arXiv:1110.3690v2 [nucl-ex] 31 Mar 2012

Search for double β decay processes in^{106}Cd with the help of^{106}CdWO_4 crystal scintillator

P. Belli^a, R. Bernabei^{a,b,1}, R.S. Boiko^c, V.B. Brudanin^d, F. Cappella^{e,f} , V. Caracciolo^{g,h}, R. Cerulli^g, D.M. Chernyak^c, F.A. Danevich^c, S. d’Angelo^{a,b}, E.N. Galashov^i, A. Incicchitti^{e,f} , V.V. Kobychev^c, M. Laubenstein^g , V.M. Mokina^c, D.V. Poda^{g,c}, R.B. Podviyanuk^c, O.G. Polischuk^c, V.N. Shlegel^i, Yu.G. Stenin^{i,2}, J. Suhonen^j , V.I. Tretyak^c, Ya.V. Vasiliev^i

aINFN, Sezione di Roma “Tor Vergata”, I-00133 Rome, Italy bDipartimento di Fisica, Università di Roma “Tor Vergata”, I-00133 Rome, Italy cInstitute for Nuclear Research, MSP 03680 Kyiv, Ukraine dJoint Institute for Nuclear Research, 141980 Dubna, Russia eINFN, Sezione di Roma “La Sapienza”, I-00185 Rome, Italy f Dipartimento di Fisica, Università di Roma “La Sapienza”, I-00185 Rome, Italy gINFN, Laboratori Nazionali del Gran Sasso, I-67100 Assergi (AQ), Italy hDipartimento di Fisica, Università dell’Aquila, I-67100 L’Aquila, Italy iNikolaev Institute of Inorganic Chemistry, 630090 Novosibirsk, Russia j Department of Physics, University of Jyväskylä, P.O. Box 35 (YFL), FI-40014 Finland

Abstract

A search for the double β processes in^{106}Cd was carried out at the Gran Sasso National Laboratories of the INFN (Italy) with the help of a^{106}CdWO_4 crystal scintillator (215 g) enriched in^{106}Cd up to 66%. After 6590 h of data taking, new improved half-life limits on the double beta decay processes in^{106}Cd were established at the level of 10^{19} − 10^{21} yr; in particular, T^{2νεβ+}_{1/2} ≥ 2.1 × 10^{20} yr, T^{2ν2β+}_{1/2} ≥ 4.3 × 10^{20} yr, and T^{0ν2ε}_{1/2} ≥ 1.0 × 10^{21} yr. The resonant neutrinoless double electron captures to the 2718 keV, 2741 keV and 2748 keV excited states of^{106}Pd are restricted to T^{0ν2K}_{1/2} ≥ 4.3 × 10^{20} yr, T^{0νKL1}_{1/2} ≥ 9.5 × 10^{20} yr and T^{0νKL3}

1/2 ≥ 4.3 × 10^{20} yr, respectively (all limits at 90% C.L.). A possible resonant enhancement of the 0ν2ε processes is estimated in the framework of the QRPA approach. The radioactive contamination of the^{106}CdWO_4 crystal scintillator is reported.

PACS: 29.40.Mc, 23.40.-s

Keywords: Double beta decay,^{106}Cd, CdWO_4 crystal scintillator, Low counting experiment

1Corresponding author. E-mail address: rita.bernabei@roma2.infn.it (R. Bernabei). 2Deceased

1 INTRODUCTION

The neutrinoless double beta decay (0ν2β) is a powerful tool to investigate the properties of the neutrino and of the weak interactions. The study of this nuclear decay, forbidden in the framework of the Standard Model, can allow us to determine an absolute scale of the neutrino mass and its hierarchy, to establish the nature of the neutrino (Majorana or Dirac particle), and to check the lepton number conservation, the possible contribution of right-handed admixture to the weak interaction, and the existence of Nambu-Goldstone bosons (majorons) [1].

Experimental efforts over the last seventy years have concentrated mainly on the decay modes with emission of two electrons. Allowed in the Standard Model, the two neutrino (2ν) 2β^− decay mode was observed in ten isotopes with half-lives in the range of 10^{18} − 10^{24} yr. For the 0ν2β^− decay mode half-life limits at the level of 10^{23} − 10^{25} yr were set for several nuclei (see reviews [2, 3] and original studies [4, 5, 6, 7, 8, 9]), while positive evidence for^{76}Ge has been published in [10] and new experiments are in progress to further investigate this latter isotope as well.

The results of the searches for the capture of two electrons from atomic shells (2ε), electron capture with positron emission (εβ^+), and emission of two positrons (2β^+) are at the level of 10^{16} − 10^{21} yr (see review [2] and original works [11, 12, 13, 14, 15, 16, 17, 18, 19, 20, 21, 22, 23, 24, 25, 26, 27]); although allowed, the two neutrino mode of these processes has not yet been detected^3. High sensitivity experiments to search for neutrinoless 2ε and εβ^+ decays are also important because they could clarify a contribution of right-handed admixtures in weak interactions [31].

The isotope^{106}Cd (the decay scheme is presented in Fig. 1) is among the most widely studied 2β^+ nuclides thanks to the large energy release (Q_{2β} = 2775.39(10) keV [32]) and to the comparatively high natural abundance (1.25 ± 0.06% [33]). It should be stressed that^{106}Cd is a rather promising isotope also according to the theoretical predictions [31, 34, 35, 36, 37, 38]. In particular, the calculated half-lives for the two neutrino mode of the 2ε and εβ^+ processes are at the level of T_{1/2} ∼ 10^{20} − 10^{22} yr [35, 39, 40, 41, 42], reachable with the present low counting technique.

Furthermore, in the case of the 0ν capture of two electrons from the K shell (or L and K shells), the energy releases of 2727 keV (2K capture), 2747 keV (KL_1) and 2748 keV (KL_3) are close to the energies of a few excited levels of^{106}Pd (with E_{exc} = 2718 keV, 2741 keV and 2748 keV). Such a coincidence could give a resonant enhancement of the 0ν2ε capture [43, 44, 45, 46, 47, 48].

Therefore, it is not surprising that the study of^{106}Cd has a rather long history. The half-life limits at the level of 10^{15} yr could be extracted from the old (1952) underground measurements of a Cd sample with photographic emulsions [49], while a search for positrons emitted in 2β^+ decay was performed in 1955 with a Wilson cloud chamber in a magnetic field and with 30 g of cadmium foil; this gave a limit of 10^{16} yr [50]. Measurements of a 153 g Cd sample during 72 h with two NaI(Tl) scintillators working in coincidence have been carried out in [51]; the half-life limits at the level of ∼ 10^{17} yr were determined for 2β^+, εβ^+ and 2ε processes.

The subsequent studies can be divided into two groups: experiments using samples of cadmium with external detectors for the detection of the emitted particles (with enriched

3An indication for 2β^+ decay processes in^{130}Ba was obtained by the geochemical method [28, 29]; however, this result has to be confirmed in a direct counting experiment. It is worth mentioning the work [30] where BaF_2 crystal scintillators were used to search for double β processes in^{130}Ba.

Figure 1: Simplified decay scheme of^{106}Cd [52] (levels at 1904 − 2714 keV are omitted). The energies of the excited levels and of the emitted γ quanta are in keV (relative intensities of γ quanta are given in parentheses).

106Cd [22, 53] and natural cadmium [39]), and experiments with detectors containing cadmium, namely semiconductor CdTe and CdZnTe detectors [54, 55] and CdWO_4 crystal scintillators [7, 56, 57]. Previous experiments on the searches for the 2β processes in^{106}Cd are summarized in Table 1.

Data from the experiment, performed in the Solotvina Underground Laboratory (1000 m w.e.), with a 15 cm^{3 116}CdWO_4 crystal scintillator (enriched in^{116}Cd to 83%, with 0.16% of 106Cd), were used to set the limits on the 2β decay of^{106}Cd at the level of 10^{17} − 10^{19} yr [56]. In experiment [39], 331 g of Cd foil were measured at the Frejus Underground Laboratory (4800 m w.e.) with a 120 cm^3 HPGe detector during 1137 h; γ quanta from the annihilations of the positrons and from the de-excitation of the daughter^{106}Pd nucleus were searched for, giving rise to half-life limits at the level of 10^{18} − 10^{19} yr. In [57], a large (1.046 kg) CdWO_4 scintillator was measured at the Gran Sasso National Laboratories (3600 m w.e.) over 6701 h. The determined limits on the half-life for the 2β^+ and εβ^+ decays were at the level of ∼ 10^{19} yr for 0ν, and ∼ 10^{17} yr for 2ν processes. A small (0.5 g) CdTe crystal was tested as a cryogenic bolometer in 1997 [54]; the achieved sensitivity was ∼ 10^{16} yr for 0ν2β^+ decay. An experiment [53] was performed in 1999 at the Gran Sasso National Laboratories using an enriched^{106}Cd (to 68%) cadmium sample (154 g) and two low background NaI(Tl) scintillators installed in the low background DAMA/R&D set-up during 4321 h; these measurements reached a sensitivity level of more than 10^{20} yr for 2β^+, εβ^+ and 2ε processes. A long-term (14183 h) experiment in the Solotvina Underground Laboratory with enriched^{116}CdWO_4 scintillators (total mass of 330 g) was completed in 2003 [7]; in addition, results of dedicated measurements during 433 h with a 454 g not-enriched CdWO_4 crystal were also considered [58]. In general, the experimental sensitivity was improved by approximately one order of magnitude in comparison with the older measurements [56].

There are two running experiments to search for 2β decay of^{106}Cd: COBRA and TGV-II. The T_{1/2} limits in the range of 10^{17} − 10^{18} yr were set in the COBRA experiment [55] using CdTe and CdZnTe crystals. In the TGV-II experiment [22, 23], 32 planar HPGe detectors are used. Cadmium foils enriched in^{106}Cd to 75% are inserted between neighbouring detectors. The main goal of the TGV experiment is the search for the two neutrino double electron capture in^{106}Cd. After 8687 h plus 12900 h (in two phases of the experiment) of data taking, the limits on double β decay of^{106}Cd to the ground state and to the excited levels of^{106}Pd are around 10^{20} yr.

Table 1: Experiments on the searches for the 2β decay of^{106}Cd. The range of the T_{1/2} limits corresponds to values given for the transitions to the ground state or to the excited levels of 106Pd. More detailed information can be found in the original papers (see also [2]). COBRA and TGV experiments are still running.

Description T_{1/2} limit, yr Year [Ref.] Cd samples between photographic emulsions^a ∼ 10^{15} (0ν2β^+, 0νεβ^+) 1952 [49] Cd foil in a Wilson cloud chamber 6 × 10^{16} (0ν2β^+) 1955 [50] Cd sample between two NaI(Tl) scintillators in coincidence (2.2 − 2.6) × 10^{17} (2β^+) 1984 [51] (4.9 − 5.7) × 10^{17} (εβ^+) 1.5 × 10^{17} (2ν2ε) 116CdWO_4 crystal scintillator (0.5 − 1.4) × 10^{18} (0ν2β^+) 1995 [56] (0.3 − 1.1) × 10^{19} (0νεβ^+) 5.8×10^{17} (2ν2ε) CdWO_4 crystal scintillator 2.2 × 10^{19} (0ν2β^+) 1996 [57] 9.2 × 10^{17} (2ν2β^+) 5.5 × 10^{19} (0νεβ^+) 2.6 × 10^{17} (2νεβ^+) Cd sample measured by HPGe detector 1.0 × 10^{19} (2β^+) 1996 [39] (6.6 − 8.1) × 10^{18} (εβ^+) (3.5 − 6.2) × 10^{18} (2ε) CdTe cryogenic bolometer 1.4 × 10^{16} (0νεβ^+) 1997 [54] 106Cd sample between two NaI(Tl) scintillators in coincidence (1.6−2.4)×10^{20} (2β^+) 1999 [53] (1.1 − 4.1) × 10^{20} (εβ^+) (3.0 − 7.3) × 10^{19} (2ε) 116CdWO_4 crystal scintillators (0.5 − 1.4) × 10^{19} (2β^+) 2003 [7] (0.1 − 7.0) × 10^{19} (εβ^+) (0.6 − 8.0) × 10^{18} (2ε) CdZnTe semiconductor detectors (COBRA) (0.9 − 2.7) × 10^{18} (2β^+) 2009 [55] (4.6 − 4.7) × 10^{18} (εβ^+) 1.6 × 10^{17} (2ε) 106Cd samples between planar HPGe detectors (TGV) 3.6 × 10^{20} (2ν2ε) 2011 [22] 1.1 × 10^{20} (0ν2ε, 2741 keV) (1.4 − 1.7) × 10^{20} (2β^+) 2011 [23] (1.1 − 1.6) × 10^{20} (εβ^+) 1.6 × 10^{20} (0ν2ε, 2718 keV) a) To our knowledge, this was the first underground experiment in history of investigations of 2β decay.

We would like to mention two important advantages of the experiments using detectors containing cadmium: a higher detection efficiency for the different channels of the^{106}Cd double β decay, and a possibility to resolve the two neutrino and the neutrinoless modes of the decay.

Thanks to their good scintillation characteristics, their low level of intrinsic radioactivity, and their pulse-shape discrimination ability (which allows an effective reduction of the background), cadmium tungstate crystal scintillators were successfully applied to low background experiments in order to search for the double β decay of the cadmium and tungsten isotopes [7, 16, 57], and in order to investigate rare α [59] and β [58, 60] decays.

The aim of the present work was the search for the 2β processes in^{106}Cd with the help of a low background cadmium tungstate crystal scintillator enriched in^{106}Cd (^{106}CdWO_4).

2 EXPERIMENT

The cadmium tungstate crystal (27 mm in diameter by 50 mm in length; mass 215 g), used in the experiment, was developed [61] from deeply purified cadmium [62] enriched in^{106}Cd to 66%. The scintillator was fixed inside a cavity (⊘47 × 59 mm) in the central part of a polystyrene light-guide, 66 mm in diameter by 312 mm in length. The cavity was filled with high purity silicon oil. Two high purity quartz light-guides, 66 mm in diameter by 100 mm in length, were optically connected to the opposite sides of the polystyrene light-guide. To collect the scintillation light the assembly was viewed by two low radioactive EMI9265–B53/FL, 3” diameter photomultiplier tubes (PMT). The detector was installed deep underground in the low background DAMA/R&D set-up at the Gran Sasso National Laboratories of the INFN (Italy). It was surrounded by copper bricks and sealed in a low radioactive, air-tight copper box continuously flushed with high purity nitrogen gas to avoid the presence of residual environmental radon. The copper box was surrounded by a passive shield made of high purity copper, 10 cm of thickness, 15 cm of low radioactive lead, 1.5 mm of cadmium and 4 to 10 cm of polyethylene/paraffin to reduce the external background. The shield was contained inside a Plexiglas box, also continuously flushed with high purity nitrogen gas.

An event-by-event data acquisition system recorded the amplitude, the arrival time, and the pulse shape of the events by means of a 1 GS/s 8 bit DC270 Transient Digitizer by Acqiris (adjusted to a sampling frequency of 20 MS/s) over a time window of 100 μs.

The energy resolution of the detector was measured with^{22}Na,^{60}Co,^{133}Ba,^{137}Cs,^{228}Th, and^{241}Am γ sources in the beginning of the experiment. For instance, the energy resolution (full width at half maximum, FWHM) of the^{106}CdWO_4 detector for the γ quanta of^{137}Cs (662 keV) and of^{228}Th (2615 keV) was 14.2(3)% and 8.4(2)%, respectively. Two additional calibration measurements were performed: one approximately in the middle, and the second one at the end of the experiment with the help of^{22}Na,^{60}Co,^{137}Cs, and^{228}Th γ sources to test the detector stability. In addition, the energy scale of the detector was checked by using the peaks due to^{207}Bi contamination of the^{106}CdWO_4 crystal scintillator (see Section 3.4). The energy scale during the experiment was reasonably stable with a deviation in the range of (1 − 2)%. The data of the calibration measurements were used to estimate the dependence of the energy resolution on the energy. Below 500 keV the energy resolution of the detector to γ quanta with energy E_γ can be described by the function: FWHM_γ = √ 11.2 × E_γ , while above 500 keV the data are fitted by FWHM_γ = √ −4900 + 21 × E_γ , where FWHM_γ and E_γ are given in keV.

The low background measurements were carried out in three runs listed in Table 2. The energy interval of the data taking was chosen as 0.05 − 4 MeV in Run 1 to investigate the background of the detector at low energy. Taking into account the rather high activity of β active^{113}Cd^m (see the next Section), the data acquisition was slightly modified in order to avoid the recording of the pulse shapes of all events with an energy lower than 0.4 MeV (Run 2); the upper energy threshold was ≈ 1.8 MeV. In a third run, after some improvement in the data acquisition system, the energy threshold was increased to ≈ 0.57 MeV and the upper energy threshold was set to 4 MeV (Run 3). The data accumulated in Run 2 were used to estimate the activity of^{228}Th in the^{106}CdWO_4 crystal by a time-amplitude analysis (see Section 3.1). The first 1320 h of data taking (Run 1 + part of Run 3) were already analyzed and presented in [63].

Table 2: The low background measurements with the^{106}CdWO_4 crystal scintillator. Times of measurements (t), energy intervals of data taking (ΔE), and background counting rates (BG) in different energy intervals are specified.

Run t ΔE BG (counts/(yr×keV×kg)) (h) (MeV) in energy interval (MeV) 0.8 − 1.0 2.0 − 2.9 3.0 − 4.0 1 283 0.05 − 4.0 474(18) 2.6(6) 0.4(3) 2 2864 0.40 − 1.8 453(11) – – 3 6307 0.57 − 4.0 412(4) 2.3(1) 0.33(4)

3 DATA ANALYSIS

The energy spectrum accumulated with the^{106}CdWO_4 detector in Runs 1 and 3 over 6590 h is presented in Fig. 2. The counting rate ≈ 24 counts/s below the energy ≈ 0.65 MeV is mainly due to the β decay of^{113}Cd^m with activity 116(4) Bq/kg. Contamination of the enriched^{106}Cd by the β active^{113}Cd^m has been found in the low background TGV experiment [64], where β particles and X rays from thin foils of the enriched^{106}Cd were measured by planar Ge detectors; part of this material was used to produce the^{106}CdWO_4 crystal.

Contributions to the background above the energy ≈ 0.6 MeV were analyzed by means of the time-amplitude and of the pulse-shape discrimination techniques, as well as by the fit of the data with Monte Carlo simulated models of the background.

3.1 Time-amplitude analysis of^{228}Th activity

The arrival time and the energy of each event were used to select the events of the fast decay chain in the^{232}Th family^4:^{224}Ra (Q_α = 5.79 MeV, T_{1/2} = 3.66 d) →^{220}Rn (Q_α = 6.41 MeV, T_{1/2} = 55.6 s) →^{216}Po (Q_α = 6.91 MeV, T_{1/2} = 0.145 s) →^{212}Pb. To select α events from the decays of^{224}Ra,^{220}Rn, and^{216}Po, one should take into account the quenching of the scintillation output in the CdWO_4 crystal scintillator, the so called α/β ratio, defined as the

4The technique of the time-amplitude analysis is described in detail e.g. in [65, 66].

Figure 2: (Color online) The energy spectrum measured with the^{106}CdWO_4 scintillator over 6590 h in the low background set-up. (Inset) The decay of the β active^{113}Cd^m dominates at the energy < 0.65 MeV (the data over 283 h).

ratio of an α peak position in the γ scale of a detector to the energy of the alpha particles. The dependence of the α/β ratio on the energy of the α particles measured for^{116}CdWO_4 scintillator [59]: α/β = 0.083(9) + 0.0168(13) × E_α (where E_α is in MeV), was used to estimate the positions of^{224}Ra,^{220}Rn, and^{216}Po α peaks in the data accumulated with the^{106}CdWO_4 detector. As a first step, all the events within an energy interval 0.6 − 1.8 MeV were used as triggers, while for the second events a time interval 0.026 − 1.45 s and the same energy window were required. Taking into account the efficiency of the events selection in this time interval (88.2% of^{216}Po decays), the activity of^{228}Th in the^{106}CdWO_4 crystal was calculated to be 0.042(4) mBq/kg. As a next step, all the selected pairs (^{220}Rn –^{216}Po) were used as triggers in order to find the events of the decay of the mother α active^{224}Ra. A 1.45 − 111 s time interval (73.2% of^{220}Rn decays) was chosen to select events in the energy interval 0.6 − 1.75 MeV. The obtained α peaks from the^{224}Ra→^{220}Rn→^{216}Po→^{212}Pb chain and the time distributions for the^{220}Rn→^{216}Po and^{216}Po→^{212}Pb decays are shown in Fig. 3.

The positions of the three α peaks, selected by the time-amplitude analysis in the γ scale of the detector, were used to obtain the following dependence of the α/β ratio on the energy of the α particles, E_α, in the range 5.8 − 6.9 MeV: α/β = 0.11(2) + 0.011(3) × E_α (where E_α is in MeV). The dependence is in agreement with the data obtained for the^{116}CdWO_4 scintillation detector in [59].

Figure 3: (Color online) Alpha peaks of^{224}Ra,^{220}Rn and^{216}Po selected by the time-amplitude analysis from the data accumulated over 9454 h with the^{106}CdWO_4 detector. The obtained half-lives of^{220}Rn (64^{+19}_{−12} s) and^{216}Po (175^{+13}_{−11} ms) are in agreement with the table values (55.6 s and 145 ms, respectively [67]).

3.2 Pulse-shape discrimination

As demonstrated in [68], the difference in pulse shapes in the CdWO_4 scintillator can be used to discriminate γ(β) events from those induced by α particles. The optimal filter method proposed by E. Gatti and F. De Martini in 1962 [69] was applied for this purpose. For each signal f(t), the numerical characteristic of its shape (shape indicator, SI) was defined as: SI = ∑ f(t_k) × P (t_k)/ ∑ f(t_k). There the sum is over the time channels k, starting from the origin of signal and averaging up to 50 μs, and f(t_k) is the digitized amplitude (at the time t_k) of a given signal. The weight function P (t) was defined as: P (t) = {f_α(t) − f_γ (t)}/{f_α(t) + f_γ(t)}, where f_α(t) and f_γ (t) are the reference pulse shapes for α particles and γ quanta measured in [70]. By using this approach, α events were clearly separated from γ(β) events as shown in Fig. 4 where the scatter plot of the shape indicator versus energy is depicted for the data of the low background measurements with the^{106}CdWO_4 detector. The distribution of the shape indicators for events with energies in the range 0.7−1.4 MeV (shown in Inset of Fig. 4) justifies reasonable pulse-shape discrimination between α particles and γ quanta (β particles), as well as a possibility to reject randomly overlapped pulses (mainly caused by the β decay of^{113}Cd^m).

The energy spectrum of the α events selected with the help of the pulse-shape discrimination is shown in Fig. 5. As demonstrated in [59], the energy resolution for the α particles is worse than that for the γ quanta due to the dependence of the α/β ratio on the direction of the

Figure 4: (Color online) The shape indicators (see text) versus the energy accumulated over 6590 h with the^{106}CdWO_4 crystal scintillator in the low background set-up. Three sigma intervals for shape indicator values corresponding to γ quanta (β particles) and α particles are depicted. Events with shape indicator values greater than ≈ 3.8 can be explained by the overlap of events (mainly of β decays of^{113}Cd^m in the crystal), while the population of the events in the energy interval ≈ 1.8 − 3.8 MeV with shape indicators outside of the γ(β) region are due to the decays of the fast^{212}Bi –^{212}Po sub-chain of^{228}Th. (Inset) The distribution of the shape indicators demonstrates the efficiency of the pulse-shape discrimination between γ(β), α and overlapped pulses.

α particles relative to the CdWO_4 crystal axes^5. As a result we cannot definitively identify single U/Th α active daughters in the spectrum. Therefore, we set only limits on α activities of U/Th daughters in the^{106}CdWO_4 crystal scintillator. For this purpose, the spectrum was fitted in the energy interval 550 − 1500 keV by a simple model, built of Gaussian functions (to describe the α peaks of U/Th daughters) plus an exponential function to describe the background. The activities of^{228}Th and^{226}Ra were restricted taking into account the results of the time-amplitude and of the double pulse (see Section 3.3) analyses. The fit and its components are shown in Fig. 5. The limits on the activity of the U/Th daughters (supposing a broken equilibrium in the chains) are presented in Table 3. The total α activity of U/Th in the^{106}CdWO_4 crystal is 2.1(2) mBq/kg.

The pulse-shape analysis also allows us to distinguish the main part of the^{212}Bi→^{212}Po→^{208}Pb events from the trace contamination of the crystal by^{228}Th (see Fig. 4).

5One could compare the energy resolutions of the α peaks presented in Fig. 3 with the expected resolution for γ quanta (see Section 2).

Figure 5: (Color online) The energy distribution of the α events (points) selected by the pulseshape analysis from the data accumulated over 6590 h with the^{106}CdWO_4 detector together with the fit (solid line) by a model, which includes the α decays from^{232}Th and^{238}U families.

3.3 Identification of Bi-Po events

The search for the fast decays^{214}Bi (Q_β = 3.27 MeV, T_{1/2} = 19.9 m) →^{214}Po (Q_α = 7.83 MeV, T_{1/2} = 164 μs) →^{210}Pb (in equilibrium with^{226}Ra from the^{238}U chain) was performed with the help of the pulse-shape analysis of the double pulses^6. Only eleven^{214}Bi –^{214}Po events were found in the data over 6590 h. Taking into account the detection efficiency in the time window of 1 − 50 μs (it contains 18.6% of the^{214}Po decays), one can estimate the activity of 226Ra in the^{106}CdWO_4 crystal as 0.012(3) mBq/kg.

To select double pulses produced by the fast chain of the decays^{212}Bi (Q_β = 2.25 MeV, T_{1/2} = 60.55 m) →^{212}Po (Q_α = 8.95 MeV, T_{1/2} = 0.299 μs) →^{208}Pb (in equilibrium with^{228}Th from the^{232}Th family), a front edge analysis was developed (see also [59]). The energy spectrum of the selected^{212}Bi –^{212}Po events and the time distribution of^{212}Po decay are presented in Fig. 6. The approach gives the activity of^{228}Th as 0.051(4) mBq/kg, in a reasonable agreement with the result of the time-amplitude analysis.

All the selected Bi-Po events were removed from the γ(β) spectrum of the^{106}CdWO_4 detector.

3.4 Simulation of the γ(β) background, radioactive contamination of^{106}CdWO_4 scintillator

To reproduce the background of the^{106}CdWO_4 detector, we consider the contribution of the primordial radioactive isotopes^{40}K and^{238}U/^{232}Th with their daughters, anthropogenic radionuclides^{90}Sr-^{90}Y and^{137}Cs, and cosmogenic^{106}Ru and^{110m}Ag. Anthropogenic^{90}Sr and 137Cs are the most widespread radionuclides, in particular after the Chernobyl accident. Contamination of cadmium tungstate by^{106}Ru and^{110m}Ag was estimated in [72], while presence of

6The technique of the analysis is described e.g. in [59, 71].

Figure 6: (Color online) (a) The energy spectrum of^{212}Bi→^{212}Po→^{208}Pb events in the 106CdWO_4 scintillator selected by means of the pulse-shape and of the front edge analyses (see text) from the data accumulated over 6590 h together with the fit (dashed line) of the simulated distribution. (b) The time distribution of the^{212}Po α decay selected by the front edge analysis. The fit of the time distribution gives a half-life: T_{1/2} = (0.26 ± 0.03) μs, in agreement with the table value for^{212}Po (0.299 μs [67]).

110mAg in 116CdWO

4 crystal scintillators was observed in [73]. The radioactive contamination of the set-up (in particular the PMTs and the copper box) can contribute to the background, too. The energy distributions of the possible background components were simulated with the help of the EGS4 [74] and GEANT4 [75] codes. The initial kinematics of the particles emitted in the nuclear decays was given by the event generator DECAY0 [76].

The background energy spectrum of the γ and β events, selected by means of the pulseshape, of the front edge and of the double pulse analyses, was fitted by a model built from the simulated distributions. The activities of the U/Th daughters were bounded taking into account the results of the time-amplitude and of the pulse-shape analyses. The activities of the^{40}K,^{232}Th and^{238}U in the PMTs were taken from [77]. The radioactive contaminations of the copper box have been assumed to be equal to those reported in [78]. In addition, we have added a model of the overlapped^{113}Cd^m β decays, which contribute to the background in the energy region up to ≈ 1 MeV.

Two clear peculiarities in the spectrum of the CdWO_4 detector at (1064 ± 3) keV and at (1631 ± 5) keV cannot be explained by the contribution from the external γ quanta. Indeed, no similar peaks were observed in the low background measurements with radiopure ZnWO_4 crystal scintillators [79] performed before the present experiment in the same experimental conditions.

To explain the peculiarities, we suppose a pollution of the crystal by^{207}Bi (T_{1/2} = 31.55 yr, Q_{EC} = 2398 keV [67]). The presence of^{207}Bi could be caused by the contamination of the facilities at the Nikolaev Institute of Inorganic Chemistry (Novosibirsk, Russia) where the 106CdWO_4 crystal was grown. A large amount of BGO crystal scintillators is in production in that laboratory. BGO crystal scintillators are typically contaminated by^{207}Bi at the level of 0.01 − 10 Bq/kg [80, 81, 82, 83]. Moreover, we cannot also exclude the possibility of a 106CdWO_4 crystal surface contamination in the laboratory of the Institute for Nuclear Research (Kyiv, Ukraine) where the scintillator was diffused and preliminary tested [61] with several gamma sources, including an open^{207}Bi source. Therefore, two distributions of^{207}Bi (uniformly distributed in the crystal volume and deposited on its surface) were also simulated and added to the background model.

A fit of the spectrum of γ(β) events in the energy region 0.66 − 4.0 MeV by the model described above, and by the main components of the background are shown in Fig. 7. The fit (χ^2/n.d.f. = 111/108 = 1.03, where n.d.f. is number of degrees of freedom) confirmed more likely a surface contamination of the crystal scintillator by^{207}Bi at level of 3 mBq (0.06 mBq/cm^2). We cannot distinguish the part of the activity due to bulk contamination and we give only a limit on the internal contamination of the crystal by^{207}Bi as ≤ 0.7 mBq/kg.

Figure 7: (Color online) The energy spectrum of the β(γ) events accumulated over 6590 h in the low background set-up with the^{106}CdWO_4 crystal scintillator (points) together with the background model (black continuous superimposed line). The main components of the background are shown: the β spectrum of the internal^{113}Cd^m, the distributions of^{40}K,^{228}Th, 238U,^{207}Bi (deposited on the crystal surface), and the contribution from the external γ quanta from PMTs and copper box (“ext γ”) in these experimental conditions.

There are no other clear peculiarities in the spectrum which could be ascribed to the internal trace radioactive contamination. Therefore, we just set limits on the activities of^{40}K,^{90}Sr-^{90}Y, cosmogenic^{106}Ru and^{110m}Ag. A summary of radioactive contamination of the^{106}CdWO_4 crystal scintillator is given in Table 3. We hope to clarify further the radioactive contamination of the scintillator at a next stage of the experiment by running the^{106}CdWO_4 crystal scintillator in coincidence/anti-coincidence with an ultra-low background HPGe γ detector.

Table 3: Radioactive contamination of the^{106}CdWO_4 scintillator determined by different methods (activities are presented in mBq/kg, while the surface contamination by^{207}Bi is given in mBq/cm^2). Data for^{116}CdWO_4 and CdWO_4 crystal scintillators are presented for comparison.

Chain Nuclide Activity 106CdWO_4^{116}CdWO_4 CdWO_4 [59, 7, 73] [57, 60] 232Th^{232}Th ≤ 0.07^a ≤ 0.08 − 0.053(9) ≤ 0.026 228Th 0.042(4)^b 0.039(2) − 0.062(6) ≤ (0.003 − 0.014) 238U^{238}U ≤ 0.6^a ≤ (0.4 − 0.6) ≤ 1.3 230Th ≤ 0.4^a ≤ (0.05 − 0.5) 226Ra 0.012(3)^c ≤ 0.005 ≤ (0.007 − 0.018) 210Po ≤ 0.2^a ≤ (0.063 − 0.6) ≤ 0.063 Total α activity 2.1(2)^a 1.4(1) − 2.7(3) 0.26(4) 40K ≤ 1.4^d ≤ 0.4 ≤ (1.7 − 5) 90Sr-^{90}Y ≤ 0.3^d ≤ 0.2 ≤ 1 106Ru ≤ 0.02^d – –

110mAg ≤ 0.06 d 0.06(4) –

113Cd 182^e 91(5) 558(4) − 580(20) 113Cd^m 116000(4000)^d 0.43(6) ≤ 3.4 − 150(10) 137Cs – 2.1(5) ≤ 0.3 207Bi internal ≤ 0.7^d 0.6(2) – 207Bi surface 0.06^d – – a) Pulse-shape discrimination (Section 3.2) b) Time-amplitude analysis (Section 3.1) c) Analysis of double pulses (Section 3.3) d) Fit of the background spectrum (Section 3.4) e) Calculated taking into account the isotopic abundance of^{113}Cd in^{106}CdWO_4 [61] and the half-life of^{113}Cd [60].

4 RESULTS AND DISCUSSION

There are no peculiarities in the data accumulated with the^{106}CdWO_4 detector which could be ascribed to the double β decay of^{106}Cd. Therefore only lower half-life limits can be set by using the formula:

lim T_{1/2} = N × η × t × ln 2/ lim S, where N is the number of^{106}Cd nuclei in the^{106}CdWO_4 crystal (2.42 × 10^{23}), η is the detection efficiency, t is the time of measurements, and lim S is the number of events of the effect searched for, which can be excluded at a given confidence level (C.L.; all the limits on the double beta processes in^{106}Cd are given at 90% C.L. in the present study).

The response functions of the^{106}CdWO_4 detector to the 2β processes in^{106}Cd were simulated with the help of the EGS4 [74] and the DECAY0 [76] packages (some examples of the simulated spectra are presented in Fig. 8).

Figure 8: (Color online) Simulated response functions of the^{106}CdWO_4 detector to 2ε, εβ^+ and 2β^+ processes in^{106}Cd.

4.1 Double beta processes in^{106}Cd with positron(s) emission

To estimate the value of lim S for the 2νεβ^+ decay of^{106}Cd to the ground state of^{106}Pd, the energy spectrum of the γ and β events accumulated over 6590 h with the^{106}CdWO_4 detector was fitted by the model built from the components of the background (see Section 3.4) and the effect searched for. The activities of U/Th daughters in the crystals were constrained in the fit taking into account the results of the time-amplitude and pulse-shape analyses. The initial values of the^{40}K,^{232}Th and^{238}U activities inside the PMTs were taken from [77], where the radioactive contaminations of PMTs of the same model were measured. The radioactive contaminations of the copper were constrained taking into account the data of the measurements [84] where copper of a similar quality was used. The best fit (achieved in the energy interval 780 − 2800 keV with χ^2/n.d.f. = 93/81 = 1.15) gives an area of the 2νεβ^+ distribution in the interval of the fit: (26 ± 230) counts, thus with no evidence for the effect. In accordance with the Feldman-Cousins procedure [85], this corresponds to lim S = 403 counts at 90% C.L. Taking into account the detection efficiency within the fit window given by the Monte Carlo simulation (η = 0.700) and the 98% efficiency of the pulse-shape discrimination to select γ(β) events, we get the following limit on the decay: T^{2νεβ+} 1/2 (g.s. → g.s.) ≥ 2.1 × 10^{20} yr at 90% C.L.

The excluded energy distribution expected for the two neutrino εβ^+ decay of^{106}Cd is shown in Fig. 9.

Figure 9: (Color online) Part of the energy spectrum of γ and β events accumulated with the 106CdWO_4 detector over 6590 h (circles) and its fit in the energy interval 780 − 2800 keV (solid line) together with the excluded distributions of 2νεβ^+ and 0νεβ^+ decay of^{106}Cd.

One can prove this result by using the so called “one sigma” approach when a value of lim S can be estimated as the square root of the counts in the energy interval of interest. There are 5462 events in the energy interval 1140 − 2220 keV where the detection efficiency for the 2νεβ^+ decay is 36%. The method gives a limit T^{2νεβ+}_{1/2} ≥ 6.0 × 10^{20} yr at 68% C.L., similar to the result acquired by fitting the experimental data with the help of the Monte Carlo simulated models.

The sensitivity to the neutrinoless channel of the εβ^+ decay is better thanks to the shift of the energy distribution to higher energies. Moreover, there are clear peaks in the spectrum of the 0νεβ^+ process in the energy region 1.6 − 2.9 MeV, which make the effect much more distinguishable (see Fig. 9). A fit of the data in the energy interval 2000−3000 keV (χ^2/n.d.f. = 23/25 = 0.92) gives an area of the effect (17 ± 13) events (lim S = 38 events, η = 0.675), which corresponds to the following limit on the 0νεβ^+ decay of^{106}Cd to the ground state of^{106}Pd: T^{0νεβ+} 1/2 (g.s. → g.s.) ≥ 2.2 × 10^{21} yr at 90% C.L.

The “one sigma” approach gives for this decay the limit (there are 187 events in the energy interval 2140 − 2960 keV, where the detection efficiency for the 0νεβ^+ decay is 62%): T^{0νεβ+}_{1/2} ≥ 5.6 × 10^{21} yr at 68% C.L., proving the result obtained by fitting the experimental data.

A fit of the data in the energy interval 1200 − 3000 keV (χ^2/n.d.f. = 71/65 = 1.09) gives S = (92 ± 52) events (lim S = 177 events, η = 0.616) of the 2ν2β^+ decay of^{106}Cd to the ground level of^{106}Pd. Therefore, we set the following limit: T^{2ν2β+} 1/2 (g.s. → g.s.) ≥ 4.3 × 10^{20} yr at 90% C.L.

The neutrinoless double positron decay was restricted by the fit in the energy interval 760 − 2800 keV (χ^2/n.d.f. = 88/82 = 1.07, S = −14 ± 69, lim S = 100, η = 0.956): T^{0ν2β+} 1/2 (g.s. → g.s.) ≥ 1.2 × 10^{21} yr at 90% C.L.

It should be stressed that the mass difference between^{106}Cd and^{106}Pd atoms also allows transitions to the excited levels of^{106}Pd. Thus, we have given limits on the 2β^+ decay of^{106}Cd to the first excited level of^{106}Pd (2^+, 512 keV), and on the electron capture with positron emission to a few lowest excited levels of^{106}Pd with the spin-parity 0^+ and 2^+. The results are presented in Table 4.

4.2 Double electron capture in^{106}Cd

In the case of 2ν double electron capture in^{106}Cd from the K or/and L shells the total energy release in the^{106}CdWO_4 detector is in the range from 2E_{L3} = 6.3 keV to 2E_K = 48.8 keV (where E_K and E_L are the binding energies of the electrons on the K and L shells of the palladium atom, respectively). Detection of such an energy deposit requires a low enough energy threshold and low background conditions. In our measurements the energy threshold for the acquisition was set too high (because of the background due to the β decay of^{113}Cd^m) to search for the two neutrino mode of double electron capture to the ground state and to the first excited level of^{106}Pd.

However, we can analyze the existing data to search for the 2ν double electron capture to the higher excited levels of^{106}Pd. For instance, by fitting the background spectrum in the energy interval 660 − 2780 keV (χ^2/n.d.f. = 103/86 = 1.20, S = −5 ± 63, lim S = 99, η = 0.328) the following half-life limit on 2ν2ε decay of^{106}Cd to the 2^+_2 level (1128 keV) of^{106}Pd was obtained:

T^{2ν2ε}_{1/2} (g.s. → 2^+_2 ) ≥ 4.1 × 10^{20} yr at 90% C.L.

The following restriction was set on the 2ν2ε decay of^{106}Cd to the 0^+_1 1134 keV level of^{106}Pd by fitting the experimental spectrum in the energy interval 660–2800 (χ^2/n.d.f. = 105/87 = 1.21, S = −5 ± 163, lim S = 263, η = 0.367):

T^{2ν2ε}_{1/2} (g.s. → 0^+_1 ) ≥ 1.7 × 10^{20} yr at 90% C.L.

In the case of the neutrinoless double electron capture, different particles can be emitted: X rays and Auger electrons from de-excitations in atomic shells, γ quanta and/or conversion electrons from de-excitation of daughter nucleus. We suppose here that only one γ quantum is emitted in the nuclear de-excitation process. It should be stressed that the electron captures from different shells (2K, KL, 2L and other modes) cannot be energetically resolved by our detector. The fit of the measured spectrum in the energy interval 1800 − 3200 keV (χ^2/n.d.f. = 37/41 = 0.90, S = 7±10, lim S = 23, η = 0.194) gives the following limit on the 0ν2ε transition of^{106}Cd to the ground state of^{106}Pd:

T^{0ν2ε}_{1/2} (g.s. → g.s.) ≥ 1.0 × 10^{21} yr at 90% C.L.

The limits on the double electron capture in^{106}Cd to the lowest excited levels of^{106}Pd were obtained by a fit of the data in different energy intervals (see Table 4).

4.3 Resonant neutrinoless double electron capture in^{106}Cd

A resonant neutrinoless double electron capture in^{106}Cd is possible on three excited levels of 106Pd with energies 2718 keV, 2741 keV and 2748 keV.

The half-life of the^{106}Cd resonant 2ε process was estimated [86] by using the general formalism of [87] and by calculating the associated nuclear matrix element in a realistic single-particle space with a microscopic nucleon-nucleon interaction. We have used a higher-RPA (randomphase approximation) framework called the multiple-commutator model (MCM) [88, 89]. Using the UCOM short-range correlations [90], the half-life for the 0ν double electron capture in^{106}Cd to the 2718 keV level of^{106}Pd (assuming its spin-parity is 0^+) can be written as:

T_{1/2} = (3.0 − 8.1) × 10^{22} ×^{x2+26.2}_{⟨mν ⟩2} yr (1)

where x = |Q_{2β} − E|, and ⟨m_ν ⟩ (the effective Majorana neutrino mass) are in eV units. Here Q_{2β} is the difference in atomic masses between^{106}Cd and^{106}Pd, and E contains the nuclear excitation energy and the hole energies in the atomic s orbitals. The dependence of the half-life on x is plotted in Fig. 10 for several values of ⟨m_ν ⟩. Use of the the recently remeasured (by the Penning-trap mass spectrometry [32]) value of Q_{2β} leads to a value x = 8390 eV for the degeneracy parameter, and thus to the 2ε half-life estimate: T_{1/2} = (2.1 − 5.7) × 10^{30} yr for ⟨m_ν ⟩ = 1 eV.

We have estimated limits on the resonant 0ν2K and 0νKL processes in^{106}Cd by using the data from our experiment. For instance, the fit of the energy spectrum of the γ and β events measured by the^{106}CdWO_4 detector over 6590 h in the energy region 1280 − 3000 keV (η = 0.315) gives 35 ± 34 events for the 0ν double electron captures from two K shells to the excited level at 2718 keV. We should take lim S = 91 events, which leads to the following limit on the possible resonant process:

T^{0ν2K}_{1/2} (g.s. → 2718 keV) ≥ 4.3 × 10^{20} yr at 90% C.L.

For the 0ν double electron capture of K and L_1 electrons to the level 2741 keV we have obtained a slightly stronger restriction (S = 10 ± 13, lim S = 31, η = 0.238):

Figure 10: (Color online) Calculated half-life for the resonant 0ν2ε capture decay of^{106}Cd to the excited level 2718 keV of^{106}Pd as a function of parameter x (see text) for different values of the effective neutrino mass. Dashed line and arrow show the value of x derived from the recent measurements of the Q_{2β} in^{106}Cd [32].

T^{0νKL1} 1/2 (g.s. → 2741 keV) ≥ 9.5 × 10^{20} yr at 90% C.L.

However, one can expect that the 0νKL process is strongly suppressed due to the large spin (4^+) of the level at 2741 keV.

Finally, for the 0ν double electron capture of K and L_3 electrons to the 2, 3^− level at 2748 keV we have obtained the following limit (S = 35 ± 21, lim S = 69, η = 0.238): T^{0νKL3} 1/2 (g.s. → 2748 keV) ≥ 4.3 × 10^{20} yr at 90% C.L.

Despite the fact that the limits are far away from the theoretical predictions, they are higher than the existing limits and are at the level of the best restrictions on resonant processes reported for different isotopes. The limit for the 0ν double electron capture to the level at 2748 keV is obtained for the first time.

All the half-life limits on 2β decay of^{106}Cd obtained in the present work are summarized in Table 4 where results of the most sensitive previous studies are given for comparison.

Although the obtained bounds are well below the existing theoretical predictions [31, 34, 35, 36, 37, 38], most of the limits are about one order of magnitude higher than those previously established. Moreover, some channels of^{106}Cd double β decay were investigated for the first time. It should be stressed that only two nuclides (^{78}Kr [21] and^{130}Ba [28]) among six potentially 2β^+ active isotopes [2] were investigated at a comparable level of sensitivity T_{1/2} ∼10^{21} yr.

Table 4: Half-life limits on 2β processes in^{106}Cd. The detection efficiencies for the effect searched for (η) and the values of lim S within the energy intervals of fit (ΔE) are presented.

Decay Decay Level ΔE (keV) η lim S T_{1/2} limit (yr) at 90% C.L. channel mode of^{106}Pd Present work Best previous (keV) limits 2ε 2ν g.s. − − − − ≥ 3.6 × 10^{20} [22] 2^+_1 512 − − − − ≥ 1.2 × 10^{20} [23] 2^+_2 1128 660 − 2780 0.328 99 ≥ 4.1 × 10^{20} ≥ 5.1 × 10^{18} [39] 0^+_1 1134 660 − 2800 0.367 263 ≥ 1.7 × 10^{20} ≥ 1.0 × 10^{20} [23] 2^+_3 1562 660 − 2800 0.342 830 ≥ 5.1 × 10^{19} − 0^+_2 1706 760 − 2800 0.320 370 ≥ 1.1 × 10^{20} − 0^+_3 2001 760 − 2780 0.484 208 ≥ 2.9 × 10^{20} − 0^+_4 2278 660 − 3000 0.381 294 ≥ 1.6 × 10^{20} − 0ν g.s. 1800 − 3200 0.194 23 ≥ 1.0 × 10^{21} ≥ 8.0 × 10^{18} [7] 2^+_1 512 2040 − 3200 0.150 36 ≥ 5.1 × 10^{20} ≥ 3.5 × 10^{18} [39] 2^+_2 1128 760 − 3000 0.465 187 ≥ 3.1 × 10^{20} ≥ 4.9 × 10^{19} [53] 0^+_1 1134 760 − 3000 0.474 169 ≥ 3.5 × 10^{20} ≥ 7.3 × 10^{19} [53] 2^+_3 1562 760 − 3000 0.520 186 ≥ 3.5 × 10^{20} − 0^+_2 1706 760 − 3000 0.531 262 ≥ 2.5 × 10^{20} − 0^+_3 2001 1300 − 3200 0.346 185 ≥ 2.3 × 10^{20} − 0^+_4 2278 660 − 3200 0.564 335 ≥ 2.1 × 10^{20} − Res. 2K 0ν 2718 1280 − 3000 0.315 91 ≥ 4.3 × 10^{20} ≥ 1.6 × 10^{20} [23] Res. KL_1 4^+ 2741 1280 − 3000 0.238 31 ≥ 9.5 × 10^{20} ≥ 1.1 × 10^{20} [22] Res. KL_3 2, 3^− 2748 1300 − 3000 0.238 69 ≥ 4.3 × 10^{20} − εβ^+ 2ν g.s. 780 − 2800 0.700 403 ≥ 2.1 × 10^{20} ≥ 4.1 × 10^{20} [53] 2^+_1 512 660 − 3000 0.846 943 ≥ 1.1 × 10^{20} ≥ 2.6 × 10^{20} [53] 2^+_2 1128 1260 − 3000 0.414 167 ≥ 3.1 × 10^{20} ≥ 1.4 × 10^{20} [53] 0^+_1 1134 1200 − 3000 0.519 172 ≥ 3.7 × 10^{20} ≥ 1.6 × 10^{20} [23] 0ν g.s. 2000 − 3000 0.675 38 ≥ 2.2 × 10^{21} ≥ 3.7 × 10^{20} [53] 2^+_1 512 1200 − 3000 0.936 91 ≥ 1.3 × 10^{21} ≥ 2.6 × 10^{20} [53] 2^+_2 1128 1200 − 3000 0.678 148 ≥ 5.7 × 10^{20} ≥ 1.4 × 10^{20} [53] 0^+_1 1134 2000 − 3000 0.240 59 ≥ 5.0 × 10^{20} ≥ 1.6 × 10^{20} [23] 2β^+ 2ν g.s. 1200 − 3000 0.616 177 ≥ 4.3 × 10^{20} ≥ 2.4 × 10^{20} [53] 2^+_1 512 760 − 2800 0.831 203 ≥ 5.1 × 10^{20} ≥ 1.7 × 10^{20} [23] 0ν g.s. 760 − 2800 0.956 100 ≥ 1.2 × 10^{21} ≥ 2.4 × 10^{20} [53] 2^+_1 512 780 − 3000 0.870 92 ≥ 1.2 × 10^{21} ≥ 1.7 × 10^{20} [23]

A new phase of the experiment with the^{106}CdWO_4 scintillation detector placed in the ultra-low background GeMulti set-up (four HPGe detectors of 225 cm^3 volume each, located at the Gran Sasso National Laboratories) is in preparation. We are going to record pulseprofiles and arrival time of the events from the^{106}CdWO_4 scintillator both in coincidence and anti-coincidence modes. To suppress the background due to the radioactive contamination of the PMT, the development of a lead tungstate (PbWO_4) active light-guide from ultra-pure archaeological lead [91, 62] has been completed. Our preliminary simulations show that such an experiment could investigate the 2ν mode of εβ^+ and of 2β^+ decays, and also 2ε transitions of 106Cd to the excited states of^{106}Pd, at a level of sensitivity near to the theoretical predictions: T_{1/2} ∼ 10^{20} − 10^{22} yr [31, 34, 35, 36, 37, 38].

Moreover, the development of a^{106}CdWO_4 crystal scintillator depleted in the^{113}Cd isotope by a factor 10^3 − 10^4 (to reduce the background caused by β decay of^{113}Cd^m) is also possible [92]. Such a detector could be able to investigate two neutrino double electron capture, which is theoretically the most favorable process of 2β decay of^{106}Cd.

5 CONCLUSIONS

A low background experiment using radiopure cadmium tungstate crystal scintillator (215 g) enriched in^{106}Cd to 66% has been carried out at the underground Gran Sasso National Laboratories of the INFN. The background of the detector below 0.65 MeV is mainly due to the β active^{113}Cd^m (≈ 116 Bq/kg). We have found surface contamination of the crystal by 207Bi at level of 3 mBq, which provides a considerable part of the background up to ≈ 2.5 MeV. The activities of U/Th in the scintillator are rather low: ≈ 0.04 mBq/kg of^{228}Th and ≈ 0.01 mBq/kg of^{226}Ra. The total α activity of U/Th is at level of ≈ 2 mBq/kg. A background counting rate of the detector in the vicinity of the^{106}Cd double beta decay energy (2.7 − 2.9 MeV), after rejection of^{212}Bi –^{212}Po events, is 0.4 counts/(yr×keV×kg).

After 6590 h of data taking, new improved limits on 2β decay of^{106}Cd were set at level of 10^{19} − 10^{21} yr, in particular: T^{2νεβ+}_{1/2} ≥ 2.1 × 10^{20} yr, T^{2ν2β+}_{1/2} ≥ 4.3 × 10^{20} yr, and T^{0ν2ε}_{1/2} ≥ 1.0×10^{21} yr. Resonant 0ν2ε processes have been restricted to: T^{0ν2K}_{1/2} (g.s. → 2718 keV) ≥ 4.3× 10^{20} yr; T^{0νKL1}_{1/2} (g.s. → 2741 keV) ≥ 9.5 × 10^{20} yr and T^{0νKL3}_{1/2} (g.s. → 2748 keV) ≥ 4.3 × 10^{20} yr (all the limits at 90% C.L.). A possible resonant enhancement of 0ν2ε processes was estimated in the framework of the QRPA approach. The half-life of the resonant decay depends on the difference between the value of Q_{2β} and of the energies of the appropriate excited levels of 106Pd minus the binding energies of two electrons on shells of the daughter atom. The half-life decreases with the decrease of this difference.

A next stage of the experiment is in preparation. We are going to install a low background scintillation detector with the^{106}CdWO_4 crystal into the GeMulti ultra-low background set-up with four 225 cm^3 HPGe detectors at the Gran Sasso National Laboratories. The sensitivity of the experiment, in particular to the two neutrino εβ^+ decay of^{106}Cd, is expected to be enhanced thanks to the high energy resolution of the GeMulti detector and to the improvement of the background conditions in coincidence mode. In addition, we hope to reduce the surface contamination of the scintillator with^{207}Bi, observed in the present study, by cleaning (removing) the crystal surface. We estimate the sensitivity of the experiment, in particular to the 2νεβ^+ decay of^{106}Cd, to be at level of the theoretical predictions T_{1/2} ∼ 10^{20} − 10^{22} yr.

Moreover, a further improvement of sensitivity can be reached by increasing the enrichment factor of^{106}Cd, and by developing^{106}CdWO_4 scintillators with lower level of radioactive contaminations, including depletion in^{113}Cd. A^{106}CdWO_4 scintillation detector with an activity of^{113}Cd^m reduced by a factor of 10^3 − 10^4 could be able to detect two neutrino double electron capture in^{106}Cd, which is theoretically the most probable process.

6 ACKNOWLEDGMENTS

The group from the Institute for Nuclear Research (Kyiv, Ukraine) was supported in part by the Project ”Kosmomikrofizyka-2” (Astroparticle Physics) of the National Academy of Sciences of Ukraine. D.V. Poda and O.G. Polischuk were supported in part by the Project ”Double beta decay and neutrino properties” for young scientists of the National Academy of Sciences of Ukraine (Reg. No. 0110U004150). Authors would like to express their gratitude to the Referee for the careful reading of the manuscript and for the valuable comments.

References

[1] F.T. Avignone III, S.R. Elliott, and J. Engel, Rev. Mod. Phys. 80, 481 (2008);

H.V. Klapdor-Kleingrothaus, Int. J. Mod. Phys. E 17, 505 (2008); H. Ejiri, J. Phys. Soc. Japan 74, 2101 (2005);

F.T. Avignone III, G.S. King, and Yu.G. Zdesenko, New J. Phys. 7, 6 (2005); S.R. Elliot and J. Engel, J. Phys. G 30, R183 (2004); J.D. Vergados, Phys. Rep. 361, 1 (2002);

S.R. Elliot and P. Vogel, Ann. Rev. Nucl. Part. Sci. 52, 115 (2002); Yu.G. Zdesenko, Rev. Mod. Phys. 74, 663 (2002).

[2] V.I. Tretyak and Yu.G. Zdesenko, At. Data Nucl. Data Tables 61, 43 (1995);

V.I. Tretyak and Yu.G. Zdesenko, At. Data Nucl. Data Tables 80, 83 (2002). [3] A.S. Barabash, Phys. At. Nucl. 73, 162 (2010).

[4] H.V. Klapdor-Kleingrothaus et al., Eur. Phys. J. A 12, 147 (2001). [5] C.E. Aalseth et al., Phys. Rev. D 65, 092007 (2002). [6] R. Bernabei et al., Phys. Lett. B 546, 23 (2002). [7] F.A. Danevich et al., Phys. Rev. C 68, 035501 (2003). [8] E. Andreotti et al., Astropart. Phys. 34, 822 (2011).

[9] A.S. Barabash, V.B. Brudanin and NEMO Collaboration, Phys. At. Nucl. 74, 312 (2011). [10] H.V. Klapdor-Kleingrothaus, I.V. Krivosheina, Mod. Phys. Lett. A 21, 1547 (2006). [11] A.S. Barabash et al., J. Phys. G 34, 1721 (2007). [12] H.J. Kim et al., Nucl. Phys. A 793, 171 (2007). [13] A.S. Barabash et al., Nucl. Phys. A 807, 269 (2008). [14] J. Dawson et al., Nucl. Phys. A 799, 167 (2008). [15] P. Belli et al., Phys. Lett. B 658, 193 (2008). [16] P. Belli et al., Eur. Phys. J. A 36, 167 (2008).

[17] A.S. Barabash et al., Phys. Rev. C 80, 035501 (2009). [18] P. Belli et al., Eur. Phys. J. A 42, 171 (2009). [19] P. Belli et al., Nucl. Phys. A 824, 101 (2009). [20] P. Belli et al., Nucl. Phys. A 826, 256 (2009).

[21] Yu.M. Gavrilyuk et al., Bull. Rus. Ac. Sci. Physics 75, 526 (2011). [22] N.I. Rukhadze et al., Nucl. Phys. A 852, 197 (2011). [23] N.I. Rukhadze et al., Bull. Rus. Ac. Sci. Physics 75, 879 (2011). [24] P. Belli et al., J. Phys. G 38, 015103 (2011). [25] E. Andreotti et al., Astropart. Phys. 34, 643 (2011). [26] A.S. Barabash et al., Phys. Rev. C 83, 045503 (2011). [27] P. Belli et al., J. Phys. G 38, 115107 (2011). [28] A.P. Meshik et al., Phys. Rev. C 64, 035205 (2001). [29] M. Pujol et al., Geochim. Cosmochim. Acta 73, 6834 (2009). [30] R. Cerulli et al., Nucl. Instr. Meth. A 525, 535 (2004). [31] M. Hirsch et al., Z. Phys. A 347, 151 (1994). [32] M. Goncharov et al., Phys. Rev. C 84, 028501 (2011). [33] M. Berglund and M.E. Wieser, Pure Appl. Chem. 83, 397 (2011). [34] A. Staudt, K. Muto, and H.V. Klapdor-Kleingrothaus, Phys. Lett. B 268, 312 (1991). [35] J. Toivanen and J. Suhonen, Phys. Rev. C 55, 2314 (1997). [36] S. Stoica and H.V. Klapdor-Kleingrothaus, Eur. Phys. J. A 17, 529 (2003). [37] A. Shukla et al., Eur. Phys. J. A 23, 235 (2005). [38] P. Domin et al., Nucl. Phys. A 753, 337 (2005). [39] A.S. Barabash et al., Nucl. Phys. A 604, 115 (1996). [40] O.A. Rumyantsev and M.H. Urin, Phys. Lett. B 443, 51 (1998). [41] O. Civitarese and J. Suhonen, Phys. Rev. C 58, 1535 (1998). [42] J. Suhonen and O. Civitarese, Phys. Lett. B 497, 221 (2001). [43] R.G. Winter, Phys. Rev. 100, 142 (1955).

[44] M.B. Voloshin, G.V. Mitselmakher, and R.A. Eramzhyan, JETP Lett. 35, 656 (1982).

[45] J. Bernabeu, A. de Rujula, and C. Jarlskog, Nucl. Phys. B 223, 15 (1983). [46] Z. Sujkowski and S. Wycech, Acta Phys. Pol. B 33, 471 (2002). [47] Z. Sujkowski and S. Wycech, Phys. Rev. C 70, 052501 (2004). [48] M.I. Krivoruchenko et al., Nucl. Phys. A 859, 140 (2011). [49] J.H. Fremlin and M.C. Walters, Proc. Phys. Soc. Lond. A 65, 911 (1952). [50] R.G. Winter, Phys. Rev. 99, 88 (1955).

[51] E.B. Norman and M.A. DeFaccio, Phys. Lett. B 148, 31 (1984). [52] D. De Frenne and A. Negret, Nuclear Data Sheets 109, 943 (2008). [53] P. Belli et al., Astropart. Phys. 10, 115 (1999). [54] Y. Ito et al., Nucl. Instr. Meth. A 386, 439 (1997). [55] J.V. Dawson et al., Phys. Rev. C 80, 025502 (2009). [56] A.Sh. Georgadze et al., Phys. At. Nucl. 58, 1093 (1995). [57] F.A. Danevich et al., Z. Phys. A 355, 433 (1996). [58] F.A. Danevich et al., Phys. Atom. Nucl. 59, 1 (1996). [59] F.A. Danevich et al., Phys. Rev. C 67, 014310 (2003). [60] P. Belli et al., Phys. Rev. C 76, 064603 (2007). [61] P. Belli et al., Nucl. Instr. Meth. A 615, 301 (2010). [62] R.S. Boiko et al., Inorganic Materials 47, 645 (2011).

[63] P. Belli et al., Proc. Int. Conf. NPAE-2010, 7-12 June 2010, Kyiv, Ukraine – Kyiv, 2011, p. 428;

P. Belli et al., AIP Conf. Proc. 1304, 354 (2010). [64] N.I. Rukhadze et al., Phys. At. Nucl. 69, 2117 (2006). [65] F.A. Danevich et al., Phys. Lett. B 344, 72 (1995). [66] F.A. Danevich et al., Nucl. Phys. A 694, 375 (2001).

[67] R.B. Firestone et al., Table of Isotopes, 8-th ed., John Wiley, New York, 1996 and CD update, 1998.

[68] T. Fazzini et al., Nucl. Instr. Meth. A 410, 213 (1998).

[69] E. Gatti, F. De Martini, Nuclear Electronics 2, IAEA, Vienna, 1962, p. 265. [70] L. Bardelli et al., Nucl. Instr. Meth. A 569, 743 (2006).

[71] P. Belli et al., Nucl. Phys. A 789, 15 (2007). [72] G. Bellini et al., Eur. Phys. J. C 19, 43 (2001). [73] A.S. Barabash et al., JINST 6, P08011 (2011). [74] W.R. Nelson et al., SLAC-Report-265, Stanford, 1985. [75] S. Agostinelli et al., Nucl. Instr. Meth. A 506, 250 (2003);

J. Allison et al., IEEE Trans. Nucl. Sci. 53, 270 (2006). [76] O.A. Ponkratenko et al., Phys. At. Nucl. 63, 1282 (2000);

V.I. Tretyak, to be published.

[77] R. Bernabei et al., Il Nuovo Cim. A 112, 545 (1999). [78] M. Günther et al., Phys. Rev. D 55, 54 (1997). [79] P. Belli et al., Nucl. Instr. Meth. A 626-627, 31 (2011).

[80] A. Balysh et al., Pribory i Tekhnika Eksperimenta 1, 118 (1993) (in Russian). [81] P. de Marcillac et al., Nature 422, 876 (2003).

[82] N. Coron et al., Proc. Workshop Radiopure Scint. for EURECA (RPScint’2008), arXiv:0903.1539 [nucl-ex], p. 12.

[83] D.N. Grigoriev et al., Nucl. Instr. Meth. A 623, 999 (2010). [84] H.V. Klapdor-Kleingrothaus et al., Phys. Rev. D 55, 54 (1997). [85] G.J. Feldman, R.D. Cousins, Phys. Rev. D 57, 3873 (1998). [86] J. Suhonen, Phys. Lett. B 701, 490 (2011). [87] J. Suhonen and O. Civitarese, Phys. Rep. 300, 123 (1998). [88] J. Suhonen, Nucl. Phys. A 563, 205 (1993).

[89] O. Civitarese and J. Suhonen, Nucl. Phys. A 575, 251 (1994). [90] M. Kortelainen et al., Phys. Lett. B 647, 128 (2007). [91] F.A. Danevich et al., Nucl. Instr. Meth. A 603, 328 (2009). [92] A.V. Tikhomirov, private communication.