Conditions for supply of software

C SydneyUniversityElectricalEngineering From:MarwanJabri

SEDAL NSW2006,AUSTRALIA Tel:+6126922240 Fax:+6126601228 Internet:Email:marwan@sedal.su.oz.au

23 April 1993

The University of Sydney agrees to grant and the Licensee agrees to accept a nontransferable and nonexclusive licence to use MUME- A Multi-Module Software Environment (“the Software”) subject to the following conditions:

1. The University of Sydney makes no representation as the adequacy of this software for any particular purpose or with respect to its adequacy to produce any particular results. No warranty or guarantee of any type is implied or intended for this material and the Licensee hereby agrees that it will not hold the University of Sydney liable for any faults in this material or for any other reason, including for claims that the software infringes on a copyright, patent or trade secret of any third party.

2. Title or ownership of the software including any modifications thereto shall at all times remain with the University of Sydney.

3. The Licensee shall not knowingly make the software available in any form to any third party except the Licensee’s faculty, students and employees for purposes of using the software in the course of bona fide research and teaching conducted by and for the Licensee.

4. The Licensee agrees to advise the University of Sydney immediately it discovers any unauthorised copies or uses of the software.

5. The Licensee shall use the software for educational and research purposes only. The Licensee agrees to inform the University of Sydney and negotiate an appropriate fee before embedding the software in any commercially available product.

Systems Engineering and Design Automation Laboratory

6. The Licensee shall inform the University of Sydney of any enhancing or problem fixing alterations made to the software by the Licensee.

7. The Licensee shall not issue modified documentation relating to the software without the prior written approval of an authorised officer of the University of Sydney.

8. The Licensee shall acknowledge the origin of the software in any publication by the Licensee referring to work performed with the aid of the software.

9. The University of Sydney hereby agrees to keep confidential any information furnished hereunder that is marked or identified as “confidential” or “proprietary” by Licensee. The information furnished and appropriately marked by Licensee shall be kept confidential by the University of Sydney for a period of three years from the date of disclosure by Licensee.

10. The University of Sydney may terminate this software licence and require return of the software if the Licensee fails to comply with the conditions of this licence, and does not remedy such noncompliance within thirty (30) days of receiving written notice of the same.

11. The term of this Licence shall commence on the date of signing of this Licence and shall continue for a period of 3 years.

12. The Licensee shall pay a fee of A$0.0 for the Licence granted hereunder. 13. The Licensee shall provide the University of Sydney technical papers and reports reporting results of the use of the software as soon as they are produced or published.

14. Upon acceptance of these terms and conditions as indicated by the signature of an officer of the Licensee having the authority to enter into such agreements, the University of Sydney will make the software available to the Licensee.

15. The University of Sydney will provide the Licensee with a password to access the Software through ftp and the Licensee agrees not to release or communicate the password to any third party.

I, an authorised official, understand and accept the stated conditions for use of the material to be provided by the University of Sydney.

Signature:

Date:

Title of Office:

Name of Organization: Address:

2