSS type classification

– 11 –

of star and an OMCat counterpart within 2^{′′} are plotted, with our photometry modified to reflect that the OMCat photometry is in the Vega system (we used m_{AB} − m_{V ega} of 1.64 and 1.37 for UVM2 and UVW1, respectively, as taken from Talavera et al. 2008). For clusters with multiple XMM-OM observations in a given filter, the OMCat photometry is based on the individual observations whereas our photometry has been performed on images that have combined all the data. Figure 3 does “double count” galaxies in this regard, as for such systems we have used the OMCat data from each one of these observations. It can be seen that the overall consistency of the photometry is good, although with slight offsets in the zero points such that our measurements are less than 0.1 mag fainter. The large outliers at magnitudes brighter than about m = 19 for UV W 1 are primarily drawn from two clusters, A1656 and A2052, that have eight and three XMM-OM UV W 1 observations, respectively. In nearly all cases the discrepant points are caused by a single XMM-OM observation representing an outlier relative to the photometry of the others. This is especially apparent for A2052, where two observations are very short (800 and 900 seconds) and it is these two observations that produce the vast majority of the outliers. The third observation of A2052 has an integration of 2000 seconds and not surprisingly we find that its OMCat photometry is more consistent with our photometry.

Figure 3 also represents a confirmation that we can safely ignore coincidence loss for our galaxy photometry. The SAS-produced photometry of the OMCat includes the correction for coincidence loss, whereas our photometry does not. We would therefore expect the relative difference between our photometry and OMCat to increase at brighter magnitudes, with our measured magnitudes being fainter. This trend is indeed seen for m^{OMCat}_{UV W 1} ≲ 14, while none of the UVM2 comparison stars are bright enough for coincidence loss to be a factor.

The GALEX NUV filter has similar effective wavelength and coverage to UVM2 (refer to Figure 1) so for clusters with UVM2 data we can also do a direct comparison of our photometry with GALEX. In this comparison we are not restricted to using only the photometry for stars, and both stars and galaxies are included. The result is shown in Figure 4, where overall consistency is again demonstrated albeit with increased scatter. However, this exercise reveals that something is amiss for one cluster, A2063, that has UVM2 magnitudes that appear too faint by about 0.7 mag. We have already shown that our photometric procedure produces consistent results with OMCat for the UVM2 data for this observation, and in subsequent analysis we ascertain that the GALEX photometry is correct and the problem lies in the UVM2 data (see Section 5). Since the offset appears to affect all of the data and not just specific objects, a simple explanation such as incorrect exposure time (too long by a factor of ∼ 2) might apply, and indeed a query to the XMM- OM calibration team confirmed that an error in the house-keeping parameter files resulted in this observation listing an exposure of 8348 seconds when in actuality it should be 3976 seconds. This results in a magnitude error of 2.5 log(8348/3976) = 0.81, which we have included in subsequent analysis. As with the OMCat comparison, there are a handful of outliers beyond those associated with A2063. These are exclusively for objects that have UVM2 magnitudes fainter than expected from their GALEX NUV magnitudes, and the majority have flagged GALEX data corresponding

– 12 –

to detector bevel edge and window reflections. Including the corrected A2063 photometry, there are 111 objects with m_{NUV} ≤ 20 and the mean difference between their NUV and UVM2 photometry is only 0.04 mag (UVM2 is fainter) but with a dispersion of 0.26 mag. Thus, the difference is not significant and our treatment of the background during source extraction appears not to have strongly biased our results for these brighter galaxies.

It is also instructive to compare the depth of our UVM2 data with the various GALEX surveys. In Figure 5 we plot the histogram of measured UVM2 magnitudes for our cluster sample, including both unresolved and extended objects. Noting that over 30% of the objects correspond to the A1656 data, we have separated these data in the plot and show a solid grey histogram for A1656, a hatched histogram for all of the remaining clusters, and an unshaded black histogram for the sum of the two. It can be seen that the peak in the magnitude distribution occurs somewhere fainter than UV M2 ≈ 22. This is comparable and even slightly deeper than the GALEX All-Sky Imaging Survey (AIS), yet much more shallow than the GALEX Medium Imaging Survey (MIS) with limiting magnitudes of m_{NUV} ∼ 20.5 and m_{NUV} ∼ 23.5, respectively (Martin et al. 2005). This roughly matches the expectations based on the effective areas of XMM-OM and GALEX (refer to Figure 1) and the respective integration times. The AIS is based on 100-second integrations, implying that XMM-OM requires several thousand seconds of integration to equal it.

4.3. Empirical Calibration and Extinction Corrections

Having produced a multiwavelength database consisting of over 700 galaxies, we can also assess how our measured UVM2 and UVW1 magnitudes compare with values that would be predicted based on their SEDs. For this purpose, we use the Blanton & Roweis (2007) kcorrect (v4.1.4) software. kcorrect uses non-negative matrix factorization to determine the SED that best fits the photometric data for a galaxy. It is based on nearly 500 input template SEDs for instantaneous bursts of star formation, with the templates spanning a range of ages, metallicities, and dust extinctions. The input templates also include models for emission from ionized gas. This host of input templates is boiled down to five templates for the fitting of actual galaxies through matching to a set of thousands of real galaxies with GALEX and SDSS photometry. These five templates are each linear combinations of the hundreds of input templates. Thus, an actual galaxy is fit as the non-negative linear combination of five templates, which in turn have been based on hundreds of input star formation histories. kcorrect is able to use this best-fitting SED for any given galaxy to determine K corrections in given filters, reproject onto different filter bandpasses, and determine quantities such as total stellar mass and star formation history.

Of our 726 XMM-OM selected galaxies with available redshifts, 253 have GALEX photometry for both the FUV and NUV filters to go along with their five-filter SDSS photometry. Consequently, these galaxies have SEDs that are sampled at a large range of wavelengths and to either side of the XMM-OM filters. We can therefore use kcorrect to fit their SEDs, reproject these fits onto the XMM-OM filters, and compare the predicted magnitudes with those we have measured from the

– 13 –

real images. This also provides a good handle on how well the fitted SEDs match the real galaxy spectra by comparing the predicted and measured magnitudes for the non-XMM-OM filters.

The magnitudes input to kcorrect need to be corrected for Galactic extinction, so we first evaluate the reddening E(B − V ) for each galaxy using the Schlegel, Finkbeiner, & Davis (1998) dust maps and convert these to extinctions using the standard A_X /E(B − V ) = R_X where X represents the given filter. For the GALEX data, we then use R_{F UV} = 8.3 and R_{NUV} = 8.2 as in Wyder et al. (2007) while for the SDSS we use the standard 5.155, 3.793, 2.751, 2.086, 1.479 for the u, g, r, i, and z magnitudes, respectively. These values are applicable for fairly normal galaxies with some current star formation, and since all but one of our clusters have E(B − V ) < 0.05 any differences in extinction by galaxy type will be minor (A400 has E(B − V ) ≈ 0.18). We also follow the prescriptions of Blanton et al. (2005) and perform slight corrections to the SDSS magnitudes to place them on the AB system, with m_{AB} − m_{SDSS} = −0.036, 0.012, 0.010, 0.028, 0.040, respectively for the u g r i z data. Finally, as recommended for kcorrect we add small error terms in quadrature to the measured values: 0.02 for FUV, NUV, g, r, and i; 0.05 for u; and 0.03 for z.

The results for the mean and dispersion of the difference between the measured and predicted magnitudes are provided in Table 3, and Figure 6 graphically depicts the comparison for the GALEX filters as well as the two XMM-OM filters. For each filter, we perform a single round of clipping where we remove objects with actual minus predicted magnitudes differing by more than 2σ from the overall mean. This serves to eliminate objects that have incorrect photometry or are very poorly fit by kcorrect . Examples of the former class of error include problems with deblending objects within the GALEX and the SDSS pipelines, while the latter can include AGN with strong non-stellar contributions to their spectra and galaxies with incorrect redshifts. It can be seen that as a whole the kcorrect fits are good approximations to the actual measured magnitudes, particularly for the SDSS filters for which kcorrect was designed. There do appear to be offsets for the GALEX and XMM-OM UV filters, but the sign and magnitude of these are consistent and likely related to the particulars of the SED fitting and its application to the UV portion of the spectrum, especially as a function of the morphological mix of the galaxies. We will discuss this further in Section 5.2. This comparison of photometry and fitted SEDs also serves as further validation that the GALEX NUV magnitudes for A2063 are correct, and that the UVM2 photometry for this cluster needs to be adjusted to reflect the proper integration time.

In the cases of UVM2 and UVW1, the predicted magnitudes will differ from the measured ones by any unknown offset in our calibration (i.e., assumed zero point magnitude) and by the extinction. Ideally, we would thereby take the vectors of measured minus predicted magnitudes along with the E(B −V ) values and perform a simple linear least squares fit to determine this offset and the appropriate R_X to translate E(B − V ) into extinction. However, as previously indicated our clusters have a very small range in E(B − V ) especially when one considers that only one galaxy from A400, the sole cluster with E(B − V ) > 0.05, has complete photometry in the seven GALEX+SDSS bands. Thus, the spread in E(B −V ) is too small to produce a meaningful estimate of R_X and we instead investigate individual pairings of zero point offset and R_X in comparison

– 14 –

with the GALEX and SDSS filters. We find that when using R_{UV M2} = 8.2 (i.e., the same value as that for NUV), the dispersion in the difference between measured and predicted magnitudes is 0.365 and near its minimum. As expected, changing the value of R_{UV M2} has little effect (≤ 0.002 in the measured dispersion) on the results for 6.8 ≤ R_{UV M2} ≤ 9.2. We have also used the UVM2 filter curve itself along with the IDL routine dust intfilter to directly determine R_{UV M2} for the “average” SDSS galaxy spectrum in the direction of A1656 and obtained 8.8. The negative mean in the difference between measured and predicted magnitudes (i.e., measured magnitudes are slightly brighter than those predicted) is opposite in direction to the one seen when directly comparing UVM2 to GALEX NUV magnitudes (Figure 4). Our preliminary approach is thus to keep the zero point magnitude unchanged and use R_{UV M2} = 8.2. Similarly, for UVW1 we find that the adopted zero point magnitude is consistent with the results for the other filters and 5.5 ≤ R_{UV W 1} ≤ 6.3. In this case, dust intfilter returns R_{UV W 1} = 6.0 and we subsequently adopt this value.

5. Application

5.1. Color Magnitude Diagrams for Galaxy Clusters

Motivated by the numerous GALEX studies, we have explored color magnitude diagrams (CMDs) constructed using photometry for galaxies with measured redshifts that place them within the eleven clusters. Figure 7 shows four such CMDs, in each case with color plotted against absolute magnitude in SDSS r. K corrections determined from the kcorrect routine have been applied to shift all photometry points to z = 0, although these corrections are small, ≲ 0.1 mag in r and ≲ 0.2 mag in the UV filters, on account of the low redshifts of the sample. For the CMD based only on SDSS data, these k corrections were determined using only the five filter SDSS photometry, while for the XMMOM/optical colors we used the SDSS plus the UVM2 and UVW1 filters and for the GALEX/SDSS CMD we used the SDSS plus FUV and NUV filters. The UVM2 magnitudes for A2063 have been adjusted by 0.81 mag to reflect the correction for integration time, and the magnitude errors arbitrarily increased by 0.1 magnitudes to reflect their additional uncertainty when using them to estimate K corrections. In each diagram, we fit the color magnitude relation using the procedure of López-Cruz, Barkhouse, & Yee (2004) although we differ from that work in that we do not use a cut in radial distance from the cluster centers (the XMM-OM images are smaller than the areas contained by r_{200}, the cut used in López-Cruz, Barkhouse, & Yee 2004), and in that we determine the fit using galaxies with measured redshifts as opposed to using the photometry for all objects with non-stellar profiles. Using only galaxies with cluster redshifts provides more accurate fits to the color magnitude relations, and these will be applied later to the categorization of galaxies having only photometric data. The brief summary of the fitting procedure is that the color-magnitude relation is fit as a straight line for all galaxies with −18 ≤ M_r ≤ −22 (chosen as the range where the red sequence can be seen to be the dominant population for all colors). We find the slope and intercept that minimize the difference between the actual and fitted colors of the data through the biweight location and scale of this distribution (Beers, Flynn, & Gebhardt

– 15 –

1990). The use of these robust statistics renders the fit less affected by outliers, which in this case are those cluster galaxies with active star formation or AGN producing blue colors. The fitting is iterative, with data more than 3σ removed from the fitted relation dropped and a subsequent fit determined. For all but UVM2, this quickly converges to a stable solution where subsequent iterations do not reject any objects. The paucity of UVM2 data points makes fitting the relation using such colors ineffective, but the rough equivalence of the UVM2 filter to the GALEX NUV filter provides perspective. Our fitted relations are: (u−r) = −0.05−0.13M_r (for N = 365 galaxies in the fit), (UV W 1 − r) = 0.95 − 0.14M_r (N = 273), and (NUV − r) = 2.22 − 0.17M_r (N = 273). We note that the relation for (NUV − r) is consistent with that reported in Wyder et al. (2007) after passive evolution between the z = 0.1 of that study and the z = 0 used here.

It can be seen from Figure 7 that the cluster galaxies of our study are dominated by objects on the red sequence, as would be expected based on the morphology-density relation and the XMM-OM data sampling the cluster cores. This general lack of star forming galaxies prevents us from decomposing the color information into separate red and blue sequences and we subsequently divide red and blue galaxies using a 2σ deviation from the fitted red sequence. There is a much greater spread in the GALEX/SDSS colors than for colors determined solely from SDSS data, both in total and for galaxies lying along the red sequence. This has been discussed in many prior studies and reflects the ability of near-UV data to probe recent star formation and thus better assess star formation history (e.g., Wyder et al. 2007; Kaviraj et al. 2007). We might also gain this information from the UVM2 filter as it is roughly the same as NUV, although within the present study we lack sufficient numbers of UVM2 detections. However, we do have ample numbers of galaxies with UVW1 photometry and the same general effect is apparent. To further illustrate this, in Figure 8 we plot histograms of the colors of galaxies relative to their fitted red sequences for the same color pairings as were used in Figure 7. These histograms show clearly that the width of the red sequence increases from (u − r) to (UV W 1 − r) to (NUV − r), with dispersions of 0.14, 0.22, and 0.43, respectively. These values reflect both real variation in galaxy colors about the red sequence and measurement errors of the data, with the median photometric errors being 0.06, 0.06, and 0.18 for u, UV W 1, and NUV . It is also apparent that the tail of the distribution – galaxies significantly bluer than the red sequence – becomes more populous as UV information is included. To this end, there are 57 cluster galaxies for which (UV W 1 − r) colors suggest a greater than 2σ separation from the red sequence whereas their (u − r) colors are consistent with the red sequence at this level.

What can be said about these 57 galaxies with blue (UV W 1 − r) colors but (u − r) colors consistent with the red sequence? Twenty-six of them do have flags on their UVW1 photometry indicating that the source was near the edge of an image or was deblended from nearby neighbors. The remaining 31 galaxies include 18 with GALEX NUV photometry and 20 with SDSS spectra, with eight galaxies having both. For half of the objects with GALEX photometry the (NUV − r) colors are consistent (at 2σ) with the red sequence defined using this color, while the other half agree with the (UV W 1 − r) impression of blue colors. In each case where the (NUV − r) colors do

– 16 –

not show a significant deviation from the red sequence the NUV data come from the AIS and thus have large associated errors at least partially explaining this lack of significant blue colors. We plot the eight available SDSS spectra for objects with GALEX photometry and discrepant SDSS and XMMOM-SDSS colors in Figure 9, along with their separations from the (NUV − r)-defined and (UV W 1 − r)-defined red sequences. At least two appear to be AGN consisting of an underlying old stellar population plus weak emission lines with [N ii]λ6584 stronger than Hα, plus relatively strong [S ii]λλ6717 + 6731 and [O ii]λ3727. For each of these, the (NUV − r) and (UV W 1 − r) colors agree that the galaxies are slightly off the red sequence. A third galaxy is likely in the same class but is a fainter object with a correspondingly noisier spectrum. Two galaxies appear to be star-forming galaxies on the basis of their emission lines and standard line ratio diagnostics. The remaining three galaxies are faint and have noisy spectra, but in each case Balmer absorption features are notable. The SDSS indicates equivalent widths of 5.2 ± 1.2, 2.7 ± 0.6, and 1.7 ± 0.4 Å for the Hδ absorption line for these three galaxies, consistent with the recent cessation of star formation and thus a general post-starburst classification.

Conversely, only four galaxies have (UV W 1 − r) colors consistent with the red sequence while their (u − r) colors suggest a greater than 2σ separation from the red sequence. One of these four galaxies has a flag on its UVW1 photometry, and in each case the (NUV − r) colors agree with the depiction gleaned from the UVW1 data. When considered along with the (UV W 1 − r)-defined blue galaxies, these findings argue that (UV W 1 − r) colors provide an accurate depiction of galaxy activity, and frequently this depiction improves upon that garnered from SDSS data alone.

As a corollary to this, the XMM-OM data are valuable for photometric selection of galaxies. For cluster studies, they accurately identify the red sequence and galaxies significantly more red than this may be assumed to be background galaxies to limit the number of targets for spectroscopic follow-up. Figure 10 shows the fainter end of the (UV W 1−r) vs. r CMD for both spectroscopicallyconfirmed cluster galaxies and all galaxies without spectroscopic redshifts. In general, our clusters are well sampled spectroscopically and the brightest possible cluster galaxy without a measured redshift would have M_r ≈ −20 should it reside in its associated cluster. This is largely a result of the SDSS Main Galaxy Sample providing spectra for nearly all galaxies down to r of about 17.8, or roughly M_r = −18.7 for our most distant cluster. Below this absolute magnitude there are many candidate cluster member galaxies, although strong selection biases are at work. The apparent decline in candidate red sequence galaxies is caused by the shallow depth of the UVW1 images relative to the SDSS r data, as redder colors fall below the detection threshhold of the UVW1 data. For A1656 where a deeper UVW1 image is available thanks to the combination of multiple observations, red sequence galaxies continue to be detected down to M_r ≳ −16. There appear to be many candidate faint star-forming galaxies with (UV W 1 − r) between about 0.5 and 2.5 and M_r ≳ −17, although the majority of these are likely to be background galaxies. This assessment is based on A1656, where spectroscopic surveys have probed to very faint populations and we find that nearly all of the galaxies in this range of color and absolute magnitude are background galaxies and hence not cluster members.

– 17 –

Ideally, we would like to use UVW1 data in conjunction with optical data to identify “green valley” objects. We are precluded from definitively doing this by the low numbers of blue galaxies and the corresponding inability to fit the blue sequence. However, we anticipate that future studies of non-cluster selected fields with UVW1 data will be able to accomplish this objective in a manner directly analogous to that for (NUV − r) work and will explore this in a future paper.

5.2. Morphological Dependence

Schiminovich et al. (2007) investigated how different galaxy morphologies related to regions of the UV-optical CMD, motivated by the interpretation of CMDs as parameterizations of star formation history and total stellar mass. They found a “star-forming sequence” along which galaxies have nearly constant star formation rate surface density, with disk-dominated galaxies tightly following this sequence and bulge-dominated galaxies exhibiting a much larger spread in star formation rate for a given mass. Here, we use our much smaller sample to do a preliminary look at how our findings are related to galaxy morphology.

The Galaxy Zoo project provides visual classifications of many galaxies from the SDSS (Lintott et al. 2008). Hundreds of thousands of volunteers have inspected SDSS galaxy images to place them within the general morphological categories of elliptical, spiral (with three subcategories pertaining the clockwise/anti-clockwise winding of their arms or “other” including edge-on orientation), mergers, and “Don’t Know.” After careful statistical evaluation of the classifications compared within the collection of volunteers and against professional and automated classifications, the Galaxy Zoo morphologies were presented in a published catalog (Lintott et al. 2011). We have used the Galaxy Zoo classifications that remove known sources of bias and provide “clean” morphologies, where clean refers to an agreement on classification of at least 80% of participants after correction for known biases.

As expected, effectively all galaxies with elliptical morphologies reside on the red sequence in each of the color pairings we examined in the previous discussion. Four elliptical galaxies have apparent blue colors in either (UV W 1 − r) or (NUV − r) (two for each). In each case only one of the two colors places the object off the red sequence, and these data have flags on the relevant UV photometry whereas the other UV photometry is unflagged and places the object on the red sequence. Similarly, most of the spirals lie off the red sequence but there are a few exceptions. Seven spiral galaxies have colors placing them on the red sequence, with the three color pairings generally producing consistent interpretations. Three of these have SDSS spectra with emission lines indicating an active nucleus, and another two have absorption-line spectra with no evidence for emission and are thus “passive spirals” (e.g., Dressler et al. 1999). The remaining two were consistent with the red sequence for (u − r) but not for (UV W 1 − r), and were thus included in Figure 9. They are the uppermost star-forming galaxy (i.e., 4th galaxy from the top) and the middle post-starburst galaxy (second galaxy from the top) in that Figure. The former is only located on the red sequence for (u − r) and may indicate an error in its u-band photometry.

– 18 –

We also revisited the photometry and kcorrect fits described in Section 6, and include the results in Table 3. Despite the relatively small numbers of sources with full GALEX and SDSS photometry plus Galaxy Zoo classifications, we find a significant difference between elliptical and spiral galaxies in the kcorrect fits to their UV spectra. In general, the fitted SEDs accurately match both the optical and UV photometry for the spiral galaxies. This is also true for the galaxies with “uncertain” classifications, which are sources for which neither the elliptical nor spiral classification received the requisite 80% agreement threshold for a clean classification. However, the UV magnitudes predicted by the SED fits for elliptical galaxies are significantly fainter than the actual measured magnitudes for such sources. At both F UV and NUV , this offset is significant at roughly 5σ. This may result from the presence of the “UV upturn” in elliptical galaxies (see review by O’Connell 1999), which is the rise in the flux density of many elliptical galaxies and spiral bulges at wavelengths ≲ 2500Å. At the low redshifts of our sample, the UV upturn falls primarily within the F UV band but extends slightly into NUV and UV M2. The UV upturn does not coincide with the UV W 1 filter and indeed we do not see any significant difference between predicted and measured magnitudes for elliptical galaxies within this filter. Potential issues caused by the lack of extreme horizontal branch stars and the UV upturn in the synthesis models used by kcorrect are specifically noted in that work, and thus the presence of the UV upturn in actual elliptical galaxies would make their measured magnitudes brighter than those predicted by the code as we observe. The strength of the UV upturn varies significantly among galaxies although is generally stronger in more metal-rich and brighter elliptical galaxies. We do find this to be consistent with our findings in that the difference between measured and predicted magnitudes is usually larger for brighter galaxies although we do not find this to be statistically significant.

5.3. Star Formation Histories of Cluster Galaxies

We can gain additional perspective on the CMDs and their relation to star formation history by examining simple toy models. We start with a galaxy residing on the red sequence at M_r = −20 and then add star formation using the Starburst99 synthesis models (Leitherer et al. 1999). In one model, we assume the galaxy undergoes an instantaneous burst of star formation that increases its stellar mass by 25% and then follow its color evolution over the subsequent 900 million years. In a second model, we assume the galaxy undergoes constant star formation at a rate of 1 M_⊙ yr^{−1}. In this latter model, after 900 million years the galaxy has increased its stellar mass by just over 30% and is thus comparable to the instantaneous burst model. For both the instantaneous burst and constant star formation cases we use Starburst99 models for each low and high metallicity (Z = 0.001 and Z = 0.04) to bracket the possible range. The resulting tracks are shown in Figure 11 plotted along with actual data for comparison.

The general behavior of the models is the same for each color pair. The instantaneous starburst models lie at the edge of the outer envelope of observed blue galaxies shortly after their burst, then fade and redden as the massive stars formed in their starbursts die off. If the metallicity of the

– 19 –

stars formed in the starburst is low enough, the galaxy remains bluer than the red sequence even after 900 million years for each of the color pairings. For higher metallicity bursts, the galaxy colors become consistent with the observed red sequence after about 400 million years for each (u − r) and (UV W 1 − r) and slightly longer for (NUV − r). Continuous star formation models maintain roughly constant colors while gradually becoming brighter as they build up stellar mass.

As noted earlier, kcorrect provides a means to evaluate star formation histories by decomposing the populations that produced the best-fitting template. A simple cut at this information is provided by the stellar birthrate parameter, b_X , the ratio of the stellar mass formed within the past X years to that formed over the history of the universe for a given galaxy (a variant on the ratio of the current SFR to the past-averaged SFR initially used by Kennicutt 1983). We have used

kcorrect to estimate b_{300}, b_{600}, and b_{1000}, where the subscripts indicate the stellar mass formed

within that past number of Myr. While we might expect the addition of ultraviolet data to reveal recent star formation missed by optical-only photometry, it actually provides stronger contraints on the lack of star formation in cluster galaxies within the past billion years. This can be seen in Figure 12, which shows histograms of the b_X values for the cluster galaxies of our sample. Using only SDSS data to estimate star formation histories (top left panel), there is a broad distribution in b_{1000} with nearly 98% of all galaxies (507/518) having b_{1000} > 0.02 and about 50% (260/518) having b_{1000} > 0.10. The addition of XMM-OM data to the SDSS photometry reduces these figures to 54% (271/499; we use only those galaxies with UVW1 data and hence the sample is slightly smaller than that based on SDSS photometry alone) and 19% (93/499), respectively, and the same figures based on GALEX and SDSS data are 60% (223/371, as 371 galaxies have both SDSS and GALEX NUV photometry) and 21% (78/371). The ultraviolet data, be they from XMM-OM or GALEX, thereby rule out significant amounts of star formation for most of our cluster galaxies over the past billion years. The difference is less on shorter timescales where the signatures of current star formation are stronger and more easily obtained even without ultraviolet data. The SDSS data alone find only about 6% (29/518) of our galaxies show any evidence for star formation over the past 300 million years, with b_{300} > 0.02. Finding large amounts of recent star formation is even more rare in our cluster sample, with only 8 galaxies (less than 2% of the total) having b_{300} > 0.10. These results are consistent with those determined when XMM-OM and GALEX data are included. The XMM-OM data in conjunction with the SDSS data find about 4% (20/499) of galaxies have b_{300} > 0.02 and less than 2% (8/499) have b_{300} > 0.10. For GALEX, these numbers are about 5% (19/371) and 3% (12/371). The overlap between the sources having b_{300} based on the different combinations of photometric bands is strong, and any discrepancies are understood as slight shifts in the timescale of recent star formation (for example, if the SDSS data showed b_{300} > 0.02 whereas the GALEX and SDSS data combined showed b_{300} < 0.02, the GALEX and SDSS data would find b_{600} several times larger than 0.02).

In Section 5.1 and Figure 9 we discussed several objects with discrepant colors. Three of these were suggested to have post-starburst characteristics, and we can assess their b_X values in light of this. The two galaxies with the stronger Hδ-absorption have b_{300} = 0.00 yet have b_{600} ≈ 0.05

– 20 –

and b_{1000} ≈ 0.06, consistent with the weak post-starburst classification. The addition of UV data does not greatly alter this interpretation and serves only to reduce slightly the magnitude of the recent star formation: b_{1000} based on SDSS data only is about 0.07 while that including near-UV data is about 0.06. The results are similar for the third of these galaxies that had the weakest Hδ absorption, although its recent star formation is a lower fraction of its total stellar mass.

5.4. Photometric Redshifts and Stellar Masses

Both large area surveys with too many objects for spectroscopic follow-up and the importance of selected area deep fields with objects too faint for practical spectroscopic observation have made phometric estimation of redshifts a heavily-used and important technique. We have investigated the application of XMM-OM photometry for photometric redshift determination by using the photo-z tools provided by kcorrect in order to determine whether the inclusion of XMM-OM photometry provides noticeable improvement in the accuracy of photometric redshifts. We evaluate the accuracy of the photometric redshifts by looking at the difference between the photometric and spectroscopic redshifts (z_{phot} − z_{spec})/(1 + z_{spec}), where we implicitly assume the spectroscopic redshifts are accurate. The dispersion in this quantity, σ_z, represents the accuracy of the photometric redshifts. A single round of 3σ clipping was used to remove a small number of “catastrophic failures” where the photometric redshifts are severe outliers to the overall trend, and we evaluated only those objects for which the near-UV photometry (F UV , NUV , UV M2, and UV W 1) had errors smaller than 0.5 magnitudes. The results may be found in Table 4.

In general, the addition of UV photometry does little to improve photometric redshifts as those derived using the SDSS photometry alone are of comparable quality to those determined when UV filters have been added to the SDSS photometry. This might be expected, as the strongest feature for photometric redshift estimation in the near-UV/optical portion of the spectrum is the 4000- Angstrom break, which is already sampled by the u and g photometric bands. As one moves to higher redshift, the addition of the UV filters is of even lesser importance as the 4000-Angstrom break shifts into redder filters where the associated SDSS photometric errors are smaller than those for the SDSS u photometry. We confirm this by separating our sample into cluster galaxies (as before, those within z ± 0.01 of the cluster systemic velocity) and background galaxies (those with z > z_{sys} + 0.01). The typical error in photometric redshifts for the low redshifts of our cluster sample is σ_z ≈ 0.05, while that for higher redshifts is σ_z ≈ 0.1. At the lower redshifts of the cluster sample there is marginal improvement in the accuracy of the photometric redshifts that include the near-UV data. This is most important for fainter galaxies where the photometric errors in u are relatively large. For sources with u > 20 and z_{spec} < 0.1, we find that substitution of UV W 1 for u photometry (and hence estimation of photometric redshifts using UV W 1 g r i z filters) improves σ_z from 0.11 to 0.05.

Prior studies have shown that the addition of UV data can improve the accuracy of stellar mass estimates (Salim et al. 2005). Without knowing the true stellar masses of galaxies in our

– 21 –

sample, we can again use stellar masses estimated using only SDSS photometry as a reference for those estimated after adding UV data to the SDSS photometry. We find that kcorrect suggests a mass increase of about 10% when UV data are included, ranging from about 8% when only UV W 1 are added to almost 12% when GALEX NUV and F UV are included, consistent with the findings reported by Salim et al. (2005). This indicates that even the addition of one photometric measurement blueward of SDSS u is valuable in estimation of stellar mass (see Figure 13). Within our sample, the increase appears dependent on galaxy mass with more massive galaxies having smaller relative increases. For galaxies with SDSS-derived stellar masses above 10^{10}M_⊙, the addition of GALEX photometry produces an average increase in the estimated stellar mass of about 8%. Conversely, stellar masses derived using GALEX plus SDSS photometry are nearly 33% larger than their values derived using only SDSS photometry when the SDSS-only stellar masses are < 10^9M_⊙. This result is at least in part a result of our object selection, as we require a detection in XMM-OM UV filters and fainter red sequence objects will often have UV M2 and UV W 1 magnitudes falling below our detection threshold.

5.5. Color-Color Diagrams and Non-Cluster Object Characterization

Colors utilizing UVW1 data are also advantageous to selecting different classes of objects. Seibert et al. (2005) showed this using GALEX NUV along with SDSS optical filters in color-color plots. They were able to segregate many different populations of stars (main sequence, white dwarfs, M dwarfs, etc.) and found improved separation of galaxies and stars particularly because the GALEX MIS NUV data are deeper than SDSS u data. We demonstrate this for XMM-OM UVW1 in Figure 14, which compares (UV W 1 − g) and (u − g) color plotted against (g − z) color. These filters have been chosen to give large spreads in colors and hence more separation of object types in color-color space. Stars and galaxies defined on the basis of the SDSS photometry are indicated by black asterisks and grey open triangles, respectively. A well-defined sequence of normal stars is seen in both plots (see, for example, Newberg et al. 1999; Covey et al. 2007), although the larger range in (UV W 1 − r) color appears to provide a cleaner separation between stars and galaxies. The nearby cluster galaxies investigated in this work are shown with red open triangles, and are strongly bunched in color-color space as they are predominantly red sequence objects and by selection are all at low redshift. The six objects with z > 1 are indicated by blue open circles, with those having SDSS spectra being dark blue and those with NED redshifts being cyan. One of the SDSS high redshift objects (at 12^h59^m34.^s6 +27^∘57^′53^{′′}) has an uncertain classification on account of its very blue featureless continuum. It was previously classified as an O-type subdwarf by Wegner & McMahan (1988), and does differ from the SDSS quasars in that it has a bluer (g − z) color. Similarly, we find that the predicted colors for quasars with 1 ≲ z ≲ 2 based on the Vanden Berk et al. (2001) composite SDSS quasar spectrum are consistent with those of the other quasars lending further support to a non-QSO identity for this particular object. In Figure 14 we also mark stars with SDSS spectra using large green star symbols. The increased number of such objects around the lower end of the stellar locus are F stars, whose spectra are

– 22 –

collected by the SDSS expressly for the purpose of spectrophotometric calibration.

Three stars with SDSS spectra lie off the main stellar locus, and we now comment briefly on these sources. First, the star with very blue colors (lower left on each plot) has an SDSS spectrum of a high-temperature blackbody (T_{eff} ≳ 40, 000 K) with slight Balmer absorption features, and has to be either a very hot O star or white dwarf. Its colors based on SDSS filters place it at the extreme end of the main sequence based on both comparison to known stars and to stellar models (Lenz et al. 1998; Covey et al. 2007), and it is in the Bianchi et al. (2011) catalog of potential hot white dwarfs. In this latter catalog, its (F UV − NUV ) and (NUV − r) colors indicate T_{eff} ≳ 40, 000 K which matches the SDSS spectrum and full photometry from GALEX, XMM-OM, and the SDSS. We find at most one other viable candidate for this type of object in our full matched sample of XMM-OM detections with SDSS counterparts. It is 3^{′′} from another faint blue star, and thus its GALEX photometry do not aid in its further characterization. The star lying below the stellar locus has the spectrum of an A-type star with strong Balmer absorption. Its location in the color-color diagram is expected for A stars, but also for blue horizontal branch stars and z ≳ 3 quasars (e.g., Newberg et al. 1999; Yanny et al. 2000). Finally, the reddest star with an SDSS spectrum has colors consistent with those of some observed M dwarfs, and with models for cool stars (T_{eff} ≲ 4000 K) with low metallicity (Lenz et al. 1998; Covey et al. 2007). Its spectrum appears to be that of a carbon star, a designation that is also consistent with its SDSS colors (Downes et al. 2004).

6. Summary

The archive of XMM observations that have targeted galaxy clusters is large, and for many of these observations the XMM-OM was also collecting data in UV filters. By taking the intersection of such cluster observations with the coverage of the SDSS and GALEX surveys and imposing a redshift cutoff of z = 0.5, we have isolated a sample of 11 nearby Abell clusters with XMM-OM data in either of the UV M2 or UV W 1 filters. We matched the astrometry of these images to that of the SDSS survey, made corrections for degradation of the XMM-OM system as a function of time, and stacked observations in fields that were observed in multiple campaigns. The accuracy of our image manipulation and photometry procedures were confirmed by their consistency with the OMCat and GALEX catalogs. In general, the UV M2 data are of comparable depth to the NUV data of the GALEX AIS and the UV W 1 data are comparable to the u data of the SDSS.

After folding in available redshift data, we arrived at a sample of 726 galaxies for use in investigating the potential value of XMM-OM UV photometry for galaxy evolution studies. Of these, 520 belong to the 11 Abell clusters of the sample. The benefits of CMDs created using GALEX NUV data are likely paralleled by XMM-OM UV M2 data, although our sample does not provide large numbers of such objects to test this claim. However, CMDs constructed using the UV W 1 filter and SDSS r show good promise for galaxy evolution studies. They show a strong red sequence with a wider real dispersion than CMDs created using SDSS u and r data, likely reflecting variations in star formation history among red sequence galaxies. They also provide greater separation

– 23 –

between red and blue sequences than those obtained using only the SDSS data. Our sample is dominated by red sequence objects and we are unable to determine whether UV W 1 data might prove useful in identifying green valley objects, although the aforementioned characteristics of UV W 1- incorporating CMDs provides a basis for some optimism on this subject. The Blanton & Roweis (2007) kcorrect package may also be applied to investigate star formation histories and produce estimates of galaxy stellar masses that include the contributions of younger stellar populations. Finally, color-color diagrams using UV W 1 data show promise for the identification of objects ranging from cool to hot stars, and extragalactic sources such as quasars.

NAM gratefully acknowledges the support for this work, which was provided by NASA ADP grant NNX09AC76G. We thank Antonio Talavera for his excellent work with XMM-OM calibration and the confirmation of an exposure time error for A2063, and we thank the anonymous referee for insightful comments which have improved the analysis and discussion. This research has made use of data obtained from the High Energy Astrophysics Science Archive Research Center (HEASARC) provided by NASA’s Goddard Space Flight Center, and the NASA/IPAC Extragalactic Database (NED) which is operated by the Jet Propulsion Laboratory, California Institute of Technology, under contract with the National Aeronautics and Space Administration. Based on observations obtained with XMM-Newton, an ESA science mission with instruments and contributions directly funded by ESA Member States and NASA. Funding for the Sloan Digital Sky Survey (SDSS) has been provided by the Alfred P. Sloan Foundation, the Participating Institutions, the National Aeronautics and Space Administration, the National Science Foundation, the U.S. Department of Energy, the Japanese Monbukagakusho, and the Max Planck Society. The SDSS Web site is http://www.sdss.org/. The SDSS is managed by the Astrophysical Research Consortium (ARC) for the Participating Institutions. The Participating Institutions are The University of Chicago, Fermilab, the Institute for Advanced Study, the Japan Participation Group, The Johns Hopkins University, the Korean Scientist Group, Los Alamos National Laboratory, the Max-Planck-Institute for Astronomy (MPIA), the Max-Planck-Institute for Astrophysics (MPA), New Mexico State University, University of Pittsburgh, University of Portsmouth, Princeton University, the United States Naval Observatory, and the University of Washington.

REFERENCES

Abazajian, K. et al. 2004, AJ, 128, 502 (SDSS DR2)

Abazajian, K. et al. 2009, ApJS, 182, 543 (SDSS DR7)

Abell, G.O., Corwin, H.G., Jr., & Olowin, R.P. 1989, ApJS, 70, 1

Baldry, I.K., Glazebrook, K., Brinkmann, J., Ivezić, Ž., Lupton, R.H., Nichol, R.C., & Szalay, A.

2004, ApJ, 600, 681

– 24 –

Beers, T.C., Flynn, K., & Gebhardt, K. 1990, AJ, 100, 32 Bertin, E., & Arnouts, S. 1996, A&AS, 117, 393 (SExtractor) Bianchi, L. et al. 2007, ApJS, 173, 659 Bianchi, L., Efremova, B., Herald, J., Girardi, L., Zabot, A., Marigo, P., & Martin, C. 2011, MNRAS, 411, 2770 Blanton, M.R. et al. 2005, AJ, 129, 2562 Blanton, M.R., & Roweis, S. 2007, AJ, 133, 734 (kcorrect ) Bruzual, A.G., & Charlot, S. 2003, MNRAS, 344, 1000 Covey, K.R. et al. 2007, AJ, 134, 2398 Donahue, M. et al. 2010, ApJ, 715, 881 Dorman, B., O’Connell, R.W., & Rood, R.T. 2003, ApJ, 591, 878 Downes, R.A., Margon, B., Anderson, S.F., Harris, H.C., Knapp, G.R., Schroeder, J., Schneider, D.P., York, D.G., Pier, J.R., & Brinkmann, J. 2004, AJ, 127, 3838 Dressler, A., Smail, I., Poggianti, B., Butcher, H., Couch, W., Ellis, R.S., & Oemler, A. Jr. 1999, ApJ, 122, 51 Gunn, J.E. et al. 1998, AJ, 116, 3040 Hicks, A.K., & Mushotzky, R.F. 2005, ApJ, 635, L9 Jansen, F. et al. 2001, A&A, 365, L1 Johnson, B.D. et al. 2007, ApJS, 173, 392 Kaviraj, S. et al. 2007, ApJS, 173, 619 Kennicutt, R.C., Jr. 1983, ApJ, 272, 54 Kuntz, K.D., Harrus, I., McGlynn, T.A., Mushotzky, R.F., & Snowden, S.L. 2008, PASP, 120, 740 Leitherer, C., Schaerer, D., Goldader, J.D., González Delgado, R.M., Robert, C., Kune, D.F., de Mello, D.F., Devost, D., & Heckman, T.M. 1999, ApJS, 123, 3 Lenz, D.D., Newberg, H.J., Rosner, R., Richards, G.T., & Stoughton, C. 1998, ApJS, 119, 121 Lintott, C., Schawinski, K., Slosar, A., Land, K., Bamford, S., Thomas, D., Raddick, M.J., Nichol, R.C., Szalay, A., Andreescu, D., Murray, P., & Vandenberg, J. 2008, MNRAS, 389, 1179

– 25 –

Lintott, C., Schawinski, K., Bamford, S., Slosar, A., Land, K., Thomas, D., Edmondson, E., Masters, K., Nichol, R.C., Raddick, M.J., Szalay, A., Andreescu, D., Murray, P., & Vandenberg, J. 2011, MNRAS, 410, 166 López-Cruz, O., Barkhouse, W.A., & Yee, H.K.C. 2004, ApJ, 614, 679 Martin, D.C. et al. 2005, ApJ, 619, L1 Martin, D.C. et al. 2007, ApJS, 173, 342 Mason, K.O. et al. 2001, A&A, 365, L36 Mittaz, J.P.D., Kaastra, J.S., Tamura, T., Fabian, A.C., Mushotzky, R.F., Peterson, J.R., Ikebe, Y., Lumb, D.H., Paerels, F., Stewart, G., & Trudolyubov, S. 2001, A&A, 365, L93 Monet, D.G. et al. 2003, AJ, 125, 984 Morrissey, P. et al. 2005, ApJ, 619, L7 Morrissey, P. et al. 2007, ApJS, 173, 682 Newberg, H.J., Richards, G.T., Richmond, M., & Fan, X. 1999, ApJS, 123, 377 O’Connell, R.W. 1999, ARA&A, 37, 603 Salim, S. et al. 2005, ApJ, 619, L39 Salim, S. et al. 2007, ApJS, 173, 267 Schawinski, K. et al. 2007, ApJS, 173, 512 Schiminovich, D. et al. 2007, ApJS, 173, 315 Schlegel, D., Finkbeiner, D.P., & Davis, M. 1998, ApJ, 500, 525 Seibert, M. et al. 2005, ApJ, 619, L23 Stoughton, C. et al. 2002, AJ, 123, 485 (SDSS EDR) Talavera, A., & the OMCal Team XMM-Newton Science Operations Center, “XMM-Newton Optical and UV Monitor (OM) Calibration Status,” XMM-SOC-CAL-TN-0019 Issue 5.0, 30 Oct 2008 Trager, S.C., Faber, S.M., Worthey, G., & González, J.J. 2000, AJ, 120, 165 Treyer, M. et al. 2007, ApJS, 173, 256 Vanden Berk, D.E. et al. 2001, AJ, 122, 549 Wegner,G., & McMahan, R.K. 1988, AJ, 96, 1933

– 26 –

Wyder, T.K. et al. 2005, ApJ, 619, L15 Wyder, T.K. et al. 2007, ApJS, 173, 293 Yanny, B. et al. 2000, ApJ, 540, 825 York, D.G. et al. 2000, AJ, 120, 1579 (SDSS) Yun, M.S., Reddy, N.A., & Condon, J.J. 2001, ApJ, 554, 803

This preprint was prepared with the AAS L^ATEX macros v5.2.

– 27 –

Fig. 1.— Filter curves for XMM-OM, based on measurements from Talavera et al. (2008), with GALEX F UV and NUV plus SDSS u also shown. The SDSS effective area assumes observation of a source at 1.3 airmass and has been divided by an arbitrary amount to fit the scale of the plot. The effective wavelengths for the filters are: GALEX F UV 1528 Å, GALEX NUV 2271 Å, UV W 2 2070 Å, UV M2 2314 Å, UV W 1 2901 Å, and SDSS u 3551 Å.

– 28 –

Fig. 2.— Separations between XMM-OM object and nearest neighbor in the SDSS (UV M2 at left, UV W 1 at right). The solid line and unshaded histogram represents the data prior to tying the astrometry to the SDSS, while the grey histogram represents the final astrometrically-corrected data.

– 29 –

Fig. 3.— Photometric comparison between OMCat (Kuntz et al. 2008) and our image processing and photometry. Magnitudes are in the Vega system, and the data points are color-coded by Abell cluster as shown in the legend (note that these same color codings will be used in all subsequent figures). Error bars are plotted for A2589 only to improve clarity, and in general are smaller than the point sizes for magnitudes m_{UV M2} ≲ 17 and m_{UV W 1} ≲ 18.5. At fainter magnitudes, the general flaring about a consistent offset between the two catalogs is consistent with the increasing magnitude errors.

– 30 –

Fig. 4.— Photometric comparison between GALEX NUV and our UV M2 photometry (AB magnitudes). Error bars are shown for only A2063 (pre-correction) and A2589 for clarity. Note the obvious discrepancy in the photometry for A2063, which is corrected by changing the exposure time from 8348 seconds to 3976 seconds. The mean offset between the NUV and UV M2, evaluated for sources with m_{NUV} ≤ 20 and removing outliers, is indicated at the top left of the plot along with the dispersion in this value.

– 31 –

Fig. 5.— Magnitude histogram for all objects detected in the UV M2 filter. The data for A1656 are indicated as a grey-shaded histogram, while the other clusters (A119, A400, A2063, A2147, A2197, and A2589; where magnitudes for A2063 have been adjusted to reflect the correct exposure time) are represented by the hatched histogram. The solid black line is the total.

– 32 –

Fig. 6.— Histograms of offsets between measured magnitudes and those predicted using kcorrect . The mean, deviation, and number of objects are indicated at the top right of each panel and are calculated after objects differing from the main distribution by more than 3σ are removed (this range is shown as vertical dashed lines).

– 33 –

Fig. 7.— Color magnitude diagrams (CMDs) for galaxies with spectroscopic redshifts confirming cluster membership. Each panel is labeled showing the pair of filters that have been used to evaluate the colors, and the top left panel includes the key for color-coding of the points by galaxy cluster. Red sequence fits (see text) are shown by solid lines, with dashed lines indicating the 1σ range about the fitted relations. No fit is provided for (UV M2 − r) as the smaller sample size prevented the fitting routine from converging, although the similarity between the UV M2 and NUV filters provides perspective.

– 34 –

Fig. 8.— Number of galaxies by color relative to the fitted color magnitude relation (see Figure 7). The relative color is defined as the actual measured color minus that predicted by the fitted color magnitude relation for a galaxy with the same absolute magnitude. Negative values thereby indicate galaxies bluer than the red sequence. Galaxies within ±2σ of the fitted color magnitude relation are indicated as the shaded portion of the histogram. For UVM2, where low numbers make the red sequence fit problematic, we have adopted the (UV M2 − r) fitted red sequence. The number of galaxies in the (u − r) panel has been multiplied by 2 (i.e., a value of 50 on the y axis indicates 100 galaxies) while that in the (UV M2 − r) panel has been divided by 4 in order to assist in comparing the panels. In all panels, a dashed line marks a color offset of zero: the location of the fitted color magnitude relation.

– 35 –

Fig. 9.— SDSS spectra for objects with unflagged NUV and UVW1 photometry and (UV W 1 − r) colors more than 2σ off the red sequence yet consistent with the (u − r) red sequence to within 2σ. All spectra have been shifted to the rest frame and the location of diagnostic features (Balmer lines, [O ii], [O iii], and [N ii]) are indicated by vertical dotted lines. The statistical significance of each galaxy’s deviation from the red sequence is indicated directly above each spectrum. The bottom three galaxies are low-luminosity AGN, the middle two are star-forming galaxies, and the top three appear to be weak post-starbursts. The post-starbursts are arranged in order of the strength of their Hδ absorption, with the uppermost galaxy having an equivalent width of 5.2 ± 1.2 Å and the lower two having equivalent widths of 2.7 ± 0.6 Å and 1.7 ± 0.4 Å, respectively.

– 36 –

Fig. 10.— Color magnitude diagram constructed using UVW1 data, with spectroscopically confirmed cluster members indicated by solid points and galaxies without measured redshifts indicated by open points. The red sequence fit is shown by a solid line, with its ±2σ range given by dotted lines. The lack of points toward the top right is caused by the shallower UVW1 data precluding the detection of faint red objects.

– 37 –

Fig. 11.— Behavior of toy model star-forming galaxies on color magnitude diagrams (CMDs). Actual data from our sample are shown as grey filled circles, with fitted red sequences and their 2σ limits shown with solid and dashed lines, respectively (refer to Figure 7). Model galaxies are depicted with asterisks (instantaneous starburst) and stars (continuous star formation), where their evolution is followed from 100 Myr (indicated by the large circled asterisk) to 900 Myr.

– 38 –

Fig. 12.— Histograms of number of cluster galaxies at given values of b_X , where X is 300 Myr (grey filled histograms), 600 Myr (hatched histograms), and 1000 Myr (solid black histograms). The b values are determined using kcorrect with input being SDSS photometry only (top left), SDSS plus XMM-OM (top right), and SDSS plus GALEX (bottom left). Note how the addition of ultraviolet data greatly reduces the spread in b_{1000}.

– 39 –

Fig. 13.— Comparison of stellar masses estimated using near-UV data (GALEX NUV and XMM- OM UV W 1) with those estimated using only SDSS photometry. The points indicating means have been evaluated for sources with SDSS masses below 10^9M_⊙, between 10^9M_⊙ and 10^{10}M_⊙, and above 10^{10}M_⊙.

– 40 –

Fig. 14.— Color-color plots based on UVW1 and SDSS photometry (left) and SDSS only photometry (right). Objects with large errors in their magnitudes (> 0.3) are excluded, as are objects with m_r < 13 to help remove stars with incorrect photometry due to saturation. The different source types are indicated by symbols: stars classified by the SDSS photometric pipeline (black asterisks), stars with SDSS spectroscopy (large green stars), SDSS photometric galaxies (grey triangles), spectroscopically-confirmed cluster galaxies (red triangles), and quasars (blue open circles, with dark blue being SDSS spectroscopic quasars and cyan being quasars with NED redshifts). The top panels are plotted with the same limits on the axes to capture the majority of the data and show the difference in spread between UVW1 and u, while the bottom panels are zoomed in on the stellar sequence (regions depicted by grey boxes in top panels) to better show the cleaner separation of source types with the addition of UVW1 data.

– 41 –

Table 1. Sample and XMM-OM Data

Cluster RA Dec z XMM Filter Observe Date (J2000) (J2000) ObsID

Abell 119 00:56:21.4 -01:15:47 0.0442 0402190501 UVM2 Jun 16, 2006 0012440101 UVW1 Jan 15, 2001 Abell 400 02:57:38.6 +06:02:00 0.0244 0300210501 UVM2 Jul 22, 2005 0404010101 UVM2 Aug 6, 2006 Abell 1656 12:59:48.7 +27:58:50 0.0231 0300530101 UVM2 Jun 19, 2005 0300530201 UVM2 Jun 17, 2005 0300530301 UVM2 Jun 11, 2005 0300530401 UVM2 Jun 9, 2005 0300530501 UVM2 Jun 9, 2005 0300530601 UVM2 Jun 7, 2005 0300530701 UVM2 Jun 7, 2005 0300530101 UVW1 Jun 18, 2005 0300530201 UVW1 Jun 17, 2005 0300530301 UVW1 Jun 11, 2005 0300530401 UVW1 Jun 9, 2005 0300530501 UVW1 Jun 8, 2005 0300530601 UVW1 Jun 7, 2005 0300530701 UVW1 Jun 6, 2005 0124711401 UVW1 May 29, 2000 Abell 1983 14:52:44.0 +16:44:46 0.0436 0091140201 UVW1 Feb 14, 2002 Abell 2052 15:16:45.5 +07:00:01 0.0355 0109920101 UVW1 Aug 21, 2000 0109920201 UVW1 Aug 21, 2000 0109920301 UVW1 Aug 21, 2000 Abell 2063 15:23:01.8 +08:38:22 0.0349 0200120401 UVM2^a Feb 17, 2005 0200120401 UVW1^a Feb 17, 2005 Abell 2147 16:02:17.2 +15:53:43 0.0350 0300350401 UVM2^a Feb 4, 2006 0300350301 UVW1^a Feb 2, 2006 Abell 2151 16:05:15.0 +17:44:55 0.0366 0147210201 UVW1 Aug 9, 2003 Abell 2197 16:28:10.4 +40:54:26 0.0308 0203710101 UVM2 Sep 23, 2004 0203710101 UVW1 Sep 23, 2004 Abell 2199 16:28:38.5 +39:33:06 0.0302 0008030601 UVW1 Aug 15, 2002 0008030301 UVW1 Jul 6, 2002

– 42 –

Table 1—Continued

Cluster RA Dec z XMM Filter Observe Date (J2000) (J2000) ObsID

Abell 2589 23:24:00.5 +16:49:29 0.0414 0204180101 UVM2 Jun 4, 2004 0204180101 UVW1 Jun 4, 2004

a“Engineering” mode rather than standard mosaic mode.

Note. — XMM observations are grouped by filter, with UVM2 listed first followed by UVW1.

– 43 –

Table 2. XMM-OM Selected Objects Cluster t^{UV M2}_{int} t^{UV W 1}_{int} N_{UV M2} N_{UV W 1} N_{tot} N_z N_{gal} N_{clus} [ksec] [ksec]

Abell 119 3.6 0.8 28^a 52^a 64^a 23^a 21^a 20 Abell 400 8.1 · · · 58 · · · 58 12 6 6 Abell 1656 12.0 14.6 201 632 652 340 333 161 Abell 1983 · · · 1.2 · · · 220 220 44 44 38 Abell 2052 · · · 3.7 · · · 229 229 57 38 35 Abell 2063 4.0^b 3.5 107 340 355 51 49 45 Abell 2147 5.0 4.8 113 408 423 67 65 55 Abell 2151 · · · 2.2 · · · 312 312 58 58 55 Abell 2197 2.6 2.2 85 267 275 27 26 23 Abell 2199 · · · 3.7 · · · 438 438 61 58 52 Abell 2589 2.4 2.4 54 208 215 28 28 28 Total · · · · · · 646 3106 3311 768 726 518

aOnly about half of the XMM-OM field is covered by the SDSS.

bCorrected integration time. The image header indicated 8348 seconds, but obvious issues with photometry showed this to be in error. The proper integration time is 3976 seconds. See discussion in Section 4.2.

Note. — Columns: 1) cluster name, 2) approximate net integration time in kiloseconds for UVM2 data, 3) approximate net integration time in kiloseconds for UVW1 data, 4) number of UVM2-detected objects with SDSS counterparts, 5) number of UVW1-detected objects with SDSS counterparts, 6) total number of XMM-OM-detected objects (either UVM2 or UVW1) with SDSS counterparts, 7) number of objects from column 6 with redshift data, 8) number of objects from column 6 with redshifts satisfying 0.001 < z < 0.999, and 9) number of objects roughly consistent with membership in that cluster.

– 44 –

Table 3. Measured Magnitudes Compared to kcorrect Predictions

All Galaxies Elliptical Spiral Uncertain Filter Mean Dev N Mean Dev N Mean Dev N

FUV -0.127 0.406 247 -0.461 0.511 34 0.022 0.186 15 -0.044 0.408 51 NUV -0.132 0.298 242 -0.250 0.306 33 -0.127 0.126 15 -0.105 0.319 50 UVM2 -0.186 0.365 122 -0.248 0.350 19 -0.112 0.284 8 0.008 0.348 21 UVW1 -0.076 0.278 232 0.049 0.159 33 -0.312 0.173 14 -0.034 0.266 48 u 0.085 0.090 245 0.119 0.065 34 0.048 0.053 15 0.077 0.062 50 g -0.016 0.064 248 -0.005 0.015 34 -0.003 0.021 15 -0.007 0.018 49 r -0.007 0.056 248 0.005 0.010 34 -0.002 0.004 14 0.004 0.013 51 i -0.009 0.046 246 -0.009 0.008 34 -0.001 0.009 15 -0.009 0.012 48 z 0.004 0.010 245 0.002 0.002 34 0.001 0.002 15 0.002 0.004 50

Note. — Values are for the difference between the measured magnitudes and those predicted based on the GALEX and SDSS photometry input to kcorrect . A round of 2σ clipping was used to remove strong outliers before computing the mean and deviation. Morphologies are taken from Table 2 of Lintott et al. (2011), and represent “clean” assignments after accounting for known biases – hence the relatively large fraction of “Uncertain” morphologies.

Table 4. Accuracy of Photometric Redshifts

All Galaxies Cluster Galaxies Background Galaxies Filters Used N_{f ull} σ_{z,f ull} N_{clip} σ_{z,clip} N_{f ull} σ_{z,f ull} N_{clip} σ_{z,clip} N_{f ull} σ_{z,f ull} N_{clip} σ_{z,clip} u g r i z 726 0.131 711 0.078 518 0.128 506 0.055 205 0.121 202 0.103 F N u g r i z 239 0.147 233 0.072 161 0.163 155 0.053 77 0.099 74 0.076 F u g r i z 250 0.149 243 0.067 167 0.159 161 0.048 82 0.124 81 0.091 N u g r i z 497 0.126 486 0.065 360 0.124 353 0.043 135 0.120 131 0.097 UV M2 UV W 1 u g r i z 174 0.136 170 0.086 97 0.133 95 0.048 75 0.134 73 0.110 UV M2 u g r i z 197 0.138 192 0.087 114 0.132 112 0.054 81 0.143 80 0.133 UV W 1 u g r i z 698 0.136 679 0.079 499 0.130 485 0.053 196 0.139 190 0.110 UV W 1 g r i z 698 0.137 681 0.082 499 0.130 485 0.050 196 0.146 192 0.126