en	This is usually caused by cloning the device image resulting in duplication of the UUID value which should be unique. In that case you can either disconnect one of the devices or reformat it.

en	For some reason we were unable to locate a disklabel on a disk that the kernel is reporting partitions on. It is unclear what the exact problem is. Please file a bug at http://bugzilla.redhat.com

en	Either restore the disklabel to a completely working state or remove it completely. Hint: parted can restore it or wipefs can remove it.

en	Rename one of the volume groups so the names are distinct. Hint 1: vgrename accepts UUID in place of the old name. Hint 2: You can get the VG UUIDs by running 'pvs -o +vg_uuid'.

en	FCoE not available

en	zFCP device %s not found, not even in device ignore list.

en	Could not set zFCP device %(devnum)s online (%(e)s).

en	Could not add WWPN %(wwpn)s to zFCP device %(devnum)s (%(e)s).

en	WWPN %(wwpn)s not found at zFCP device %(devnum)s.

en	Could not add LUN %(fcplun)s to WWPN %(wwpn)s on zFCP device %(devnum)s (%(e)s).

en	LUN %(fcplun)s at WWPN %(wwpn)s on zFCP device %(devnum)s already configured.

en	Could not read failed attribute of LUN %(fcplun)s at WWPN %(wwpn)s on zFCP device %(devnum)s (%(e)s).

en	Failed LUN %(fcplun)s at WWPN %(wwpn)s on zFCP device %(devnum)s removed again.

en	Could not correctly delete SCSI device of zFCP %(devnum)s %(wwpn)s %(fcplun)s (%(e)s).

en	Could not remove LUN %(fcplun)s at WWPN %(wwpn)s on zFCP device %(devnum)s (%(e)s).

en	Could not remove WWPN %(wwpn)s on zFCP device %(devnum)s (%(e)s).

en	Could not set zFCP device %(devnum)s offline (%(e)s).

en	Unable to change iSCSI initiator name once set

en	Must provide an iSCSI initiator name

en	No iSCSI nodes discovered

en	Could not log in to any of the discovered nodes

en	unable to allocate aligned partition

en	requested size exceeds maximum allowed

en	disk %s inaccessible

en	partition is too small for %(format)s formatting (allowable size is %(min_size)s to %(max_size)s)

en	partition is too large for %(format)s formatting (allowable size is %(min_size)s to %(max_size)s)

en	Unable to allocate requested partition scheme.

en	not enough free space after creating extended partition

en	failed to allocate aligned partition

en	cannot reclaim more than request has grown

en	DiskChunk requests must be of type PartitionRequest

en	partitions allocated outside disklabel limits

en	VGChunk requests must be of type LVRequest

en	not enough space for LVM requests

en	Executing %(action)s

en	create device

en	destroy device

en	resize device

en	create format

en	Creating %(type)s on %(device)s

en	Not enough entropy to create LUKS format. %d bits are needed.

en	Created %(type)s on %(device)s

en	destroy format

en	resize format

en	Resizing filesystem on %(device)s

en	Resized filesystem on %(device)s

en	add container member

en	remove container member

en	configure format

en	configure device

en	RAID level %(raid_level)s requires that device have at least %(min_members)d member.

en	RAID level %(raid_level)s requires that device have at least %(min_members)d members.

en	RAID level %(raid_level)s is an invalid value. Must be one of (%(levels)s).

en	Cannot remove a member from existing %s array

en	Apple Bootstrap

en	Linux HFS+ ESP

en	PPC PReP Boot

en	LUKS

en	Encrypted

en	DM Integrity

en	Unknown

en	BIOS Boot

en	dm-raid member device

en	partition table

en	Unsupported %(name)s

en	software RAID

en	multipath member device

en	physical volume (LVM)

en	Generic

en	Performance