arXiv:1010.2397v2 [astro-ph.HE] 22 Nov 2010

FACT – the First Cherenkov Telescope using a G-APD Camera for TeV Gamma-ray Astronomy

H. Anderhub^∗ M. Backes^{†‖}, A. Biland^∗, A. Boller^∗, I. Braun^∗ T. Bretz^‡, S. Commichau^∗, V. Commichau^∗, M. Domke^†, D. Dorner^{∗§}, A. Gendotti^∗, O. Grimm^∗, H. von Gunten^∗, D. Hildebrand^∗, U. Horisberger^∗, J.-H. Köhne^†, T. Krähenbühl^∗, D. Kranich^∗, B. Krumm^†, E. Lorenz^∗, W. Lustermann^∗, K. Mannheim^¶, D. Neise^†, F. Pauss^∗, D. Renker^∗, W. Rhode^†, M. Rissi^∗, M. Ribordy^‡, U. Röser^∗, L.S. Stark^∗, J.-P. Stucki^∗, O. Tibolla^{¶‖}, G. Viertel^∗, P. Vogler^∗, K. Warda^†, Q. Weitzel^∗

∗ETH Zurich, Institute for Particle Physics, CH-8093 Zurich, Switzerland †Technische Universität Dortmund, D-44221 Dortmund, Germany ‡École Polytechnique Fédérale de Lausanne, CH-1015, Switzerland §ISDC, Data Centre for Astrophysics, CH-1290 Versoix, Switzerland ¶Universität Würzburg, D-97074 Würzburg, Germany ‖corresponding authors: Omar.Tibolla@astro.uni-wuerzburg.de; michael.backes@physik.tu-dortmund.de

Abstract. Geiger-mode Avalanche Photodiodes (G- APD) bear the potential to significantly improve the sensitivity of Imaging Air Cherenkov Telescopes (IACT). We are currently building the First G-APD Cherenkov Telescope (FACT) by refurbishing an old IACT with a mirror area of 9.5 square meters and construct a new, fine pixelized camera using novel G-APDs. The main goal is to evaluate the performance of a complete system by observing very high energy gamma-rays from the Crab Nebula. This is an important field test to check the feasibility of G-APD-based cameras to replace at some time the PMT-based cameras of planned future IACTs like AGIS and CTA. In this article, we present the basic design of such a camera as well as some important details to be taken into account.

Keywords: Cherenkov telescope, ground-based gamma-ray astronomy, instrumentation, Geigermode Avalanche Photodiode (G-APD)

I. INTRODUCTION

Since the first detection of very high energy (VHE) gamma-rays from outer space in 1989 [1], the field of ground-based gamma-ray astronomy with Imaging Air Cherenkov Telescopes (IACT) has made a tremendous development, resulting in more than a hundred known gamma-ray sources of both, galactic and extragalactic origin. This achievement was mainly driven by technological developments enabling a giant leap in sensitivity as achieved by the most recent instruments, the CANGAROO-III, H.E.S.S., MAGIC, and VERITAS telescopes. Now the field is standing at the crossroads, seeking for another significant increase in sensitivity compared to the currently best instruments for the next generation instrumentation, CTA.

As the sensitivity of IACTs depends on the overall photon detection efficiency, i.e., on the conversion of

Cherenkov photons hitting the primary mirror into measurable photoelectrons, it is only natural to seek for the best possible devices for photon detection. For all IACTs built up to now, Photomultiplier tubes (PMT) have been the first choice. Recently, a new semiconductor device with excellent single photon response became available: the so-called Geiger-mode Avalanche Photodiodes (G- APD).

II. GEIGER-MODE AVALANCHE PHOTODIODES Photomultiplier tubes have been the workhorse in detecting single or rare photons ever since their invention. This is mainly due to their high photon detection efficiency (PDE) and their high intrinsic amplification (O(10^5 −10^7)). But due to limited possibilities to further increase their quantum efficiency (QE), sensitivity to even weak magnetic fields, needs of stabilized HV power supplies, easy damage by high light levels and expensive production techniques one would like to replace them by more advanced devices. With the invention of Geigermode Avalanche Photodiodes, many of those drawbacks could be overcome by robust semiconductor devices, keeping the high intrinsic amplification and promising even higher PDEs than that of PMTs (for an overview, see [2]). This, together with the advantages that G-APDs are operated at voltages of about 70 V, which is much lower than for PMTs, and that they are neither damaged by bright illumination during operation nor sensitive to magnetic fields makes them promising candidates for replacing PMTs in the next generation of Astroparticle Physics instrumentations, and especially in IACTs [3, 4]. For this purpose, several intrinsic properties of a given G-APD type, like the afterpulse behavior [5], the angular acceptance and the light amount reconstruction [6] have been studied especially focusing on their possible application in IACTs. And also the first Cherenkov light from air-showers has been detected with an installation of some single G-APDs on the MAGIC telescope [7].

Thus, the idea of a two-step test for this new technology to be operated under Cherenkov telescope conditions was developed [8], with the first step evaluating a small test camera consisting of 144 G-APDs (see Section III) and the second step to build a full-size camera operated on an existing Cherenkov telescope (see Section IV).

III. 36-PIXEL TEST CAMERA M0 For the first step of the test to study whether G- APDs are actually suitable to replace PMTs in IACTs, a small test camera was built [9]. This camera was made up of 144 G-APDs of the type Hamamatsu MPPC S10362-33-50-C [10], of which always four were added together analogly, making up one pixel. Thus, the camera consisted of 36 pixels being arranged in a quadratic lattice. The trigger decision was taken on the majority of the innermost 16 pixels. Upon a trigger, all signals from the 36 pixels were digitized using the Domino Ring Sampling chip DRS2 [11], which is based on a capacitor array, allowing for a high sampling rate of 2 GSamples/s and being read out after a trigger by a fairly slow (40 MHz) ADC system. A similar digitization system, also based on the DRS2, is currently being used by the second MAGIC telescope [12].

This test setup, combined with an 80 cm diameter focusing mirror, served to observe Cherenkov light from VHE air-showers in the presence of the rather bright night-sky background of Zurich. This test proved that it was possible to observe air-showers by a self-triggered camera built entirely of G-APDs [13, 14]. This, and similarly auspicious findings of another group [15] clearly lead to promising expectations about the first real-size Cherenkov telescope equipped with a G-APD camera, FACT.

IV. FACT The First G-APD Cherenkov Telescope (FACT) will be based on a former HEGRA telescope, still situated at the Roque de los Muchachos Observatory on the Canary Island of La Palma at about 2200 m a.s.l. The telescope will receive a complete technological upgrade, including refurbished mirrors, the drive system, and the data acquisition system (as also previously reported [16, 17, 18]) and will be equipped with a new camera, based entirely on G-APDs.

A. Mirrors

The existing glass mirrors of the HEGRA CT3 will be exchanged by the mirrors originally built for an upgrade of HEGRA CT1 [19]. These mirrors are made all of aluminum, with an honeycomb inlay between the front and the back plates. They are of hexagonal shape, covering an area of 0.317 m^2 each. Being comprised of 30 of such mirrors, the total reflective surface of FACT amounts to 9.51 m^2. The over twelve years old mirrors have been re-machined by diamond-milling and subsequent coating with SiO_2. The distribution of the focal lengths is depicted in Fig. 1. It shows a very small spread of 9 mm around the mean focal length of 4.890 m.

Fig. 1: Distribution of the focal lengths of the FACT mirrors.

The spectral reflectivity of the mirrors is influenced by the coating thickness and thus by the homogeneity of the coating across the mirror surface. The specular reflectivity of all mirrors was measured to be constant within 4 % over every single mirror. The mean measured spectral reflectivity of all mirrors is shown in Fig. 2, also giving the maximum deviations as error bars.

Fig. 2: Mean Measured reflectivity of the mirror facets for FACT. The maximum deviations are given as error bars. The former reflectivity of the used mirrors (CT1) [19], as well as those for H.E.S.S. [20] and MAGIC [21] mirrors are given for comparison.

B. Drive System

The telescope drive will essentially be a down-scaled version of the drive system implemented in the MAGIC telescopes [22]. It is based on a programmable logic controller, accessible via Ethernet. New gears, fitting the new motors to the existing telescope system have been designed and all drive components are ready for installation.

C. Camera

The FACT camera will consist of 1440 G-APDs of the same type as already successfully operated in the test camera. Each G-APD will represent a pixel and will be equipped with a light guide and connected to a read-out channel. To account for the extreme nonlinear dependence of the gain of the G-APDs, a feedback system, based on an external temperature-stabilized LED pulser has been developed and extensively tested [23], using the test camera described in Section III. Taking into account the extremely isotropic angular acceptance of the used G-APDs [6], a special design for nonimaging light concentrators made of UV transparent plexiglass has been made [24]. These light concentrators have a parabolic shape, guiding the incident light with total reflections from a hexagonal entrance to a quadratic exit window matching the sensitive area of the G-APDs. This scheme allows one to arrange the pixels in a hexagonal pattern, thus matching the requirements of a minimal angular dependence of light collection used for advanced analysis methods developed for Cherenkov astronomy, as e.g. introduced in [25]. In contrast a

Fig. 3: Conceptual drawing of the FACT camera.

simple majority coincidence in the 36-pixel test camera, the trigger signal for FACT will be generated by a signal over threshold logic for every analog sum of 9 adjacent pixels, arranged in non-overlapping patches. The data acquisition (DAQ) system will be based on the DRS4 [26], which is an improved successor of the DRS2, used in the test camera, allowing for higher sampling rates (up to 5 GSamples/s) and a significantly reduced dead-time. The trigger logic and the DAQ are housed in water cooled crates, located directly behind the sensor plane inside the camera, see Fig. 3. The data transfer down from the telescope will be handled via optical link Ethernet connections.

D. Software

During the design phase of the software special care was taken to comply with many standards already used by software for the MAGIC telescopes. The fully functional analysis software package MARS [27, 28] is at hand and can be used with only a few changes for the analysis of FACT data. For the Monte Carlo simulations, CORSIKA [29] air-shower simulations and the recently developed detector simulation subroutines in MARS CheObs [30] will be used. According to preliminary simulations based on this software, an energy threshold of 400 GeV is predicted for FACT [31].

V. OUTLOOK

The construction of the camera as well as the assembly of the new telescope components will be carried out during fall in order to be ready to observe this winter the Crab Nebula.The hopefully successful test of the novel G-APD camera will be a first step to consider the new photosensors for the next generation of IACTs, as e.g. CTA. FACT itself might be the first telescope to be included in a world-wide network of Cherenkov telescopes [32, 33] for monitoring bright blazars in the northern hemisphere [34].

ACKNOWLEDGMENTS

Testing novel photo-sensors for advanced Cherenkov cameras is partially funded through the German BMBF grants 05A08WW1 and 05A08PEA which are gratefully acknowledged.

REFERENCES

[1] T. C. Weekes, et al., Observation of TeV gamma rays from the Crab nebula using the atmospheric Cerenkov imaging technique, Astrophysical Journal 342 (1989) 379–395.

[2] D. Renker, E. Lorenz, Advances in solid state photon detectors, Journal of Instrumentation 4 (2009) 4004.

[3] J. Buckley, et al., The Status and future of groundbased TeV gamma-ray astronomy. A White Paper prepared for the Division of Astrophysics of the American Physical Society, ArXiv e-prints (2008) 0810.0444.

[4] R. G. Wagner, et al., The Next Generation of Photo-Detectors for Particle Astrophysics, in: Astro2010: Technology Development Papers, volume 2010 of The Astronomy and Astrophysics Decadal Survey, pp. 59–+.

[5] T. Krähenbühl, et al., Geiger-mode Avalanche Photodiodes as Photodetectors in Cherenkov Astronomy, in: 31^{th} International Cosmic Ray Conference, Łódź, Poland, p. 1282. Published online: http://icrc2009.uni.lodz.pl/proc/.

[6] T. Krähenbühl, et al., Geiger-mode avalanche photodiodes as photodetectors in Cherenkov astronomy, in: International Workshop on New Photon Detectors (PD09).

[7] A. Biland, et al., First detection of Cherenkov light from cosmic-particle-induced air showers by Geiger-mode avalanche photodiodes, Nuclear Instruments and Methods in Physics Research A 581 (2007) 143–146.

[8] I. Braun, et al., First Avalanche-photodiode camera test (FACT): A novel camera using G-APDs for the observation of very high-energy γ-rays with Cherenkov telescopes, Nuclear Instruments and

Methods in Physics Research A 610 (2009) 400– 403.

[9] Q. Weitzel, et al., A Novel Camera Type for Very High Energy Gamma-Astronomy, in: 31^{th} International Cosmic Ray Conference, Łódź, Poland, p. 1074. Published online: http://icrc2009.uni.lodz.pl/proc/.

[10] Hamamatsu Photonics, MPPC - Multi-Pixel Photon Counter – technical information, http://sales.hamamatsu.com/assets/ applications/SSD/mppc kapd9003e02.pdf, 2009.

[11] S. Ritt, The DRS2 Chip: a 4.5 GHz Waveform Digitizing Chip for the MEG Experiment, in: Proc. IEEE National Science Symposium.

[12] R. Pegna, et al., A GHz sampling DAQ system for the MAGIC-II telescope, Nuclear Instruments and Methods in Physics Research A 572 (2007) 382–384.

[13] H. Anderhub, et al., A novel camera type for very high energy gamma-ray astronomy based on Geiger-mode avalanche photodiodes, Journal of Instrumentation 4 (2009) P10010.

[14] H. Anderhub, et al., Results of the Prototype Camera for FACT, Nuclear Instruments and Methods in Physics Research A (2010) This issue.

[15] H. Miyamoto, et al., SiPM development and application for astroparticle physics experiments, in: 31^{th} International Cosmic Ray Conference, Łódź, Poland, p. 1320. Published online: http://icrc2009.uni.lodz.pl/proc/.

[16] T. Bretz, et al., Long term VHE gamma ray monitoring of bright blazars with a dedicated Cherenkov telescope, in: Blazar Variability across the Electromagnetic Spectrum.

[17] T. Bretz, et al., Long-term monitoring of bright blazars with a dedicated Cherenkov telescope, in: F. A. Aharonian, W. Hofmann, & F. Rieger (Ed.), American Institute of Physics Conference Series, volume 1085 of American Institute of Physics Conference Series, pp. 850–853.

[18] M. Backes, et al., Long-Term Monitoring of Bright Blazars with a Dedicated Cherenkov Telescope, International Journal of Modern Physics D 18 (2009) 1645–1649.

[19] J. Cortina, et al., The new data acquisition system of the first telescope in HEGRA, in: B. L. Dingus, M. H. Salamon, & D. B. Kieda (Ed.), American Institute of Physics Conference Series, volume 515 of American Institute of Physics Conference Series, pp. 368–372.

[20] K. Bernlöhr, et al., The optical system of the H.E.S.S. imaging atmospheric Cherenkov telescopes. Part I: layout and components of the system, Astroparticle Physics 20 (2003) 111–128.

[21] C. Bigongiari, et al., The MAGIC telescope reflecting surface, Nuclear Instruments and Methods in Physics Research A 518 (2004) 193–194. Proc. Frontier Detectors for Frontier Physics.

[22] T. Bretz, et al., The drive system of the major atmospheric gamma-ray imaging Cherenkov telescope, Astroparticle Physics 31 (2009) 92–101.

[23] H. Anderhub, et al., A G-APD based Camera for Imaging Atmospheric Cherenkov Telescopes, Nuclear Instruments and Methods in Physics Research A (2010) Article in Press.

[24] I. Braun, et al., Solid Light Concentrators for Cherenkov Astronomy, in: 31^{th} International Cosmic Ray Conference, Łódź, Poland, p. 1248. Published online: http://icrc2009.uni.lodz.pl/proc/.

[25] E. Aliu, et al., Improving the performance of the single-dish Cherenkov telescope MAGIC through the use of signal timing, Astroparticle Physics 30 (2009) 293–305.

[26] S. Ritt, Design and Performance of the 6 GHz Waveform Digitizing Chip DRS4, in: Proc. IEEE National Science Symposium.

[27] T. Bretz, et al., MAGIC - Roadmap to a standard analysis, in: F. A. Aharonian, H. J. Völk, & D. Horns (Ed.), High Energy Gamma-Ray Astronomy, volume 745 of American Institute of Physics Conference Series, pp. 730–735.

[28] T. Bretz, D. Dorner, MARS-The Cherenkov Observatory edition, in: F. A. Aharonian, W. Hofmann, & F. Rieger (Ed.), American Institute of Physics Conference Series, volume 1085 of American Institute of Physics Conference Series, pp. 664–667.

[29] D. Heck, J. Knapp, EAS Simulation with COR- SIKA: A User’s Manual, Forschungszentrum Karlsruhe, http://www-ik.fzk.de/corsika, 2010.

[30] T. Bretz, D. Dorner, MARS - CheObs goes Monte Carlo, in: 31^{th} International Cosmic Ray Conference, Łódź, Poland, p. 1259. Published online: http://icrc2009.uni.lodz.pl/proc/.

[31] T. Bretz, et al., Status of the DWARF project for long-term monitoring of bright blazars, in: 31^{th} International Cosmic Ray Conference, Łódź, Poland, p. 1275. Published online: http://icrc2009.uni.lodz.pl/proc/.

[32] T. Bretz, et al., Long-term VHE γ-ray monitoring of bright blazars with a dedicated Cherenkov telescope, in: 30^{th} International Cosmic Ray Conference, Mérida, Mexico, volume 3 of International Cosmic Ray Conference, pp. 1495–1498.

[33] T. Bretz, et al., Long-term VHE γ-ray monitoring of bright blazars with a dedicated telescope, Astronomische Nachrichten 328 (2007) 676.

[34] M. Backes, et al., Long-term monitoring of blazars the DWARF network, in: 31^{th} International Cosmic Ray Conference, Łódź, Poland, p. 1452. Published online: http://icrc2009.uni.lodz.pl/proc/.