arXiv:1109.5670v1 [astro-ph.GA] 26 Sep 2011

The RAVE catalogue of stellar elemental abundances: first data release C. Boeche^1, A. Siebert^2, M. Williams^1, R.S. de Jong^1, M. Steinmetz^1, J.P. Fulbright^3, G.R.

Ruchti^3, O. Bienaymé^2, J. Bland-Hawthorn^4, R. Campbell^5, K.C. Freeman^6, B. K. Gibson^7, G. Gilmore^8, E. K. Grebel^9, A. Helmi^{10}, U. Munari^{11}, J.F. Navarro^{12}, Q. A. Parker^{13,14}, W. Reid^{13}, G. M. Seabroke^{15}, A. Siviero^{1,16}, F. G. Watson^{14}, R. F. G. Wyse^3, T. Zwitter^{17,18}

ABSTRACT

We present chemical elemental abundances for 36, 561 stars observed by the RAdial Velocity Experiment (RAVE), an ambitious spectroscopic survey of our Galaxy at Galactic latitudes |b| > 25^∘ and with magnitudes in the range 9< IDENIS <13. RAVE spectra cover the Ca-triplet region at 8410–8795Å with resolving power R∼7500. This first data release of the RAVE chemical catalogue is complementary to the third RAVE

1Leibniz-Institut für Astrophysik Potsdam (AIP), An der Sternwarte 16, D-14482 Potsdam, Germany 2Observatoire astronomique de Strasbourg, Université de Strasbourg, CNRS, UMR 7550, 11 rue de l’université, F-67000 Strasbourg, France

3Johns Hopkins University, Department of Physics and Astronomy, 366 Bloomberg center, 3400 North Charles Street, Baltimore, MD 21218, USA 4Sydney Institute for Astronomy, School of Physics A28, University of Sydney, NSW 2006, Australia 5Western Kentucky University, Bowling Green, Kentucky, USA 6Research School of Astronomy and Astrophysics, Australia National University, Cotter Road, Weston Creek, Canberra, ACT 2611, Australia 7Jeremiah Horrocks Institute, University of Central Lancashire, Preston, PR1 2HE, UK 8Institute of Astronomy, University of Cambridge, Madingley Road, Cambridge CB3 0HA, UK 9Astronomisches Rechen-Institut, Zentrum für Astronomie der Universität Heidelberg, Mönchhofstr. 12-14, D- 69120 Heidelberg, Germany

10Kapteyn Astronomical Institute, University of Groningen, P.O. Box 800, 9700 AV Groningen, The Netherlands 11INAF Osservatorio Astronomico di Padova, Via dell’Osservatorio 8, Asiago I-36012, Italy 12Department of Physics and Astronomy, University of Victoria, P.O. Box 3055, Station CSC, Victoria, BC V8W 3P6, Canada

13Department of Physics and Astronomy, Faculty of Sciences, Macquarie University, Sydney, NSW 2109, Australia 14Australian Astronomical Observatory, P.O. Box 296, Epping, NSW 1710, Australia 15Mullard Space Science Laboratory, University College London, Holmbury St Mary, RH5 6NT, UK 16Dipartimento di Astronomia, Universitá di Padova, Vicolo dell’Osservatorio 2, I-35122 Padova, Italy 17University of Ljubljana, Faculty of Mathematics and Physics, Jadranska 19, 1000 Ljubljana, Slovenia 18Center of excellence SPACE-SI, As̆kerc̆eva cesta 12, 1000 Ljubljana, Slovenia

– 2 –

data release of radial velocities and stellar parameters, and it contains chemical abundances for the elements Mg, Al, Si, Ca, Ti, Fe and Ni, with a mean error of ∼0.2 dex, as judged from accuracy tests performed on synthetic and real spectra. Abundances are estimated through a dedicated processing pipeline in which the curve of growth of individual lines is obtained from a library of absorption-line equivalent widths to construct a model spectrum that is then matched to the observed spectrum via a χ^2-minimization technique. We plan to extend this pipeline to include estimates for other elements, such as oxygen and sulfur, in future data releases.

Subject headings: catalogs — stars: abundances — techniques: spectroscopic — Galaxy: abundances — Galaxy: evolution — surveys

1. Introduction

Stars inherit the chemical patterns of the interstellar matter from which they were born. At the end of their lives they return their nuclear products to the interstellar medium through stellar winds and supernovae, enriching it with heavier elements. The elemental abundance pattern of every generation of stars thus depends on the previous one and, in time, a sort of “genealogical tree” develops. In principle, this allows for the star formation history of a galaxy to be traced using stellar elemental abundances (Freeman & Bland-Hawthorn 2002).

At the same time, the assembly history of a galaxy also leaves traces in the kinematics of its stars. Indeed, once born, stars behave like a collisioness fluid that spreads through phase space, generally leaving clear tracks of their dynamical origin. For example, disrupted open clusters generate moving groups of stars with similar kinematics that can still be recognized long after disruption (Eggen 1965), while accretion events produce transient stellar streams that closely track the orbit of their progenitor satellites (Helmi et al., 2006).

Chemical and kinematic information, when available, can therefore be used to reconstruct the history of the Milky Way much in the way archaeologists examine relics to recreate the ancient past. The data requirements of this exercise, however, have limited its applicability in the past: assembling a large and homogeneous set of proper motions, distances, radial velocities, and elemental abundances requires large photometric and spectroscopic surveys that have not been feasible until recently.

Spectroscopy has traditionally been the bottleneck, with much of the work on chemical elemental abundances limited to small, biased samples. Until recently, iron abundances ([Fe/H]) had been estimated for samples as large as the ∼ 16, 000 stars of the Geneva-Copenhagen Survey (Nordström et al., 2004), but the numbers of stars with abundances measured for multiple elements were much smaller. Indeed, the largest homogeneous sample available up to now was published by Valenti & Fisher (2005), who measured the abundances of 5 elements in 1, 040 nearby F, G and K stars.

– 3 –

Smaller samples, often composed of a few hundred stars or fewer, have also been presented by several authors (Edvardsson et al., 1993, Fuhrmann 1998, 2008, Luck & Heiter 2006, 2007, Reddy et al. 2006, among others). Larger, but inhomogeneous, datasets have been collated from the literature by Soubiran & Girard (2005) and Venn et al. (2004), who compiled 743 and 821 stars, respectively, and also in the PASTEL catalogue (Soubiran et al., 2010), which is a collection of 865 literature studies.

The availability of dedicated telescopes and multi-object spectrographs has radically changed this state of affairs, enabling surveys such as the RAdial Velocity Experiment, RAVE (Steinmetz at al. 2006), and the Sloan Extension for Galactic Understanding and Exploration (SEGUE) (Yanny et al., 2009). Combined these two surveys have now taken spectra for roughly a million stars. Galactic archaeology has thus become one of the fastest-growing fields of astronomical enquiry, as evidenced by the numerous surveys currently underway or in the advanced planning stages, e.g., Gaia (Perryman at al. 2001); the Large Sky Area Multi-Object Fiber Spectroscopic Telescope (LAMOST^1); and HERMES (Freeman & Bland-Hawthorn 2008).

We present here the first release of the chemical catalogue for RAVE, an ambitious spectroscopic survey of our Galaxy at Galactic latitudes |b| > 25^∘ and magnitudes in the range 9< IDENIS <13. This catalogue contains multi-element abundance measurements for 36, 561 stars of the Milky Way based on 37, 848 RAVE spectra covering the Ca-triplet region at 8410– 8795Å with resolving power R∼7500. This data release is associated to the RAVE third data release (DR3, Siebert et al. 2011), where further information (kinematics, photometry, etc.) can be found. As of summer 2011, RAVE has taken more than half a million spectra for some 400,000 stars. Abundances for these targets will be published in subsequent data releases.

RAVE (Steinmetz et al. 2006) was first conceived as a radial velocity survey to provide the missing third velocity component for stars in the solar suburb. However, it soon became clear that RAVE spectra carry much more information than just radial velocities. After further development, the RAVE processing pipeline was modified to deliver estimations of the values of the stellar parameters like effective temperature, gravity and metallicity (Zwitter et al. 2008, Siebert et al. 2011).

We take this development one step further here by tackling the measurement of chemical elemental abundances at the medium spectral resolution provided by RAVE data. This feature is shared with other large spectroscopic surveys with limited resolution and spectral coverage, such as Gaia and LAMOST. Although high precision is not expected from medium resolution spectroscopy, the availability of hundreds of thousands of RAVE spectra enables the creation of a large and homogeneous catalogue of chemical abundances suitable for statistical investigation.

The RAVE chemical pipeline measures abundances for 7 elements: Mg, Al, Si, Ca, Ti, Fe and Ni. Homogeneity is assured by an automated processing pipeline that measures abundances

1http://www.lamost.org/website/en

– 4 –

assuming the stellar parameters computed by the RAVE pipeline described in Siebert et al. (2011). RAVE stars have astrometry from different sources like Tycho2 (Høg et al. 2000), PPM-Extended catalogue PPMX (Roeser et al. 2008) and the Second U.S. Naval Observatory CCD Astrograph Catalog UCAC2 (Zacharias et al. 2004). These, together with RAVE radial velocities and distance estimates (Breddels et al. 2010, Zwitter et al. 2010, Burnett et al. 2011), yield 3D positions and velocities. Combining this information with chemical abundances results in a unique chemo-kinematic dataset suitable for investigations of the formation history of the Galaxy.

This paper is structured as follows. In Section 2 we present the chemical processing pipeline, detailing how the chemical elemental abundances are measured. Tests to establish the accuracy and reliability of the results are detailed in Section 3, while in Section 4 we discuss our method of measurement and in Section 5 we present the RAVE chemical catalog. In Section 6 we outline our conclusions.

2. The Pipeline

The RAVE chemical abundance pipeline uses a different approach to classical elemental abundance estimation methods. These methods either (i) measure equivalent widths (EW)s and infer elemental abundances from the curves-of-growth (COG)s or (ii) synthesize spectra with varying elemental abundances to find the best match between the synthetic and observed spectra. The first method cannot be successfully applied to the RAVE spectra because it requires isolated lines for precise EW measurements and, at the medium resolution of RAVE, most of the lines are instrumentally blended. Also, the second method is computationally too expensive as it requires the synthesis of several spectra ∼400Å wide, each having hundreds of lines.

The adopted method can be considered a hybrid approach, measuring the elemental abundances by fitting the spectrum with a model constructed with lines of known EWs. The construction of the model is robust and fast, with the elemental abundances determined by a χ^2 minimization routine. The drawback of this method is that the EWs of the lines are computed by neglecting the opacity of the neighboring lines. This may overestimate the EWs, leading in some cases to underestimated elemental abundances. We show below that this effect is small for most of the lines in the RAVE wavelength range.

2.1. Procedure

The chemical pipeline utilizes RAVE reduced spectra and their stellar parameters, such as effective temperature (T^{RAVE}_{eff} ), gravity (log g^{RAVE}) and metallicity ([m/H]^{RAVE}), returned by the

– 5 –

RAVE pipeline (described in Siebert et al., 2011)^2. The pipeline also uses an EW library based on the RAVE line list. The RAVE line list contains 604 known absorption lines identified in the RAVE wavelength range (Sec.2.2). The EW library contains the EWs of absorption lines for every point on the T_{eff}, log g and [m/H] grid (Sec. 2.3), which accounts for the variation of the EW with the stellar parameters. Variations of EW with elemental abundances are then further calculated for each point of this grid, for five different abundance levels in the range [−0.4, 0.4] with respect to the value of metallicity [m/H].

The pipeline contains some auxiliary codes to (re)normalize the spectrum and detect spectral defects like bad normalization, cosmic rays and other unwanted features.

The pipeline algorithm can be outlined as follows:

1. Upload the normalized, RV corrected and wavelength calibrated spectrum and the estimated stellar parameters T^{RAVE}_{eff} , log g^{RAVE}, [m/H]^{RAVE}

2. Upload the RAVE line list from the EW library and the corresponding EWs for the stellar parameters at the five different abundance levels

3. Extract a shorter line list of those lines which, at the estimated stellar parameters, have large enough EWs to be visible above the noise

4. Fit the strong lines and correct the continuum

5. Construct the COGs of the lines by fitting a polynomial function through the five EWabundance points

6. Create the model by assuming a Gaussian profile for each line and summing these profiles together

7. Vary the chemical elemental abundances to obtain different models by changing the EWs of the lines according to their COG

8. Minimize the χ^2 between the models and the observed spectrum to find the best-matching model

In the following we give further details pertaining to these steps.

2.2. Line list and constraining the oscillator strength

The RAVE line list contains 604 absorption lines identified in spectra of the Sun and Arcturus. The lines correspond to the element species N I, O I, Mg I, Al I, Si I, S I, Ca I, Ti I, Ti II, Cr I, Fe I,

2[m/H]^{RAVE}indicates the uncalibrated metallicity as defined in Zwitter et al. 2008.

– 6 –

Fe II, Co I, Ni I, Zr I and to the CN molecule. In order to get precise chemical elemental abundances from the EWs we firstly need reliable atomic parameters for the lines. A critical parameter is the oscillator strength (gf, often expressed as logarithm log gf). If precise laboratory measurements are missing for the log gf values then they are obtained through an inverse spectral analysis to obtain ‘astrophysical log gfs’. This is the case for the RAVE wavelength region, where the VALD database (Kupka et al. 1999) reports that only 11 Fe Ilines have laboratory oscillator strength measurements. The Sun and Arcturus’s spectra were synthesized and the log gf values for each line obtained using an automated procedure which varies the log gfs so as to match both spectra simultaneously. For the synthesis we adopted Solar abundances as given by Grevesse & Sauval (1998). They will be the zero point of the abundances of this work. The details of the procedure are outlined in Appendix A.

The pipeline makes use of a shorter working line list which contains the lines strong enough to be visible above the noise. The lines deemed visible are those satisfying:

EW (mÅ) > 2 · 1 ST N · d · 1000

where STN is the signal-to-noise ratio^3 and d is the spectral dispersion (for RAVE spectra d = 0.4Å/pix). Other lines can blend with these visible lines, contributing to their flux absorption and changing their apparent EW. We therefore added to the working line list all those lines having EW>1mÅ and being closer than 0.6Å (1.2Å is the full-width half maximum of a typical RAVE spectrum) to the visible lines.

2.3. The EW library and COG computation

In order to compute the line COGs we built an EW library with the RAVE line list for 30, 640 atmosphere models. The EWs were computed using the LTE line-analysis software MOOG (Sneden 1973) and the ATLAS9 model atmosphere grid (2003, Castelli & Kurucz). As the spacing of the ATLAS9 grid is different to our requirements, we linearly interpolated the ATLAS9 grid to produce our own grid, covering the T_{eff} range [3600,7600]K in steps of 100K, gravity range [0.0,5.0] dex in steps of 0.2 dex, and metallicities in the range [−2.5,+0.5] dex in steps of 0.1 dex. We did not compute the EWs for atmospheres with T_{eff}>5100K and log g<1.0 (hot supergiants), because MOOG does not produce results for these parameters and furthermore there are no such stars in our catalogue. For every atmosphere model we computed the EWs of the lines for 5 abundance levels with respect to iron: [X/Fe]= −0.4, −0.2, 0.0, 0.2, 0.4 dex assuming [Fe/H]=[m/H]. The whole EW library consists of 145, 080 files. To obtain EWs for stellar parameters between the grid points of the EW library we linearly interpolate the closest points on the grid.

3In the following we will use STN to indicate the signal-to-noise ratio as computed in Siebert et al. (2011) whereas S/N will be used with the usual meaning given in spectrophotometry.

– 7 –

Fig. 1.— Distribution on (T_{eff}, log g) plane of 712 stars observed spectroscopically at high resolution.

2.4. Microturbulence

The EW computation requires a value of the microturbulence ξ for each atmosphere model. For high-resolution data ξ is typically determined by measuring the EWs of Fe Ilines and changing ξ until the iron abundances inferred from strong and weak lines agree. As we do not measure individual EWs for our spectra we cannot use this procedure, but instead rely on relations giving ξ as a function of the stellar parameters. Such relations have been derived by Edvardsson et al. (1993), Reddy et al., (2003), Allende Prieto et al., (2004), where ξ is given as a function of T_{eff} and log g. Unfortunately, these results cover only specific regions of parameter space (e.g., hot dwarfs or cold giants). Thus, we derived our own relation covering a wide a range of T_{eff} and log g. To do so we made use of literature results from high resolution spectroscopy that report both stellar parameters and ξ of their stellar samples. We collected data for 712 giants and dwarfs spanning a wide range in T_{eff} and log g from Luck & Heiter 2006, 2007, Bensby et al. 2005, Fuhrmann 1998, Fulbright et al. 2006, Allende Prieto et al. 2004. Figure 1 displays the coverage in the T_{eff} - log g plane for the sample. A 3rd-degree polynomial fit was used to obtain the microturbulence dependence on gravity and effective temperature. Appendix B gives the coefficients of this polynomial fit, ξ_{poly}.

Figure 2 compares the Allende Prieto et al. (2004) law with ξ_{poly}. Uncertainties of σ_ξ=0.32 km s^{−1} in our polynomial law translate approximately into ∼ 0.04 dex elemental abundance uncertainties for dwarfs stars (as estimated by Reddy et al. 2003 and Mishenina et al. 2003).

2.5. Continuum re-normalization and strong line fitting

Before measuring EWs, the spectrum’s continuum needs to be re-normalized and its strong lines fitted. For while the spectrum is continuum normalized by the RAVE pipeline, we have found

– 8 –

that this normalization is is not rigorous enough for elemental abundance estimation: the RAVE pipeline employs a 3rd order spline function to fit the continuum leaving behind fringing effects on scales of less than 50Å wide seen in some RAVE-normalized spectra. The chemical pipeline performs a new normalization to remove such unwanted features, fitting the continuum and the strong Ca IIand H IPaschen lines. These strong lines are then excluded from the measurement process because they are difficult to fit properly. The pipeline then considers as “continuum” the fit to the classical continuum plus the strong lines, and by comparison with this level the metallic lines are measured.

Before applying the continuum correction we estimate a preliminary metallicity, which we call [m/H]^{est} to distinguish it from the final metallicity [m/H]^{chem}. This preliminary metallicity is required because the intensity of the absorption lines must be known in order to subtract them. When they are subtracted the continuum level can then be seen. However, in order to measure the intensity of a line one must know where the continuum lies. The continuum level is therefore determined iteratively, starting with the normalization of the RAVE pipeline and measuring the line intensities using the chemical elemental abundances estimation subroutine (see Sec. 2.6), with the difference that all the abundances vary together as one variable [X/H]=[m/H]^{est} . Wavelength intervals ∼20Å wide centered on the strong lines are avoided as the large wings of these lines can affect the results of the χ^2 determination of the metallicity. The best-match [m/H]^{est} is then used to synthesize the metallic lines, which are then subtracted before the strong lines are fit.

Fitting the continuum is performed in four steps, summarized below and illustrated in Figure 3 from top to bottom:

1. Perform a preliminary metallicity and subtract the metallic lines (gray line in panel (a), Figure 3).

2. Fit the strong lines with a Lorentzian profile for Ca IIand a Gaussian profile for H Iand subtract them (gray line in panel (b), Figure 3).

3. Estimate the continuum profile by box-car smoothing what remains (gray line in panel (c), Figure 3).

4. Add the strong lines and the continuum together to obtain the new “continuum” (grey line in panel (d), Figure 3)

2.6. Chemical elemental abundance estimation

The chemical pipeline uses the parameters T^{RAVE}_{eff} and log g^{RAVE} for the elemental abundance estimation. The observed spectrum is fit by a model spectrum firstly obtained by subtracting the flux absorbed by the metallic lines to that derived above in Sec. 2.5, i.e., the strong lines + continuum fit (gray line in panel (d), Figure 3). The absorption lines are assumed to have

– 9 –

Gaussian profiles, and as the instrumental profile is dominant with respect to the line profile, we use the same full width half maximum (FWHM) for all lines. However, this FWHM is varied and optimized during the χ^2 minimization process.

The pipeline computes the COG of the lines by using the EWs at five levels of abundances ([X/Fe]= −0.4, −0.2, 0.0, 0.2, 0.4 dex, assuming [Fe/H]=[m/H]^{RAVE} ) from the EW library. For every line, the five EW points are fit with a 3rd order polynomial function, which serves as the COG. However, these polynomial functions represent only part of the COGs and will diverge if extrapolated too far beyond the five levels in the EW library. To avoid such divergences we limit accepted abundance results to those in the range −0.6 ≤[X/Fe]≤ +0.6^4.

Using the COGs the pipeline then creates the model spectrum, using [X/H]=[m/H]^{RAVE} as a first-guess to the metallicity. It computes the χ^2 between the observed spectrum and the model and, through a minimization process, changes the elemental abundances [X/H] until the best match (minimum χ^2) with the observed spectrum is reached. The minimization process is performed with 15 variables: 13 elemental abundances, one molecule and the instrumental FWHM of the lines.

Figure 4 shows the best-match model spectrum of the Sun and compares it with the observed one. The three spectra on the top show how the model spectrum is built up: the spectra of three elements (Fe, Si, Mg) at parameters T_{eff} =5861K and log g =4.54 are generated according to the estimated elemental abundances and added together to construct the solar spectrum.

This methodology has a drawback: the computed COG of any absoption line neglects the opacity of the neighboring lines, leading to an overestimation of the EW of blended lines and so an underestimation of the elemental abundances. This systematic originates from the EW library created by using the MOOG’s driver “ewfind”, which computes the expected EW of the lines as if they were isolated. In order to minimize this systematic error we apply a correction coefficient to reduce the EWs of lines which are physically blended. The corrected EW is given by EWcorr = EW · coeff · cont, (1) where the coefficient coeff = 1 − neighbor<0.2Å ∑ i EW_i/2.50/dispersion, is computed by considering all the neighbouring lines within 0.2Å of the line of interest. The dispersion is expressed in Å/pix and cont is the value of the continuum (gray line in panel (d) of Figure 3) at the central wavelength of the line. The multiplication of the EW by cont in Eq. 1 corrects for the effects of strong lines (such as Ca II), if the line of interest lies within their large wings. This correction reduces the systematic error in the abundances from ∼ −0.15 dex to ∼ −0.1 dex or less for most elements (see details in the following sections, where quality checks are outlined).

4Abundances beyond this limit can be due to photon noise stronger than the absorption lines or by peculiar abundances. The two cases cannot be distinguished by the chemical pipeline.

– 10 –

2.7. Spectrum quality determination: the frac parameter

Roughly 25% of RAVE spectra are affected by defects like fringing or cosmic rays that cannot be removed by continuum correction (they usually affect regions smaller than 100Å). In order to determine the locus and size of the defect we define the flux residual between the observed and the best-match model for the i-th pixel with r(i) = f_{model}(i) − f_{obs}(i), where f is the flux of the spectra, and we use the following algorithm (also used in Siebert et al., 2011):

1. Consider the interval I_j = [j − 10, j + 10] centered on the pixel j. Compute

χ̃^2(j) = 1 max(I_j ) − min(I_j ) · max(I_j ) ∑ i=min(I_j ) ( r(i) σ )^2,

ψ(j) = 1 max(I_j ) − min(I_j ) max(I_j ) ∑ i=min(I_j ) r(i), where χ̃^2(j) is the reduced χ^2 and ψ(j) is the estimation of the area between the observed and model spectra. σ is the inverse of the signal-to-noise (STN) ratio.

2. If χ̃^2(j) > 2 and ψ(j) > 2 · σ then the pixels in the interval I_J are labeled as a defect.

The process is repeated for all the pixels of the spectrum, resulting in an array of 0 and 1, with 1 label indicating non-defective pixels. The fraction of pixels that are non-defective is then denoted with the frac parameter (i.e., the higher the frac parameter, the better the quality of the spectrum). We deem spectra with frac < 0.7 as overly affected by fringing/cosmic ray defects and exclude these spectra from our analysis.

– 11 –

3. Validation and accuracy

There are several sources of error that affect the elemental abundances measurement process. For example, there are uncertainties in (i) the oscillator strength values, (ii) the continuum normalization, (iii) the stellar parameters; (iv) uncertainties in microturbulence, (v) uncertainties due to local line opacity neglected by the pipeline, (vi) neglect of non-LTE effects and (vii) photon shot noise. These sources of errors interact in a complex fashion, making the error estimation process quite challenging. To establish the capability of the pipeline to derive the chemical elemental abundances we ran a series of tests on synthetic and real spectra for which stellar parameters and elemental abundances are well known. The results are presented below.

3.1. Chemical elemental abundances accuracy from synthetic spectra

We ran the pipeline on a sample of 1, 353 synthetic spectra to which three intensity levels of artificial noise were added, testing the accuracy of the results at S/N= 100, 40, and 20. To make the sample as realistic as possible, the spectra have been synthesized with distributions of T_{eff} and log g from a mock sample of RAVE observations (M. Williams, private communication) created by using the Besançon model (Robin et al. 2003). The T_{eff} vs log g distribution of the sample is shown in Figure 5.

Each spectrum of the sample had the elemental abundances of one of the stars from the Soubiran & Girard catalogue (2005), ensuring realistic distribution of the chemical abundances. As our line list has only eight elements in common with the Soubiran & Girard catalogue, we assigned the elemental abundance [X/H]=[Fe/H] to the elements Cr, Co, Ni, Zr. We also assigned [X/H]=[α/H] to C, N, O, Mg, Al, Si, S, Ca, Ti when the measurement of one of these elements was missing. The spectra were synthesized using the code MOOG at resolution 0.01Å/pix and degraded to RAVE resolution (0.4Å/pix, 1.4Å FWHM).

The first test was performed by adopting the stellar parameters T_{eff}, log g and [m/H] of the synthetic spectrum in order to evaluate the accuracy of the elemental abundance measurements of the pipeline alone. The results are illustrated in Figure 6. For the second test we added uncertainties to the stellar parameters so as to simulate real RAVE spectra. Following the typical RAVE errors, we added a random Gaussian error with standard deviation 300K in T_{eff}, 0.5 dex in log g and 0.3 dex in [m/H] to the correct parameters and ran the pipeline adopting such “wrong” parameters. For the sake of brevity and clarity we present only the results for the seven most reliable elements (see also Figure 7) .

3.1.1. Results assuming no error in the stellar parameters

Results at S/N=100. With no errors added to the stellar parameters the residuals between

– 12 –

measured and expected elemental abundances [X/H] have a systematic error of ≃ −0.10 dex and standard deviation σ ≃ 0.10 dex or smaller (see Figure 6), with a slight variation from element to element. The relative enhancement [X/Fe] shows a small (≃ −0.10 dex) systematic error at high [X/Fe].

Results at S/N=40. The elemental abundance residuals have σ ≃0.10-0.20 dex depending on the element and show the same systematics seen with S/N=100, but slightly less pronounced.

Results at S/N=20. At this S/N the pipeline can still estimate abundances of Fe, Al and Si and the relative enhancement to iron [X/Fe], but with σ ≃0.2-0.3 dex. Other elements like Mg and Ti exhibit larger systematic errors. An α-element abundance estimated as the average of Mg and Si still yields reliable results with an error of σ ≃ 0.2 dex. Elements such as Ca and Ni cannot be reliably measured because the lines are too weak to be detected.

We found correlations between stellar parameters and elemental chemical abundances obtained. In particular, the abundances correlate with T_{eff} (Figure 8). This is very likely due to continuum correction, which can appear lower than the real level in spectra crowded of lines, as in cold giants stars.

3.1.2. Results including errors in the stellar parameters

Results at S/N=100. When errors are added to the stellar parameters the elemental abundances [X/H] are affected to the level of σ ≃ 0.15 − 0.20 dex for elements like Mg, Al, Si, Ca, Fe, Ni. Titanium abundances show clear systematic errors, being overestimated at high abundance and underestimated at low abundance. Enhancements relative to Fe, [X/Fe], have errors σ < 0.2 dex and little sign of systematic errors for most of the elements.

Results at S/N=40. The elemental abundance errors are in the range σ ≃0.15-0.30 dex depending on the element. The relative elemental abundances [X/Fe] are reliable with errors σ ≃0.2 dex.

Results at S/N=20. At this S/N the pipeline can still estimate abundances of Fe, Al and Si and the relative enhancement with respect to iron [X/Fe] even with an error of σ ≃0.2-0.3 dex. Other elements like Mg and Ti show systematic errors. An α-element abundance computed by averaging Mg and Si yields reliable results with an error of σ ≃ 0.2 dex. Elements such as Ca and Ni cannot be reliably measured because the lines are too weak to be detected.

As could be expected, there is a correlation between errors in stellar parameters and errors in the elemental abundance estimates. Figure 9 highlights these correlations, showing that most of the elemental abundances errors are correlated with T_{eff} errors. In general, an overestimate in T_{eff} corresponds to an overestimate in abundance, since most of the lines have smaller EW at higher T_{eff}. Only weak correlations with log g and [m/H] errors are evident.

– 13 –

3.2. The accuracy of elemental abundance estimates from real spectra

The initial RAVE input catalogue had no stars whose chemical elemental abundances were known to high accuracy to compare the results of our pipeline with. To create a comparison dataset of real stars, we therefore observed 104 stars chosen from Soubiran & Girard (2005) (hereafter SG05), a collection of high-precision elemental abundance measurements from the literature. Since these are bright stars, most of the RAVE spectra have S/N>100 and therefore the accuracy in our abundance estimates is representative of the high S/N case. Ruchti et al. (2010) (hereafter R10) have also re-observed 243 RAVE stars at high resolution and measured stellar parameters and chemical elemental abundances. The RAVE spectra of these stars have S/N between 30 and 90 and therefore we can use them to test the accuracy of our procedure for intermediate S/N.

We have seven elements in common with SG05 and five elements with R10 (Fe, Mg, Si, Ca and Ti). However, for the latter we could only compare four elements because the weak Ca Ilines were not strong enough in the RAVE spectra to be measured by the pipeline. As with synthetic spectra, we ran a first test by adopting the high-resolution stellar parameters to evaluate the performance of the pipeline alone and then ran a second test by using the RAVE stellar parameters, which have larger uncertainties relative to the high-resolution data.

The results of the first test are shown in Figure 10 where the gray dots and black “+” correspond to SG05 and R10, respectively. When the high-resolution stellar parameters are adopted the chemical pipeline’s elemental abundances agree with the SG05 and R10 results to within ∼ 0.15 dex on average. The smaller dispersion of the SG05 stars around the one-to-one correspondence line compared to R10 is due to the higher S/N of the RAVE spectra of these stars. All elements are typically underestimated by ∼0.1 dex, an offset that is roughly constant across the entire abundance range [−2.0,+0.5] dex. The α-enhancement (Figure 11) is estimated well for all but [α/Fe]>0.4 dex, where there is a small systematic bias of ∼0.1 dex.

When the RAVE stellar parameters are adopted (the “second test”, Figure 12) the dispersion in our elemental abundances compared to the published values increases to ∼0.2-0.3 dex on average, depending on the element. In Table 1 we report the mean and standard deviation after grouping the sample in dwarf and giant stars separately. The larger dispersion at low abundances ([X/H]<– 1.0 dex) is very likely due to the fact that estimating precise stellar parameters on such spectra is challenging due to the few and weak visible absorption features (excluding for the Ca IItriplet, which is not measured).

The enhancement estimates ([X/Fe], see Figure 13) are accurate to within ∼0.3 dex. At high enhancements, abundances are systematically underestimated by ∼0.1-0.2 dex, depending on the element. However, as we are comparing our measurements with other authors’ (high resolution) measurements, the variance of the residuals is the quadratic sum of the variances of our and the high resolution results. This means that the standard deviations reported in Figure 12 and Figure 13 represent a conservative estimate of the expected RAVE errors.

– 14 –

high res. stellar parameters RAVE stellar parameters giants dwarfs giants dwarfs mean σ(dex) mean σ(dex) mean σ(dex) mean σ(dex) [Mg/H] − [Mg/H]ex -0.15 0.21 -0.08 0.14 -0.05 0.28 -0.06 0.15 [Al/H] − [Al/H]ex -0.11 0.13 -0.11 0.15 [Si/H] − [Si/H]ex -0.15 0.15 -0.04 0.09 0.11 0.21 -0.03 0.14 [Ca/H] − [Ca/H]ex -0.13 0.20 -0.16 0.22 [Ti/H] − [Ti/H]ex -0.14 0.17 -0.12 0.22 0.10 0.36 -0.03 0.30 [Fe/H] − [Fe/H]ex -0.08 0.15 -0.06 0.15 0.07 0.30 0.04 0.31 [Ni/H] − [Ni/H]ex -0.02 0.29 0.06 0.26 [α/H] − [α/H]ex -0.10 0.15 -0.04 0.10 -0.02 0.21 -0.02 0.15

Table 1: Mean and standard deviation of the residuals between measured and expected elemental abundances obtained by using the high resolution stellar parameters (left) and the RAVE parameters (right) for 347 standard stars. We computed the values for giants (log g<3.5) and dwarfs (log g≥3.5) separately. The two groups are also representative of stars with T_{eff}<5500K and intermediate STN (R10 stars), and stars with T_{eff}>5500K and high STN (SG05 stars).

3.3. Internal errors from repeat observations

In order to take into account the effect of binary stars, RAVE observes some stars (∼5% of the whole sample) more than once. In this chemical catalogue, 964 stars have been observed twice, 90 thrice and 67 four times. Multiple observations are also useful to estimate the internal error by comparing the results obtained from different spectra of the same object. A fair comparison would require that the repeated observations of an object have the same S/N. Unfortunately, due to variable atmospheric conditions the spectra often have different S/N values. We therefore averaged the STNs of the spectra for each object and computed the corresponding standard deviations of the elemental abundances. In this way we could assess the magnitude of internal errors in our procedure as a function of STN. In Figure 15 we plot the results for 12, 504 RAVE stars having multiple observations, where we use the RAVE internal data release as it has a substantially larger number of stars. For all the elements the 1σ confidence line (gray solid line) lies below 0.2 dex and hovers around ∼0.1 dex for STN>80.

3.4. [m/H]^{RAVE} vs. [m/H]^{chem}: a comparison

In Figure 16 we compare the distributions of [m/H]^{RAVE}, [m/H]^{chem} and [Fe/H]^{chem} for 37819 RAVE spectra with STN>20. The metallicity [m/H]^{chem} is inferred from the chemical elemental abundances with the equation given by Salaris et al. (1993)

[m/H]^{chem} = [Fe/H] + log(0.638 · 10[α/Fe] + 0.362), (2)

– 15 –

where the α enhancement is computed as

[α/Fe] =

[Mg/H]+[Si/H] 2 − [Fe/H] (3)

and the elemental abundances [Mg/H], [Si/H] and [Fe/H] come from the chemical pipeline.

[m/H]^{RAVE} is ∼0.1 dex lower than [m/H]^{chem}, which is to be expected as the non-calibrated RAVE metallicity is underestimated by ∼0.15 dex with respect to the reference stars used in Siebert et al., 2011. The shape of the [m/H]^{RAVE} distribution is fairly similar to the [m/H]^{chem} distribution for dwarf stars but different for giants. Moreover, [m/H]^{RAVE} seems to better match [Fe/H]^{chem} than [m/H]^{chem}, particularly for giants. This could be due to α enhancement: giants stars have a higher proportion of thick disk stars (α-enhanced) than do dwarfs stars, which are mostly thin disk (not α-enhanced). Although used during the stellar parameters estimation process, the RAVE pipeline is unable to measure α enhancement (Zwitter et al., 2008). Therefore, it is possible that particularly for α-enhanced stars [m/H]^{RAVE} better represents [Fe/H]. Apart from the discussed shift of 0.1 dex in metallicity, there seems to be fair agreement between the [m/H]^{RAVE} and [m/H]^{chem} distributions.

4. Discussion

For each element, the accuracy of the abundance estimate depends on the number of lines that are strong enough to be clearly detected; to be measurable, the lines must be stronger than the noise. At the same time, the intensity of the lines depends on the stellar parameters and elemental abundances of the star. This means that for a fixed S/N, the accuracy of the elemental abundance is a function of the stellar parameters and of the abundance itself.

The interplay of these factors makes the accuracy of the abundance results difficult to estimate. At high S/N, the accuracy varies from element to element, depending on the number and intensity of the lines measured. For instance, Ti and Ni lines are measured better in stars with T_{eff} lower than ∼5000K, whereas sulfur (not present in this data release) can be seen and measured only for temperatures higher than ∼4800K. The RAVE line list has a few weak Ca Ilines that can be measured only in stars with [m/H] >–0.5 dex.

Noise affects the EWs of the lines and so the model spectrum. As the pipeline varies the abundances of the individual elements, the larger the number the absoption lines of an element, the lower the abundance error due to the fitting, because the effects of noise are averaged over the lines. Thus, the abundance accuracy of elements with fewer lines is especially affected by noise. When the noise is particularly strong with respect to the intensity of the lines, i.e., low S/N, the minimization routine fits the noise and the resulting elemental abundance diverges. In such cases the pipeline rejects the measurement and renders a null value -9.99.

The situation get worse in the low S/N regime, because the pipeline measures even fewer lines, i.e., only those strong enough to be detected despite the noise. This decreases the number of

– 16 –

measurable elements and increases the uncertainties. In Section 3.1 we tested the pipeline down to S/N=20 to see if at such a low S/N the measurements are still trustworthy. The results suggest we can use such data, but with care. Noise generates selection effects: spectra having low [m/H] or high T_{eff} do not have lines strong enough to overcome the noise and they go through the pipeline unmeasured. A limited number of lines can also generate systematic errors because the abundance of an element depends on just a few lines (sometimes even only one) and thus becomes especially vulnerable to uncertainties in the oscillator strengths.

Nevertheless, the tests performed with synthetic spectra at S/N=20 show that abundances of elements with strong lines like Fe, Al and Si can still be measured. At such low S/N, errors as large as ∼0.2-0.3 dex are expected, but they do not show large systematic biases and the residuals are on average close to zero.

We conclude that elemental abundances may be trusted down to S/N=40 for seven elements (details will follow in Section 5), whereas between S/N=20 and 40 we can trust the abundance of [Fe/H] and (to be on the safe side) the abundance [α/H], when computed from the average of Mg and Si. Abundances for other elements for the low S/N stars should be considered indicative, and used only for exploratory purposes until new comparison stars enable a proper validation of our results in this S/N regime.

4.1. Zero point of the RAVE elemental abundance scale

Our elemental abundance measurements are indirect measurements in the sense that they are inferred from the comparison between the intensity of lines seen in real spectra and their intensity predicted by stellar atmosphere models. Since the models are different for different stellar parameters, a question arises regarding whether all the models yield elemental abundances which refer to the same zero point, i.e., the origin of the internal elemental abundance scale. The same question concerns whether this zero point refers to the same zero point of the real spectra, i.e., between the internal and external scales.

The latter question has a prompt answer: we do not know the external scale, because real stellar atmospheres have never been directly probed and all elemental abundance measurements refer to models. Therefore, we can only check the consistency of the internal scale. This can be performed by comparing the measured elemental abundances of a sample of synthetic spectra at different stellar parameters, as done in Figure 6.

In this plot, at S/N=100, the residuals between measured and expected elemental abundances are on average zero for any gravity and metallicity; the points align along a straight line with slope roughly equal to one. This means that the measured differences in elemental abundance at any metallicity regime are the same (constant offset), i.e., they refer to the same zero point. However, the offset from element to element may vary, showing that the offsets are due to the measurement process and not due to the metallicity of the atmosphere models.

– 17 –

On the other hand, there is a clear correlation between residuals and T_{eff}: the higher the T_{eff} ,the higher the measured elemental abundance. This systematic may be due to continuum correction: cooler stars have spectra that are crowded with absorption lines and so the continuum appears lower than it is. Additionally, the varying behaviour of the elements in Figure 6 can be explained by considering that their lines lie in different regions of the spectrum, i.e., on the wings of a Ca IIline or in a region relatively free of lines. This can translate into systematic, wavelength-localized shifts of the estimated continuum as a function of T_{eff}.

Although this systematic effect appear tractable and correctable, we did not apply any correction to the data because such a systematic is not visible on tests with real spectra. When the RAVE elemental abundances are compared with the expected elemental abundances of standard stars as function of T_{eff} no clear trend is visible (Figure 14), except that RAVE elemental abundances have a slight systematic bias to lower values. A reasonable explanation is that the elemental abundance measurements given by SG05 and R10 suffer from the same systematic error, due to uncertainties in estimating the correct continuum level in regions crowded with absorption lines or affected by the wings of strong, broad lines.

We conclude that the RAVE chemical pipeline can determine chemical elemental abundances with a systematic error that may be as large as ∼ 0.1 dex as a function of T_{eff}. Since this systematic looks quite linear with T_{eff} (see Figure 9 and Figure 14), to reduce this error to ±0.05 dex we suggest analysing separately samples of stars with T_{eff}>5500K (mostly dwarfs) from samples with T_{eff} <5500K (mostly giants).

5. The RAVE chemical catalogue

We present the catalogue of chemical elemental abundances for 36,561 RAVE stars, measured using 37,848 spectra.

5.1. Sample selection

The spectra have been selected from the DR3 RAVE database using the following constraints:

• Effective temperature 4000≤T_{eff}(K)≤7000: this is the temperature range within which the RAVE line list has been calibrated. At lower temperature the spectra are characterized by molecular lines other than CN (CH, TiO and other molecules), while at higher temperatures lines of ionized atoms appear, and both are not included in the line list.

• Signal-to-noise STN>20: for STN<20 the absorption lines are strongly affected by noise and the stellar parameters and chemical elemental abundances are not reliable.

– 18 –

• Rotational velocity V_{rot} <50 km s^{−1}: at higher rotational velocity the lines have a FWHM larger than that due to the spectral resolution (FWHM≃1.2Å) and they cannot be precisely measured. Moreover, any spectra showing larger lines might be a double-lined spectrum, which we also must be avoided.

Despite these selection criteria, some spectra exhibit emission or are affected by bad continuum normalization. For such spectra the stellar parameters and chemical elemental abundances are not reliable and it is advisable to reject them. Constraints on the parameters χ^2 and frac help identify these spectra. For statistical studies we suggest rejecting spectra with χ^2 > 2000 and frac < 0.7, which removes 739 out of 37,848 spectra of the catalogue.

5.2. Stellar parameters

The distributions of the stellar parameters and STN values are presented in Figure 17. The quantities T_{eff} and log g are given by the RAVE data archive whereas STN and [Fe/H] are estimated by the chemical pipeline. The distributions in T_{eff} and log g show two peaks corresponding to giants at lower temperature and dwarfs, which are mostly at higher temperatures. The iron abundance distribution peaks at [Fe/H]≃–0.1 dex for dwarfs and [Fe/H]≃–0.5 dex for giants. The latter are in average more metal-poor because they lie further from the Galactic plane and have therefore a larger fraction of thick disk stars^5.

5.3. Chemical elemental abundances: selection effects due to STN and stellar parameters

We encourage the user to pay particular attention to selection effects introduced by the stellar parameters and STN. Together they affect the total number of abundance estimations as well as their accuracy. Absorption lines can be undetectable because of the low [m/H] of the star, because the too-high (or too-low) T_{eff} does not populate enough of its electronic levels, or because the spectrum has a too-low STN. This is illustrated in Fig 18 and Fig 19, where the number of spectra having [X/H] estimation diminishes with STN and [m/H]. In general, only metal-rich stars have elemental abundance estimations at any STN whereas metal poor stars have estimations only if their spectra have high STN.

5As RAVE is a magnitude limited survey, the intrinsically bright objects are on average at large distances.

– 19 –

5.4. Accuracy and reliability element by element

We now discuss and summarize the reliability of the chemical abundances for individual elements in light of the previous discussion. First, we make some general remarks about the measured elemental abundances and their errors:

• The accuracy of the chemical abundances depends on several variables. In particular if T_{eff} is erroneously estimated, the abundances are affected to different degree for different elements. If there are systematics deviations in T_{eff} there will be systematic deviations in [X/H] as well.

• In general [X/H] are underestimated, and the magnitude of the bias is a function of T_{eff}:

stars with T_{eff} <5000K yield on average abundances that are ∼0.1 dex lower than stars with >5000K, whose abundance errors average to zero. This effect increases the errors when stars with different T_{eff} are analyzed. On the other hand, relative abundances [X/Fe] are nearly unaffected because the trend is similar for all elements.

• The errors given below refer to the expected errors for two intervals of STN at [m/H] ∼0.0 dex. As already discussed in the previous section, errors can increase for lower STN and lower [m/H].

Magnesium yields reliable results on synthetic and real spectra. At any T_{eff} we expect an abundance error σ_{Mg} ≤0.15 dex for STN≥40 and ∼0.25 dex for 20≥STN≥40.

Aluminum abundances are obtained from only two physically isolated lines (which are instrumentally blended at RAVE resolution). Despite the instrumental blending, the lines are strong and give accurate estimates in tests with synthetic and real spectra that shows no systematic offset. For STN≥40 we expect abundance errors σ_{Al} ≤0.2 dex and ∼0.3 dex for 20≥STN≥40.

Silicon is the most reliable element together with Fe. We expect an abundance error σ_{Si} ≤0.15 dex for STN≥40 and ∼0.20 dex for 20≥STN≥40.

Calcium abundances are obtained from only five weak Ca Ilines. Ca Iis better measured at higher metallicity and T_{eff} <5000K. Estimated errors are σ_{Ca} ∼0.25 dex for STN≥40 and ∼0.4 dex for 20≥STN≥40.

Titanium gives reliable abundances at high STN. At STN∼40 its abundance is reliable for T_{eff}<5000K and underestimated for higher temperatures. The correlation with T_{eff} errors is particularly strong (T_{eff} underestimation generates [Ti/H] underestimation and vice versa), leading to larger errors. We expect an abundance error of σ_{Ti} ∼0.2 dex at STN≥40 and ∼0.3 dex for 20≥STN≥40. We recommend separately analyzing stars with T_{eff} lower and higher than 5000K.

Iron is the most reliable element together with Si. It can be accurately measured on spectra with any T_{eff} in the range we consider. We expect an abundance error of σ_{Fe} ∼0.1 dex at STN≥40 and ∼0.2 dex at 20≥STN≥40.

– 20 –

Nickel has six weak lines in the RAVE wavelength range that are visible only at T_{eff}<5000K. In synthetic spectra with STN=100 the pipeline yields errors comparable to those of other elements but biased to lower values by ∼0.2 dex. It is not measurable for [m/H]<-0.6 dex. Tests on real spectra are inconclusive because they were all performed for stars with T_{eff}>5000K. We expect uncertainties of σ_{Ni} ∼0.2 dex for STN≥40 and ∼0.3 dex for 20≥STN≥40. Because of the small number and the weakness of its lines, it is advisable to use Ni values with care.

The overall metallicity [m/H]^{chem} is inferred from the chemical elemental abundances with Equation 2 (Salaris et al. 1993), with the abundances [Mg/H], [Si/H] and [Fe/H] delivered by the chemical pipeline. The metallicity [m/H]^{chem} is reliable and we expect errors of σ_{[m/H]} ∼0.1 dex for STN≥40 and ∼0.2 dex for 20≥STN≥40.

The α enhancement [α/Fe] has been computed as the average of [Mg/Fe] and [Si/Fe] (Equation 3). In the range 20≥STN≥40 it is advisable to use it instead of the single α element values because it is more reliable. We estimate errors of σ_α ∼0.1 dex for STN≥40 and ∼0.2 dex for 20≥STN≥40.

5.5. The data

The RAVE chemical catalogue contains data for 37,848 spectra of 36,561 stars and it is provided as an ASCII table of 37,848 lines. It contains chemical abundances for the elements Mg, Al, Si, Ca, Ti, Fe and Ni, RAVE stellar parameters, signal-to-noise STN, object name and other parameters for quality checks as explained in Table 2. The distributions of the relative chemical abundances are shown in Figure 20. The catalogue will be accessible online at http://www.rave-survey.org and via the Strasbourg Astronomical Data Center (CDS) service.

– 21 –

Fig. 2.— Top panel: residuals between measured microturbulence ξ and computed ξ with the Allende Prieto et al.’s formula for 712 stars. Bottom panel: residuals between measured ξ and computed by a 3rd degree polynomial function. Solid and open points represent dwarf and giant stars, respectively. The gray cross represents the Sun.

– 22 –

Fig. 3.— Black line: RAVE spectrum of the Sun. Panel (a): metallic lines fitting. Panel (b): strong line fitting. Panel (c): continuum fitting. Panel (d): the grey line is the sum of the gray lines in panels (b) and (c). This curve is used as the continuum line from which we estimate the chemical elemental abundances.

– 23 –

Fig. 4.— Once the abundances of Fe, Si and Mg are fixed their absorption lines can be synthesized (gray lines on the top). By summing them together we obtain the grey line on the bottom, which is the model spectrum of the Sun. The black line is the Sun’s spectrum reflected by the Moon and observed by RAVE.

Fig. 5.— Distribution of the synthetic spectra sample on the stellar parameters plane T_{eff} and log g.

– 24 –

Fig. 6.— Left: expected elemental abundances [X/H] (x-axis) versus measured elemental abundances (y-axis) for the sample of synthetic spectra at S/N=100, 40, 20 (for the left, middle and right column, respectively) and assuming no errors in stellar parameters. Right: as in left panels but for the expected enhancement [X/Fe] (x-axis) and the residuals measured-minus-expected (y-axis). Offsets and standard deviations are reported in the panels.

– 25 –

Fig. 7.— As in Figure 6 but with noisy stellar parameters to simulate the RAVE stellar parameters of the RAVE archive.

– 26 –

Fig. 8.— Correlation between the elemental abundance residuals measured-minus-expected (y-axis) and the stellar parameters (x-axis) at S/N=100.

Fig. 9.— Correlation between the elemental abundance residuals measured-minus-expected (y-axis) and the stellar parameter errors (x-axis) at S/N=100.

– 27 –

Fig. 10.— Comparison between high resolution elemental abundance ([X/H]ref) from the literature (x-axis) and RAVE elemental abundances (y-axis) for the SG05 sample (98 stars, gray dots) and the R10 sample (243 stars, black “+”). For these measurements we adopted the values of T_{eff} and log g from the high-resolution data (first test).

Fig. 11.— Relative elemental abundance residuals RAVE-minus-high resolution (y-axis) versus high resolution measurements ([X/Fe]_{ref} ). For these measurements we adopted the values of T_{eff} and log g from the high-resolution data (first test). The symbols are as in Figure 10.

– 28 –

Fig. 12.— As in Figure 10 but adopting T_{eff} and log g from the RAVE data (second test).

Fig. 13.— As in Figure 11 but adopting T_{eff} and log g from the RAVE data (second test).

– 29 –

Fig. 14.— Residuals between measured and expected elemental abundances as a function of T_{eff}. For these measurements we adopted high resolution stellar parameters.

Fig. 15.— Expected internal errors of the chemical elemental abundances, estimated via standard deviations of the abundances from repeat observations. For a more robust statistic we used 30821 spectra of 12504 stars of the RAVE internal data release. The solid gray line represents the 1σ abundance error limit, i.e., 68% of the stars lie under the line for each STN bin, whereas the dashed gray line represents the 2σ limit. For this sample 9469 stars have two observations, 1286 have three, 1060 have four, 473 have five, 153 have six, 33 have seven, 11 have eight, 11 have nine, 4 have ten and four have 11 observations.

– 30 –

Fig. 16.— Comparison between [m/H]^{chem} (black line) [Fe/H]^{chem} (dotted line) and [m/H]^{RAVE} (noncalibrated metallicity, gray line) distributions for the whole sample (37848 spectra, left panel), dwarf (middle panel) and giant stars (right panel).

Fig. 17.— Distributions of stellar parameters T_{eff}, log g, [Fe/H] and signal-to-noise ratio STN for 37848 spectra of the chemical catalogue. In the bottom left panel, the [Fe/H] distribution is given separately for dwarfs (black line) and giants (gray line).

– 31 –

Fig. 18.— Fraction of spectra having elemental abundance measurements as a function of the STN. Every bin is normalized to the total number of observed spectra in the corresponding STN bin.

Fig. 19.— Fraction of spectra having elemental abundance measurements as a function of [m/H]^{RAVE}. Every bin is normalized to the total number of observed spectra in that [m/H]^{RAVE} bin. The solid, dashed and dotted lines represent the whole sample, dwarf stars only and giants stars only, respectively.

– 32 –

Fig. 20.— Abundances relative to iron for spectra with STN>20 (left panels) and STN>40 (right panels). The isocontours hold 34.0%, 68.0%, 95.0% and 99.5% of the sample.

– 33 –

6. Conclusions

This first release of the RAVE chemical catalogue reports the chemical abundances of seven elements (Mg, Al, Si, Ca, Ti, Fe, Ni) for 36,561 stars (from 37,848 spectra) selected from the DR3 data release. The chemical processing pipeline developed for the creation of the present catalogue assures homogeneous elemental abundance measurements in addition to the RAVE pipeline that estimates the values of the stellar parameters and radial velocities.

The uncertainties in the estimated elemental abundances depend mostly on the signal-to-noise ratio (STN) of the spectra; on the values of the stellar parameters of the stars; and on the element considered. The expected errors in abundance can be as small as 0.1 dex at STN>80 for the elements Fe and Si and up to ∼0.3 at 20≥STN≥40 for Ni.

On average we expect errors of ∼0.2 dex at STN≥40 for most of the elements. The relative abundances [X/Fe] are reliable with an underestimation of ∼ −0.1 dex for [X/Fe]>+0.3.

We plan to increase the number of measured elements in future data releases. We believe that with further development of the chemical pipeline it should be possible to enrich the catalogue with the abundances of at least two other elements (oxygen and sulfur).

The availability of chemical elemental abundances, together with the radial velocities of the stars (given in the RAVE DR3 data release) and their distances (Breddels et al. 2010, Zwitter et al. 2010, Burnett et al. 2011), make RAVE a prime dataset for Galactic archaeology investigations.

C.B. would like to thank M. Asplund, D. Yong and F. Thévenin for the useful discussions he had with them.

Funding for RAVE has been provided by: the Australian Astronomical Observatory; the Lebniz-Institut fr Astrophysik Potsdam (AIP); the Australian National University; the Australian Research Council; the European Research Council through ERC-StG 240271 (Galactica); the French National Research Agency; the German Research Foundation (DFG); the Sonderforschungsbereich “The Milky Way System” (SFB 881) of the DFG; the Istituto Nazionale di Astrofisica at Padova; The Johns Hopkins University; the National Science Foundation of the USA (AST- 0908326); the W.M. Keck foundation; the Macquarie University; the Netherlands Research School for Astronomy; the Natural Sciences and Engineering Research Council of Canada; the Slovenian Research Agency; the Swiss National Science Foundation; the Science & Technology Facilities Council of the UK; Opticon; Strasbourg Observatory; and the Universities of Groningen, Heidelberg and Sydney.

The RAVE web site is at http://www.rave-survey.org.

– 34 –

Table 2: Catalogue description

Field number name null value description

1 Object ID ... Identifier of the star 2 [Mg/H] -9.99 Mg abundance 3 N ... number of Mg lines measured 4 [Al/H] -9.99 Al abundance 5 N ... number of Al lines measured 6 [Si/H] -9.99 Si abundance 7 N ... number of Si lines measured 8 [Ca/H] -9.99 Ca abundance 9 N ... number of Ca lines measured 10 [Ti/H] -9.99 Ti abundance 11 N ... number of Ti lines measured 12 [Fe/H] -9.99 Fe abundance 13 N ... number of Fe lines measured 14 [Ni/H] -9.99 Ni abundance 15 N ... number of Ni lines measured 16 T_{eff} ... RAVE effective temperature 17 log g ... RAVE gravity 18 [m/H]^{RAVE} ... RAVE metallicity 19 [m/H]^{chem} ... metallicity from the chemical pipeline 20 [α/Fe]^{chem} ... α-enhancement from the chemical pipeline 21 STN ... signal-to-noise ratio 22 frac ... fraction of spectrum matching the template well 23 Ntot ... total number of lines measured 24 χ^2 ... χ^2 between observed and template spectra

– 35 –

A. Correction of the atomic oscillator strengths in the RAVE/Gaia wavelength region

In the following we outline how the pipeline treats oscillator strengths (gf, often expressed as a logarithm log gf) in the wavelength range 8400-8800Å. These are necessary in order to obtain trustworthy elemental abundance measurements in a wavelength region which is still poorly known. According to the Vienna Atomic Line Database VALD (1999) only 11 Fe lines have accurate gfvalue laboratory measurements (Blackwell et al., 1986, Bard et al., 1991, Bard & Kock, 1994), while the remaining hundreds of lines rely on theoretical and semi-empirical calculations (Kurucz, 1995). Some of these values have proved imprecise, with errors as large as 1 dex for important lines belonging to Fe and Si (Bigot & Thévenin, 2006). We have attempted to improve the oscillator strength values of 604 absorption lines using an inverse spectral analysis applied to spectra of the Sun and Arcturus.

A.1. Method

The RAVE line list consists of 604 absorption lines (excluding the H Iand Ca IIstrong lines) identified by looking at the high S/N Sun and Arcturus spectra (Hinkle et al., 2000) and verified by cross checking the line identification of Moore et al. (1966) and Hinkle et al. (2000). Some previously unidentified lines have been added in order to match features that are clearly visible in spectra of the Sun and Arcturus.

The lines have been selected from Kurucz data (Kurucz, 1995) and we have also adopted Kurucz’s wavelengths and excitation potentials χ. Following Chen et al. (2000) we also adopted the enhancement factor E_γ for the Unsöld approximation because it is commonly accepted that the line broadening due to Van der Waals interaction obtained from Unsöld’s approximation is too weak and needs to be corrected. For the CN molecule we used the dissociation energy D=7.75eV, as suggested by Sauval & Grevesse (1994).

We performed the inverse spectral analysis by synthesizing solar and Arcturus’s spectra with MOOG (a standard LTE line analysis and synthesis code by Sneden, 1973) and changing the log gfs values until a good match with both observed spectra is reached. We show here that matching these two spectra (or more) allows us to improve the log gfs of blended lines, which otherwise would be impossible to disentangle.

The EW of a measured absorption line is related to the log gf value through the curve of growth equation (see Gray, 2005, formula 16.4) log EW λ = log C + log A + log(gf · λ) − θχ − log κ_ν , (A1)

– 36 –

where C and θ are functions^6 of the temperature T, and κ_ν is the opacity at the frequency ν. When all the atmosphere model parameters are fixed, the curve of growth equation can be written as a function, f, of log gf and elemental abundance A EW = f(log gf, A). (A2) This allows us to disentangle two or more blended lines: let EW^x_{blend} be the EW of a blended feature of the star x composed of n lines of m different elements (n ≥ m) and having EW_1, EW_2...EW_n unknown EWs. Then we can write the system of equations EW^1_{blend} = n∑ f(log gf_n, A_n) (A3) EW^2_{blend} = n∑ f(log gf_n, A_n) . . . . EW^N_{blend} = n∑ f(log gf_n, A_n)

where A_n represents the abundance of the element the line belongs to.

Since the physical conditions and elemental abundance A of each stars are in general different, the values EW^x_{blend} are different as well. The equation system A3 is solvable when the (N) number of equations is greater than the unknown n + m. The existence and uniqueness of the solution is assured even for lines where the weak-line approximation does not hold, because the first derivative of the curve of growth is always positive.

This means that it is always possible to determine the log gfs of a blended feature and the elemental abundances by using a large enough number of spectra of different stars. In our case we have used two spectra: the Sun and Arcturus.

A.2. The correction routine

The following routine is valid when the stellar parameters and elemental abundances of both stars are known. We also consider later the case where elemental abundances are not known. To

6 C and θ are expressed as follows C = constant ·^{πe2}_{mc2}^{Nj /NE}_{u(T )} NH θ = 5040/T

where T is the temperature, Nj /NE is the fraction of atoms of the j-th stage of ionization with respect to the number of atoms of the element considered, NH is the number of hydrogen atoms per unit volume and u(T ) is the partition function.

– 37 –

synthesize the solar spectrum we assumed an effective temperature T_{eff}=5777K, gravity log g=4.44, microturbulence V_t=1.0 km/s and metallicity [m/H]=0.00. For Arcturus the atmospheric parameters are taken from Earle, Luck & Heiter (2005) (T_{eff}=4340K, log g=1.93, V_t=1.87 km/s [m/H]=– 0.55 dex).

The synthetic spectra have been obtained assuming solar chemical abundances by Grevesse & Sauval (1998) (hereafter GS98) and adopting the grid ATLAS9 model atmospheres of Castelli & Kurucz (2003). The log gfs correction is performed using the following procedure:

1. Synthesize the solar and Arcturus spectra from our line list.

2. Select the first line of the list

3. Integrate the absorbed flux of the observed and synthesized spectra over an interval spanning 0.4Å around the center of the line (roughly 1 FWHM, which takes into account most of the absorbed flux) and calculate the normalized EW residual (NEWR), defined as follows NEW R = (F_{synt} − F_{obs}) F_{obs} (A4)

where F_{synt} and F_{obs} are the flux of the synthetic and the observed spectrum, respectively. For the Sun and Arcturus we write (NEW R_{Sun}) and (NEW R_{Arc}).

4. If NEW R_{Sun} < −0.05 then add +0.01 to the log gf, else if NEW R_{Sun} > 0.05 then add −0.01 to the log gf (i.e. match the Sun first). Go to step 7.

5. If |NEW R_{Sun}| < 0.05 and NEW R_{Arc} < −0.05 then add −0.01 to the log gf, else if |NEW R_{Sun}| < 0.05 and NEW R_{Arc} > 0.05 then add +0.01 to the log gf (e.g. if the Sun matches then try to match Arcturus). Go to step 7.

6. If |NEW R_{Sun}| and |NEW R_{Arc}| are both < 0.05 then a valid log gf has been reached.

7. Select the next line from the line list and return to step 3.

The routine is iterated until no more improvement is seen. For about ten lines a good match could not be reached. Several reasons may be behind this: bad continuum correction, lines located over the Ca IIlines where the fit is unaccurate, misidentified lines or unrecognized blends. For these lines, we did a visual check and manually corrected the log gf values. The correction is good enough to derive gf-values that yield abundance errors per measured line smaller than 0.2 dex in average for both the Sun and Arcturus.

Since the abundance of Arcturus is not known for all elements, we decided to assume an initial abundance for all the elements ([X/H]=[m/H]) and find the right abundances with the following procedure:

1. Synthesize the Sun’s and Arcturus’s spectra.

– 38 –

2. Correct the log gf values by running the above correction routine until no more improvements are possible.

3. Check the distribution of the NEWRs for each element separately: if a positive/negative offset is present, decrease/increase its abundance.

4. Synthesize the solar and Arcturus’s spectra with the new log gfs and abundances.

5. Return to step 2.

This algorithm is repeated until there are no more improvements. The results of this procedure are the new log gfs and Arcturus’s chemical abundances (listed in Table 3).

A.2.1. Multiplets treatment

In the RAVE/Gaia wavelength range there are features that belong to atomic multiplets. An interesting characteristic of these multiplets is that they share the same excitation potential χ and have small differences in wavelength. In this case, obtaining a proper log gf for the individual lines is problematic.

We work around this problem in the following way: consider the two Al Ilines at λ_1 = 8773.896Å and λ_2 = 8773.897Å that share the same excitation potential χ = 4.021947eV . The two lines have unknown equivalent widths EW_1 and EW_2 but the sum

EW_{T ot} = EW_1 + EW_2, (A5)

is measured and well known. We can write the curve of growth as EW λ = C · A_{Al} · (gf) · λ 10^{θχ} · κ_ν , (A6)

where A_{Al} is the aluminum abundance and the other quantities are as in Eq. A1. Substituting Eq. A6 in Eq. A5 and adopting the approximation λ_1 ≃ λ_2 = λ we obtain EW_{T ot} λ = EW_1 + EW_2 λ = C · A_{Al} · (gf_1 + gf_2) · λ 10^{θχ} · κ_ν . (A7)

Using the logarithmic form, this equation then becomes log EW_{T ot} λ = log C + log A + log((gf_1 + gf_2) · λ) − θχ − log κ_ν , (A8)

which suggests that an appropriate functional form for a “dummy” variable log gf_d would be log(gf_1 + gf_2). Even if this does not allow us to disentangle the two log gfs, we can consider the multiplet as if it were one single line and correct the log gf_{fic}; it will be a “dummy” value but it results in giving the correct abundance of Al. This correction has also been applied to three Mg Imultiplets, centered at wavelengths 8717.814, 8736.020 and 8773.896Å.

– 39 –

abundance this work LH05 T98 F07

[O/H] +0.17 –0.30 –0.10 [Mg/H] –0.03 +0.02 –0.45 –0.10 [Al/H] –0.27 –0.28 –0.40 –0.17 [Si/H] –0.15 –0.14 –0.30 –0.15 [S/H] –0.13 [Ca/H] –0.26 –0.56 –0.20 –0.28 [Ti/H] –0.22 –0.39 –0.20 –0.20 [Cr/H] –0.37 –0.55 –0.20 [Fe/H] –0.52 –0.55 –0.40 –0.54 [Co/H] –0.17 –0.36 –0.20 [Ni/H] –0.45 –0.48 –0.35 [Zr/H] –1.00

Table 3: Arcturus’s elemental abundances compared with the results by Luck & Heiter (2005) (LH05), Thévenin (1998) (T98), Fulbright et al. (2007) (F07)

A.3. Tests

In order to test the accuracy of this procedure, we have measured by hand the EWs of 100 atomic lines in the solar spectrum. Figure 21 presents the difference in abundances obtained by using the Kurucz gf-values (open points) and the corrected ones (solid points). Our correction reduced the standard deviations of the abundance residuals from σ=0.63 dex to σ=0.15 dex and their averages from +0.16 to -0.05.

We also compared our results to the log gf by Kirby et al. (2008), who corrected the gf-values by applying a similar method, i.e., by synthesizing the solar and Arcturus’s spectra and comparing the synthetic spectra with the observed ones. A comparison between our and their results is shown in Figure 22 for the 89 corrected lines in common: on average our log gf are lower by –0.05 dex. This is very likely due to different solar elemental abundances adopted: Kirby adopts the Anders & Grevesse (1989) abundances which are on average higher than Grevesse & Sauval (1998), which we adopt.

One more test involves comparing our results for Arcturus’s elemental abundances with abundances quoted in the literature. This is done in Tab. 3 where our elemental abundances are compared with those of Luck & Heiter (2005), Thévenin (1998) (T98), and Fulbright et al. (2007) (F07). From the consistency of these tests, we are confident that our computed log gf values are accurate and that our procedure yields robust and reliable elemental abundance estimates.

– 40 –

Fig. 21.— solar elemental abundances obtained from 100 atomic lines for which EWs (x-axis) have been measured by hand from the solar spectrum. The open points represent the elemental abundances obtained by using the Kurucz gf-values, whereas the corrected gf-values are represented by the solid points. The respective dispersions are σ=0.63 dex (open points) and σ=0.15 dex (solid points).

Fig. 22.— Comparison between corrected log gfs by Kirby et al. 2008 (x-axis) and RAVE (y-axis). The statistics on the panel refers to points after the crossed outlier has been removed.

– 41 –

Table 4. Seven lines extracted from the RAVE line list. The whole table contains 604 lines with log gf correction, and the 3 Ca IIand 8 H Ilines which are not used for elemental abundance measurements (and did not undergo to log gf corrections). The atomic species 607.0 represent the CN molecule, following the MOOG format.

wavelength(Å) atomic species χ(eV) log gf E_γ Dissociation energy (eV)

8643.306 26.0 4.913304 -2.470 1.40 0.00 8644.077 607.0 0.933782 -1.773 2.50 7.75 8646.050 607.0 1.324726 -1.540 2.50 7.75 8646.371 14.0 6.206423 -1.740 1.30 0.00 8647.175 607.0 0.877831 -1.872 2.50 7.75 8648.465 14.0 6.206423 0.100 1.30 0.00 8648.688 607.0 0.910915 -1.516 2.50 7.75

Note. — Table 4 is published in its entirety in the electronic edition of the Astronomical Journal.

– 42 –

B. Microturbulence

The polynomial function used to determine the microturbulence ξ is expressed as follows

ξ_{poly}(km s^{−1}) = i+j≤3∑

i,j=0,1,2,3 a_{ij} T^i(log g)^j (B1)

where the coefficients a_{ij} are

a_{00} = −10.3533 (B2) a_{01} = 2.59492 a_{02} = 0.161863 a_{03} = 0.176579 a_{10} = 0.00509193 a_{11} = −0.00157151 a_{12} = −3.99782 · 10^{−7} a_{20} = −0.000361822 a_{21} = 3.82802 · 10^{−7} a_{30} = −5.18845 · 10^{−11}

– 43 –

REFERENCES Allende Prieto, C., Barklem, P.S., Lambert, D.L., Cunha, K., 2004, A&A 420, 183 Anders, E., Grevesse, N., 1989, Geochim. Cosmochim. Acta 53, 197 Asplund, M., Grevesse, N., Sauval, A. J., 2005, in ASP Conf.Ser. 336, Cosmic Abundances as Record of Stellar Evolution and Nucleosynthesis, ed. Thomas G. Barnes III and Frank N. Bash, (San Francisco: ASP), 25 Abazajian, K.N., et al., 2009, ApJS 182, 543 Bard, A., Kock, A., Kock, M. 1991, A&A, 248, 315 Bard, A., Kock, M. 1994, A&A, 282 ,1014 Barklem, P.S., Piskunov, N., O’Mara, B.J., 2000, A&AS 142, 467 Bensby, T., Feltzing, S., Lundström, I., Ilyin, I., 2005, A&A 433, 185 Bigot, L., Thévenin, F. 2006, MNRAS 372, 609 Blackwell, D. E., Booth, A. J., Haddock, D. J., Petford, A. D., Leggett, S. K. 1986, MNRAS, 220, 549 Boeche, C., PhD thesis, 2011, urn:nbn:de:kobv:517-opus-52478, Potsdam Universität,

http://opus.kobv.de/ubp/volltexte/2011/5247/

Borrero, J. M., Bellot Rubio, L. R., Barklem, P. S., del Toro Iniesta, J. C., 2003 A&A 404, 749 Breddels, M. A., et al., 2010, A&A 511, 90 Burnett B., et al., 2011, A&A 532, 113 Castelli, F., Kurucz, R. L., 2003, in IAUS symp. 210, Modelling of Stellar Atmospheres, ed. N.

Piskunov, W.W. Wiess and D.F. Gray , Published on behalf of the IAU by the ASP, 20 Chen, Y.Q., Nissen, P.E., Zhao, G., Zhang, H.W., Benoni, T., 2000, A&AS 141, 491 Edvardsson, B., Andersen, J., Gustafsson, B., Lambert, D.L., Nissen, P.E., Tomkin, J., 1993, A&A 275, 101 Eggen, O., 1965, in Galactic Structure, Stars and Stellar Systems, Volume 5, ed. A. Blaauw & M.

Schmidt, (Chicago: Univ. of Chicago Press), 111 Eggen, O., J., Lynden-Bell, D., Sandage, R., 1962, ApJ 136, 748 Freeman, K., Bland-Hawthorn, J., 2002, ARA&A 40, 487

– 44 –

Freeman, K., Bland-Hawthorn, J., 2008, in ASP Conf. Ser. 399, Panoramic Views of Galaxy Formation and Evolution, ed. Tadayuki Kodama, Toru Yamada, and Kentaro Aoki, (San Francisco: ASP), p.439 Fuhrmann, K., 1998, A&A 338, 161 Fuhrmann, K., 2008, MNRAS 384, 173 Fulbright, J.P., McWilliam, A., Rich, R.M., 2007, AJ 661, 1152 Fulbright, J.P., McWilliam, A., Rich, R.M., 2006, AJ 636, 821 Gray, D. F., 2005, The Observation and Analysis of Stellar Photospheres, Third Edition, Cambridge University Press, New York Gilmore, G., Reid, N., 1983, MNRAS 202, 1025 Gilmore, G., Wyse, R.F.G., Kuijken, K., 1989, ARA&A 27, 555 Grevesse, N., Sauval, A.J. 1998, Space Sci. Rev. 85, 161 Gurtovenko, E.A., Kostik, R. I. 1981, A&AS, 46, 239 Helmi, A., Navarro, J.F., Nordström, B., Holmberg, J., Abadi, M.G., Steinmetz, M., 2006, MNRAS 365, 1309 Hinkle, K., Wallace, L., Valenti, J.,; Harmer, D., 2000, Visible and Near Infrared Atlas of the Arcturus Spectrum 3727-9300 Å, Available at: ftp://ftp.noao.edu/catalogs/arcturusatlas/visual Høg, E.; Fabricius, C.; Makarov, V. V.; Urban, S.; Corbin, T.; Wycoff, G.; Bastian, U.; Schwekendiek, P.; Wicenec, A. 2000, A&A 355, L27 Kirby, E.N., et al., 2008, AJ 682, 1217 Kurucz, R. L. 1995, in ASP Conf.Ser 78, Astrophysical Application of Powerful New Database, ed.

S.J. Adelman, W.L. Wiese, (San Francisco, CA), 205 Kupka, F.,Piskunov, N., Ryabchikova, T.A., Stempels, H.C., Weiss, W.W., 1999, A&AS, 138, 119 Luck, R.E., Heiter, U. 2005, 2005, AJ 129, 1063 Luck, R.E., Heiter, U., 2006, AJ 131, 3069 Luck, R.E., Heiter, U., 2007, AJ 133, 2464 Mishenina, T.V., Kovtyukh, V.V., Korotin, S.A., Soubiran, C., 2003, Astron. Zh. 80, 458 Moore, C. E., Minnaert, M. G. J., Houtgast, J., 1966, The solar spectrum 2935 Å to 8770 Å, National Bureau of Standards Monograph 61

– 45 –

Nordström, B., et al., 2004, A&A 418, 989 Perryman, M. A. C., et al., 2001, A&A 369, 339 Reddy B.,E., Tomkin J., Lambert L., and Allende Prieto C., 2003, MNRAS 340, 304 Reddy, B.E., Lambert D.L., Allende Prieto C., 2006, MNRAS 367, 1329 Robin, A., C., Reylé, C., Derrière, S., Picaud, S., 2003, A&A 409, 523 Roeser, S., Schilbach, E., Schwan, H., Kharchenko, N.V., Piskunov, A.E., Scholz R.-D., 2008, A&A 488, 401 Ruchti, G. R. et al., 2010, ApJ 721, 92 Salaris, M., Chieffi, A., Straniero, O., 1993, AJ 414, 580 Sauval, A. J., Grevesse, N., 1994, in IAUS symp. 154, Infrared solar physic, ed. D.M. Rabin, John T. Jefferies, and C. Lindsey, (Kluwer Academic Publishers; Dordrecht), 549 Siebert, A., et al., 2011, AJ 141, 187 Sneden, C., 1973, Ph.D. thesis, Univ. Texas ar Austin, software available at

http://verdi.as.utexas.edu/moog.html

Soubiran, C., Girard, P., 2005, A&A 438, 139 Soubiran C., Le Campion J.-F., Cayrel de Strobel G., and Caillo A., A&A submitted, arXiv:

1004.1069 Steinmetz, M., et al., 2006, AJ 132, 1645 Thévenin, F. 1989, A&AS, 77, 137 Thévenin, F. 1990, A&AS, 82, 179 Thévenin, F. 1998, Bull. Inf. CDS 49 (unpublished) Unsöld, A., 1955, Physik der Sternatmospharen. Springer, Berlin Valenti, J.A., Fisher, D.A., 2005, AJSS 159, 141 Venn K.A., Irwin M., Shetrone M.D., Tout C.A., Hill V., Tolstoy E., AJ 128, 1177 Yanny, B., et al., 2009, AJ 137, 4377 Zwitter, T., et al., 2008, AJ 136, 421 Zwitter, T., et al., 2010, A&A 522, 54

– 46 –

Zacharias, N., Urban, S.E., Zacharias, M.I., Wycoff, G.L., Hall, D.M., Germain, M.E., Holdenried, E.R., Winter, L. AJ 127, 3043

This preprint was prepared with the AAS L^ATEX macros v5.2.