[GeV] 2 0χ∼ , _1^±χ∼m

200 300 400

[GeV] 1 0χ∼m

50

100

150

200

0.8 pb

1.3 pb

1.9 pb

ATLAS -1 Ldt = 34 pb

∫^{= 500 GeVq~m}