arXiv:1009.5890v1 [astro-ph.GA] 29 Sep 2010

PASJ: Publ. Astron. Soc. Japan , 1–??, © 2015. Astronomical Society of Japan.

Astrometry of H_2O masers in the massive star–forming region IRAS 06061+2151 with VERA

Kotaro NIINUMA,^1 Takumi NAGAYAMA,^1 Tomoya HIROTA,^{1, 2} Mareki HONMA,^{1, 2} Kazuhito MOTOGI,^6 Akiharu NAKAGAWA,^5 Tomoharu KURAYAMA,^5 Yukitoshi KAN-YA,^1 Noriyuki KAWAGUCHI,^{1, 2, 3} Hideyuki KOBAYASHI,^{1, 4} Yuji UENO,^2 1Mizusawa VLBI Observatory, National Astronomical Observatory of Japan, 2-21-1 Osawa, Mitaka, Tokyo 181-8588 2Graduate University for Advanced Studies, 2-21-1 Osawa, Mitaka, Tokyo 181-8588 3Mizusawa VLBI Observatory, National Astronomical Observatory of Japan, 2-12 Hoshi-ga-oka, Mizusawa-ku, Oshu, Iwate 023-0861 4Department of Astronomy, The University of Tokyo, 7-3-1 Hongo, Bunkyo-ku, Tokyo 113-8654 5Graduate School of Science and Engineering, Kagoshima University, 1-21-35 Korimoto, Kagoshima, Kagoshima 890-0065 6Department of Cosmosciences, Graduate School of Science, Hokkaido University, N10 W8, Sapporo 060-0810 kotaro.niinuma@nao.ac.jp

(Received 2010 July 23; accepted 2010 September 21)

Abstract

We measured the trigonometric annual parallax of H_2O maser source associated with the massive starforming regions IRAS 06061+2151 with VERA. The annual parallax of 0.496 ± 0.031 mas corresponding to a distance of 2.02^{+0.13}_{−0.12} kpc was obtained by 10 epochs of observations from 2007 October to 2009 September. This distance was obtained with a higher accuracy than the photometric distance previously measured, and places IRAS 06061+2151 in the Perseus spiral arm. We found that IRAS 06061+2151 also has a peculiar motion of larger than 15 km s^{−1} counter to the Galactic rotation. That is similar to five sources in the Perseus spiral arm, whose parallaxes and proper motions have already been measured with higher accuracy. Moreover, these sources move at on average 27 km s^{−1} toward the Galactic center and counter to the Galactic rotation.

Key words: astrometry — masers (H_2O) — ISM: H II regions — techniques: high angular resolution — VERA

1. Introduction

The annual parallax is the most direct way to accurately measure the distance to a target source without any assumption. Very Long Baseline Interferometer (VLBI) provides the highest accuracy of position determination among astronomical instruments. It is possible to determine the position of target sources with an accuracy of less than 1 mas with the VLBI observations. The phasereferencing VLBI has been utilized in recent astrometry to measure the annual parallaxes of target sources. For example, the results of trigonometric parallax measurements of H_2O and CH_3OH maser sources using the NRAO Very Long Baseline Array (VLBA) were reported by Xu et al. (2006); Hachisuka et al. (2006, 2009); Reid et al. (2009a).

The Japanese VLBI Exploration of Radio Astrometry (VERA) is an instrument dedicated to carrying out VLBI astrometry. It aims to figure out the Galactic 3D structure by measuring the trigonometric parallaxes and the proper motions of maser sources with the phase-referencing VLBI. To carry out effective phase-referencing observations, the dual-beam system was developed (Kobayashi et al. 2008). The results of the trigonometric parallaxes of several H_2O maser source (e.g. Orion-KL, IRAS 06058+2138) with VERA have already been reported by Choi et al. (2008); Hirota et al. (2007, 2008a, 2008b);

Honma et al. (2007); Imai et al. (2007); Nakagawa et al. (2008); Oh et al. (2010); Sato et al. (2008, 2010).

It is believed that our Galaxy is composed of several spiral arms. In order to understand the spiral structure and the rotational kinematics of the Galaxy, it is important to study the structure of each spiral arm. So, measuring the accurate distance to the astronomical objects and investigating their kinematics in the spiral arms are essential for studying spiral arm structure. The Perseus spiral arm is the nearest one to us outward from the Sun in the Galaxy and consists of many star-forming regions. Also, the distances to six sources have previously been measured with high accuracy in previous studies (Moellenbrock et al. 2009; Moscadelli et al. 2009; Oh et al. 2010; Reid et al. 2009a; Sato et al. 2008; Xu et al. 2006). It turns out that some of these sources (e.g. W3OH, IRAS 00420+5530) showed their peculiar motion with respect to the Galactic rotation. However, it is necessary to increase the number of samples because the current number is insufficient to indicate that their peculiar motions relate to the motion of the Perseus spiral arm.

IRAS 06061+2151 is a massive star-forming region located in the Gemini OB1 cloud complex. Several sources are associated with IRAS 06061+2151, for example, a radio continuum source associated with the ultra compact H II region, G188.794+1.031 (Kurtz et

Table 1. VERA observations of IRAS 06061+2151

Epoch ID Date Day of year Synthesized beam T_{sys} θ_{maj} × θ_{min}(P A) Iriki Mizusawa Ogasawara Ishigakijima [mas×mas (^∘)] [K] 1 2007/Oct 23 2007/296 1.80 × 1.12 (128.5) 150 - 240 110 - 150 320 - 600 240 - 550 2 2007/Dec 15 2007/349 1.83 × 1.13 (127.4) 110 - 170 110 - 530 150 - 210 250 - 550 3 2008/Feb 15 2008/046 1.81 × 1.13 (128.9) 100 - 160 100 - 190 150 - 2600 150 - 300 4 2008/Apr 20 2008/111 1.84 × 1.13 (127.4) 130 - 200 130 - 200 160 - 270 250 - 550 5 2008/Jun 15 2008/167 1.79 × 1.12 (128.5) 500 - 12000 180 - 260 300 - 550 120 - 200 6^∗ 2008/Sep 29 2008/273 1.74 × 1.09 (129.7) - 120 - 200 450 - 850 350 - 1500 7 2008/Nov 02 2008/307 1.86 × 1.13 (125.7) 250 - 2300 140 - 280 200 - 380 300 - 750 8 2008/Dec 14 2008/349 1.90 × 1.13 (133.4) 100 - 140 100 - 130 200 - 380 180 - 1400 9 2009/Feb 15 2009/046 1.86 × 1.14 (130.7) 150 - 700 110 - 180 240 - 5000 210- 540 10 2009/May 11 2009/131 1.82 × 1.13 (128.5) 100 - 145 200 - 340 150 - 240 200 - 450 11 2009/Sep 07 2009/250 1.89 × 1.15 (128.5) 190 - 360 250 - 580 290 - 600 210 - 440

*: We do not include the data of the epoch 2008/273 for the astrometric analysis (Sect. 2). **:In the column of T_{sys}, we list the minimum and the maximum of T_{sys} during the observation at each station and in each epoch.

al. 1994), a sub-millimeter wavelength source JCMTSF J060907.1+215037 (Di Francesco et al. 2008), a near infrared (NIR) cluster GL 5182, the C^{18}O line emission (Saito et al. 2007). Moreover, this region shows the H_2O maser emission (Kömpe et al. 1989). Thus the structure and the kinematics of a molecular gas around this region have been well studied with high spatial resolution observations. Especially, Motogi et al. (2008) found the bipolar morphology and the expanding motion suggested by the relative proper motion measurement of H_2O masers with the Japanese VLBI Network (JVN: the maximum angular resolution is about 1 mas at 22 GHz). The photometric distance to the Gemini OB1 cloud complex was measured by the previous studies, and the distance range was from 1.5 kpc to 3.5 kpc (Carpenter et al. 1995; Humphreys 1978; Moffat et al. 1979). IRAS 06058+2138 whose parallax distance has already been measured as approximately 2 kpc by VLBI observation, is known to be located in the Perseus spiral arm and located near IRAS 06061+2151 on the celestial sphere. Therefore, although the uncertainty of the photometric distance is much larger, there is a possibility that IRAS 06061+2151 may also be located in the Perseus spiral arm.

In this paper, we report on the result of the annual parallax measurement of the H_2O maser source in IRAS 06061+2151 with VERA, and discuss the motion in the Galaxy.

2. VLBI observations with VERA

VERA observations of the H_2O maser source (6_{16} −5_{23}, 22235.080 MHz) associated with IRAS 06061+2151 have been carried out since 2007 October to 2009 September at 2- to 3-month intervals. We present the results from a total of 11 observing epochs: 2007/296, 2007/349, 2008/046, 2008/111, 2008/167, 2008/273, 2008/307, 2008/349, 2009/046, 2009/131, and 2009/250; hereafter an observing epoch is denoted by year/day of the year (DOY). All 4 VERA stations, providing a maximum baseline length of

2270 km, participated in 10 epochs, but only 3 VERA stations (Mizusawa, Ogasawara, and Ishigakijima: see Figure 1 of Petrov et al. (2007)) participated in the 2008/273 epoch. Therefore, we do not include the data of the epoch 2008/273 in order to conduct a more accurate astrometric analysis.

Observations were made in the dual-beam mode and we observed simultaneously (Kawaguchi et al. 2000; Honma et al. 2008a) the H_2O maser source in IRAS 06061+2151 (J2000.0 α = 06^h09^m06.^s97458 ± 0.^s006, δ = +21^∘50^′41.^{′′}4045 ± 0.^{′′}05; Migenes et al. 1999), and the reference source J0603+2159 (J2000.0 α = 06^h03^m51.^s55709±0.^s00008, δ = +21^∘59^′37.^{′′}6976±0.^{′′}0035; Fey et al. 2004). The separation angle between those two was 1.^∘22. J0603+2159 was detected with a peak flux density ranging from about 60 to 140 mJy beam^{−1} throughout all epochs. Left-handed circular polarization was received and sampled with 2-bit quantization and filtered using the VERA digital filter unit (Iguchi et al. 2005). The data were recorded onto magnetic tapes at a rate of 1024 Mbps, providing a total bandwidth of 256 MHz which was divided into 16 IF channels (16 MHz each). 8 MHz of the one IF was assigned to IRAS 06061+2151 and the other 15 IFs were assigned to J0603+2159. A bright continuum source, DA193, was observed every 90 minutes for bandpass and delay calibration. The system noise temperatures (T_{sys}) including atmospheric attenuation were depending on the weather conditions and the elevation angle of the observed sources. We list the value of T_{sys}^1 as well as the typical synthesized beam sizes (major and minor axes) and their position angles at all epochs in Table 1. The aperture efficiencies of the antennas ranged from 45 to 52 %, depending on the stations (see, the VERA status report^2). A variation of the aperture efficiency of each antenna as a function of the elevation angle was confirmed to be less than 10 %, even at the lowest elevation in the

1 We list the minimum and the maximum of T_{sys} during the observation at the each station and the each epoch in Table 1.

2 http://veraserver.mtk.nao.ac.jp/restricted/CFP2009/status09.pdf

Fig. 1. The phase-referenced map of the maser spot at vLSR = −7.795 km s^{−1} in three epochs. Epochs when the maser spot was observed and the ratio of the maser spot size whose flux has more than 30% of brightest component in the map to beam size are shown on the top of each map, as ’DOY (spot size)’. The most right figure was not included in our result because spot size of the maser spot exceeds the threshold for conducting an astrometric analysis in the presented study (see Sect. 4.1, and 5.1).

observations (∼20^∘). Correlation processing was carried out on the Mitaka FX correlator (Chikada et al. 1991) on the NAOJ Mitaka campus. For H_2O maser lines, the spectral resolution was set at 15.625 kHz, corresponding to a velocity resolution of 0.21 km s^{−1}. So, the bandwidth of 8 MHz corresponds to the velocity coverage of 107.5 km s^{−1}.

3. Data reduction with VEDA

We conducted the data reduction with the software package VERA Data Analyzer (VEDA). VEDA has been developed for the astrometric analysis of data observed with the VERA dual-beam system by the software development group in Mizusawa VLBI observatory of NAOJ.

At first we conducted the averaging of time and frequency for the data of the position reference source J0603+2159 in order to reduce the data size. After data averaging, we carried out the amplitude calibration and the bandpass calibration for the maser source in IRAS 06061+2151 and J0603+2159 independently. The amplitude calibrations were performed based on the (T_{sys}) data monitored during the scan. The bandpass calibrations were performed utilizing auto-correlation spectra of the blank sky data and the bright calibrator source (DA193).

The fringe search was conducted with the visibility data of the fringe finder DA193 in order to determine the delay and the delay-rate offset. Next the fringes were searched for J0603+2159 by utilizing the station solution determined by DA193, and the image of J0603+2159 was obtained by the deconvolution (CLEAN) and the selfcalibration algorithm.

The absolute position of the maser source was obtained by applying the phase solutions of J0603+2159 to the maser source (phase-referencing method). For the maser source, the Doppler tracking were made. Finally, we made images for each velocity channels, which were selected so that LSR velocities of maser features reported in Motogi et al. (2008) are fully covered, in order to search for maser spots. Each of the velocity channels was imaged with a field of view of 2^{′′} × 2^{′′} with 1024 grids × 1024 grids by CLEAN with a threshold for signal to noise ratio of 7 (7σ detection limit). For each detected maser spot, the images of 10 mas × 10 mas were obtained with 512 grids × 512 grids.

After the imaging process, we conducted the astrometric analysis using the result of phase-referenced analysis. For the astrometric analysis, the maser spots without extended structures should be selected so as to accurately determine the position. So, we can set the threshold for the structure of maser spot using the parameter ”spot size” with VEDA. The spot size is defined as the ratio of an area whose flux is larger than 30 % of the peak flux density to the synthesized beam size. We set the limit of 5.0 for the spot size in imaging process, so the maser spots whose size extend beyond 5.0 times the beam size were rejected. As an example, we show channel maps of the same spot detected with a different spot size at several epochs in Figure 1. We discussed the details of the spot size in Sect. 5.1.

4. Results

The cross-power spectrum of the H_2O masers toward IRAS 06061+2151 from 2007/296 to 2009/250 with Mizusawa–Ishigakijima baseline (2270 km) are shown in Figure 2. The component around v_{LSR} = −8 km s^{−1} showed the stable emission through the entire epoch. The systemic velocity (v_{sys}) of IRAS 06061+2151 is −1.6 ± 0.2 km s^{−1}, which is obtained by^{12}CO observations of IRAS sources (Wouterloot et al. 1989). In total we detected 142 maser spots whose LSR velocities are ranged from −19.2 km s^{−1} to 4.4 km s^{−1}, and their spatial distributions are shown in Figure 3. The maser spots are distributed over an area of 300 mas × 600 mas. Their distribution shows three groups, the northern, middle, and southern. The red-shifted components with respect to v_{sys}, are included in only the northern and middle groups, and blue-shifted components are concentrated in the southern group. This is consistent with the distribution reported by (Motogi et al. 2008). And these spots are located in 4.^{′′}6 southeast of the peak position of sub-millimeter source (SCUBA 850 μm image was derived from the Canadian Astronomy Data Centre), and at the same position within 0.^{′′}2 as the peak of the 8.4 GHz continuum source observed using VLA B-configuration (Kurtz et al. 1994).

Fig. 2. Scalar averaged cross power spectra of H_2O maser emission toward IRAS 06061+2151 obtained using VERA. The spectra are integrated for 900 s at the Mizusawa-Ishigakijima baseline. The dashed line indicates the systemic velocity of -1.6 km s^{−1} (Wouterloot et al. 1989).

4.1. Measurements of the Annual Parallax

We used the 11 maser spots for a parallax measurement (see Sect. 5.1 for details). They were selected as they were detected during at least 6 epochs and their size was less than 2.5. The least square method was utilized for fitting the movement of each maser spot throughout the observing epochs to obtain the sinusoidal parallax curve and the linear proper motion represented by following equations (Green 1985);

α = α_0 + μ_αt + πF_α δ = δ_0 + μ_δt + πF_δ

where, (α_0, δ_0) is the position at t = 0, π is the annual parallax, (F_α, F_δ ) are sinusoidal functions of direction and time describing the parallax ellipse, and (μ_α, μ_δ) are proper motions in RA and Decl. respectively, t is the interval in years from the standard epochs.

We conducted a combined parallax fit, in which the positions of 11 spots are fitted simultaneously with one common parallax but different proper motions and position offsets for each spot. As the result of this fit, the annual parallax of 0.496 ± 0.031 mas corresponding to a distance of 2.02^{+0.13}_{−0.12} kpc was obtained (see Table 2, Figure 4). Besides, the absolute proper motions of 11 maser spots are indicated in Figure 3 as black arrows. In the fitting process, we obtained the position uncertainties (post-fit residuals) of 0.181 mas in RA direction, and 0.183 mas in Decl. direction, which are added to make the reduced χ^2 to be approximately unity. The distance to IRAS 06061+2151 was determined directly with very high accuracy of 6.3 %.

Here we prove that the error bars of 0.181 and 0.183 in RA and Decl., respectively are reasonable if we consider the uncertainties in astrometry. Possible errors in absolute position of the target are: a zenith atmospheric delay offset at each station, station position error (baseline error), and the thermal noise error. A zenith atmospheric delay offset at each station is caused by a difference in the optical path length (Δl) between two sources (target source–position reference source). The range of the elevation angle during our observations were between 30^∘ and 80^∘. Given the mean zenith angle of observed sources of 55^∘, the zenith atmospheric delay residual of 3 cm error, and separation of the zenith angles between two sources of 1.^∘22, we can estimate Δl to be 1.59 mm (Honma et al. 2007, 2008b; Nakagawa et al. 2008). The positional error of 144 μas due to this effect is derived from Δl/B_{max}, where B_{max} is the maximum baseline length of VERA. The station position error was estimated to be 6 μas for a separation angle of 1.^∘22, assuming that the position accuracy of 3 mm in each station, based on geodetic observations at the S and X bands (Jike et al. 2009). The thermal error due to noise was estimated to be 9 μas by dividing the half width of the synthesized beam size (θ_b) by the SNR of phase referenced image. We used θ_b = 1.8 mas as the typical synthesized beam size (see Table 1) and SNR = 100 as the averaged SNR of phase referenced image of maser spots used for astrometric analysis. We note that the post-fit residual, which we obtained by the least-square fit of annual parallax is consistent with the sum of these estimated uncertainties.

5. Discussion & conclusions

5.1. Spot size

In this section, we discuss the parameter ”spot size” defined with VEDA (see in Sect. 3). The spot size of each maser spot depends not only on the maser structure

No. ] Astrometry of IRAS 06061+2151 5

Fig. 3. 850 μm SCUBA image (gray scale), the yellow cross indicates the center position of 8.4 GHz continuum image observed with VLA B-configuration (Kurtz et al. 1994), and the distribution of the H_2O maser spots. 11 maser spots used for an astrometric analysis are displayed with open circles and their absolute proper motion with arrows. Since they are close one another and they overlaps in this map.

Table 2. The parallaxes and the absolute proper motions of each maser spot

Spot ID v_{LSR} Position offset^a [mas] Annual parallax^b [mas] Absolute proper motion [mas yr^{−1}] Detected Epoch^c N^d_{epochs} Δα cosδ Δδ μ_α cosδ μ_δ 1 -9.480 -0.325(0.134) -0.040(0.132) 0.518 ± 0.084 0.11 ± 0.12 −4.04 ± 0.10 1111*111** 7 2 -9.269 -0.269(0.197) -0.054(0.186) 0.539 ± 0.119 −0.07 ± 0.15 −3.88 ± 0.12 1111*1111* 8 3 -9.059 -0.171(0.190) -0.045(0.200) 0.533 ± 0.114 −0.01 ± 0.14 −3.88 ± 0.13 1111*1111* 8 4 -8.848 -0.081(0.173) -0.032(0.194) 0.522 ± 0.102 −0.14 ± 0.13 −3.88 ± 0.13 111111111* 9 5 -8.637 -0.033(0.173) -0.012(0.191) 0.495 ± 0.103 −0.19 ± 0.13 −3.89 ± 0.12 111111111* 9 6 -8.427 -0.001(0.185) -0.005(0.185) 0.481 ± 0.110 −0.21 ± 0.14 −3.90 ± 0.12 111111111* 9 7 -8.216 0.024(0.188) 0.013(0.169) 0.473 ± 0.111 −0.20 ± 0.14 −3.92 ± 0.11 111111111* 9 8 -8.005 0.049(0.175) 0.025(0.156) 0.466 ± 0.103 −0.14 ± 0.13 −3.92 ± 0.10 111111111* 9 9 -7.795 0.050(0.181) 0.060(0.144) 0.416 ± 0.116 −0.07 ± 0.18 −4.01 ± 0.12 111111*1** 7 10 -7.584 0.114(0.196) 0.119(0.145) 0.419 ± 0.137 −0.05 ± 0.27 −3.92 ± 0.18 111111**** 6 11 -7.373 18.435(0.129) 12.334(0.276) 0.641 ± 0.120 −0.12 ± 0.12 −3.75 ± 0.19 111***111* 6 combined fit (0.181) (0.183) 0.496 ± 0.031 –

a: ”Position offset” are offsets from the reference position which was set to be α = 06^h09^m06.^s970593, δ = +21^∘50^′41.^{′′}204897 (J2000.0). We determined this coordinate so that the position offset of the strongest maser spot in 2007/296 is (0, 0). Positions are those observed at the epoch detected for the first time, as noted in the ”Detected Epochs”. Numbers in parentheses represent the uncertainty. b: The results were obtained from the RA–Decl. parallax fit.

c: Each digit shows the detected epochs of the maser spots corresponding to 2007/296, 2007/349, 2008/046, 2008/111, 2008/167, 2008/307, 2008/349, 2009/046, 2009/131, and 2009/250 respectively. ”1” means that the maser spot was detected, and ”*” means non-detection. d: Total number of detected epochs.

but on the signal to noise ratio (SNR) of the brightest component in the map. Even if the maser spot has no structures, low SNR causes an increase of the spot size. In order to conduct an analysis of astrometric measurement with higher accuracy, the maser spots which have no structures and whose SNRs are substantially high, should be selected. By utilizing the maser spots which falls below the threshold for the spot size, it is possible to conduct an analysis of astrometric measurement with the maser spots which have no structures, or are very bright.

Fig. 4. Movements of the 11 maser spots and the results of the least square fit for each maser spot in IRAS 06061+2151. Each panel shows as follows; (a) shows the displacement of RA offset against day of year (DOY) from 2007/250, (b) shows the displacement of RA offset removed the best fit proper motion from (a), (c) shows the displacement of Decl. offset against day of year (DOY) from 2007/250, and (d) shows the displacement of Decl. offset removed the best fit proper motion from (c), respectively. To clarify, the data for each spot were added small offset (-0.5 – -32.0 mas) vertically. The Spot ID of each maser spots is labeled in Table 2 and shown in the most left panel. The error bars represent the position uncertainties resulting from systematic errors which are given to make the reduced χ^2 to be ∼ 1.

In this paper, we used the maser spots which were detected at more than 6 epochs, and whose spot size is less than 2.5 for astrometric analysis. On the other hand, we also conducted a combined parallax fit for 13 maser spots which were also detected at more than 6 epochs, and their spot sizes were less than 5.0. As the result of the latter analysis, we obtained the annual parallax of 0.511 ± 0.029 mas. Comparing the former result with the latter, we found no significant difference. In the analysis of this study, there is little difference in the number of maser spots which were used for analysis with between former and latter conditions, because of the high threshold set for the number of detected epochs in which the maser spots were detected in this analysis. Although various values were also used to set the limit for the number of detected epochs and the spot size, we could not find the result that the structure of the maser spots adversely affects astrometric accuracy. The astrometric accuracy in present results of this source completely depends on the amount of statistics.

However, if the spot size of maser spot exceeds 3.0, several components appear around the brightest component as seen in the most right figure of Figure 1. In the case of this map, there would be no effect on the astrometric analysis because it is possible to distinguish the brightest component from other components (the brightest one exists as a compact component). But if some components associated with the brightest component are seen in the map, such a maser spot would adversely affect the astrometric result and its accuracy. So, we have to confirm the shape of maser spots in the phase referenced map to determine whether each maser spot has a structure which affects the astrometric result, or not. Only if we set a limit of 2.5 for the spot size such as in the present study, only compact maser spots are used for the astrometric analysis as seen in the left and middle maps of Figure 1.

5.2. Motion of IRAS 06061+2151

The systematic motion of maser source is affected by its internal structure motions. In order to reduce their effects, we first calculated the un-weighted mean of the proper motions of the 11 maser spots in Table 2, and derived the mean proper motion to be (μ_α cos δ, μ_δ) = (−0.10±0.10, −3.91±0.07) mas yr^{−1}. Here, we calculated the standard deviation of the proper motions of 11 maser spots as the uncertainty of this mean proper motion. In order to obtain the proper motion in the Galactic coordinate, the tracking center position of IRAS 06061+2151 and the position added the mean proper motion values to the Galactic coordinate. We obtained the proper motion with respect to LSR in the Galactic coordinate to be (μ_l, μ_b) = (3.37 ± 0.01, −1.98 ± 0.12) mas yr^{−1} by the difference of them. Given the source distance of 2.02 kpc, the proper motions (μ_l, μ_b) correspond to a velocity of (v_l, v_b) = (32.20 ± 0.12, −18.92 ± 1.14) km s^{−1}. Also, the systemic velocity of −1.6 ± 0.2 km s^{−1} derived from^{12}CO observation was used as the radial velocity of this source.

In order to convert v_{LSR} = −1.6 ± 0.2 km s^{−1} to a heliocentric frame, v_{helio}, we used the following equation with the standard solar motion values (U^{std}_⊙ , V^{std}_⊙ , W^{std}_⊙ ) = (10.3, 15.3, 7.7) km s^{−1} (see the appendix of Reid et al. 2009b).

v_{helio} = v_{LSR} − (U^{std}_⊙ cosl + V^{std}_⊙ sinl)cosb − W^{std}_⊙ sinb

Table 3. The peculiar velocity of of IRAS 06061+2151

Galactic and solar motion parameters Peculiar velocity References of Θ_0 R_0 U_p V_p W_p solar motion parameters^∗ [km s^{−1}] [kpc] [km s^{−1}] [km s^{−1}] [km s^{−1}] Dehnen & Binney (1998) 220 8.5 9.6 ± 0.7 −28.5 ± 2.3 −11.6 ± 1.6 236 ± 15 8.0 ± 0.5 10.4 ± 0.9 −28.5 ± 2.3 −11.6 ± 1.6

Schönrich et al. (2010) 220 8.5 10.9 ± 0.9 −21.6 ± 2.2 −11.5 ± 1.6 236 ± 15 8.0 ± 0.5 11.7 ± 1.1 −21.6 ± 2.2 −11.5 ± 1.6

Standard solar motion values 220 8.5 10.2 ± 0.6 −18.5 ± 2.2 −11.0 ± 1.5 236 ± 15 8.0 ± 0.5 11.0 ± 0.8 −18.5 ± 2.2 −11.0 ± 1.5

*See Sect. 5.2

As the result of this calculation, we obtained v_{helio} to be 10.8 km s^{−1}.

Next, to discuss about the Galactic 3-dimensional motions, we used the solar motion values of (U_⊙, V_⊙, W_⊙) = (10.0±0.36, 5.25±0.62, 7.17±0.38) km s^{−1}, derived from Hipparcos data by Dehnen & Binney (1998), R_0 = 8.5 kpc as the distance of the Sun to the Galactic center, and Θ_0 =220 km s^{−1} as the rotation speed of the LSR. Also, we assume a flat rotation which means the rotation speed at the position of the target source Θ(R) = Θ_0, where R is the distance from the target source to the Galactic center (in the case of IRAS 06061+2151, R = 10.5 kpc). As a result of calculations using these observed and assumed parameters, we found that IRAS 06061+2151 implies peculiar motions of (U_p, V_p, W_p) = (9.60 ± 0.67, −28.50 ± 2.26, −11.56 ± 1.55) km s^{−1}. where U_p is peculiar motion of a star toward the Galactic center, V_p is peculiar motion of a star in the direction of the Galactic rotation, and W_p is peculiar motion toward the North Galactic Pole. With this calculation using the Galactic parameters assumed above, IRAS 06061+2151 showed a peculiar motion of larger than 28 km s^{−1} counter to the Galactic rotation. In order to confirm whether this peculiar motion was caused by the model of the Galactic rotation or not, we re-calculated the peculiar motion of IRAS 06061+2151 by using the solar motion of (U_⊙, V_⊙, W_⊙) = (10.3, 15.3, 7.7) and (11.10^{+0.69}_{−0.75}, 12.24^{+0.47}_{−0.47}, 7.25^{+0.37}_{−0.36}) km s^{−1} (Schönrich et al. 2010), R_0 = 8.0 ± 0.5 kpc (Reid 1993), and Θ_0 = 236 ± 15 km s^{−1} (Reid & Brunthaler 2004). We list the result of recalculation of the peculiar velocity components in Table 3. Though the Galactic parameters were variously changed, the motion of IRAS 06061+2151 counter to the Galactic rotation was larger than 17.0 km s^{−1}. Therefore, we suggest that IRAS 06061+2151 orbits the Galaxy slower than its rotation.

The peculiar motions of several sources which are located in the Perseus spiral arm are shown in Table 4. The parallaxes and the proper motions of these sources have already been measured by previous studies. We calculated (U_p, V_p, W_p) of each source using R_0 = 8.5 kpc, Θ_0 = 220 km s^{−1} , (U_⊙,V_⊙,W_⊙) = (10.0±0.36, 5.25±0.62, 7.17 ± 0.38) km s^{−1} and the parameters of each source already reported (Moellenbrock et al. 2009; Moscadelli et al. 2009; Oh et al. 2010; Reid et al. 2009a; Sato et al. 2008; Xu et al. 2006). We used the systemic velocities derived from CO and HCO^+ observations (Torrelles et al. 1987; Wouterloot et al. 1989; Molinari et al. 2002; Lee & Jung 2003) as the radial velocity for H_2O maser sources, because the line width of H_2O maser sources is generally very broad (from a few tens of km s^{−1} to 100 km s^{−1}). Six sources (IRAS 06061+2151, IRAS 06058+2138, AFGL2789, W3OH, NGC7538, IRAS00420+5530) orbit the Galaxy at least 15 km s^{−1} slower than the expected Galactic rotation, and they move at on average 27 km s^{−1} toward the Galactic center and counter to the Galactic rotation.

We note that NGC 281 does not show this peculiar motion, this would be because that NGC 281 is slightly offset from the Galactic plane and is associated with an expanding super-bubble (Sato et al. 2008). Thus, the result of our observation of IRAS 06061+2151 would be consistent with the conclusion that previous studies imply a noncircular rotation of the Perseus spiral arm.

We thank an anonymous referee for careful reading, and valuable comments. We are also extremely grateful to the staff of all the VERA stations for their assistance in observations. This research used the facilities of the Canadian Astronomy Data Centre operated by the the National Research Council of Canada with the support of the Canadian Space Agency, and the SIMBAD database operated at CDS, Strasbourg, France.

References

Carpenter, J. M., Snell, R. L., and Schloerb, F. P., 1995, ApJ, 445, 246 Choi, Y. K., et al., 2008, PASJ, 60, 1007 Chikada, Y., et al., 1991, in Frontiers of VLBI, ed. H.

Hirabayashi, M. Inoue, & H. Kobayashi (Tokyo: Universal Academy Press), 79 Dehnen, W., Binney, J. J., 1998, MNRAS, 298, 387 Di Francesco, J., Johnstone, D., Kirk, H., et al., 2008, ApJS, 175, 277 Fey, A. L., Ma, C., Arias, E. F., et al. 2004, AJ, 127, 3587

8 K. Niinuma et al. [Vol. ,

Table 4. The peculiar motions of seven sources in the Perseus spiral arm

Source D l b U_p V_p W_p maser emission Ref.* [kpc] [deg] [deg] [km s^{−1}] [km s^{−1}] [km s^{−1}] IRAS 06061+2151 2.05^{+0.13}_{−0.12} 188.79 1.03 9.6 ± 0.7 −28.5 ± 2.3 −11.6 ± 1.6 H_2O This paper IRAS 06058+2138 1.76^{+0.11}_{−0.11} 188.95 0.89 3.9 ± 1.0 −21.3 ± 6.2 4.0 ± 4.4 H_2O 1 2.10^{+0.03}_{−0.03} −4.4 ± 3.0 −15.7 ± 0.9 −2.0 ± 0.5 CH_3OH 2 AFGL2789 3.07^{+0.30}_{−0.30} 94.60 -1.80 14.0 ± 3.3 −33.5 ± 3.3 −11.0 ± 4.4 H_2O 1 W3OH 1.95^{+0.04}_{−0.04} 133.95 1.06 22.8 ± 2.4 −17.9 ± 2.0 1.0 ± 0.4 CH_3OH 3 NGC7538 2.65^{+0.12}_{−0.11} 111.54 0.78 24.2 ± 1.9 −29.4 ± 2.8 −10.9 ± 1.1 CH_3OH 4 IRAS 00420+5530 2.17^{+0.05}_{−0.05} 122.02 -7.07 25.5 ± 2.1 −20.6 ± 2.3 6.1 ± 0.7 H_2O 5 NGC281 2.82^{+0.24}_{−0.24} 123.07 -6.31 11.4 ± 3.9 −0.7 ± 4.2 −13.6 ± 2.5 H_2O 6

*References are 1:Oh et al. (2010), 2:Reid et al. (2009a), 3:Xu et al. (2006), 4:Moscadelli et al. (2009), 5:Moellenbrock et al. (2009), 6:Sato et al. (2008)

Green, M. R. 1985, Spherical Astronomy (Cambridge

University Press), 339 Hachisuka, K., Brunthaler, A., Menten, K. M., et al., 2006,

645, 337 Hachisuka, K., Brunthaler, A., Menten, K. M., et al., 2009,

696, 1981 Hirota, T., et al., 2008a, PASJ, 60, 37 Hirota, T., et al., 2008b, PASJ, 60, 961 Hirota, T., et al., 2007, PASJ, 59, 897 Honma, M., et al., 2007, PASJ, 59, 889 Honma, M., et al., 2008a, PASJ, 60, 935 Honma, M., Tamura, Y., Reid, M. J., 2008b, PASJ60, 951 Humphreys, R. M., 1978, ApJS, 38, 309 Iguchi, S., Kurayama, T., Kawaguchi, N., Kawakami, K., 2005,

PASJ, 57, 259 Imai, H., et al., 2007, PASJ, 59, 1107 Jike, T., Manabe, S., and Tamura, Y., 2009, Journal of the

Geodetic Society of Japan, 55, 369 Kawaguchi, N., Sasao, T., Manabe, S., 2000, Proc. SPIE, 4015, 511 Kobayashi, H., et al., 2008, in IAU Symp. 248, 148 Kömpe, C., Joncas, G., Baudry, A., and Wouterloot, J. G. A.,

1989, A&A, 221, 295 Kurtz, S., Churchwell, E., Wood, D. O. S., 1994, ApJS, 91, 659 Lee, Y., & Jung, J-H, 2003, New Astron., 8, 191 Migenes, V., Horiuchi, S., Slysh, V. I., et al. 1999, ApJS, 123, 487 Moellenbrock, G. A., Claussen, M. J., Goss, W. M., 2009, ApJ,

694, 192 Moffat, A. F. J., Jackson, P. D., Fitzgerald, M. P., 1979,

A&AS, 38, 197 Molinari, S., Testi, L., Rodríguez, L., and Zhang, Q., ApJ,

570, 758 Moscadelli, L., Reid, M. J., Menten, K. M., et al., 2009, ApJ,

693, 406 Motogi, K., Watanabe, Y., Sorai, K., et al., 2008, MNRAS,

390, 523 Nakagawa, A., et al., 2008 PASJ, 60, 1013 Oh, C. S., Kobayashi, H., Honma, M., et al., 2010, PASJ, 62, 101 Petrov, L., Hirota, T., Honma, M., et al. 2007, AJ, 133, 2487 Reid, J. M., 1993, ARA&A, 31, 345 Reid, J. M., & Brunthaler, A., 2004, ApJ, 616, 872 Reid, J. M., et al., 2009a, ApJ, 693, 397 Reid, J. M., et al., 2009b, ApJ, 700, 137 Saito, H., Saito, M., Sunada, K., Yonekura, Y., 2007, ApJ,

659, 459 Sato, M., et al., 2010, PASJ, 62, 287

Sato, M., et al., 2008, PASJ, 60, 975 Schönrich R., Binney J., Dehnen W., 2010, MNRAS, 403, 1829 Torrelles, J. M., Anglada, G., Rodríguez, L. F., Cantò, J., & Barral, J. F. 1987, A&A, 177, 171 Wouterloot, J. G. A., Brand, J., 1989, A&AS, 80, 149 Xu, Y., Reid, M. J., Zheng, X. W., Menten, K. M., 2006, Science, 311, 54