en	The installation was stopped due to what seems to be a problem with your hardware. The exact error message is: %s. The installer will now terminate.

en	Hardware error occurred

en	The installation was stopped due to an error which occurred while running in non-interactive cmdline mode. Since there cannot be any questions in cmdline mode, edit your kickstart file and retry installation. The exact error message is: %s. The installer will now terminate.

en	Running in cmdline mode, no interactive debugging allowed. The exact error message is: %s. The installer will now terminate.

en	Live image

en	Local repositories

en	NFS server {}
et	NFS-i server %s

en	Local media

en	RPM OSTree

en	Live OS

en	Red Hat CDN

en	Local media via SE/HMC

en	The %packages --ignorebroken feature is not supported on your product!

en	Deployment starting: {}

en	Deployment complete: {}

en	Starting pull of {branch_name} from {source}

en	Preparing deployment of {}

en	Receiving objects: {percent}% ({fetched}/{requested}) {bytes}

en	Writing objects

en	Installing %(flatpak_name)s

en	Starting Flatpak installation

en	Post-installation flatpak tasks

en	Flatpak installation has finished

en	No match found for given boot drive "{}".

en	More than one match found for given boot drive "{}".

en	Requested boot drive "{}" doesn't exist or cannot be used.

en	GRUB2 does not support installation to a partition.

en	GRUB2 encrypted password must be in grub.pbkdf2 format.

en	%(deviceName)s may not have enough space for grub2 to embed core.img when using the %(fsType)s file system on %(deviceType)s

en	boot loader stage2 device %(stage2dev)s is on a multi-disk array, but boot loader stage1 device %(stage1dev)s is not. A drive failure in %(stage2dev)s could render the system unbootable.

en	boot loader stage2 device %(stage2dev)s is on a multi-disk array, but boot loader stage1 device %(stage1dev)s is not part of this array. The stage1 boot loader will only be installed to a single drive.

en	/boot file system

en	RAID sets that contain '%(desc)s' must have one of the following raid levels: %(raid_level)s.

en	RAID sets that contain '%(desc)s' must have one of the following metadata versions: %(metadata_versions)s.

en	RAID sets that contain '%(desc)s' must have one of the following device types: %(types)s.

en	%(name)s must have one of the following disklabel types: %(types)s.

en	%(desc)s cannot be of type %(type)s.

en	%(desc)s must be mounted on one of %(mountpoints)s.

en	%(desc)s must be between %(min)d and %(max)d MB in size

en	%(desc)s must not be smaller than %(min)dMB.

en	%(desc)s must not be larger than %(max)dMB.

en	%(desc)s must be within the first %(max_end)s of the disk.

en	Boot loader stage1 device cannot be on an iSCSI disk which is not configured in iBFT.

en	%(bootloader_stage2_description)s cannot be on an iSCSI disk which is not configured in iBFT.

en	%(desc)s cannot be of type %(type)s

en	Failed to proceed with the installation.

en	No disk found for specified BIOS disk "%s".

en	RAID partition "%s" is defined multiple times.

en	PV partition "%s" is defined multiple times.

en	Btrfs partition "%s" is defined multiple times.

en	The size "%s" is invalid.

en	part --noformat must also use the --onpart option.

en	Partition "%s" given in part command does not exist.

en	Target size "%(size)s" for device "%(device)s" is invalid.

en	The "%s" file system type is not supported.

en	Disk "%s" given in part command does not exist.

en	Cannot install to unpartitionable device "%s".

en	Disk "%s" in part command is not partitioned.

en	The maximum size "%s" is invalid.

en	The mount point "%s" is not valid. It must start with a /.

en	raid --noformat must also use the --device option.

en	RAID device "%s" given in raid command does not exist.

en	RAID device "%(device)s" has a format of "%(format)s", but should have a format of "mdmember".

en	Tried to use undefined partition "%s" in RAID specification.

en	RAID volume "%s" specified with --useexisting does not exist.

en	The RAID volume name "%s" is already in use.

en	Physical volume "%(device)s" has a format of "%(format)s", but should have a format of "lvmpv".

en	Tried to use undefined partition "%s" in Volume Group specification

en	Volume group "%s" defined without any physical volumes. Either specify physical volumes or use --useexisting.

en	Volume group given physical extent size of "%(extentSize)s", but must be one of: %(validExtentSizes)s.

en	volgroup --noformat and volgroup --useexisting must also use the --name= option.

en	Volume group "%s" given in volgroup command does not exist.

en	The volume group name "%s" is already in use.

en	No volume group exists with the name "%s". Specify volume groups before logical volumes.

en	Cache PVs must belong to the same VG as the cached LV

en	No thin pool exists with the name "%s". Specify thin pools before thin volumes.

en	logvol --noformat must also use the --name= option.

en	Logical volume "%s" given in logvol command does not exist.

en	Logical volume name "%(logvol)s" is already in use in volume group "%(volgroup)s".

en	Logical volume size "%(logvolSize)s" must be larger than the volume group extent size of "%(extentSize)s".

en	Btrfs partition "%(device)s" has a format of "%(format)s", but should have a format of "btrfs".

en	Tried to use undefined partition "%s" in Btrfs volume specification.

en	Btrfs volume defined without any member devices. Either specify member devices or use --useexisting.

en	Btrfs volume "%s" specified with --useexisting does not exist.

en	No usable disks selected.

en	No big enough free space on disks for automatic partitioning

en	Unknown or invalid device '%s' specified

en	Unknown or invalid format '%(format)s' specified for device '%(device)s'

en	No format on device '%s'

en	Failed to add a device.

en	New {name} {version} Installation

en	Cannot set label on file system.

en	Unacceptable label format for file system.

en	Please enter a valid mount point.

en	Invalid container name.

en	Name is already in use.

en	The RAID level you have selected ({level}) requires more disks ({min}) than you currently have selected ({count}).

en	Please enter a mount point.

en	/boot/efi must be on a device of type {type} or {another}

en	{fs} must be on a device of type {type}

en	{} cannot be encrypted

en	You must create a new file system on the root device.

en	Device does not support RAID level selection {}.

en	This Software RAID array is missing %(missing)d of %(total)d member partitions. You can remove it or select a different device.

en	This LVM Volume Group is missing %(missingPVs)d of %(totalPVs)d physical volumes. You can remove it or select a different device.

en	This %(type)s device is missing member devices. You can remove it or select a different device.

en	Failed to change a device.

en	File system type "{}" given in autopart command is invalid.

en	Btrfs file system is not supported.
et	Selle failisüsteemi suurust ei saa muuta.

en	Disklabel "{}" given in clearpart command is not supported on this platform.

en	Disk "{}" given in clearpart command does not exist.

en	Device "{}" given in clearpart device list does not exist.

en	Disk "{}" given in ignoredisk command does not exist.

en	NIC "{}" given in fcoe command does not exist.

en	Network interface "{nic}" required by iSCSI "{iscsi_target}" target is not up.

en	iscsi --iface must be specified (binding used) either for all targets or for none

en	Namespace "{}" given in nvdimm command was not found.

en	Disk "{}" given in nvdimm command does not exist.

en	Incorrectly specified origin of the snapshot. Use format "VolGroup/LV-name"

en	Snapshot: origin "%s" doesn't exist!

en	Snapshot: origin "%(origin)s" of snapshot "%(name)s" is not a valid thin LV device.

en	Snapshot %s already exists.

en	An error occurred while resizing the device {}: {}

en	Gathering entropy 100%

en	Gathering entropy (time ran out)

en	Gathering entropy {percents}% (remaining time {time})

en	First sector of boot partition

en	RAID Device

en	Master Boot Record

en	EFI System Partition

en	PReP Boot Partition

en	Apple EFI Boot Partition

en	Apple Bootstrap Partition

en	DASD

en	zFCP

en	You must include at least one disk as an install target.

en	You must include at least one MBR- or GPT-formatted disk as an install target.

en	For a UEFI installation, you must include an EFI System Partition on a GPT-formatted disk, mounted at /boot/efi.

en	For a UEFI installation, you must include a Linux HFS+ ESP on a GPT-formatted disk, mounted at /boot/efi.

en	You must include a PReP Boot Partition within the first 4GiB of an MBR- or GPT-formatted disk.

en	You must include an Apple Bootstrap Partition on an Apple Partition Map-formatted disk.

en	You must include at least one MBR- or DASD-formatted disk as an install target.

en	You must include at least one MBR-formatted disk as an install target.

en	You have not defined a root partition (/), which is required for installation of %s to continue.

en	Your root partition must be on a device of type: %s.

en	The LDL DASD disk {name} ({busid}) cannot be used for the installation. Please format it.

en	It is recommended to create a new file system on your %(mount)s partition.

en	Your %(mount)s partition is less than %(size)s which is lower than recommended for a normal %(productName)s install.

en	Your %(mount)s partition size is lower than required %(size)s.

en	Your %(mount)s partition is too small for %(format)s formatting (allowable size is %(minSize)s to %(maxSize)s)

en	Your %(mount)s partition is too large for %(format)s formatting (allowable size is %(minSize)s to %(maxSize)s)

en	No valid boot loader target device found. See below for details.

en	You have not created a bootable partition.

en	Your BIOS-based system needs a special partition to boot from a GPT disk label. To continue, please create a 1MiB 'biosboot' type partition.

en	Your firmware doesn't support XFS file system features on the /boot file system. The system will not be bootable. Please, upgrade the firmware or change the file system type.

en	You have not specified a swap partition. %(requiredMem)s of memory is recommended to continue installation without a swap partition, but you only have %(installedMem)s.

en	You have not specified a swap partition. %(requiredMem)s of memory is required to continue installation without a swap partition, but you only have %(installedMem)s.

en	You have not specified a swap partition. Although not strictly required in all cases, it will significantly improve performance for most installations.

en	At least one of your swap devices does not have a UUID, which is common in swap space created using older versions of mkswap. These devices will be referred to by device path in /etc/fstab, which is not ideal since device paths can change under a variety of circumstances.

en	This mount point is invalid. The %s directory must be on the / file system.

en	Your %s must be on a separate partition or LV.
et	%s peab olema primaarsel partitsioonil.

en	The mount point %s must be on a linux file system.

en	The existing unlocked LUKS device {} cannot be used for the installation without an encryption key specified for this device. Please, rescan the storage.

en	Encryption requested for LUKS device %s but no encryption key specified for this device.

en	The available memory is less than %(size)s which can be too small for LUKS2 format. It may fail.

en	%s is currently mounted and cannot be used for the installation. Please unmount it and retry.

en	Selected disks {} contain volume group '{}' that also uses further unselected disks. You must select or de-select all these disks as a set.

en	{device_description} ({device_name})

en	{device_name} on {container_name}

en	There is an entry in your /etc/fstab file that contains an invalid or incorrect file system type. The file says that {detected_type} at {mount_point} is {fstab_type}.

en	Escrow certificate %s requires the network.

en	SSL error while downloading the escrow certificate: %s

en	The following error was encountered while downloading the escrow certificate: %s

en	Unknown Linux

en	{product} {version} for {arch}

en	{product} Linux {version} for {arch}

en	The selected disk {} is not recognized.

en	You selected disk %(selected)s, which contains devices that also use unselected disk %(unselected)s. You must select or de-select these disks as a set.

en	Workarounds for manual installations: * Select only the disks with the same sector size during manual installation in graphical or text mode. * When disks with inconsistent sector size are selected for the installation, restrict each created LVM Volume Group to use Physical Volumes with the same sector size. This can only be done in graphical mode in the Custom partitioning spoke. Workarounds for kickstart installations: * Restrict what disks are used for the partitioning by specifying 'ignoredisk --drives=..' or 'ignoredisk --only-use=..'. * Specify what disks should be used for each created LVM Physical Volume: partition pv.1 --ondisk=..'. General workarounds: * Plain partitioning scheme can be used instead of LVM. * Some drives support re-configuration of sector sizes, for example by running 'hdparm --set-sector-size=<SIZE> <DEVICE>'.

en	Invalid time source.
et	Vigane ajatsoon

en	Please select an organization for your account and try again.

en	Registration failed.
et	Ühendus nurjus

en	Unregistration failed.
et	Ühendus nurjus

en	Failed to attach subscription.

en	product name unknown

en	unknown
et	Tundmatu

en	not available
et	Pole saadaval

en	Registration failed due to insufficient credentials.

en	Unsupported

en	Btrfs

en	LVM Thin Provisioning

en	The 'swap' area on your computer is used by the operating system when running low on memory.

en	The 'boot' area on your computer is where files needed to start the operating system are stored.

en	The 'root' area on your computer is where core system files and applications are stored.

en	The 'home' area on your computer is where all your personal data is stored.

en	The BIOS boot partition is required to enable booting from GPT-partitioned disks on BIOS hardware.

en	The PReP boot partition is required as part of the boot loader configuration on some PPC platforms.

en	Missing name of the %addon section.

en	Unknown name of the %addon section.

en	Unable to encrypt password: unsupported algorithm {}

en	User name is reserved for system: %s

en	Either a group name in the group list is invalid or groups are not separated by a comma.

en	Name cannot start with '-' character.

en	Name '%s' is not allowed.

en	Fully numeric name is not allowed.

en	Name '$' is not allowed.

en	Name cannot contain character: '%s'

en	Name must be shorter than 33 characters.

en	Name '%s' is invalid.

en	Support for this hardware has been removed in this major OS release. Please check the removed functionality section of the release notes.

en	This hardware (or a combination thereof) is not supported by Red Hat. For more information on supported hardware, please refer to http://www.redhat.com/hardware.

en	No disks detected. Please shut down the computer, connect at least one disk, and restart to complete installation.

en	Simultaneous Multithreading (SMT) technology can provide performance improvements for certain workloads, but introduces several publicly disclosed security issues. You have the option of disabling SMT, which may impact performance. If you choose to leave SMT enabled, please read https://red.ht/rhel-smt to understand your potential risks and learn about other ways to mitigate these risks.

en	Simultaneous Multithreading (SMT) may improve performance for certain workloads, but introduces several publicly disclosed security issues. You can disable SMT, which may impact performance. Please read https://red.ht/rhel-smt to understand potential risks and learn about ways to mitigate these risks.

en	The password is empty.

en	The passphrase is empty.

en	The passwords do not match.

en	The passphrases do not match.

en	The passwords you entered were different. Please try again.

en	The passphrases you entered were different. Please try again.

en	The password is too short

en	The passphrase is too short

en	The password you have provided is weak.

en	The passphrase you have provided is weak.

en	The password you have provided is weak:

en	The passphrase you have provided is weak:

en	Press Done again to use the password anyway.

en	The password you have provided contains non-ASCII characters. You may not be able to switch between keyboard layouts when typing it.

en	The passphrase you have provided contains non-ASCII characters. You may not be able to switch between keyboard layouts when typing it.

en	You will have to press Done twice to confirm it.

en	Password set.

en	Empty

en	Too short

en	Good

en	Strong

en	Hide password.

en	Show password.

en	Probing storage...

en	Anaconda Installer

en	No host url

en	malformed URL, cannot parse it.

en	URL has no host component

en	The %%anaconda section has been deprecated. It may be removed from future releases, which will result in a fatal error when it is encountered. Please modify your kickstart file to remove this section.

en	Some warnings occurred during reading the kickstart file:

en	An error occurred during reading the kickstart file: %s The installer will now terminate.

en	Text mode provides a limited set of installation options. It does not offer custom partitioning for full control over the disk layout. Would you like to use VNC mode instead?

en	X was unable to start on your machine. Would you like to start VNC to connect to this computer from another computer and perform a graphical installation or continue with a text mode installation?

en	An error occurred while activating your storage configuration.

en	There is a problem with your existing storage configuration or your initial settings, for example a kickstart file. You must resolve this matter before the installation can proceed. There is a shell available for use which you can access by pressing ctrl-alt-f1 and then ctrl-b 2. Once you have resolved the issue you can retry the storage scan. If you do not fix it you will have to exit the installer.

en	_Exit Installer

en	_Retry

en	Some packages, groups or modules are broken, the installation will be aborted.

en	Would you like to ignore this and continue with installation?

en	There was an error running the kickstart script at line %(lineno)s. This is a fatal error and installation will be aborted. The details of this error are: %(details)s

en	The following error occurred while setting up the payload. This is a fatal error and installation will be aborted.

en	The following error occurred while installing the payload. This is a fatal error and installation will be aborted.

en	The following software marked for installation has errors. This is likely caused by an error with your installation source.

en	The following error occurred while installing the boot loader. The system will not be bootable. Would you like to ignore this and continue with installation?

en	Failed to provision the target system for Satellite.

en	The following error occurred during the installation: {details} Would you like to ignore this and continue with installation?

en	An error occurred during Red Hat Insights configuration. Would you like to ignore this and continue with installation?

en	Configuring Red Hat subscription

en	Configuring installed system

en	Writing network configuration

en	Creating users

en	Configuring addons

en	Generating initramfs

en	Setting up kexec

en	Storing configuration files and kickstarts

en	Running post-installation scripts

en	Waiting for %s threads to finish

en	Setting up the installation environment

en	Configuring storage

en	Running pre-installation tasks

en	Installing.

en	Installing boot loader

en	Performing post-installation setup tasks

en	Creating snapshots

en	Host name cannot be None or an empty string.

en	Host name must be 64 or fewer characters in length.

en	Local host name must not end with period '.'.

en	Host names can only contain the characters 'a-z', 'A-Z', '0-9', '-', or '.', parts between periods must contain something and cannot start or end with '-'.

en	Status not available

en	Connecting...

en	Disconnecting...

en	Wired (%(interface_name)s) connected

en	Wireless connected to %(access_point)s

en	Bond %(interface_name)s (%(list_of_slaves)s) connected

en	Team %(interface_name)s (%(list_of_slaves)s) connected

en	Bridge %(interface_name)s (%(list_of_slaves)s) connected

en	VLAN %(interface_name)s (%(parent_device)s, ID %(vlanid)s) connected

en	Connected: %(list_of_interface_names)s

en	Giving up attempting to connect after %d try!

en	Attempting to start vncconfig

en	Please manually connect your vnc client to IP-ADDRESS:%s to begin the install. Switch to the shell (Ctrl-B 2) and run 'ip addr' to find the IP-ADDRESS.

en	You chose to connect to a listening vncviewer. This does not require a password to be set. If you set a password, it will be used in case the connection to the vncviewer is unsuccessful

en	WARNING!!! VNC server running with NO PASSWORD! You can use the vncpassword=PASSWORD boot option if you would like to secure the server.

en	VNC password must be six to eight characters long. Please enter a new one, or leave blank for no password.

en	%(productName)s %(productVersion)s INSTALLATION

en	Checking image checksum

en	Downloading %(url)s (%(pct)d%%)

en	Downloading %(total_files)s RPMs, %(downloaded)s / %(total_size)s (%(percent)d%%) done.

en	Downloading packages

en	Installing %s

en	Configuring %s

en	Verifying %s

en	Failed to set up installation source

en	Error downloading package metadata

en	status: working

en	status: not working

en	checking status

en	NTP servers:

en	not configured

en	CUSTOMIZATION

en	USER SETTINGS

en	Warning: Processor has Simultaneous Multithreading (SMT) enabled. Click for details.

en	The following warnings were encountered when checking your kernel configuration. These are not fatal, but you may wish to make changes to your kernel config.

en	_OK

en	Please complete items marked with this icon before continuing to the next step.

en	WELCOME TO %(name)s %(version)s.

en	Invalid group name.

en	_User Creation

en	The password was set by kickstart.

en	No user will be created

en	Administrator %s will be created

en	User %s will be created

en	Installation requires a total of %s for system data.

en	This device contains the installation source.

en	You can remove existing file systems you no longer need to free up space for this installation. Removing a file system will permanently delete all of the data it contains.

en	There is also free space available in pre-existing file systems. While it's risky and we recommend you back up your data first, you can recover that free disk space and make it available for this installation below.

en	%(freeSize)s of %(devSize)s

en	Not resizeable

en	Free space

en	%(count)s disk; %(size)s reclaimable space (in file systems)

en	Total selected space to reclaim: %s

en	Delete _all

en	Preserve _all

en	Your current %(product)s software selection requires %(total)s of available space, including %(software)s for software and %(swap)s for swap space.

en	Your current %(product)s software selection requires %(total)s of available space, including %(software)s for software and %(swap)s for swap space.

en	%s The disks you've selected have the following amounts of free space:

en	You don't have enough space available to install %s. You can shrink or remove existing partitions via our guided reclaim space tool, or you can adjust your partitions on your own in the custom partitioning interface.

en	You don't have enough space available to install %(product)s, even if you used all of the free space available on the selected disks.

en	You don't have enough space available to install %(productName)s, even if you used all of the free space available on the selected disks. You could add more disks for additional space, modify your software selection to install a smaller version of %(productName)s, or quit the installer.

en	You haven't created any mount points for your %(product)s %(version)s installation yet. You can:

en	_Click here to create them automatically.

en	Create new mount points by clicking the '+' button.

en	Or, assign new mount points to existing partitions after selecting them below.

en	_New mount points will use the following partitioning scheme:

en	_Automatically created mount points can be encrypted by default:

en	Authentication required by wireless network

en	Passwords or encryption keys are required to access the wireless network '%(network_id)s'.

en	_Password:

en	_Key:

en	User name:

en	Identity:

en	Private key password:

en	Other ({})

en	Not Specified
et	Pole ühendatud

en	Service level

en	SKU

en	Contract

en	Start date
et	Käivita VNC

en	End date

en	Entitlements

en	{} consumed

en	_Do not install boot loader

en	_Set as Boot Device

en	Create a new %(container_type)s ...

en	Create or select %(container_type)s

en	CONFIGURE %(container_type)s

en	Please create a name for this %(container_type)s and select at least one disk below.

en	Specify the Desired Capacity in whole or decimal numbers, with an appropriate unit. Spaces separating digit groups are not allowed. Units consist of a decimal or binary prefix, and optionally the letter B. Letter case does not matter for units. The default unit used when units are left out is MiB. Examples of valid input: '100 GiB' = 100 gibibytes '512m' = 512 megabytes '123456789' = 123 terabytes and a bit less than a half

en	Volume Group

en	_Volume Group:

en	Volume

en	_Volume:

en	container

en	container

en	Do _not show this dialog for other selected file systems.

en	Delete _all file systems which are only used by {}.

en	{} may be a system boot partition! Deleting it may break other operating systems. Are you sure you want to delete it?

en	Are you sure you want to delete all of the data on {}, including subvolumes?

en	Are you sure you want to delete all of the data on {}, including snapshots?

en	Are you sure you want to delete all of the data on {}?
et	Kas sa oled kindel,et soovid paigaldusprotseduuri katkestada?

en	No disks selected.
et	Ühtegi ketast pole valitud

en	_Cancel

en	_Quit

en	Installation _Destination

en	Partitioning method changed - planned storage configuration changes will be cancelled.

en	Processing...

en	Kickstart insufficient

en	Error checking storage configuration

en	Warning checking storage configuration

en	Error checking storage configuration. Click for details.

en	Warning checking storage configuration. Click for details.

en	FCP device {hba_id} WWPN {wwpn} LUN {lun}

en	NVDIMM device {namespace}

en	{} free
et	vaba ruum

en	You have chosen to skip boot loader installation. Your system may not be bootable.

en	There was a problem with your disk selection. Click here for details.

en	The following errors were encountered when checking your disk selection. You can modify your selection or quit the installer.

en	_Quit

en	_Modify Disk Selection

en	The following errors were encountered when checking your storage configuration. You can modify your storage layout or quit the installer.

en	_Modify Storage Layout

en	The following warnings were encountered when checking your storage configuration. These are not fatal, but you may wish to make changes to your storage layout.

en	_OK

en	_Language Support

en	%s to switch layouts.

en	_Keyboard

en	Testing layouts configuration not available.

en	Getting list of layouts...

en	Keyboard layouts are not supported when using VNC. However the settings will be used after the installation.

en	Layout switching not configured.

en	Unmanaged

en	Bond

en	VLAN

en	Team

en	Bridge

en	_Network & Host Name

en	Host name is not valid: %s

en	_Blivet-GUI Partitioning

en	Error checking storage configuration. Click for details or press Done again to continue.

en	Warning checking storage configuration. Click for details or press Done again to continue.

en	Continuing with this action will reset all your partitioning selections to their current on-disk state.

en	_Reset selections

en	_Preserve current selections

en	%d _storage device selected

en	%(items_selected)s of %(items_total)s mount points in %(page_name)s

en	Please select a single mount point to edit properties. You have currently selected: %s

en	When you create mount points for your %(name)s %(version)s installation, you'll be able to view their details here.

en	Device reconfiguration failed.

en	No disks assigned

en	and {} other

en	The container is encrypted.

en	The space available to this mount point can be changed by modifying the volume below.

en	Error checking storage configuration. Click for details or press Done again to continue.

en	Warning checking storage configuration. Click for details or press Done again to continue.

en	Failed to add new device.

en	Device removal request failed.

en	No disks selected. Keeping previous disk set.

en	({} free)

en	Automatic partitioning failed.

en	Invalid input. Specify the Desired Capacity in whole or decimal numbers, with an appropriate unit.

en	Click for details.

en	Failed to unlock encrypted block device.

en	Setting up installation source...

en	Invalid proxy URL

en	Invalid proxy protocol: %s

en	Extra characters in proxy URL

en	Proxy authentication data duplicated

en	_Installation Source

en	Failed to set up installation source; check the repo url

en	Satellite

en	Error setting up base repository

en	Failed to set up installation source; check the repo url and proxy settings.

en	Device: %s

en	Label: %s

en	You need to configure the network to use a network installation source.

en	_Satellite

en	Red Hat _CDN

en	Repository %s has empty url

en	URL is empty

en	Repository %s has invalid url

en	Invalid URL

en	Repository %s does not match selected protocol

en	Protocol in URL does not match selected protocol

en	Repository %s has empty NFS server

en	NFS server is empty

en	Repository %s has invalid host name

en	Invalid host name

en	Repository %s required remote directory

en	Remote directory is required

en	Duplicate repository names.

en	Empty repository name

en	Invalid repository name

en	Repository name conflicts with internal repository name.

en	_Time & Date

en	Restoring hardware time...

en	PM

en	AM

en	Use of this product is subject to the license agreement found at %s

en	_Reboot System

en	_Finish Installation

en	%s is now successfully installed and ready for you to use! Go ahead and reboot your system to start using it!

en	%s is now successfully installed and ready for you to use! Go ahead and quit the application to start using it!

en	The following nodes were discovered using the iSCSI initiator %(initiatorName)s using the portal IP address %(portalAddress)s. Please select which nodes you wish to log into:

en	No device to be reconfigured selected.

en	Rescanning disks finished.

en	_Software Selection

en	Red Hat CDN requires registration.

en	Source changed - please verify

en	Invalid environment specified in kickstart

en	Please confirm software selection
et	Viga tarkvara valiku kontrollimisel

en	Selected environment is not valid

en	Error checking software dependencies. Click for details.

en	The software marked for installation has the following errors. This is likely caused by an error with your installation source. You can quit the installer, change your software source, or change your software selections.

en	_Quit

en	_Modify Software Source

en	Modify _Selections

en	_Connect to Red Hat
et	Ühendatud

en	Activation key set.

en	Unregistering...
et	Ühendus nurjus

en	Registering...

en	Attaching subscription...

en	Subscription attached.

en	Registered to Satellite.
et	Ühendus nurjus

en	Registered.
et	Ühendus nurjus

en	Not registered.

en	The system is registered to a Satellite instance.

en	The system is registered.
et	Selle failisüsteemi suurust ei saa muuta.

en	Registered with account {}

en	Registered with organization {}

en	Role: {}

en	SLA: {}

en	Usage: {}

en	Connected to Red Hat Insights
et	Ühendatud

en	Not connected to Red Hat Insights
et	Ühendatud

en	Subscribed in Simple Content Access mode.

en	No subscriptions are attached to the system

en	1 subscription attached to the system

en	{} subscriptions attached to the system

en	Please enable network access before connecting to Red Hat.

en	_Root Password

en	Root password has been set.

en	_Installation Destination

en	{} _storage device selected

en	Help!

en	_No

en	_Yes

en	Nothing to format

en	Formatting DASDs

en	Probing storage

en	{count} disk selected; {capacity} capacity; {free} free

en	Saving storage configuration...

en	Failed to save storage configuration

en	Failed to save boot loader configuration

en	Checking storage configuration...

en	Root account is disabled
et	Administraatori konto on keeltaud.

en	Root password is set

en	Not enough space in file systems for the current software selection. An additional {} is needed.

en	Not enough space in file systems for the current software selection.

en	to begin installation

en	Installation

en	Enter '%s' to ignore the warning and attempt to install anyway.

en	The following mandatory spokes are not completed:

en	Please complete all spokes before continuing

en	Default HUB title

en	to enter the %(spoke_title)s spoke

en	Full name can't contain the ':' character

en	User creation

en	Create user

en	Full name

en	User name

en	Use password

en	Password

en	Administrator

en	Groups

en	You must set a password

en	Invalid user name: %(name)s. %(error_message)s

en	to go back to region list

en	Time settings

en	not set

en	Timezone: %s

en	Change timezone

en	Set timezone

en	Configure NTP servers

en	Available timezones in region %s

en	Available regions

en	Please select the timezone. Use numbers or type names directly

en	NTP configuration

en	Add NTP server

en	Remove NTP server

en	Add NTP server address

en	Enter an NTP server address and press %s

en	Select an NTP server to remove

en	to rescan devices

en	Installation Destination

en	Select all

en	The following unformatted or LDL DASDs have been detected on your system. You can choose to format them now with dasdfmt or cancel to leave them unformatted. Unformatted DASDs cannot be used during installation.

en	Warning: All storage changes made using the installer will be lost when you choose to format. Proceed to run dasdfmt?

en	This may take a moment.

en	Passphrase

en	Please provide a default LUKS passphrase for all devices you want to encrypt. You will have to type it twice.

en	Partitioning Options

en	Manually assign mount points

en	Installation requires partitioning of your hard drive. Select what space to use for the install target or manually assign mount points.

en	Reverting previous configuration. This may take a moment...

en	Partition Scheme Options

en	Select a partition scheme configuration.

en	Assign mount points

en	Choose device from above to assign mount point and set format. Formats marked with * are new formats meaning ALL DATA on the original format WILL BE LOST!

en	Warning: This will revert all changes done so far. Do you want to proceed?

en	Scanning disks. This may take a moment...

en	Configure device: %s

en	Choose from above to assign mount point and/or set format.

en	Mount point

en	none

en	Invalid mount point given

en	Format

en	Invalid or unsupported format given

en	Supported formats: %s

en	Reformat

en	to return to language list

en	Language settings

en	Language is not set.

en	Available locales

en	Available languages

en	Please select language support to install

en	Warning: Processor has Simultaneous Multithreading (SMT) enabled

en	Bad format of the IP address

en	Bad format of the netmask

en	Network configuration

en	Wired (%(interface_name)s) disconnected

en	Wired (%(interface_name)s) connected

en	IPv4 Address: %(addr)s Netmask: %(netmask)s Gateway: %(gateway)s

en	DNS: %s

en	IPv6 Address: %(addr)s/%(prefix)d

en	Network configuration is not available.

en	Host Name: %s

en	Current host name: %s

en	Host Name

en	Set host name

en	Configure device %s

en	Device configuration

en	IPv4 address or %s for DHCP

en	IPv4 netmask

en	IPv4 gateway

en	IPv6 address[/prefix] or %(auto)s for automatic, %(dhcp)s for DHCP, %(ignore)s to turn off

en	IPv6 default gateway

en	Nameservers (comma separated)

en	Connect automatically after reboot

en	Apply configuration in installer

en	Configuring device %s.

en	Configuration not saved: netmask missing in static configuration

en	Installation source

en	Choose an installation source type.

en	CD/DVD

en	local ISO file

en	Network

en	SE/HMC

en	Specify Repo Options

en	Repo URL

en	SERVER:/PATH

en	NFS mount options

en	Server must be specified as SERVER:/PATH

en	Select device containing the ISO file

en	No mountable devices found

en	Select an ISO to use as install source

en	No *.iso files found in device root folder

en	Please provide VNC password (must be six to eight characters long). You will have to type it twice. Leave blank for no password

en	The password cannot be more than eight characters long.

en	Progress

en	Installation complete

en	Use of this product is subject to the license agreement found at:

en	Installation complete. Press %s to quit

en	Shell

en	Start shell

en	Exit the shell to continue

en	Software selection

en	Installation source needs to be set up first.

en	Base environment

en	Additional software for selected environment

en	No additional software to select.
et	Kohandatud tarkvara valitud

en	Default spoke title

en	testing status...

en	Root password

en	Unsupported Hardware Detected

en	Enter a new value for '%(title)s' and press %(enter)s

en	Would you like to use it anyway?

en	Full name cannot contain colon characters

en	policy name required for %s

en	A %(command)s with the name %(policyName)s has already been defined.

en	The pwpolicy command has been deprecated. It may be removed from future releases, which will result in a fatal error when it is encountered. Please modify your kickstart file to remove this command.

en	%(product_name)s requires %(needed_ram)s MB of memory to install, but you only have %(total_ram)s MB on this machine.

en	The %(product_name)s graphical installer requires %(needed_ram)s MB of memory, but you only have %(total_ram)s MB.

en	Press [Enter] to reboot your system.

en	The installation cannot continue and the system will be rebooted

en	Press ENTER to continue

en	Please ssh install@HOSTNAME to continue installation.

en	Unable to find /bin/bash to execute! Not starting shell.

en	The rescue environment will now attempt to find your Linux installation and mount it under the directory : %s. You can then make any changes required to your system. Choose '1' to proceed with this step. You can choose to mount your file systems read-only instead of read-write by choosing '2'. If for some reason this process does not work choose '3' to skip directly to a shell.

en	Read-only mount

en	Skip to shell

en	Quit (Reboot)

en	Rescue Shell

en	When finished, please exit from the shell and your system will reboot.

en	Your system has been mounted under %(mountpoint)s. If you would like to make the root of your system the root of the active system, run the command: chroot %(mountpoint)s

en	An error occurred trying to mount some or all of your system: {message} Some of it may be mounted under {path}.

en	You don't have any Linux partitions.

en	Not mounting the system.

en	Please press %s to get a shell

en	Root Selection

en	The following installations were discovered on your system.

en	FOO

en	BAR

en	BAZ

en	Unable to create PID file

en	Anaconda is unable to create %s because the file already exists. Anaconda is already running, or a previous instance of anaconda has crashed.

en	_Quit

en	_Continue

en	DISTRIBUTION INSTALLATION

en	SPOKE NAME

en	PRE-RELEASE / TESTING

en	Current layout: '%s'. Click to switch to the next layout.

en	Current layout: '%s'. Add more layouts to enable switching.

en	New Selector

en	_Done

en	_Quit

en	_Begin Installation

en	We won't touch your disks until you click 'Begin Installation'.

en	RAID0

en	RAID1

en	RAID4

en	RAID5

en	RAID6

en	RAID10

en	Add a new mount point.

en	Add

en	Remove the selected mount point(s).

en	Remove

en	Reload storage configuration from disk.

en	Refresh

en	Mount _Point:

en	Desired _Capacity:

en	_Label:

en	Device(s):

en	_Modify...

en	_Name:

en	Device _Type:

en	_Encrypt

en	File S_ystem:

en	Ref_ormat

en	_Volume Group:

en	_Modify...

en	RA_ID Level:

en	LUKS Version:

en	_Update Settings

en	Note: The settings you make on this screen will not be applied until you click on the main menu's 'Begin Installation' button.

en	This device is encrypted and cannot be read without a valid passphrase. You may unlock it below.

en	_Passphrase:

en	_Unlock

en	This device cannot be edited directly. You can remove it or select a different device.

en	AVAILABLE SPACE

en	TOTAL SPACE

en	_Discard All Changes

en	Return partitioning to the original state before you made any changes. This is not a destructive operation.

en	_Cancel

en	_OK

en	Add and mark for usage NTP servers

en	New NTP Server

en	Add NTP Server

en	This URL refers to a pool of NTP servers

en	Server supports Network Time Security (NTS) authentication

en	Pool

en	Configure NTP

en	TIME & DATE

en	_Region:

en	Region

en	_City:

en	City

en	_Network Time

en	Use Network Time

en	Hours

en	Minutes

en	Hour Up

en	Hour Down

en	Minutes Up

en	Minutes Down

en	AM/PM Up

en	AM/PM Down

en	24-_hour

en	_AM/PM

en	Set Date & Time

en	I want to _exit.

en	I want to _proceed.

en	This is unstable, pre-release software.

en	Notice: This is pre-released software that is intended for development and testing purposes only. Do *not* use this software for any critical work or for production environments. By clicking "I want to proceed", you understand and accept the risks associated with pre-released software, that you intend to use this for testing and development purposes only and are willing to report any bugs or issues in order to enhance this work. If you do not understand or accept the risks, then please exit this program by selecting "I want to exit" which will reboot your system.

en	Beta Warn

en	Languages

en	Type here to search.

en	Locales

en	WELCOME

en	_Root Password:

en	_Confirm:

en	Confirm Password

en	empty password

en	The root account is used for administering the system. Enter a password for the root user.

en	Lock root account

en	Allow root SSH login with password

en	UNFORMATTED DASDS

en	_Cancel

en	_OK

en	The following unformatted or LDL DASDs have been detected on your system. You can choose to format them now with dasdfmt or cancel to leave them unformatted. Unformatted DASDs cannot be used during installation.

en	Unformatted DASDs Detected

en	Warning: All storage changes made using the installer will be lost when you choose to format.

en	_Format with dasdfmt

en	This may take a moment. You may go back to the main menu to complete other installation options while formatting completes.

en	Disk formatting complete.

en	_Quit

en	_Continue

en	Unsupported Hardware

en	SUMMARY OF CHANGES

en	_Cancel & Return to Custom Partitioning

en	_Accept Changes

en	Your customizations will result in the following changes taking effect after you return to the main menu and begin installation:

en	Order

en	Type

en	Device

en	RESCAN DISKS

en	_Cancel

en	_OK

en	You can remove or insert additional disks at this time and press 'Rescan Disks' below for the changes to take effect.

en	Warning: All storage changes made using the installer will be lost when you press 'Rescan Disks'.

en	_Rescan Disks

en	Scanning disks. This may take a moment...

en	You may go back to the main menu to complete other installation options while this scan completes.

en	Disk rescan complete.

en	Pressing 'OK' below will take you to the disk selection screen where you will need to re-select your disks.

en	_Cancel

en	_Reclaim space

en	RECLAIM DISK SPACE

en	Description goes here.

en	File System

en	Reclaimable Space

en	_Preserve

en	_Delete

en	_Shrink

en	Reclaim

en	_Cancel & add more disks

en	_Reclaim space

en	Here we'll describe how much space is needed for the current software selection.

en	fs free

en	Free space unavailable but reclaimable from existing partitions.

en	Need Space

en	_Quit installer

en	_Cancel

en	No Space

en	Authentication

en	_Cancel

en	C_onnect

en	Passwords or encryption keys are required to access the wireless network

en	An unknown error occurred during installation. Details are below.

en	_Cancel

en	_Delete It

en	_Cancel

en	_Select

en	Select one or more disks this device may reside on.

en	_Cancel

en	_Add mount point

en	Desired _Capacity:

en	Mount _Point:

en	More customization options are available after creating the mount point below.

en	That mount point is already in use. Try something else?

en	Enter size and unit.

en	Single

en	_Cancel

en	_Save

en	CONFIGURE CONTAINER

en	Please create a name for this container and select at least one disk below.

en	_Name:

en	LUKS Version:

en	Encrypt

en	RAID Level:

en	Please enter a valid name.

en	Si_ze policy:

en	Automatic

en	As large as possible

en	Fixed

en	_Cancel

en	_Save Passphrase

en	DISK ENCRYPTION PASSPHRASE

en	You have chosen to encrypt some of your data. You will need to create a passphrase that you will use to access your data when you start your computer.

en	_Passphrase:

en	Con_firm:

en	Warning: You won't be able to switch between keyboard layouts (from the default one) when you decrypt your disks after install.

en	SELECTED DISKS AND BOOT LOADER
et	VALITUD KETTAD

en	_Close

en	Selected disks
et	Valitud seade

en	Boot

en	_Remove

en	Secure Boot
et	Turvalisus

en	Firmware will verify the integrity of the Linux kernel during boot if the Secure Boot is enabled and configured on the machine. Secure Boot is not supported on IBM z14 and earlier models, therefore choose to disable it if you intend to boot the installed system on such models.

en	Enabled if supported by the installing machine

en	Enabled unconditionally

en	Disabled

en	LANGUAGE SUPPORT

en	Select additional language support to be installed:

en	Device Selection

en	Select the device(s) you'd like to install to. They will be left untouched until you click on the main menu's "Begin Installation" button.

en	Local Standard Disks

en	Disks left unselected here will not be touched.

en	Specialized & Network Disks

en	_Add a disk...

en	Add Specialized Disk

en	Storage Configuration

en	A_utomatic

en	_Custom

en	Advanced Custom (_Blivet-GUI)

en	I would like to _make additional space available.

en	Encryption

en	_Encrypt my data.

en	You'll set a passphrase next.

en	Storage Options

en	_Full disk summary and boot loader...

en	_Refresh...

en	Add device

en	_Cancel

en	_Add

en	_Select the type of device you wish to add

en	Wi-Fi Networks

en	_Cancel

en	C_onfigure

en	Select a network to configure

en	_Cancel

en	C_onnect
et	Ühendatud

en	Select a network

en	We'll need network access to fetch information about your location and to make software updates available for you.

en	NETWORK & HOST NAME

en	Please use the live desktop environment's tools for customizing your network configuration. You can set the host name here.

en	Slaves

en	Parent

en	VLAN ID

en	_Configure...

en	My ssid

en	_Use as Hotspot...

en	_Stop Hotspot...

en	_Configure...

en	_Select network

en	_Configure...

en	User Name

en	_Configure...

en	_Method

en	_Configuration URL

en	HTTP _Proxy

en	H_TTPS Proxy

en	_FTP Proxy

en	_Socks Host

en	Network Config Box

en	Unloc_k

en	Airplane Mode

en	More Network Config Box

en	_Host Name:

en	_Apply

en	Set as current system host name.

en	Current host name:

en	CREATE USER

en	_Full name

en	_User name

en	Full Name

en	_Password

en	_Confirm password

en	_Require a password to use this account

en	_Make this user administrator

en	Allow this user to run the 'sudo' command.

en	_Advanced...

en	Which keyboard layouts would you like to use on this system? You may move any layout to the top of the list to select it as the default.

en	Changes here will only apply to the installed system. Use the desktop's tool to configure the keyboard for the installation process.

en	Selected Layouts

en	_Add layout

en	_Remove layout

en	Move selected layout _up

en	Move selected layout _down

en	_Preview layout

en	_Test the layout configuration below:

en	Alt + Shift to switch layouts.

en	_Options

en	_Cancel

en	_Add

en	You may add a keyboard layout by selecting it below:

en	Available Layouts

en	Add Layout

en	_Cancel

en	_OK

en	Which combination(s) would you prefer for switching between keyboard layouts?

en	Layout Options

en	BLIVET GUI PARTITIONING

en	_Undo last action

en	_Reset All

en	CONNECT TO RED HAT

en	_Account

en	Activation _Key

en	Organization

en	Activation Key
et	Tegevus

en	key1,key2,...

en	Purpose

en	Usage

en	Role

en	SLA

en	Set System Purpose

en	Insights

en	Connect to Red Hat _Insights

en	Custom base URL

en	Satellite URL

en	Use HTTP proxy

en	Location
et	Tegevus

en	hostname:port

en	Options
et	Tegevus

en	The system is currently not registered.
et	Selle failisüsteemi suurust ei saa muuta.

en	_Register

en	_Unregister

en	Method

en	System Purpose

en	No subscriptions have been attached to the system

en	SYSTEM PURPOSE
et	SÜSTEEM

en	_Cancel

en	_OK

en	ADD DASD STORAGE TARGET

en	To use DASD disks, you must provide the device number.

en	_Device number:

en	_Start Discovery

en	Discovering DASD devices. This may take a moment...

en	Device discovery failed.

en	The following error occurred discovering DASD devices. Please double check your configuration information and try again.

en	_Retry Discovery

en	Device discovery succeeded.

en	The added DASD can be found under "Local Standard Disks."

en	_Cancel

en	_OK

en	ADD iSCSI STORAGE TARGET

en	To use iSCSI disks, you must provide the address of your iSCSI target and the iSCSI initiator name you've configured for your host.

en	_Target IP Address:

en	iSCSI _Initiator Name:

en	No credentials (discovery authentication disabled)

en	CHAP pair

en	CHAP pair and a reverse pair

en	_Discovery Authentication Type:

en	Example: iqn.2012-09.com.example:diskarrays-sn-a8675309

en	CHAP _User name:

en	CHAP _Password:

en	CHAP _User name:

en	CHAP _Password:

en	Reverse CHAP User _name:

en	Reverse CHAP Pass_word:

en	_Start Discovery

en	Discovering iSCSI targets. This may take a moment...

en	Discovery login rejected.

en	The following error occurred discovering iSCSI targets. Please double check your authorization information and try again.

en	_Retry Discovery

en	_Bind targets to network interfaces This may take a moment...

en	Node Name

en	Interface

en	Portal

en	_Node Login Authentication Type:

en	Use the credentials from discovery

en	CHAP _User name:

en	CHAP _Password:

en	CHAP _User name:

en	CHAP _Password:

en	_Reverse CHAP User name:

en	Reverse CHAP Pass_word:

en	_Log In

en	Node login failed.

en	The following error occurred logging into the selected iSCSI node. Please double check your authorization information and try again.

en	Retry _Log In

en	_Cancel

en	Please select the network interface which is connected to your FCoE switch.

en	_NIC:

en	Use _DCB

en	Use auto _VLAN

en	_Add FCoE Disk(s)

en	Error adding FCoE SAN.

en	The following error occurred while attempting to add an FCoE SAN. Please check your configuration and try again

en	ADD zFCP STORAGE TARGET

en	To use zFCP disks, you must provide the device number, WWPN, and LUN configured for the device.

en	_Device number:

en	WWPN:

en	_Start Discovery

en	Discovering zFCP devices. This may take a moment...

en	The following error occurred discovering zFCP devices. Please double check your configuration information and try again.

en	_Retry Discovery

en	LUN:

en	_Cancel

en	The following NVDIMM devices selected from the list will be reconfigured to sector mode:

en	_Sector size:

en	Start _Reconfiguration

en	Reconfiguring NVDIMM devices. This may take a moment...

en	The following error occurred reconfiguring NVDIMM devices:

en	Devices reconfiguration succeeded.

en	Rescanning disks after reconfiguration. This may take a moment ...

en	Warning: Existing data on reconfigured devices will be lost.

en	Base Environment

en	Additional software for Selected Environment

en	_Cancel

en	_Open

en	_Cancel

en	_Cancel

en	_OK

en	_Enable HTTP Proxy

en	_Proxy Host:

en	_Use Authentication

en	User _name:

en	Pass_word:

en	Which installation source would you like to use?

en	_Auto-detected installation media:

en	Device:

en	Label:

en	_Verify

en	Installation media via SE/_HMC

en	_ISO file:

en	D_evice:

en	_Choose an ISO

en	_On the network:

en	_Proxy setup...

en	URL type:

en	repository URL

en	mirrorlist

en	metalink

en	N_FS mount options:

en	This field is optional.

en	Updates

en	Install the _latest available software updates

en	Install the _default versions provided by the installation source (above) only

en	Additional repositories

en	Enabled

en	Add a new repository.

en	A_dd

en	Remove the selected repository.

en	_Remove

en	Revert to the previous list of repositories.

en	Rese_t

en	URL for the repository, without protocol.

en	URL of proxy in the form of protocol://host:[port]

en	Optional proxy user name.

en	Optional proxy password.

en	_Name:

en	Protocol for the repository URL.

en	Pro_xy URL:

en	U_ser name:

en	Pass_word:

en	Name of the repository.

en	INSTALLATION PROGRESS

en	Search _By:

en	Port / Target / LUN #

en	Target WWID

en	_Port:

en	_Target:

en	_LUN:

en	_WWID:

en	Search Res_ults:

en	WWID

en	Interconnect

en	Model

en	LUN

en	Port

en	Target

en	Vendor

en	Namespace

en	Mode

en	Searc_h

en	Filter _By:

en	Show Only _Devices From:

en	Show Only _Devices With:

en	Show Only _Devices Containing:

en	Paths

en	_Multipath Devices

en	Filter _By:

en	Show Only _Devices From:

en	Show Only _Devices With:

en	Show Only _Devices Containing:

en	Identifier

en	_Other SAN Devices

en	Filter B_y:

en	Show Only Devices in _Mode:

en	Sector

en	Memory

en	_Namespace:

en	_NVDIMM Devices

en	Filter B_y:

en	CCW

en	WWPN

en	_CCW:

en	_WWPN:

en	_LUN:

en	_zSeries Devices

en	_Add zFCP LUN...

en	Add EC_KD DASD...

en	Add _iSCSI Target...

en	Add FCo_E SAN...

en	Reconfigure _NVDIMM...

en	Refresh _List

en	_Cancel

en	_Save Changes

en	ADVANCED USER CONFIGURATION

en	Home _directory:

en	User and Group IDs

en	Specify a _user ID manually:

en	Specify a _group ID manually:

en	Group Membership

en	_Add user to the following groups:

en	Example:

en	wheel, my-team (1245), project-x (29935)

en	Tip:

en	You may input a comma-separated list of group names and group IDs here. Groups that do not already exist will be created; specify their GID in parentheses.

en	_Exit Installer

en	_No

en	_Yes

en	Quit

en	Liveinst Setup

en	You are currently running Fedora from live media. You can install Fedora now, or choose "Install to Hard Drive" in the Activities Overview at any later time.

en	You can choose "Install to Hard Drive" in the Activities Overview at any later time.