arXiv:0909.2535v1 [astro-ph.CO] 14 Sep 2009

Accepted 2009 July 17; Astrophysical Journal in press Preprint typeset using L^ATEX style emulateapj v. 03/07/07

SPECTROSCOPIC IDENTIFICATIONS OF SPITZER SOURCES IN THE SWIRE/XMM-NEWTON /ELAIS-S1 FIELD: A LARGE FRACTION OF ACTIVE GALACTIC NUCLEI WITH HIGH F (24 μm)/F (R) RATIO

N. Sacchi^{1,2}, F. La Franca^1, C. Feruglio^{3,4}, F. Fiore^3, S. Puccetti^5, F. Cocchia^3, S. Berta^6, M. Brusa^6, A. Cimatti^7, A. Comastri^8, A. Franceschini^9, C. Gruppioni^8, R. Maiolino^3, I. Matute^{1,10}, M. Polletta^{11}, L.

Pozzetti^8, F. Pozzi^7, C. Vignali^7, G. Zamorani^8, S. Oliver^{12}, M. Rowan-Robinson^{13}, G. Smith^{14}, C. Lonsdale^{15} Accepted 2009 July 17; Astrophysical Journal in press

ABSTRACT We present a catalog of optical spectroscopic identifications of sources detected by Spitzer at 3.6 or 24 μm down to ∼10 and ∼280 μJy, respectively, in the SWIRE/XMM-Newton/ELAIS-S1 field and classified via line width analysis and diagnostic diagrams. A total of 1376 sources down to R ∼ 24.2 mag have been identified (1362 detected at 3.6 μm, 419 at 24 μm, and 405 at both) by low-resolution optical spectroscopy carried out with FORS2, VIMOS, and EFOSC2 at the Very Large Telescope and 3.6m ESO telescopes. The spectroscopic campaigns have been carried out over the central 0.6 deg^2 area of ELAIS-S1 which, in particular, has also been observed by XMM-Newton and Chandra. We find the first direct optical spectroscopic evidence that the fraction of active galactic nuclei (AGN; mostly AGN2) increases with increasing F (24 μm)/F (R) ratio, reaching values of 70(±20)% in the range 316<F (24 μm)/F (R)<1000. We present an Infrared Array Camera–Multiband Imaging Photometer color–color diagram able to separate AGN1 from obscured AGN2 candidates. After having corrected for the spectroscopic incompleteness of our sample, it results that the AGN fraction at F (24 μm)∼0.8 mJy is ∼22(±7)% and decreases slowly to ∼19(±5)% down to F (24 μm)∼0.3 mJy. Subject headings: galaxies: active – infrared: galaxies – surveys

1. INTRODUCTION

Multi-wavelength surveys are fundamental instruments to study the cosmological evolution of extragalactic sources. Each region of the electromagnetic spectrum provides information on different physical mechanisms which take place in the galaxies. The emission in the mid-infrared (MIR) band is mainly produced by dust heated either by the stars (particularly during periods of strong star formation activity) or by the emission originating in an active galactic nucleus (AGN). In several cases, both causes contribute to the formation of the to-

1 Dipartimento di Fisica, Università Roma Tre, via della Vasca Navale 84, I-00146 Roma, Italy; email: sacchi@fis.uniroma3.it,

lafranca@fis.uniroma3.it

2 TNG Fundación Galileo Galilei - INAF, Rambla José Ana Fernández Pérez 7, 38712 Breña Baja, TF - Spain

3 INAF-Osservatorio Astronomico di Roma, via Frascati 33, I- 00040, Monteporzio Catone, Italy

4 CEA, Irfu, Service d’Astrophysique, Centre de Saclay, F-91191 Gif-sur-Yvette, France

5 ASI Science Data Center, via G. Galilei, I-00044 Frascati, Italy 6 Max Planck Institut für Extraterrestrische Physik, Giessenbachstrasse 1, D-85748 Garching, Germany

7 Dipartimento di Astronomia, Università di Bologna, via Ranzani 1, I-40127 Bologna, Italy

8 INAF-Osservatorio Astronomico di Bologna, via Ranzani 1, I- 40127 Bologna, Italy

9 Dipartimento di Astronomia, Università di Padova, vicolo dell’Osservatorio 2, I-35122 Padova, Italy

10 INAF-Osservatorio Astronomico di Arcetri, largo E. Fermi 5, I-50125 Firenze, Italy

11 INAF-IASF Milano, via E. Bassini 15, I-20133 Milano, Italy 12 Astronomy Centre, Department of Physics and Astronomy, University of Sussex, Falmer, Brighton BN1 9QJ, UK

13 Astrophysics Group, Blackett Laboratory, Imperial College of Science Technology and Medicine, Prince Consort Road, London SW7 2BZ, UK

14 Center for Astrophysics and Space Sciences, University of California, San Diego, La Jolla, CA 92093-0424, USA

15 Infrared Processing and Analysis Center, California Institute of Technology 100-22, Pasadena, CA 91125, USA

tal spectral energy distribution (SED) in the MIR (see, e.g., Polletta et al. 2008; Donley et al. 2008 and references therein).

In recent years, XMM-Newton- and Chandra-based Xray surveys have been able to delineate the density and evolution of X-ray unabsorbed and even moderately absorbed AGN (Compton-thin; N_H =10^{22}-10^{24} cm^{−2}) up to redshift ∼4 (see, e.g., Ueda et al. 2003; La Franca et al. 2005). The fraction of absorbed AGN is observed to decrease with increasing luminosity (e.g., Ueda et al. 2003; La Franca et al. 2005; Hasinger 2008; see also Lawrence & Elvis 1982) and to increase with increasing redshift (La Franca et al. 2005; Ballantyne et al. 2006; Treister & Urry 2006; Hasinger 2008; Treister et al. 2009). In this framework, in order to reproduce the cosmic X-ray background, a population of heavily X-ray absorbed AGN (Compton-thick; CT) as numerous as the Compton-thin one is expected. Because of the strong X-ray absorption, these CT AGNs are difficult to select even in the X-ray band.

As the AGN (absorbed) activity is expected to contribute significantly to the MIR SED, observations in the MIR regime are potentially useful for selecting AGN, including those which are undetected in the X-ray band.

The launch of the Spitzer telescope has allowed the construction of several large area multi-wavelength databases with MIR coverage, such as (for example) the 9 deg^2 NOAO Deep Wide-Field Survey (NDWFS) of the Boötes field (Murray et al. 2005), the 3.7 deg^2 Extragalactic First Look Survey (E-FLS; Fadda et al. 2006) and the smaller 0.5 deg^2 of the All-Wavelength Extended Groth Strip International Survey (AEGIS; Davis et al. 2007). Indeed, the use of Spitzer colors has been revealed to be efficient (if not complete) in selecting AGN (e.g., Lacy et al. 2004, 2007; Stern et al. 2005). Using both Spitzer and X-ray observations, Brand et al.

2 SACCHI ET AL.

(2006), Treister et al. (2006), and Donley et al. (2008) have evaluated the fraction of AGN as a function of the 24 μm flux, which results in being around 30%-45% at ∼3 mJy, decreasing to about 10% at ∼0.4 mJy.

Many studies have shown evidence of the existence of X-ray absorbed (Compton-thick) Spitzer-selected AGN (e.g., Donley et al. 2005, 2007; Alonso-Herrero et al. 2006; Polletta et al. 2006; Steffen et al. 2007; Alexander et al. 2008). Maybe the most efficient criterion in selecting X-ray-absorbed AGN is based on selecting sources with large F (24 μm)/F (R) ratios, in some cases linked to radio observations (e.g., Martínez-Sansigre et al. 2005, 2007). Because of the faint optical fluxes these sources are difficult to spectroscopically identify in the optical, and, in fact, the AGN classifications for this class of objects are mainly based on MIR spectroscopy with the Infrared Spectrograph (IRS) on board Spitzer (e.g., Houck et al. 2005; Weedman et al. 2006; Yan et al 2007; Brand et al. 2008). Because of the low resolution of the IRS spectra, for many sources the classification and the redshift measure are derived from the identification of the 9.7 μm silicate absorption features on approximate power law spectral shapes.

Using stacked Chandra images of sources with large F (24 μm)/F (R) ratios, Daddi et al. (2007) and Fiore et al. (2008, 2009) have shown that the average X-ray spectrum can be reproduced if a high percentage (∼80%) of the sources in the sample are highly X-ray absorbed (even Compton-thick) AGN (but see Donley et al. (2008) and Pope et al. (2008) for partly different conclusions). This result is itself important for the understanding of AGN density evolution, but it needs to be complemented with a quantification of the real fraction of AGN among these sources. In fact, the above studies are mainly based on photometric redshifts and lack direct optical spectroscopic identifications and classifications. Such measurements are crucial in order to understand how much of the average resulting hard X-ray spectrum is diluted and/or contaminated by starburst galaxies included in the samples (see, e.g., Polletta et al. 2008; Donley et al. 2008).

Brand et al. (2007) have studied in the near IR the spectrum of 10 ULIRG sources with 24 μm fluxes larger than 0.8 mJy and large F (24 μm)/F (R) ratios and found that the SEDs were compatible with a mixed contribution of AGN and starburst activity. Studying the SED and MIR spectrum of 21 obscured AGNs with large F (24 μm)/F (R) ratios, and 24 μm fluxes larger than 1 mJy, Polletta et al. (2008) found that the contribution by the starburst component to the bolometric luminosity was below 20%.

Dey et al. (2008) have measured spectroscopic redshift for 86 very luminous dust-obscured galaxies with F (24 μm)>0.3 mJy and F (24 μm)/F (R)>1000 in the Boötes field, and find a broad redshift distribution centered at z ∼ 2. Roughly half the redshifts are the results of Spitzer IRS observations, and half come from groundbased optical or NIR spectroscopy. However, no optical spectral classification of the galaxies has been discussed in their work.

Here we present the optical spectroscopic identifications and classification of 1376 sources of the central 0.6 deg^2 of the ELAIS-S1 field included in the Spitzer Widearea Infrared Extragalactic Survey (SWIRE; Lonsdale et al. 2003, 2004) and then use our database to estimate the fraction of AGN as a function of the MIR flux and the F (24 μm)/F (R) ratio.

Throughout this work with “fraction of AGN”, we mean the fraction of extragalactic sources in which is possible to reveal, via optical line width analysis and diagnostic diagrams (see, e.g., Veilleux & Osterbrock 1987; Kewley et al. 2006), the presence of an active nucleus, regardless of its strength relative to the host galaxy. In the case of uncertain AGN signatures, we adopted a conservative approach. Our database allows the first direct estimate (using optical spectra) of the fraction of AGN among the sources with large (>316) F (24 μm)/F (R) ratios.

We adopt a flat cosmology with H_0 = 70 km s^{−1} Mpc^{−1}, Ω_M =0.30, and Ω_Λ=0.70. Magnitudes are given in the Vega system. Unless otherwise stated, uncertainties are quoted at the 68% (1σ) confidence level.

2. MULTI-WAVELENGTH DATABASE

The ELAIS-S1 field (center: α=00^h35^m00^s.0, δ=- 43^o30^′00^{′′}; J2000) is part of the SWIRE survey (Lonsdale et al. 2004) which is the largest Spitzer Legacy Program. SWIRE includes six high-latitude fields, totaling 49 deg^2 (∼7 of which on the ELAIS-S1 region) observed by Spitzer in four bands (3.6, 4.5, 5.8, and 8.0 μm) with the Infrared Array Camera (IRAC; Fazio et al. 2004), and in three bands (24, 70, and 160 μm) with the Multiband Imaging Photometer (MIPS; Rieke et al. 2004).

Originally the ELAIS-S1 field was selected as one of the four fields of the European Large Area ISO Survey (ELAIS) covering a total of 12 deg^2 at 15 μm (Oliver et al. 2000; Rowan-Robinson et al. 2004). The size of the ELAIS-S1 field is 4 deg^2 and the 15 μm catalog published by Lari et al. (2001) contains 329 extragalactic sources over the flux range 0.5 − 100 mJy. The imaging and spectroscopic identification and classification of the 15μm sources have been presented by La Franca et al. (2004; see also La Franca et al. 2007 and Gruppioni et al. 2008).

An area of 3.9 deg^2 is covered by radio observations obtained with Australian Telescope Compact Array (ATCA) down to S_{1.4−GHz} ≃ 30 μJy (1σ; Middelberg et al. 2008; see also Gruppioni et al. 1999). ELAIS-S1 is also one of the targets selected by the GALEX Deep Survey, which has deeply covered the central part of S1 in the far- and near-UV (Burgarella et al. 2005).

2.1. Spitzer data

The Spitzer/SWIRE observations in ELAIS-S1 cover a ∼7 deg^2 region larger than the whole 4 deg^2 ISO region, in all the IRAC and MIPS bands, reaching 5σ sensitivities of 3.7, 5.4, 48, 37.8, 230, 18×10^3, and 150×10^3 μJy in the 3.6, 4.5, 5.8, 8.0, 24, 70, and 160 μm channels, respectively (Lonsdale et al. 2004). The SWIRE data in ELAIS-S1 have been released to the community in autumn 2005 (Data Release 3, DR3) through the query building GATOR at the NASA/Infrared Science Archive^{16}. However, for the purposes of this work, we had access to the SWIRE working catalogs, which contain all of the sources in the public catalog, but reach deeper flux densities (on average about a factor

16 http://irsa.ipac.caltech.edu/applications/Gator/

A LARGE FRACTION OF AGN WITH HIGH F (24 μm)/F (R) RATIO 3

Fig. 1.— Position on sky of 3.6 μm (dots) and 24 μm (open squares) detected sources with a reliable redshift estimate. The circles indicate the area covered by the four XMM-Newton pointings. The dashed and dotted lines show the statistically useful areas of the 24 μm and 3.6 μm spectroscopic samples, respectively (see Section 3.1).

of 30% fainter). Details about the SWIRE data reduction, that was carried out by the Spitzer Science Center and SWIRE team, can be found in the Data Release paper (Surace et al. 2005). Details on the generation of the Spitzer band merged catalog can be found in Gruppioni et al. (2008).

While the original SWIRE/ELAIS-S1 field is ∼7 deg^2, here we concentrate on a central rectangular area, of 0.6 deg^2, with limits 8.21^∘<α<9.245^∘ and -43.91^∘<δ<- 43.116^∘ nearly including the four XMM-Newton observations of the area described by Puccetti et al. (2006) (see Figure 1). This area contains a total of 35021 sources detected by Spitzer, 32815 at 3.6 μm and 2056 at 24 μm (1920 have been detected in both bands). Because of their bright flux limits, we excluded from the catalog the MIPS measures at 70 and 160 μm.

2.2. Optical and NIR data

B, V , and R images, down to B ∼ 25, V ∼ 25, and R ∼ 24.5 (95% completeness) have been obtained with the WFI at the ESO 2.2m telescope within the framework of the ESO-Spitzer wide-area Imaging Survey (ESIS; Berta et al. 2006; PI: Alberto Franceschini), while about 1 deg^2 of ELAIS-S1 has been covered by deep K^′ and J bands exposures with SOFI at the ESO NTT telescope (I. Matute et al., in preparation). Recently, I- and z -band photometry, down to I ∼ 23 and z ∼ 22.5 (90% completeness), carried out with VIMOS at the Very Large Telescope (VLT), has been released (Berta et al. 2008).

2.3. X-ray band data

The first very shallow (∼10^{−13} cgs; 2-10 keV) X-ray band observations on the ELAIS-S1 area were carried out with BeppoSAX and presented by Alexander et al.

TABLE 1 Number of good-quality^a spectra

Period Instrument Total 3.6μm 24μm X&24μm

· · · 15μm Catal.^b 60 54 59 8 73-04 VIMOS 888 885 139 35 75-05 VIMOS 328 327 129 18 76-05 EFOSC2 20 19 12 3 77-06 FORS2-SLIT 11 11 11 6 78-06 FORS2-MOS 69 66 69 13

Total · · · 1376 1362 419 83

a We define as “good quality” those spectra with quality flag ≥1.5 (see section 3.5) b La Franca et al. (2004, 2007)

(2001). More recently, the central ∼0.6 deg^2 region of ELAIS-S1 has been surveyed in the X-ray band with XMM-Newton (four pointings of about 70 “useful” ks each) with 478 sources detected, 395 in the soft (0.5 − 2 keV) band down to a flux of 5.5 × 10^{−16} cgs and 205 in the hard (2 − 10 keV) band down to a flux of 2 × 10^{−15} cgs (Puccetti et al. 2006).

The regions with the highest XMM-Newton sensitivity (∼65% of the full XMM-Newton area) were later target of 165 ks Chandra observations, reaching on-axis sensitivities of 2 × 10^{−15} cgs (2-10 keV; S. Puccetti et al., in preparation), with the aim of obtaining precise positions for the X-ray sources.

3. OPTICAL SPECTROSCOPY

ELAIS-S1 was the target of several spectroscopic campaigns with ESO telescopes. The follow-up programs of the 15 μm ELAIS-S1 sources provided 60 identifications of R<22 sources within our investigated area (La Franca et al. 2004, 2007). In the period 2004-2006, five follow-up programs were accepted, with the aim of obtaining spectroscopic identifications for the XMM-Newton, 3.6 and 24 μm sources in the SWIRE/XMM-Newton/ELAIS-S1 area. The number of spectra obtained in each spectroscopic run is shown in Table 1.

3.1. VIMOS observations

Spectroscopic targets with a limiting magnitude of R ∼ 24 were observed with the VIsible MultiObject Spectrograph (VIMOS) at the VLT in multi-object spectroscopy (MOS) mode, with the Low Resolution Red (LRR) grism (λ/Δλ ∼ 210), covering the 5500-9500 Å wavelength range, with 1–4 hr exposure time per pointing, totaling 66 hr of observing time. VIMOS data reduction was carried out using the VIMOS Interactive Pipeline and Graphical Interface (VIPGI) developed by INAF Milano (Scodeggio et al. 2005). Two observing runs were carried out in the years 2004 and 2005. The first observing run was dedicated to identifying K-band and X-ray sources located in the western half of the area, as the SWIRE catalog was not yet available. The second run (as all the following runs) was dedicated to observing 24 μm and X-ray sources, while the 3.6 μm sources were used as fillers of the masks. The observations were carried out in the eastern half of the area, but unfortunately it was not possible to observe the southeastern corner (see Figure 1). In total 1473 spectra were collected: 1212

4 SACCHI ET AL.

of good quality (quality flag ≥1.5; see section 3.5 for a description of the quality flag).

3.2. EFOSC2 and FORS2 (long slit) observations

Four nights of visiting-mode observation in single-slit mode with EFOSC2 at the ESO-3.6m in La Silla allowed us to observe 20 optically bright (R<20) targets in the 4000-9000 Å wavelength range with grisms 6 and 13.

Twenty hours of observing time was allocated with FORS2 at the VLT in long-slit mode. A total of 12 good-quality spectra were obtained with the 150I grism (λ/Δλ ∼ 260), covering the wavelength range 3700- 10300 Å.

3.3. FORS2 (MOS) observations

Spectroscopy of 69 faint sources has been carried out with FORS2 at the VLT in 2006 in MOS (MOvable-Slit) mode, with 2.5 hr exposure times per pointing, corresponding to a total of 28 hr of observing time. The same grism setup of the FORS2 Long-Slit observations was used (see the previous section).

3.4. Data reduction

The reduction process used standard MIDAS and IRAF facilities, except for VIMOS data which required a specific software package (VIPGI; Scodeggio et al. 2005). The raw data were bias-subtracted, corrected for pixel-to-pixel variations (flat field), and eventually skysubtracted. Wavelength calibrations were carried out by comparison with exposures of He and Ar lamps. Relative flux calibration was carried out by observations of several spectrophotometric standard stars.

3.5. Classification

Spectroscopic redshifts were obtained using both the

rvidlines IRAF tool and an instrument-optimized MI-

DAS procedure, which allowed to compute the average of the redshifts corresponding to each measured line center. We assigned a quality flag to each redshift: [2] for the determinations based on at least two confirmed features (typically 3-4 or more absorption/emission lines besides the continuum shape), [1.5] for two very plausible features (besides the continuum shape), [1] for one clearly recognizable feature, [0.5] for tentative estimates of redshift. The spectroscopic catalogs we present include only highly reliable redshift estimates, with quality flag ≥ [1.5].

We classified the sources according to their optical spectral features in five broad classes.

• Broad-line AGN (AGN1): type-1 AGN with broad (FWHM > 2000 km s^{−1}) emission lines such as C IV λ1549, C III] λ1909, Mg II λ2798, Hβ, Hα. As a reference, in Figure 2, the composite spectrum of a sub-sample of 25 (1<z <3)^{17} type-1 AGN is shown.

• Narrow-line AGN (AGN2): type-2 AGN with narrow (FWHM < 2000 km s^{−1}) high-ionization emission lines (C IV λ1549, C III] λ1909, [Ne V]

17 These redshift and wavelength intervals were chosen in order to maximize the number of overlapping spectra.

Fig. 2.— Composite spectra of 25 AGN1 (1<z <3), 7 high (1.6<z <2.6) and 12 middle (0.8<z <1.2) redshift AGN2, and 20 ELG (0.6<z <1.2).

λ3426) or low-ionization ([O II] λ3727, Hβ, [O III] λλ5007, 4959, Hα, [S II] λ6725) emission lines with flux ratios indicating the presence of an AGN (e.g., Osterbrock 1989; Veilleux & Osterbrock 1987; Tresse et al. 1996). In Figure 2, the composite spectra of seven high (1.6<z <2.6) and 12 middle (0.8<z <1.2) redshift^{17} AGN2 are shown.

• Emission-line galaxies (ELG): sources with narrow emission lines, but no clear AGN signature in the optical spectra (see Figure 2). They show strong low-ionization emission lines that may be produced by thermal photons from hot stars. They often show also CaHK λλ3933, 3969 absorption and the continuum break at 4000 Å. This class is likely to include a fraction of NL AGN, possibly misclassified due to a small wavelength range (e.g., only [O II] λ3727 visible), low signal-to-noise ratio (S/N) spectra, or dilution by the host galaxy emission. In Figure 2, the composite spectrum of 20 middle (0.6<z <1.2) redshift^{17} ELG is shown.

• Absorption-line galaxies (GAL): sources with spectra typical of early-type galaxies, characterized by absorption features such as CaHK λλ3933, 3969 and strong 4000 Å continuum break.

• Stars: sources with stellar spectra (mainly of cold M-stars), characterized by a blackbody continuum and absorption features.

A LARGE FRACTION OF AGN WITH HIGH F (24 μm)/F (R) RATIO 5

TABLE 2 The spectroscopic catalog

ID_{ESIS} R.A. Decl. R z q cls ID_{SWIRE} S_{3.6μm} S_{24μm} ID_X [deg] [deg] [mag] [log(μJy)] [log(μJy)] (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11)

J003522.49-432517.45 8.84371 -43.42152 18.65 0.225 2.0 4 SWIRE3 J003522.50-432517.3 2.2335 · · · 311 J003521.34-432509.51 8.83894 -43.41928 21.71 0.636 2.0 2 SWIRE3 J003521.36-432509.3 1.7075 · · · 301 J003453.39-431802.46 8.72240 -43.30064 20.65 1.075 2.0 1 SWIRE3 J003453.39-431802.1 1.8465 2.5470 258 J003443.36-431713.39 8.68062 -43.28707 18.42 0.000 2.0 5 SWIRE3 J003443.36-431713.3 2.7933 · · · 245 J003407.39-430751.01 8.53081 -43.13084 18.91 0.188 2.0 2 SWIRE3 J003407.41-430750.9 2.2723 2.1869 185 J003424.30-432037.21 8.60127 -43.34372 21.47 1.041 2.0 1 SWIRE3 J003424.32-432037.2 1.5117 2.5663 216 J003429.29-432409.80 8.62204 -43.40269 21.28 1.065 2.0 1 SWIRE3 J003429.30-432409.5 1.7462 · · · 229 J003416.03-433338.06 8.56669 -43.56065 22.17 0.956 2.0 1 SWIRE3 J003416.02-433338.2 1.6669 2.5285 205 J003320.65-433716.86 8.33610 -43.62132 19.48 0.287 2.0 2 SWIRE3 J003320.68-433716.6 2.1074 2.4607 80 J003503.93-432847.13 8.76638 -43.47975 20.78 1.108 2.0 1 SWIRE3 J003503.94-432846.9 2.2380 2.8999 270 J003716.73-434151.12 9.31958 -43.69757 17.91 0.226 2.0 3 SWIRE3 J003716.71-434151.1 2.5961 3.3699 · · · J003546.69-430340.11 8.94461 -43.06111 17.30 0.147 2.0 3 SWIRE3 J003546.72-430339.8 2.8383 3.4389 · · · J003635.09-430133.70 9.14621 -43.02603 17.61 0.208 2.0 3 SWIRE3 J003635.10-430133.6 2.7766 3.4651 · · · J003531.00-430117.55 8.87917 -43.02154 17.14 0.146 2.0 3 SWIRE3 J003531.01-430117.4 2.7604 3.3664 · · ·

Note. — Column 1: ESIS identification name from Berta et al. (2006). Columns 2 and 3: coordinates (J2000). Column 4: R-band Vega magnitude. Column 5: redshift. Column 6: redshift quality code: [2.0]=reliable, based on >2 confirmed lines; [1.5]=very plausible, based on two lines. Column 7: spectroscopic classification code: [1]=type-1 AGN; [2]=type-2 AGN; [3]=ELG; [4]=normal galaxy; [5]=star. Column 8: SWIRE identification name of the most probable corresponding Spitzer source. Column 9: flux at 3.6 μm. Column 10: flux at 24 μm. Column 11: XMM-Newton source name, see Feruglio et al. (2008).

(This table is available in its entirety in a machine-readable form in the online edition of the Astrophysical Journal. A portion is shown here for guidance regarding its form and content.)

The wavelength range of our spectra (mostly in the interval 4500-9500 Å), is wide enough to classify the sources. In the case of those narrow lines sources, where only the region of the [O II] λ3727 line was visible, we used the presence (or not) of the high-ionization [Ne V] λ3426 line to discriminate between AGN2 and ELG. In any case, the AGN2 classification has been conservatively assigned only in fully reliable conditions. Because of the presence of broad emission lines in their spectra, even in the case of low S/N data, we can exclude that type- 1 AGN have been wrongly classified as either AGN2 or ELG.

As far as the galaxies with no emission lines (passive) are concerned, we were not able to measure redshifts larger than one (with calcium-break redshifted out of the wavelength coverage). However, this bias should be small in the 24 μm sample, as the fraction of energy emitted in the MIR by the passive galaxies is smaller than in the other galaxies (see, e.g., the SED library shown in Figure 1 of Polletta et al. 2007), and therefore the 24 μm sample should be scarcely populated by no emission line galaxies (see discussion in Section 4.1). This bias could instead affect the 3.6 μm sample^{18} which, however, has not been scientifically used in this work.

4. THE SPECTROSCOPIC CATALOG

In Table 2, we present the whole spectroscopic catalog consisting of 1376 optical counterparts of 3.6 and 24 μm Spitzer sources (whose redshift estimates have a quality flag ≥ [1.5]). For every source we report: the ESIS catalog identification code (from Berta et al. 2006), sky coordinates in degree units (J2000) of the optical counterpart and its R-band magnitude, redshift, redshift quality code (only sources with 1.5 or 2.0 redshift quality are included), spectroscopic classification code ([1]=type- 1 AGN; [2]=type-2 AGN; [3]=ELG; [4]=normal galaxy;

18 Where indeed we found a fraction of classified no emission line galaxies four times larger than in the 24 μm sample; see discussion in Section 4.2.

Fig. 3.— 24 μm flux density distribution of all Spitzer sources (line on top), those with an R-band detection (hatched region) and those with a reliable redshift estimate (darker shaded area).

[5]=star). We report also the SWIRE identification code and the 3.6 and 24 μm flux densities, in log[μJy] units, of the corresponding Spitzer sources. For those sources detected in the X-rays, the ID code from the catalog of Feruglio et al. (2008) is also reported.

The spectroscopic sample of the (both Spitzer detected and not) XMM-Newton sources has been presented in a separate publication by Feruglio et al. (2008). Therefore, the spectroscopic identification of any X-ray detected Spitzer source appears in both catalogs.

4.1. The 24 μm sample

Because of the incomplete execution of the second VI- MOS run, the statistically useful area of the field for spectroscopic identifications of the 24 μm sources is a rectangle with limits 8.21^∘<α<9.245^∘ and -43.91^∘<δ<- 43.116^∘, where all sources having α>9.0^∘ and δ<-43.7^∘ have been excluded (see Figure 1).

A total of 1932 24 μm sources were detected by Spitzer

6 SACCHI ET AL.

Fig. 4.— Central: R magnitude as a function of the 24 μm flux. Those having a reliable redshift estimate are represented by symbols whose meaning is shown in the legend. Sources detected in the X-ray are represented by cyan crosses. The dashed lines indicate the loci with equal F (24 μm)/F (R) ratio (whose values are reported in the labels). The vertical dotted line represents the 24 μm flux limit of 280 μm used to measure the fraction of AGN, while the horizontal dotted line represents the R=24.2 mag limit of the spectroscopic identifications. Upper: fraction of the spectroscopically identified sources as a function of the 24 μm flux for the whole 24 μm sample (dashed line) and the R-band detected 24 μm sample (continuous line). Right: fraction of the spectroscopically identified 24 μm sources as a function of the R-band magnitude.

within this 0.56 deg^2 studied area, 1512 of which (78%) have been identified in the R-band optical ESIS catalog. 419 sources have been spectroscopically identified: 399 result to be extragalactic sources and 20 stars. The extragalactic sources were classified into 107 AGN (27.3%, 52 AGN1 and 57 AGN2), 253 ELG (63.4%), and 37 GAL (9.3%). Figure 3 shows the histogram of the 24 μm flux of all sources (top line), those with an R-band detection (hatched region) and those with a reliable redshift estimate (darker shaded area).

In Figure 4, the distribution of the R magnitude as a function of the 24 μm flux is shown, with the indication of the spectroscopically identified and the X-ray detected sources. The fraction of spectroscopically identified sources decreases at both faint optical and 24 μm fluxes. This trends should be taken into account when these data are used. In our analyses (see section 5), we selected a sub-sample with 24 μm fluxes brighter than 280 μJy and magnitudes brighter than R=24.2, which corresponds to the largest possible sample where sufficient spectroscopic information exists (at these flux limits the fraction of spectroscopically identified sources is about 10%).

We have compared the spectroscopic sample (including only sources with a reliable redshift identification; see the previous section) with the “parent” 24 μm sample. In the upper left panel of Figure 5, the fraction of the 24 μm sources brighter than R=24 mag which have been detected at 3.6 μm as a function of the 24 μm flux is shown. At 24 μm fluxes brighter than 280 μJy (once the uncertainties are taken into account), no significant difference is found between the spectroscopic sample and the parent 24 μm sample: in both samples, in any bin more than 95% of the sources brighter than R=24 have been detected at 3.6 μm. No significant difference is found, either, between the two samples, in the value of the F (24 μm)/F(3.6 μm) ratio as a function of the 24 μm flux (see the lower left panel in Figure 5). We can then affirm that, although the fraction of spectroscopically identified sources depend either from the optical and 24 μm fluxes, the average MIR SED properties of the spectroscopically identified sources are not significantly different from those of the parent 24 μm sample (with R brighter than 24 mag).

In the upper right panel of Figure 5, the R-band distribution of the spectroscopically identified 24 μm sources is shown. Unlike the identifications carried out with FORS2 and EFOSC2, where almost all spectra down to R ∼ 24 mag are useful (quality-flag ≥1.5), at R-band magnitudes fainter than R ∼ 19 mag the fraction of lowquality VIMOS spectra increases with decreasing optical fluxes: it is about 20%, 35%, and 85% in the 21-22, 22- 23, and 23-24 R-band magnitude bins, respectively. As a consequence, most (∼80%) of the spectroscopic identifications at magnitudes fainter than R=23 mag have been carried out only with FORS2, which is indeed much more

A LARGE FRACTION OF AGN WITH HIGH F (24 μm)/F (R) RATIO 7

Fig. 5.— Upper left: fraction of the 24 μm sources brighter than R=24 which have been detected at 3.6 μm as a function of the 24 μm flux. The whole sample and the spectroscopically identified one are represented by open and filled circles, respectively. Lower left: ratio of the 24 μm and 3.6 μm flux densities as a function of the 24 μm flux for the same samples. Symbols are as in the previous panel. Thick vertical error bars correspond to the (1σ) uncertainties on the mean, while the light vertical error bars show the (1σ) spread of the distributions. Upper right: R magnitude distribution of the spectroscopically observed 24μm sources. The dotted line is the distribution of all the spectra, while the continuous line is the distribution of the “good-quality” (qual≥1.5) spectra presented in this work. The shaded area is the histogram of those sources whose spectra have been mainly obtained with FORS2/VLT (some of the brightest with EFOSC2/3.6 m or DFOSC). Lower right: fraction of the “good-quality” (qual≥1.5) spectra of the 24μm sources according to the spectroscopic class. Each histogram includes the classes below itself.

efficient (because of better sky and fringe subtraction) at faint magnitudes. In the lower right panel of Figure 5, the R-band magnitude distribution of the fraction of each spectroscopic class among the good-quality spectra is shown.

The redshift histogram of the spectroscopically identified 24 μm sources and the 24 μm luminosity–redshift diagram are shown in Figure 6. The luminosities have been computed applying a k-correction derived by a best SED fitting (F. La Franca et al., in preparation): following Fiore et al. (2008) we used a modified version of the SED library described in Polletta et al. (2007) and already used for similar analyses by Lonsdale et al. (2004), Franceschini et al. (2005), Hatziminaoglou et al. (2005), Polletta et al. (2006), Weedman et al. (2006), and Tajer et al. (2007). The luminosity–redshift distribution is that typical of a flux-limited sample. On average, the most distant and luminous sources are the AGN1, then there are the AGN2, and finally the ELG. As this is also an optical limited sample (the spectroscopic identifications reach R ∼ 24.2 mag), the explanation of this behavior requires a proper analysis (which is beyond the scope of this paper) of the bivariate MIR/optical luminosity functions of each population, combined with the k-corrections and all the selection effects. However, several works have been dedicated to the understanding of the shape of the 24 μm redshift distribution, discussing the combination of the effects of both the luminosity functions evolution and the MIR/optical SEDs (see, e.g., Pérez-González et al. 2005, Caputi et al. 2006, Desai et al. 2008). Desai et al. (2008) discuss in detail the

Fig. 6.— Top: redshift distribution of all 24 μm detected Spitzer sources. Those spectroscopically classified as AGN1, AGN2, and ELG are indicated in blue, red, and green colors, respectively. Bottom: log(νL_ν ) 24 μm luminosity–redshift diagram of all spectroscopically identified 24 μm sources. Blue circles, red squares, and green circles represent AGN1, AGN2, and ELG, respectively.

redshift distribution of a sample of 591 24 μm sources, detected in the Boötes field of the NOAO Deep Wide- Field Survey, down to F (24 μm) = 300 μJy and spectroscopically identified down to R=25 mag (thus with flux limits similar to our sample). They obtained optical spectroscopic redshift for 71% of the sources. Similarly to our sample, their redshift distribution shows a peak at z ∼ 0.3 and a possible additional peak at z ∼ 0.9 (see their Figure 9). These peaks could be attributed to redshifted emission features in the SED which enter the 24 μm MIPS bandpass. According to the analysis of Desai et al. (2008), the z ∼ 0.3 peak is difficult to be reproduced, as only the polycyclic aromatic hydrocarbon (PAH) emission features at 16.3 and 17 μm can be partly responsible of its presence, while the z ∼ 0.9 peak could be attributed to the 12.7 μm PAH feature and the 12.8 μm [Ne II] emission line passing trough the 24 μm bandpass. However, it is interesting to note that these two peaks are fairly well reproduced by the galaxy evolution model of Lagache et al. (2004) (see Figure 11 in Desai et al. 2008) where both normal and starburst galaxies are represented by luminosity-dependent SEDs. The model encompasses a strong rate of evolution of the luminosity density of starburst galaxies, peaking at z ∼ 0.7 and remaining constant up to z =4, while the normal galaxies evolve up to z =0.4, after which their luminosity density remains constant. Analyzing a fraction of their sources without emission-line redshifts, Desai et al. (2008) find also weak evidence for another peak at z ∼ 2 where about 55% of the sources are AGN-dominated.

At redshift larger than 1.0, our distribution is populated by AGN. AGN1 show larger redshifts and luminosities than AGN2: 80% of the AGN1 have redshift larger than ∼0.9, while 80% of the AGN2 show redshift lower than ∼1.1. This redshift distribution is not unusual for an MIR sample combined to an optical flux

8 SACCHI ET AL.

limit (introduced by the spectroscopic identification and classification process). See, e.g., the luminosity–redshift distribution of the 15 μm selected (F(15 μm)>500 μJy) sample in the whole ELAIS-S1 region by Matute et al. (2006; their Figure 3) where the spectroscopic identifications have been carried out down to R ∼ 22 mag. In the 15 μm sample used by Matute et al. (2006), 90% of the AGN1 show redshift larger than ∼0.4, while 80% of the AGN2 have redshift lower than ∼0.4. The difference between the redshift distribution of the two AGN populations is due to a combination of their luminosity functions with a difference in the average MIR/Optical ratio of their SED. Although both AGN1 and (with larger uncertainties) AGN2 show a strong luminosity evolution in the MIR (e.g., Matute et al. 2006 find a luminosity evolution at 15 μm of L(z) = L(0) × (1 + z)^k with k ∼ 2.9 for AGN1 and k ∼ 1.8 − 2.6 for AGN2; see also Brown et al. (2006) for a recent estimate of the AGN1 evolution at 24 μm), AGN2 have on average larger F (24 μm)/F (R) ratios than AGN1 (see, e.g., La Franca et al. (2004) and the discussion in Section 5.1.1 of this paper). In our sample, about 40% of the AGN2 show F(24μm)/F (R) ratios larger than 100, while only 15% of the AGN1 have F(24μm)/F (R) ratios larger than this limit. A similar kind of difference between AGN1 and AGN2 is seen in the X-rays, as far as the X-ray to optical ratio is concerned (see, e.g., Fiore et. al. 2003). This happens because, in AGN2, the optical AGN component is more often obscured, and the resulting optical spectrum is the combination of the hosting galaxy emission with the AGN Narrow Line Region (when visible; see, e.g., Fiore et al. (2000, 2003), Cocchia et al. (2007), and Caccianiga et al. (2008) for a discussion on the X-ray Bright Optically Normal Galaxies–XBONG). The average lower optical luminosity of AGN2 compared to the AGN1 (with the same 24 μm luminosity), combined to the optical R=24.2 mag spectroscopic limit, is therefore one of the most important agent for the average lower redshifts of the AGN2 sample (the luminosity function and the k-corrections are the other most important ingredients). In summary, as the measure of the 24 μm AGN1 and AGN2 luminosity function is beyond the scope of this paper, we can comment that the similarity between the AGN1 and AGN2 luminosity–redshift distribution of our sample and that observed at 15 μm (Matute et al. 2006), suggests that it is qualitatively compatible with the previous estimates of the AGN evolution in the MIR (e.g., Matute et al. 2002, 2006; see also Brown et al. 2006), where all these selection effects have been taken into account.

4.2. The 3.6 μm sample

Although the spectroscopic follow up was dedicated to the identification of the 24 μm and X-ray sources, a total of 1362 3.6 μm sources (881 not detected either in the 24 μm or the X-ray bands) have been spectroscopically identified. These spectra come from the identifications of 3.6 μm sources used as fillers of the VIMOS and FORS2 masks, or from the identification of the K -band (2.2 μm) sources of the western half area, observed during the first VIMOS run (see Section 3). We limit the following discussion to the western half of the VIMOS area having limits 8.21^∘<α<8.74^∘ and -43.91^∘<δ<-43.116^∘ that can be treated as an unbiased representation of the parent

Fig. 7.— 3.6 μm flux distribution of all Spitzer sources (line on top), those with an R-band detection (hatched region), and those with a reliable redshift estimate (darker shaded area).

3.6 μm sample and in which most of these sources (999) are indeed located (see Figure 1).

A total of 16782 3.6 μm sources were detected by Spitzer within this 0.31 deg^2 area, 10794 of which (64%) have been identified in the R-band optical ESIS catalog. 999 sources have been spectroscopically identified: 762 result to be extragalactic sources and 237 stars. The extragalactic sources were classified into 111 AGN (14.6%, 51 AGN1 and 60 AGN2), 358 ELG (47.0%), and 293 GAL (38.5%). Figure 7 shows the 3.6 μm flux histogram of the sub-sample (line on top), those with an R-band detection (hatched region) and those with a reliable redshift estimate (darker shaded area). The fraction of 3.6 μm sources with spectroscopic redshift is 22% for sources with F (3.6 μm)>50 μJy and decreases at fainter fluxes (∼1% at F (3.6 μm)∼30 μJy).

In Figure 8, the distribution of the R magnitude as a function of the 3.6 μm flux is shown, with the indication of the spectroscopically identified and the X-ray detected sources. The fraction of spectroscopically identified sources decreases at both faint optical and 3.6 μm fluxes. Unlike the 24 μm sample, a decrease in the fraction of identifications is evident at bright optical and 3.6 μm fluxes too (see also Figure 7). This is due to the fact that the spectroscopic identifications of the sources brighter than R=18 were carried out by single slit observations of the 24 μm sources only.

This bias is evident in the upper left panel of Figure 9 where the fraction of the 3.6 μm sources brighter than R=24 which have been detected at 24 μm as a function of the 3.6 μm flux is shown. In the 3.6 μm flux interval between 10 and 160 μJy, there is no difference between the spectroscopic sample and the parent 3.6 μm sample. No difference is found either, in the same flux interval, between the F (24 μm)/F (3.6 μm) ratios of the two samples (see the lower left panel in Figure 9 ). On the other hand, at 3.6 μm fluxes brighter than 160 μJy the fraction of 24 μm detected spectroscopically identified sources is significantly larger than the parent 3.6 μm sample. We can then conclude that, within the western half of the area, in each R-band magnitude interval brighter than R ∼ 24, the 3.6 μm spectroscopic catalog is a fair sample of the 3.6 μm sources only in the 10-160 μJy flux range.

A LARGE FRACTION OF AGN WITH HIGH F (24 μm)/F (R) RATIO 9

Fig. 8.— Central: R magnitude as a function of the 3.6 μm flux of the sources in the western half of the area. Those having a reliable redshift estimate are represented by symbols whose meaning is shown in the legend. Sources detected in the X-ray are indicated with cyan crosses. The two dotted vertical lines show the flux limits where, in each R-band magnitude interval, the spectroscopic identifications are a fair (“gray”) sample of the 3.6 μm catalog (see Section 4.2). The horizontal dotted line represents the R=24.2 mag limit of the spectroscopic identifications. Upper: fraction of the spectroscopically identified sources as a function of the 3.6 μm flux for the whole 3.6 μm sample (dashed line) and the R-band detected 3.6 μm sample (continuous line). Right: fraction of the spectroscopically identified 3.6 μm sources as a function of the R-band magnitude.

In the upper right panel of Figure 9 the R-band distribution of the spectroscopically identified 3.6 μm sources is shown, while in the lower right panel of Figure 9 the R-band magnitude distribution of the fraction of each spectroscopic class among the good-quality spectra is shown. Unlike the spectroscopic 24 μm sample (see Figure 5 for comparison) even at faint R-band magnitudes (R ∼ 22−24), a large fraction (about 40%) of the sources are non-emission line galaxies (GAL) and stars. The redshift histogram of the spectroscopically identified 3.6 μm sources is shown in Figure 10.

4.2.1. IRAC colors

With the launch of Spitzer, some color–color diagrams (mainly based on the IRAC photometry) have been proposed in order to quickly characterize the MIR SED properties of the sources and select the AGN (see, e.g., Lacy et al. 2004; Stern et al. 2005; Lacy et al. 2007). In Figure 11, the IRAC color–color diagram, as proposed by Lacy et al. (2004, 2007), of all the spectroscopically classified 3.6 μm sources is shown. The dashed line shows the original AGN selection criteria, calibrated on a Sloan Digital Sky Survey quasar sample and subsequently confirmed with spectroscopic observations. The study of the relations among the average SED properties of the sources and their optical spectra is beyond the scope of this paper. However, we can note that, as in the above mentioned studies, also the sources of our sample occupy two branches, forming a “V”-shaped locus. Each spectroscopic class preferentially occupies different regions of the diagram according to the energetically dominant component in the MIR regime (see, e.g., Sajina et al. 2005). In line with the above-mentioned studies, ∼85% of the AGN (97% of the AGN1 and 70% of the AGN2 detected in all the four IRAC bands) in our sample are located inside the AGN selection region (the branch on the right) corresponding to sources having red power-law MIR-SEDs whose slope increases moving to the upper right part of the diagram. ELG and GAL occupy (without solution of continuity) the upper and lower region, respectively, of the left branch. Stars are located at the bottom, almost in the center of the passive galaxy locus, as they have qualitatively similar SEDs (with an emission shortfall in the MIR).

5. FRACTION OF AGN

As discussed in the introduction, it is very interesting to measure the fraction of AGN among those sources showing large F (24 μm)/F (R) ratios or as a function of the 24 μm flux. In order to use the most statistically useful sample, in the following analyses we will use the sub-sample of the spectroscopic catalog of the 24 μm extragalactic sources corresponding to the intersection of the area of the spectroscopic follow up (see section 4.1) with the area covered by the XMM-Newton observations (see also Figure 1). As discussed in section 4.1, we select a sub-sample at 24 μm fluxes brighter than 280 μJy and

10 SACCHI ET AL.

Fig. 9.— Upper left: fraction of the 3.6 μm sources brighter than R=24 which have been detected at 24 μm as a function of the 3.6 μm flux. The whole sample and the spectroscopically identified one are represented by open and filled circles, respectively. Lower left: ratio of the 24 μm and 3.6 μm flux densities as a function of the 3.6 μm flux for the same samples. Symbols are as in the previous panel. Thick vertical error bars correspond to the (1σ) uncertainties on the mean, while the light vertical error bars show the (1σ) spread of the distributions. Upper right: R magnitude distribution of the spectroscopically observed 3.6 μm sources. The dotted line is the distribution of all the spectra, while the continuous line is the distribution of the “good-quality” (qual≥1.5) spectra presented in this work. The shaded area is the histogram of those sources whose spectra have been mainly obtained with FORS2/VLT (some of the brightest with EFOSC2/3.6 m or DFOSC). Lower right: fraction of the “good-quality” (qual≥1.5) spectra of the 3.6 μm sources according to the spectroscopic class. Each histogram includes the classes below itself.

Fig. 10.— Redshift distribution of the 3.6 μm detected Spitzer sources. Those spectroscopically classified as AGN1, AGN2, and ELG are indicated in blue, red, and green colors, respectively (as in Figure 6).

magnitudes brighter than R=24.2, which corresponds to the largest possible sample where sufficient spectroscopic information exists. These selections correspond to an area of 0.54 deg^2.

Fig. 11.— IRAC color–color diagram of the spectroscopically classified 3.6 μm sources. Black points show all the sources detected in all the four IRAC bands. The dashed line shows the AGN selection criteria proposed by Lacy et al. (2004, 2007). Open black circles indicate those 24μm sources having F (24 μm)/F (R) ratios larger than 300. For more information about the sources distribution, see, e.g., Sajina et al. (2005).

5.1. Fraction of AGN as a function of the F(24 μm)/ F( R) ratio

The spectroscopic campaign has been carried out observing sources detected by either XMM-Newton or Spitzer (or both). 83 of the 419 spectroscopically identified 24 μm sources are also included in the XMM- Newton detection catalog (see Table 1). Therefore, in the estimate of the AGN fraction as a function of the F(24 μm)/F (R) ratio, a correction for the bias introduced by the inclusion of the X-ray sample has to be taken into account (indeed, as shown by Feruglio et al. (2008), most of the X-ray sources are AGN). If we call N_X (and N_{X,spec}) and N_{NoX} (and N_{NoX,spec}) the number of Spitzer sources (and those spectroscopically identified) in a given MIR flux interval, detected and not detected in the X-ray band, respectively, the true fraction of AGN (Fr_{AGN}) among all (N_{Tot}) the Spitzer sources is given by

F r_{AGN} = ( N_{X,AGN} N_{X,spec}

N_X +

N_{NoX,AGN} N_{NoX,spec}

N_{NoX} ) /N_{Tot} ,

where N_{X,AGN} and N_{NoX,AGN} are the number of spectroscopically identified AGN, detected and not detected in the X-ray band, respectively.

We have verified that, although the fraction of spectroscopic identifications decreases at faint R-band magnitudes, in each F (24 μm)/F (R) bin the fraction of spectroscopic identifications is not significantly dependent on either the 24 μm flux or the R-band magnitude (see Figure 12). Therefore, the spectroscopic identifications provide a fair random sampling of the sources in each F (24 μm)/F (R) bin.

The fraction of AGN as a function of the F (24 μm)/F (R) ratio is shown in Figure 13, while in Figure 14 the redshift of the spectroscopically identified sources as

A LARGE FRACTION OF AGN WITH HIGH F (24 μm)/F (R) RATIO 11

Fig. 12.— Fraction of spectroscopically identified 24 μm sources as a function of the F (24 μm) flux divided into different bins of the F (24 μm)/F (R) ratio (the dashed horizontal lines indicate mean values in each F (24 μm)/F (R) bin). Given the narrow dimension of the intervals in F (24 μm)/F (R), the overall constant trend in F (24 μm) is similar in F (R) as well.

Fig. 13.— Fraction of AGN as a function of the F (24 μm)/F (R) ratio (triangles). Filled circles represent the fraction of AGN1, while open squares represent the fraction of AGN2. Horizontal error bars represent the ratio interval; vertical bars represent the Poissonian errors propagated through the F r_{AGN} formula in Section 5.1.

a function of the F (24 μm)/F (R) ratio is plotted. The fraction of AGN clearly increases with increasing F (24 μm)/F (R) ratio. While 85% of the AGN1 concentrates in the range 1<log[F (24 μm)/F (R)]<2, which is typical of the local AGN1 SEDs (e.g., Spinoglio et al. 2002), the AGN2 fraction constantly increases with the F (24 μm)/F (R) ratio: in the 2.5<log[F (24 μm)/F (R)]<3 interval (where a total of 18 sources have been spectroscopically identified) AGN2 outnumber AGN1 by a factor of ∼5, and the total fraction of AGN is 70(± 20)%.

However, it should be noted that this statistics could be affected by some biases. In poor-quality data, emis-

Fig. 14.— Redshift of the spectroscopically identified sources as a function of the F (24 μm)/F (R) ratio. Filled circles and open squares represent AGN1 and AGN2, respectively.

sion line spectra are more easily identified than noemission line spectra. In the 2.5<log[F (24 μm)/F (R)]<3 interval, beside the 18 classified spectra, 8 further FORS2 spectra (with similar R-band distribution) missed an identification. These additional 8 spectra could be populated by the same mixture of AGN1, AGN2, ELG, and passive galaxies, but, under the most extreme assumption that all these objects were included among the non- AGN sample, the fraction of AGN in the 2.5<log[F (24 μm)/F (R)]<3 interval would be 50%, instead of 70%. Therefore, although our estimate of a fraction of 70% AGN in the 2.5<log[F (24 μm)/F (R)]<3 interval has not to be considered an upper limit, it should be bear in mind that if this bias were present, the real dependence of the AGN fraction with increasing F (24 μm)/F (R) ratio would be weaker (but still present) than shown in Figure 13.

On the other hand, in Section 3.5, we have stated that a fraction (which is difficult to quantify) of the ELG classified sources could instead reveal to be AGN2 if identified with higher S/N optical spectra. Although we are not able to quantify this bias, we can qualitatively expect it to be more relevant for the optically fainter sources, whose F (24 μm)/F (R) ratio is on average larger. In this case, the increase of the AGN fraction with increasing F (24 μm)/F (R) ratio would be even more relevant.

In Figure 15, the optical spectra of the 18 sources with 2.5<log[F (24 μm)/F (R)]<3 are shown. The positions of typical AGN emission lines (even if not observed) are shown as a reference. Ten out of the 14 spectra with magnitudes larger than R=22.5 mag have been observed by FORS2. The AGN2 show larger [O III] λ5007/Hβ and [O II] λ3727/Hβ ratios than observed in the ELG, typical of AGN activity (e.g., Osterbrock 1989). Moreover, when observable, AGN2 show the high-ionization [Ne V] λ3426 emission line, which instead is not present in the ELG spectra (see also Figure 2).

The observed differences on the F (24 μm)/F (R) ratios of AGN1 and AGN2 is principally explained by the difference between their optical luminosity. While in AGN1 the optical luminosity originates directly in the nucleus, in AGN2, as the AGN is obscured, the optical luminosity comes from the lower luminous hosting galaxy. As shown in Figures 6 and 14, for non-AGN1 sources the average

12 SACCHI ET AL.

Fig. 15.— Optical spectra of the 18 sources with 2.5<log(F (24 μm)/F (R))<3. The positions of typical AGN emission lines (even if not observed) are shown as a reference.

A LARGE FRACTION OF AGN WITH HIGH F (24 μm)/F (R) RATIO 13

Fig. 16.— F (24 μm)/F (R) ratio as a function of the (IRAC) F (5.8 μm)/F (3.6 μm) ratio of 24 μm detected sources. The loci mostly populated by AGN1 and obscured AGN2 are delimited by dashed lines (the respective fractions are reported in the text). The larger F (24 μm)/F (R) ratio of AGN2 compared to AGN1 is due to the stronger obscuration in the optical for AGN2, while the F (5.8 μm)/F (3.6 μm) separation between ELG and AGN is mainly due to the PAH features present in most IR galaxies combined with a redshift effect (for more information, see, e.g., Sajina et al. 2005). The classification of the spectroscopically identified sources is shown in the legend.

redshift increases with increasing F (24 μm)/F (R) ratio. All the sources with log[F (24 μm)/F (R)]>2.5 have z >0.8, and νL_ν 24 μm luminosity larger than 10^{44} erg s^{−1}. This behavior is due to the fact that those non- AGN1 sources showing larger F (24 μm)/F (R) ratio have preferentially the faintest optical magnitudes and thus the largest redshift. In contrast, AGN1 are more easily found at large redshifts but with lower (roughly constant) F (24 μm)/F (R) ratios. In this case (as discussed in Section 4.1), this is caused by the evolution of AGN1 luminosity functions (the density increases with increasing redshift^{19}) combined with the accessible volumes and k-corrections (see, e.g., Matute et al. 2002, 2006), while the average SED (and then the F (24 μm)/F (R) ratio) does not evolve significantly.

5.1.1. IRAC–MIPS color–color selection of absorbed AGN

As shown in Figure 11, the sources with large (>300) F (24 μm)/F (R) ratios are mostly located in the IRAC color–color region where AGNs are expected: i.e., in the branch where both the F (5.8 μm)/F (3.6 μm) and F (8.0 μm)/F (4.5 μm) ratios are larger. However, it is evident that the F (5.8 μm)/F (3.6 μm) ratio is more efficient than the F (8.0 μm)/F (4.5 μm) ratio in the AGN selection. It is therefore possible to create an optical– IRAC–MIPS color–color diagram, based on the F (5.8 μm)/F (3.6 μm) and F (24 μm)/F (R) ratios, which is highly efficient in selecting obscured AGN (AGN2).

Figure 16 shows how this optical–IRAC–MIPS dia-

19 A luminosity evolution results in an increase of the density of sources with the same luminosity.

Fig. 17.— Fraction of optically classified AGN as a function of the 24 μm flux. The shaded area shows the 1σ confidence limits once the sources not detected in the R-band are included and assumed to contain a fraction of 68% of AGN, as measured in the 2.5<log[F (24 μm)/F (R)]<3 bin. Overplotted are the estimates based on both Xray and Spitzer data from Brand et al. (2006; squares) and Treister et al. (2006; triangles). The dashed line shows the expectations from the burst model of Pearson (2005). Horizontal error bars of our data represent the flux interval.

gram is populated according to our spectroscopic classification. The region with log[F (5.8 μm)/F (3.6 μm)]>0 and 1<log[F (24 μm)/F (R)]<2 is mainly populated by AGN1: 65% are AGN1 and 12% are AGN2 (79% of all the AGN1 are located in this region). The region with log[F (5.8 μm)/F (3.6 μm)]>0 and log[F (24 μm)/F (R)]>2 is mainly populated by AGN2: 24% are AGN1 and 55% are AGN2 (36% of all the AGN2 are included in this area). Therefore, while the first region is quite efficient in selecting AGN1, the second one is useful in selecting obscured AGN2 with a moderate level of completeness.

5.2. Fraction of AGN as a function of the 24 μm flux

The measure of the fraction (and counts) of AGN as a function of the 24 μm flux is a very useful information to constrain the evolutionary models of AGN and starburst galaxies (see, e.g., Gruppioni et al. 2005; Franceschini et al. 2008). Unlike for the estimate of the AGN fraction as a function of the F (24 μm)/F (R) ratio (presented in the previous section), in this case, the presence in our sample of a decrease of the fraction of spectroscopically identified sources with decreasing R-band magnitudes (see Figure 4) and, on top of that, the lack of any identification at magnitudes fainter than R=24.2, complicates the attainment of a reliable measure.

In order to overcome these difficulties, and still obtain a sufficiently useful estimate, we have derived the fraction of AGN as a function of the 24 μm flux by assuming that it is mainly dependent on the F (24 μm)/F (R) ratio as measured in the previous section. The AGN fraction was then derived by dividing each 24 μm flux interval into F (24 μm)/F (R) bins and multiplying the number of sources in each bin to its previously measured fraction of AGN (see Figure 13).

In Figure 17, the corresponding fraction of optically classified AGN as a function of the 24 μm flux is shown. The shaded area corresponds to the 1 σ confidence limits once the sources not detected in the R-band are also

14 SACCHI ET AL.

included and assumed to contain a fraction of 68% of AGN, as measured for the objects with the largest F (24 μm)/F (R) ratio. The AGN fraction at F (24 μm)∼0.8 mJy results to be ∼22(±7)% and decreases slowly to ∼19(±5)% down to F (24 μm)∼0.3 mJy. This estimate of the fraction of optically classified AGN, at 24 μm fluxes fainter than 0.8 mJy, is larger than the previous measures by Brand et al. (2006) and Treister et al. (2006) and the expectations of the burst model of Pearson (2005) (see Figure 17). It should be noted that our measure of the AGN fraction is based on a direct spectroscopic optical classification, while the estimates from Brand et al. (2006) are based on a classification which uses Spitzer colors (selecting sources in which the MIR emission is AGN dominated), and Treister et al. (2006) use a selection in the hard-X band and then corrects by the absorbed AGN fraction expected to be missed assuming an N_H population distribution. The real fraction of AGN would be even larger if we took into account that a fraction (∼10%) of X-ray (or even MIR) classified AGN do not show in the optical signatures of AGN activity (e.g., the XBONG; see Fiore et al. 2000, 2003; La Franca et al. 2007; Cocchia et al. 2007; Caccianiga et al. 2008; Gruppioni et al. 2008; Feruglio et al. 2008 and references therein). These objects usually show large values of both X-ray to optical and MIR to optical flux ratios.

6. DISCUSSION AND CONCLUSIONS

As discussed in the introduction, several studies have presented evidence that many galaxies showing SEDs with large F (24 μm)/F (R) ratios (e.g., Polletta et al. 2008 use a threshold of F (24 μm)/F (R)>400 and 24 μm fluxes larger than 1 mJy) harbor an AGN. These works were mainly based on low-resolution MIR spectroscopy or SED studies. X-ray stacking analyses of sources with F (24 μm)/F (R)>1000 have shown that their average X-ray spectrum is compatible with Compton-thin and Compton-thick absorbed sources (Daddi et al. 2007; Fiore et al. 2008, 2009), but the relevance of this result depends on the fraction of AGN (and complementary starburst galaxies) which contribute to the average X-ray spectrum (see Donley et al. 2008).

Our catalog of 1376 optical spectroscopic identifications of 3.6 and 24 μm SWIRE sources, thanks to the use of FORS2 and VIMOS at VLT, has pushed the optical classification down to R ∼ 24, and has allowed us to directly measure the fraction of AGN as a function of the F (24 μm)/F (R) ratio. We have then shown that, at 24 μm fluxes larger than 280 μJy, in the range 316<F (24 μm)/F (R)<1000, 70(±20)% of the sources show an optical AGN spectrum, and most of them are AGN2. In fact, the increase of the total fraction of AGN with the F (24 μm)/F (R) ratio is caused by a strong increase of the fraction of AGN2, which populate more than 80% of the AGN found in the 316<F (24 μm)/F (R)<1000 range. This result is in agreement with the above-mentioned observed average X-ray absorbed spectrum reported for similar kind of sources. Indeed, in the framework of the classical unified AGN scenario X-ray absorbed spectra are typical of AGN2.

At fainter optical luminosity (R>24) and then larger F (24 μm)/F (R) ratios the fraction of AGN might be even higher, but the optical spectroscopic identification of a statistical significant sample of these sources is difficult to achieve with the currently available 8 m class telescopes.

Our result confirms previous indications that the population of sources showing large F (24 μm)/F (R) ratios are mainly AGN2 (e.g., Daddi et al. 2007; Fiore et al. 2008, 2009), but as we were able to spectroscopically separate the AGN(2) from the starburst galaxies, we are now able to measure how many and how much of these AGNs show X-ray absorption and, even more interestingly, if they include a significant fraction of the long searched and predicted Compton-thick AGN population. Such a kind of study requires the use of deep Chandra X-ray observations which, in ELAIS-S1, partly already exist (S. Puccetti et al., in preparation), and will be the subject of a forthcoming paper.

Acknowledgments: Based on observations made with the ESO telescopes at the La Silla and Paranal Observatories under program IDs 168.A-0322, 170.A-0143, 073.A- 0446, 075.A-0428, 076.A-0225, 077.A-0800, and 078.A- 0795. Part of the data published in this paper have been reduced using VIPGI, designed by the VIRMOS Consortium and developed by INAF Milano. We are grateful to Bianca Garilli and Marco Scodeggio for the support provided in running the VIPGI pipeline. This work is based on observations made with the Spitzer Space Telescope, which is operated by the Jet Propulsion Laboratory, California Institute of Technology under a contract with NASA. We acknowledge financial contribution from contract ASI-INAF I/023/05/0, PRIN-MIUR grant 2006-02-5203. The anonymous referee is acknowledged for his detailed and constructive reports.

Facilities: VLT:Melipal (VIMOS), VLT:Antu (FORS2), ESO:3.6 m (EFOSC2), Spitzer

REFERENCES

Alexander, D. M., et al. 2001, ApJ, 554, 18 Alexander, D. M., et al. 2008, ApJ, 687, 835 Alonso-Herrero, A., et al. 2006, ApJ, 640, 167 Ballantyne, D. R., Shi, Y., Rieke, G. H., Donley, J. L., Papovich, C., & Rigby, J. R. 2006, ApJ, 653, 1070 Berta, S., et al. 2006, A&A, 451, 881 Berta, S., et al. 2008, A&A, 488, 533 Brand, K., et al. 2006, ApJ, 644, 143 Brand, K., et al. 2007, ApJ, 663, 204 Brand, K., et al. 2008, ApJ, 680, 119 Brown, M. J. I., et al. 2006, ApJ, 638, 88 Burgarella, D., et al. 2005, ApJ, 619, L63 Caccianiga, A., et al. 2008, A&A, 477, 735 Caputi, K. I., et al. 2006, ApJ, 637, 727 Cocchia, F., et al. 2007, A&A, 466, 31

Croom, S. M., Smith, R. J., Boyle, B. J., Shanks, T., Miller, L., Outram, P. J., & Loaring, N. S. 2004, MNRAS, 349, 1397 Daddi, E., et al. 2007, ApJ, 670, 173 Davis, M., et al. 2007, ApJ, 660, L1 Dey, A., et al. 2008, ApJ, 677, 943 Desai, V., et al. 2008, ApJ, 679, 1204 Donley, J. L., et al. 2005, AJ, 129, 220 Donley, J. L., Rieke, G. H., Pérez-González, P. G., Rigby, J. R., & Alonso-Herrero, A. 2007, ApJ, 660, 167 Donley, J. L., Rieke, G. H., Pérez-González, P. G., Barro 2008, ApJ, 687, 111 Fadda, D., et al. 2006, AJ, 131, 2859 Fazio, G. G., et al. 2004, ApJS, 154, 10 Feruglio, C. et al. 2008, A&A, 488, 417 Fiore, F., et al. 2000, New Astron., 5, 143

A LARGE FRACTION OF AGN WITH HIGH F (24 μm)/F (R) RATIO 15

Fiore F., et al. 2003, A&A, 409, 79 Fiore F., et al. 2008, ApJ, 672, 94 Fiore F., et al. 2009, ApJ, 693, 447 Franceschini, A., et al. 2005, AJ, 129, 2074 Franceschini, A., et al. 2008, A&A, 487, 837 Gruppioni, C., et al. 1999, MNRAS, 305, 297 Gruppioni, C., Pozzi, F., Lari, C., Oliver, S., & Rodighiero, G.

2005, ApJ, 618, L9 Gruppioni, C. et al. 2008, ApJ, 684, 136 Hasinger, G. 2008, A&A, 490, 905 Hatziminaoglou, E., et al. 2005, AJ, 129, 1198 Houck, J. R., et al. 2005, ApJ, 622, L105 Kewley, L. J. et al. 2006, MNRAS, 372, 961 La Franca, F., et al. 2004, AJ, 127, 3075 La Franca, F., et al. 2005, ApJ, 635, 864 La Franca, F., et al. 2007, A&A, 472, 797 Lacy, M., et al. 2004, ApJS, 154, 166 Lacy, M., Petric, A. O., Sajina, A., Canalizo, G., Storrie-Lombardi, L. J., Armus, L., Fadda, D., & Marleau, F. R. 2007, AJ, 133, 186 Lawrence, A., & Elvis, M. 1982, ApJ, 256, 410 Lari, C., et al. 2001, MNRAS, 325, 1173 Lonsdale, C. J., et al. 2003, PASP, 115, 897 Lonsdale, C.J. et al. 2004, ApJS, 154, 54 Martínez-Sansigre, A., Rawlings, S., Lacy, M., Fadda, D., Marleau, F. R., Simpson, C., Willott, C. J., & Jarvis, M. J. 2005, Nature, 436, 666 Martínez-Sansigre, A., et al. 2007, MNRAS, 379, L6 Matute, I., et al. 2002, MNRAS, 332, L11 Matute, I., La Franca, F., Pozzi, F., Gruppioni, C., Lari, C., & Zamorani, G. 2006, A&A, 451, 443 Middelberg, E., et al. 2008, AJ, 135, 1276 Murray, S. S., et al. 2005, ApJS, 161, 1 Oliver, S., et al. 2000, MNRAS, 316, 749 Osterbrock, D. E. 1989, Astrophysics of Gaseous Nebulae and Active Galactic Nuclei (Mill Valley, CA: Univ. Science Books)

Pearson, C. 2005, MNRAS, 358, 1417 Pérez-González, P. G., et al. 2005, ApJ, 630, 82 Polletta, M., et al. 2006, ApJ, 642, 673 Polletta, M., et al. 2007, ApJ, 663, 81 Polletta, M., Weedman, D., Hönig, S., Lonsdale, C. J., Smith, H. E., & Houck, J. 2008, ApJ, 675, 960 Pope, A., et al. 2008, ApJ, 689, 127 Pozzi, A. et al. 2004, ApJ, 609, 122 Puccetti, S. et al. 2006, A&A, 457, 501 Rieke, G. H., et al. 2004, ApJS, 154, 25 Rowan-Robinson, M., et al. 2004, MNRAS, 351, 1290 Sajina, A., et al. 2005, ApJ, 621, 256 Sajina, A., et al. 2006, MNRAS, 369, 939 Scodeggio, M., et al. 2005, PASP, 117, 1284 Spinoglio, L., Andreani, P., & Malkan, M. A. 2002, ApJ, 572, 105 Steffen, A. T., Brandt, W. N., Alexander, D. M., Gallagher, S. C., & Lehmer, B. D. 2007, ApJ, 667, L25 Stern, D., et al. 2005, ApJ, 631, 163 Surace, J. A., Shupe, D. L., Fang, F., Evans, T., Alexov, A., Frayer, D., Lonsdale, C. J., & SWIRE Team 2005, BAAS, 37, 1246 Tajer, M., et al. 2007, A&A, 467, 73 Treister, E., & Urry, C. M. 2006, ApJ, 652, L79 Treister, E., et al. 2006, ApJ, 640, 603 Treister, E., et al. 2009, ApJ, 693, 1713 Tresse, L., et al. 1996, MNRAS, 281, 847 Ueda, Y., Akiyama, M., Ohta, K., & Miyaji, T. 2003, ApJ, 598, 886 Veilleux, S. & Osterbrock, D.E. 1987, ApJS, 63, 295 Weedman, D. W., et al. 2006, ApJ, 651, 101 Yan, L., et al. 2007, ApJ, 658, 778